Advances in Materials Science and Engineering
Volume 2019 (2019), Article ID 6707143, 8 pages
https://doi.org/10.1155/2019/6707143

Research Article

Evaluation of Structural Properties and Catalytic Activities in Knoevenagel Condensation Reaction of Zeolitic Imidazolate Framework-8 Synthesized under Different Conditions

Pham Dinh Du,¹ Nguyen Viet Duy Thanh,² and Nguyen Trung Hieu³

¹Faculty of Natural Science, Thu Dau Mot University, Thu Dau Mot 820000, Vietnam
²Center for Vocational Education and Continuing Education, Can Tho 900000, Vietnam
³Center for Scientific Research and Practice, Thu Dau Mot University, Thu Dau Mot 820000, Vietnam

Correspondence should be addressed to Pham Dinh Du; dupd@tdmu.edu.vn

Received 27 December 2018; Accepted 21 March 2019; Published 17 April 2019

Guest Editor: Hien Duy Mai

Copyright © 2019 Pham Dinh Du et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

In the present study, the zeolitic imidazolate framework-8 (ZIF-8) was synthesized at both room temperature and high temperatures. The effects of solvents, molar ratios of precursors, reaction time, and temperature on the structural properties of the as-prepared materials were investigated. Moreover, the surface morphologies of the obtained specimens were characterized using X-ray diffraction, scanning electron microscopy, Fourier-transform infrared spectroscopy, and nitrogen adsorption methods. The results show that ZIF-8 was formed in methanol and water at room temperature and in dimethylformamide (DMF) at high temperatures. Further, in methanol, the molar ratios of precursors and reaction time have negligible effects on the morphologies and structures of ZIF-8; however, in DMF, the reaction temperature has a significant influence on the microstructures of ZIF-8. The catalytic activities of the obtained materials were evaluated using the Knoevenagel condensation reaction, and ZIF-8 proves to be an excellent solid base catalyst.

1. Introduction

Zeolitic imidazolate frameworks (ZIFs) belong to the family of metal-organic frameworks (MOFs) and possess unique properties (uniform small pores and high surface area) of both zeolites and MOFs [1, 2]. In ZIFs, divalent metal cations are found to be tetrahedrally coordinated with the imidazolate anions [2, 3]. In recent years, ZIFs have attracted significant attention in gas storage and separation applications [4, 5], catalytic reactions [6], chemical processes [7, 8], and drug delivery systems [9]. ZIF-8 is one of the most studied zeolitic imidazolate frameworks due to its high chemical and thermal stabilities. In addition, ZIF-8 has a large surface area (SBET = 1630 m²·g⁻¹) and high porosity (0.636 cm³·g⁻¹) [2]. In previous studies, ZIF-8 is synthesized in DMF at high temperature and pressure [2, 3]. ZIF-8 can also be synthesized in methanol at room temperature under normal pressure [2, 10–14]. In these two approaches, the solvents and temperature/pressure have a critical role in the formation of ZIF-8. However, there have not been any studies dealing with this issue.

The Knoevenagel condensation is an important reaction for the formation of carbon-carbon double bonds. The reaction is traditionally catalyzed by conventional bases such as KOH, NaOH, or amine compounds [15]. Today, many researchers have conducted this reaction with different precursors by using solid base catalysts to expand their applicability in the organic synthesis industry [16–18]. Recently, Tran et al. [19] have studied the catalytic activity of ZIF-8 by the Knoevenagel condensation reaction and advocated its feasibility as a catalyst.

In the present work, ZIF-8 was synthesized in two different routes. The effects of solvents, molar ratios of precursors, reaction time, and temperature on the structural properties of the as-prepared materials were investigated. In addition, the catalytic activities of the fabricated materials were evaluated using the Knoevenagel condensation reaction.

