Advances in Materials Science and Engineering
Volume 2020 (2020), Article ID 1623036, 1 page
https://doi.org/10.1155/2020/1623036

Corrigendum

Corrigendum to “Study on the Mitigative Effect of Controlled Permeable Formwork (CPF) Liner on Early-Age Shrinkage of Box-Girder Concrete”

Jianxiong Ye,¹ Linwen Yu,1,2 and Yong Chen¹

¹College of Materials Science and Engineering, Chongqing University, 400045 Chongqing, China
²The State Key Laboratory of Green Building Materials, 100024 Beijing, China

Correspondence should be addressed to Linwen Yu; linwen.yu@cqu.edu.cn

Received 16 April 2020; Accepted 18 April 2020; Published 14 July 2020

Copyright © 2020 Jianxiong Ye et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Study on the Mitigative Effect of Controlled Permeable Formwork (CPF) Liner on Early-Age Shrinkage of Box-Girder Concrete” [1], the fund number for the National Key R&D Program of China was given incorrectly in the Acknowledgments section. The correct funding statement is as follows:

This project was supported by the National Key R&D Program of China (No. 2017YFB0310104), National Natural Science Foundation of China (No. 51708060), Open Funds from the State Key Laboratory of High Performance Civil Engineering Materials (No. 2016CEM09), and State Key Laboratory of Green Building Materials, Chongqing Commission on Housing and Urban Rural Development (No. 2018-1-3-5,6).

References

J. Ye, L. Yu, and Y. Chen, “Study on the mitigative effect of controlled permeable formwork (CPF) liner on early-age shrinkage of box-girder concrete,” Advances in Materials Science and Engineering, vol. 2019, Article ID 4150279, 8 pages, 2019.