2. Experimental

2.1. Synthesis and Characterization of ZIF-8

ZIF-8 was synthesized via two different routes using zinc nitrate hexahydrate (Zn(NO₃)₂·6H₂O, Fisher) and 2-methylimidazole (C₄H₆N₂, 99%, Acros) (denoted as meIm) precursors.

(i)Process A was performed according to Zhu et al. [20]. In a typical process, 8 mmol Zn(NO₃)₂·6H₂O was dissolved in 1.4 mol methanol (CH₃OH, 99.9%, Fisher) (denoted as MeOH) (solution 1) and 64.4 mmol meIm was dissolved in 1.4 mol MeOH (solution 2). Solution 2 was then added to solution 1, and the as-prepared mixture was stirred for 8 h. Finally, the obtained ZIF-8 powder (denoted as Z-A(MeOH)) was collected using centrifugation at 3000 rpm, washed three times with MeOH, and dried overnight at 100°C.(ii)Process B was carried out according to Bushell et al. [21]. In a typical process, 7.20 g Zn(NO₃)₂·6H₂O and 4.48 g meIm were first dissolved in 90 mL dimethylformamide (C₃H₇NO, ≥99.5%, Fisher) (denoted as DMF) and the prepared solution was then heated in a Teflon-lined steel autoclave (volume of 200 mL) for three days at 100°C. The as-produced white solid material was collected using filtration, washed in a Soxhlet apparatus for two days with MeOH, and dried at 100°C to obtain ZIF-8 (denoted Z-B(DMF)).

The effects of solvents, molar ratios of Zn(NO₃)₂·6H₂O and meIm, reaction time, and temperature on the structural properties of the as-prepared ZIF-8 samples were further studied.

Characterization. X-ray diffraction (XRD) patterns were recorded on a VNU-D8 Advance Instrument (Bruker, Germany) under-Cu Kα radiation (λ = 1.5418 Å). The N₂ adsorption/desorption isotherm measurement test was performed at 77 K in a Tristar 3000 analyzer, and before setting the dry mass, the samples were degassed at 250°C with N₂ for 5 h. Scanning electron microscopy (SEM) images were obtained using an SEM JMS-5300LV (Japan), and infrared spectra (IR) were recorded in a Jasco FT/IR-4600 spectrometer (Japan) in the range of 4000–400 cm⁻¹.

2.2. Knoevenagel Reaction

The Knoevenagel condensation reaction between benzaldehyde and ethyl cyanoacetate was carried out according to Martins et al. [18]. In the reaction, 1.07 g (10 mmol) benzaldehyde (C₆H₅CHO, 98%, Acros), 1.04 g (10 mmol) ethyl cyanoacetate (NCCH₂CO₂C₂H₅, 98%, Acros), and 15.42 g toluene (C₆H₅CH₃, 99.9%, Duksan) were added to a glass reactor and stirred at 30°C. When the temperature became stable, 0.1 g of ZIF-8 was added. After 6 h of reaction, the solution was centrifuged to remove the catalyst. The compositional analysis of the reactants and products in the liquid sample was executed using a GC-MS chromatograph (Agilent GC-MS 7890).

The conversion and the selectivity were calculated according to the following equations:

3. Results and Discussion

3.1. Structural Properties of Z-A(MeOH) and Z-B(DMF)

Figure 1(a) exhibits the XRD patterns of ZIF-8 synthesized with process A and process B. The diffraction peak (011) at 2θ = 7.2° is observed in both samples, indicating their high crystallinities [2, 10, 12, 20, 22]. However, the intensity of diffraction peaks in Z-B(DMF) is higher than that in Z-A(MeOH), and this means that Z-B(DMF) has higher symmetric planes.

(a)

(b)

Figure 1: (a) XRD patterns and (b) FT-IR spectra of Z-A(MeOH) and Z-B(DMF) samples.

The FT-IR spectra of both Z-A(MeOH) and Z-B(DMF) are displayed in Figure 1(b), and the findings are consistent with earlier reported results [19, 23, 24]. The bands at 3122 cm⁻¹ and 2920 cm⁻¹ are associated with the aromatic and the aliphatic C-H asymmetric stretching vibrations, respectively. The band at 1668 cm⁻¹ is attributed to the C=C stretching mode, and the band at 1574 cm⁻¹ is assigned to the C=N stretching mode. The bands at 1300–1460 cm⁻¹ are associated with the entire ring stretching, whereas the band at 1140 cm⁻¹ is formed from the aromatic C-N stretching mode. Similarly, the bands at 991 cm⁻¹ and 748 cm⁻¹ could be assigned to the C-N bending vibration mode and to the C-H bending mode, respectively. Moreover, the band at 690 cm⁻¹ is developed due to the ring out-of-plane bending vibration of imidazolate. The sharp band at 416 cm⁻¹ formed due to Zn-N stretching indicates that zinc atoms are connected to the nitrogen atoms in the 2-methylimidazolate linkers.

The surface morphologies of the materials synthesized with the two approaches are totally different. Z-A(MeOH) comprises cubic crystals, hexagonal-faceted crystals, and rhombic dodecahedrons (with an edge of ∼100 nm) (Figures 2(a) and 2(b)). In contrast, Z-B(DMF) has truncated rhombic dodecahedrons with varying particle sizes of 3–20 μm (Figures 2(c) and 2(d)) [19, 22, 25]. Hence, compared with Z-A(MeOH), Z-B(DMF) yields high and sharp diffraction peaks due to its clear crystal planes and large crystal size.

(a)

(b)

(c)

(d)

Figure 2: SEM images of Z-A(MeOH) (a, b) and Z-B(DMF) (c, d).

In process A, the formation path of ZIF-8 depends on the reaction time [10, 11]. However, in process B, ZIF-8 was prepared in DMF at 100°C in three days; hence, a fully crystalline ZIF-8 phase was obtained.

Figure 3 displays the nitrogen adsorption/desorption isotherms of Z-A(MeOH) sample and Z-B(DMF) sample at 77 K. According to the classification of IUPAC, the isotherm curves belong to type-I, indicating that Z-A(MeOH) and Z-B(DMF) are microporous materials. The specific surface area of Z-A(MeOH) and Z-B(DMF) is 1279 m²·g⁻¹ and 1415 m²·g⁻¹, respectively (Table 1). These values are higher than those of ZIF-8 synthesized with other routes [23, 26].

(a)

(b)

Figure 3: Nitrogen adsorption/desorption isotherms of Z-A(MeOH) sample (a) and Z-B(DMF) sample (b).

Table 1: Porous properties of ZIF-8 samples.

Sample
BET surface area (m²·g⁻¹)
t-plot micropore area (m²·g⁻¹)
t-plot external surface area (m²·g⁻¹)
t-plot micropore volume (cm³·g⁻¹)

Z-A(MeOH)
1279
1237
42
0.604

Z-B(DMF)
1415
1412
3
0.642

3.2. Effects of Solvents

Solvents play an important role in the ZIF-8 synthesis. Earlier studies reported that ZIF-8 can be formed in different solvents: DMF [19, 21], methanol [2, 10–14], and water [25]. Therefore, in our experiment, the effects of different solvents (methanol, DMF, water, and toluene) on the ZIF-8 formation were investigated in detail. Table 2 describes the characteristics of ZIF-8 obtained from process A and process B with different solvents.

Table 2: Characteristics of ZIF-8 obtained in different solvents.

Solvent
Product (state, color, and abundance ratio)

Process A
Process B

Methanol
Solid, white, medium
Solid, milk white, very small

DMF
Gel, white
Solid, white, medium

Water
Solid, white, large
Solid, white, large

Toluene
Solid, gray, very small
Gel, white

Z-A(MeOH) sample; Z-B(DMF) sample.

It is clear that toluene is an unsuitable solvent for the ZIF-8 synthesis. This can be attributed to the very small dipole moment of toluene (0.36 D) compared with that of methanol (1.69 D), water (1.85 D), and DMF (3.86 D), and the deprotonation of a meIm compound cannot occur to form a meIm⁻ ion.

Figure 4 shows that the synthesized samples in water have characteristic diffraction peaks (at 2θ < 30°) and characteristic vibration bands. However, in process B, the diffraction peaks at 2θ = 31.73°, 34.4°, 36.23°, and 47.48° and the band at 492 cm⁻¹ indicate the existence of ZnO oxides and Zn-O bonds in ZIF-8 [26]. This can be ascribed to the hydrolysis of Zn²⁺ ions in water at high temperatures.

(a)

(b)

Figure 4: (a) XRD patterns and (b) FT-IR spectra of ZIF-8 synthesized in water.

The morphologies of the synthesized samples in water are displayed in Figure 5. In process A, the surface morphologies of ZIF-8 are indeterminate (Figures 5(a) and 5(b)). On the contrary, the microstructures of ZIF-8 synthesized in process B consist of hexagonal cylinders and cubic crystals (Figures 5(c) and 5(d)).

(a)

(b)

(c)

(d)

Figure 5: SEM of ZIF-8 synthesized in water: process A (a, b); process B (c, d).

The results in Table 2 indicate that the solvent exchange between the two processes did not lead to the formation of ZIF-8. This is due to large differences in the boiling temperature and dipole moment of the solvents, indicating that solvents play an important role in the synthesis of ZIF-8.

3.3. Effects of Synthesis Time and meIm/Zn Molar Ratios

Figure 6 displays the SEM images of the synthesized ZIF-8 samples at two different stirring intervals—two days and five days. Both samples have mainly hexagonal and rhombic dodecahedron crystals of a diameter of ∼100 nm. Further, their very sharp diffraction peaks appear at 2θ below 10°, indicating the formation of highly crystalline materials (Figure 7(a)).

(a)

(b)

Figure 6: SEM images of ZIF-8 crystals synthesized with process A as a function of synthesis time: (a) two days; (b) five days.

(a)

(b)

Figure 7: XRD patterns of ZIF-8 crystals synthesized with process A: (a) different synthesis times; (b) different meIm/Zn molar ratios.

The XRD patterns of the samples synthesized at different meIm/Zn molar ratios are presented in Figure 7(b). In all cases, the amounts of Zn(NO₃)₂·6H₂O and methanol were kept constant. No conspicuous difference was noticed in the XRD peaks of the samples; however, their relative crystallinities slightly decrease as the meIm/Zn molar ratio increases from 64.4/8 to 100/8. These findings are well consistent with those reported by Zhang et al. [24].

3.4. Effects of Synthesis Temperature

The effects of reaction temperature on ZIF-8 synthesized with the process B are depicted in Figure 8. Noticeably, better cohesion of particles in the sample synthesized at 200°C reduces the intensities of diffraction peaks at larger angles. However, as the reaction temperature increases, the intensities of diffraction peaks at angles less than 10° become higher, indicating the formation of ZIF-8 with higher crystallinities.

(a)

(b)

Figure 8: SEM image (a) and XRD patterns (b) of ZIF-8 samples synthesized with process B at different temperatures.

In conclusion, the meIm/Zn molar ratios, reaction time, and temperature have an impact on the crystallinity of ZIF-8 but do not affect its crystalline structure.

3.5. Catalytic Test

The Knoevenagel condensation reaction between benzaldehyde and ethyl cyanoacetate to form ethyl-2-cyano-3-phenylacrylate (Scheme 1) was used to test the catalytic activities of the synthesized ZIF-8 samples.

Scheme 1: Knoevenagel condensation reaction between benzaldehyde and ethyl cyanoacetate.

The effect of different ZIF-8 samples on the Knoevenagel condensation reaction is illustrated in Figure 9. Evidently, all synthesized samples exhibit excellent catalytic activities in the Knoevenagel condensation reaction (the benzaldehyde conversion in the catalytic reactions is considerably higher than that in the reactions without catalysts). Figure 9(a) shows that the conversion of benzaldehyde depends on the crystallinity of ZIF-8. The conversion is greater when the intensity of diffraction peaks at 2θ < 10° is higher (Figures 1(a), 7(a), and 8(b)). Specifically, ZIF-8 synthesized with process B at 200°C has the highest yield. In addition, the selectivity of ethyl-2-cyano-3-phenylacrylate always remains close to 100% (Figure 9(b)), indicating that the formation of benzoic acid during the catalytic reaction is negligible.

(a)

(b)

Figure 9: Effect of various ZIF-8 samples on the Knoevenagel condensation reaction: (a) benzaldehyde conversion (%); (b) ethyl-2-cyano-3-phenylacrylate selectivity ((1) without a catalyst; (2) Z-A(MeOH); (3) Z-B(DMF); (4) ZIF-8 sample synthesized with process A for five days; and (5) ZIF-8 sample synthesized with process B at 200°C).

The Knoevenagel condensation reaction is commonly catalyzed by liquid or solid bases. ZIF-8 is a bifunctional catalyst composed of both acidic (Lewis acid Zn²⁺ ions) and basic sites (imidazole groups) [20]. It was noticed that the catalytic activities of ZIF-8 are governed by the basic sites of imidazoles. To evaluate the durability of ZIF-8 catalyst for the Knoevenagel reaction, Tran et al. also test the leaching of the 2-methylimidazole linker [19]. They conclude that the ZIF-8 solid catalysts remain stable, and no contribution of homogeneous catalysis due to active acid species leaching into the reaction solution is found. Thus, in the ZIF-8 sample synthesized with process B at 200°C, the Lewis acid Zn²⁺ sites may become saturated; hence, the decrease in densities of the Lewis acid sites results in more base sites from the imidazole linkers.

A comparison of the benzaldehyde conversion of the Knoevenagel condensation with different catalysts is shown in Table 3. Although the reaction conditions are different, the benzaldehyde conversion of this study is higher (76.5% compared with 51–70%) or consistent with that of previous studies (78–92%).

Table 3: Effect of the different catalysts on Knoevenagel condensation.

Catalyst
Precursors
Reaction condition
Benzaldehyde conversion (%)
References

ZIF-8
Benzaldehyde (10 mmol) and ethyl cyanoacetate (10 mmol)
30°C, 6 h, 0.1 g of the catalyst
76.5
The present work

ZIF-8
Benzaldehyde (1.9 mmol) and malononitrile (1.9 mmol)
Room temperature, 6 h, 0.02 g of the catalyst
51
[19]

MCM-41
Benzaldehyde (10 mmol) and diethyl malonate (10 mmol)
Room temperature, 24 h, 0.025 g of the catalyst
56–70
[16]

Amine-MCM-41
Benzaldehyde (10 mmol) and diethyl malonate (10 mmol)
Room temperature, 24 h, 0.025 g of the catalyst
78–92
[16]

[CTA⁺]-Si-MCM-41
Benzaldehyde (4.8 mmol) and ethyl cyanoacetate (4.8 mmol)
30°C, 3 h, 20 mg of the catalyst
57.2
[17]

ZIF-8 sample synthesized with process B at 200°C.

4. Conclusions

ZIF-8 was formed in methanol and water at room temperature and in DMF at high temperatures (100–200°C). In methanol, the reaction time and meIm/Zn molar ratio have small effects on the microstructures (uniform particles of ∼100 nm diameter) of ZIF-8; however, the diffraction peaks at the angles smaller than 10° had slight variations. In contrast, ZIF-8 synthesized in DMF manifests full crystallinity with varying particle sizes (3∼20 μm) with the better cohesion of particles observed at 200°C. All ZIF-8 samples exhibit excellent catalytic activities in the Knoevenagel condensation reaction because of the base sites of imidazoles. When ZIF-8 are highly crystalline (samples synthesized in MeOH for five days and in DMF at 200°C), the activities of the base sites of imidazole prevail those of the Lewis acid sites of Zn²⁺, resulting in a higher conversion of benzaldehyde.

Data Availability

The data used to support the findings of this study are available from the corresponding author upon request.

Conflicts of Interest

The authors declare that they have no conflicts of interest.

References

H. Hayashi, A. P. Côté, H. Furukawa, M. O’Keeffe, and O. M. Yaghi, “Zeolite A imidazolate frameworks,” Nature Materials, vol. 6, no. 7, pp. 501–506, 2007.

K. S. Park, Z. Ni, A. P. Cote et al., “Exceptional chemical and thermal stability of zeolitic imidazolate frameworks,” Proceedings of the National Academy of Sciences, vol. 103, no. 27, pp. 10186–10191, 2006.

X. C. Huang, Y. Y. Lin, J. P. Zhang, and X. M. Chen, “Ligand-directed strategy for zeolite-type metal-organic frameworks: zinc(II) imidazolates with unusual zeolitic topologies,” Angewandte Chemie International Edition, vol. 45, no. 10, pp. 1557–1559, 2006.

Y. He, W. Zhou, G. Qian, and B. Chen, “Methane storage in metal-organic frameworks,” Chemical Society Reviews, vol. 3, no. 16, pp. 5657–5678, 2014.

E. Barea, C. Montoro, and J. A. R. Navarro, “Toxic gas removal-metal-organic frameworks for the capture and degradation of toxic gases and vapours,” Chemical Society Reviews, vol. 45, no. 43, 2014.

M. Hu, H. Lou, X. Yan, X. Hu, R. Feng, and M. Zhou, “In-situ fabrication of ZIF-8 decorated layered double oxides for adsorption and photocatalytic degradation of methylene blue,” Microporous and Mesoporous Materials, vol. 271, pp. 68–72, 2018.

V. Stavila, A. A. Talin, and M. D. Allendorf, “MOF-based electronic and opto-electronic devices,” Chemical Society Reviews, vol. 43, no. 16, pp. 5994–6010, 2014.

D. Q. Khieu, M. T. Thanh, T. V. Thien et al., “Synthesis and voltammetric determination of Pb(II) using a ZIF-8-based electrode,” Journal of Chemistry, vol. 2018, Article ID 5395106, 12 pages, 2018.

P. Horcajada, R. Gref, T. Baati et al., “Metal-organic frameworks in biomedicine,” Chemical Reviews, vol. 112, no. 2, pp. 1232–1268, 2012.

S. R. Venna, J. B. Jasinski, and M. A. Carreon, “Structural evolution of zeolitic imidazolate framework-8,” Journal of the American Chemical Society, vol. 132, no. 51, pp. 18030–18033, 2010.

J. Cravillon, C. A. Schröder, H. Bux, A. Rothkirch, J. Caro, and M. Wiebcke, “Formate modulated solvothermal synthesis of ZIF-8 investigated using time-resolved in situ X-ray diffraction and scanning electron microscopy,” CrystEngComm, vol. 14, no. 2, pp. 492–498, 2012.

M. Zhu, S. R. Venna, J. B. Jasinski, and M. A. Carreon, “Room-temperature synthesis of ZIF-8: the coexistence of ZnO nanoneedles,” Chemistry of Materials, vol. 23, no. 16, pp. 3590–3592, 2011.

M. T. Thanh, T. V. Thien, P. D. Du, N. P. Hung, and D. Q. Khieu, “Iron doped zeolitic imidazolate framework (Fe-ZIF-8): synthesis and photocatalytic degradation of RDB dye in Fe-ZIF-8,” Journal of Porous Materials, vol. 25, no. 3, pp. 857–869, 2018.

D. N. Ta, H. K. D. Nguyen, B. X. Trinh, Q. T. N. Le, H. N. Ta, and H. T. Nguyen, “Preparation of nano-ZIF-8 in methanol with high yield,” Canadian Journal of Chemical Engineering, vol. 96, no. 7, pp. 1518–1531, 2018.

P. Formentín, H. García, and A. Leyva, “Assessment of the suitability of imidazolium ionic liquids as reaction medium for base-catalysed reactions Case of Knoevenagel and Claisen-Schmidt reactions,” Journal of Molecular Catalysis A: Chemical, vol. 214, no. 1, pp. 137–142, 2004.

K. M. Parida and D. Rath, “Amine functionalized MCM-41: an active and reusable catalyst for Knoevenagel condensation reaction,” Journal of Molecular Catalysis A: Chemical, vol. 310, no. 1-2, pp. 93–100, 2009.

L. Martins, W. Hölderich, P. Hammer, and D. Cardoso, “Preparation of different basic Si-MCM-41 catalysts and application in the Knoevenagel and Claisen-Schmidt condensation reactions,” Journal of Catalysis, vol. 271, no. 2, pp. 220–227, 2010.

L. Martins, T. J. Bonagamba, E. R. de Azevedo, P. Bargiela, and D. Cardoso, “Surfactant containing Si-MCM-41: an efficient basic catalyst for the Knoevenagel condensation,” Applied Catalysis A: General, vol. 312, pp. 77–85, 2006.

U. P. N. Tran, K. K. A. Le, and N. T. S. Phan, “Expanding applications of metal-organic frameworks: zeolite imidazolate framework ZIF-8 as an efficient heterogeneous catalyst for the Knoevenagel reaction,” ACS Catalysis, vol. 1, no. 2, pp. 120–127, 2011.

M. Zhu, D. Srinivas, S. Bhogeswararao, P. Ratnasamy, and M. A. Carreon, “Catalytic activity of ZIF-8 in the synthesis of styrene carbonate from CO₂ and styrene oxide,” Catalysis Communications, vol. 32, pp. 36–40, 2013.

A. F. Bushell, M. P. Attfield, C. R. Mason et al., “Gas permeation parameters of mixed matrix membranes based on the polymer of intrinsic microporosity PIM-1 and the zeolitic imidazolate framework ZIF-8,” Journal of Membrane Science, vol. 427, pp. 48–62, 2013.

J. Yao, R. Chen, K. Wang, and H. Wang, “Direct synthesis of zeolitic imidazolate framework-8/chitosan composites in chitosan hydrogels,” Microporous and Mesoporous Materials, vol. 165, pp. 200–204, 2013.

X. Zhou, H. P. Zhang, G. Y. Wang, Z. G. Yao, Y. R. Tang, and S. S. Zheng, “Zeolitic imidazolate framework as efficient heterogeneous catalyst for the synthesis of ethyl methyl carbonate,” Journal of Molecular Catalysis A: Chemical, vol. 366, pp. 43–47, 2013.

Y. Zhang, Y. Jia, M. Li, and L. Hou, “Influence of the 2-methylimidazole/zinc nitrate hexahydrate molar ratio on the synthesis of zeolitic imidazolate framework-8 crystals at room temperature,” Scientific Reports, vol. 8, no. 1, pp. 1–7, 2018.

K. Kida, M. Okita, K. Fujita, S. Tanaka, and Y. Miyake, “Formation of high crystalline ZIF-8 in an aqueous solution,” CrystEngComm, vol. 15, no. 9, p. 1794, 2013.

Y. Du, R. Z. Chen, J. F. Yao, and H. T. Wang, “Facile fabrication of porous ZnO by thermal treatment of zeolitic imidazolate framework-8 and its photocatalytic activity,” Journal of Alloys and Compounds, vol. 551, pp. 125–130, 2013.