Advances in Orthopedics
Volume 2020 (2020), Article ID 7949216, 7 pages
https://doi.org/10.1155/2020/7949216

Clinical Study

Instrumentation Removal following Minimally Invasive Posterior Percutaneous Pedicle Screw-Rod Stabilization (PercStab) of Thoracolumbar Fractures Is Not Always Required

Neil Manson,1,2,3 Dana El-Mughayyar,¹ Erin Bigney,¹ Eden Richardson,¹ and Edward Abraham1,2,3

¹Canada East Spine Centre, Saint John Regional Hospital, 400 University Ave, PO Box 2100, Saint John, New Brunswick E2L 4L4, Canada
²Saint John Regional Hospital, Horizon Health Network, 400 University Ave, PO Box 2100, Saint John, New Brunswick E2L 4L4, Canada
³Department of Surgery, Dalhousie University, 100 Tucker Park Rd, Saint John, New Brunswick E2K 5E2, Canada

Correspondence should be addressed to Dana El-Mughayyar; dana.el-mughayyar@horizonnb.ca

Received 23 January 2020; Revised 4 May 2020; Accepted 15 June 2020; Published 31 July 2020

Academic Editor: Panagiotis Korovessis

Copyright © 2020 Neil Manson et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Study Design. Clinical case series. Background. Percutaneous stabilization for spinal trauma confers less blood loss, reduces postoperative pain, and is less invasive than open stabilization and fusion. The current standard of care includes instrumentation removal. Objective. 1. Reporting patient outcomes following minimally invasive posterior percutaneous pedicle screw-rod stabilization (PercStab). 2. Evaluating the results of instrumentation retention. Methods. A prospective observational study of 32 consecutive patients receiving PercStab without direct decompression or fusion. Baseline data demographics were collected. Operative outcomes of interest were operative room (OR) time, blood loss, and length of hospital stay. Follow-up variables of interest included patient satisfaction, Numeric Rating Scales for Back and Leg (NRS-B/L) pain, Oswestry Disability Index (ODI), and return to work. Clinical outcome data (ODI and NRS-B/L) were collected at 3, 12, 24 months and continued at a 24-month interval up to a maximum of 8 years postoperatively. Results. 81.25% of patients (n = 26) retained their instrumentation and reported minimal disability, mild pain, and satisfaction with their surgery and returned to work (mean = 6 months). Six patients required instrumentation removal due to prominence of the instrumentation or screw loosening, causing discomfort/pain. Instrumentation removal patients reported moderate back and leg pain until removal occurred; after removal, they reported minimal disability and mild pain. Neither instrumentation removal nor retention resulted in complications or further surgical intervention. Conclusions. PercStab without instrumentation removal provided high patient satisfaction, mild pain, and minimal disability and relieved the patient from the burden of finances and resources allocation of a second surgery.

1. Introduction

Spine fractures compromise approximately 6% of all fractures worldwide [1, 2]. Surgical treatments are proposed to patients with unstable traumatic pathologies, with or without neurological deficit [3]. While traditional open surgical treatments are commonly used, they may result in considerable blood loss, complications, extended hospital stays, and delayed functional recovery [4–7]. Minimally invasive surgical (MIS) techniques are intended to minimize approach morbidity and associated complications of open surgeries [5]. Posterior percutaneous pedicle screw fixation can provide spinal stabilization with placement through small incisions using specific MIS technologies, in an effort to minimize complications [8–11].

As this is a nonfusion technique, the current standard of care following minimally invasive posterior percutaneous pedicle screw-rod stabilization (PercStab) includes instrumentation removal [12]. There is no consensus on timing of hardware removal but it is considered once tissue healing occurs and stability is restored to prevent instrumentation failure, loosening at the bone-screw interface, or other instrument related complications [13, 14]. Vanek et al. showed that instrumentation was removed from the part of the lumbar spine (below L-2) between 12 and 18 months postoperatively [15, 16]. Yang et al. reported that seven patients of 64 opted out of having their instrumentation removed postoperatively as they reported feeling satisfied with their function and wished to avoid having a second procedure [11]. Satisfaction without any disruptions can eliminate a second procedure in patients.

The objectives of this study were (1) reporting patient outcomes following minimally invasive posterior percutaneous pedicle screw-rod stabilization to treat spine trauma and (2) evaluating the results of instrumentation retention.

2. Methods

A prospective observational study monitored 32 consecutive spine trauma patients meeting inclusion criteria: age of 18 years or older with unstable spinal trauma for which PercStab was the course of treatment. Baseline data collection included patient age, sex, body mass index (BMI), comorbidities, mechanism of injury (MOI), Injury Severity Score (ISS), AOSpine Classification system, numeric pain rating scale, and admission diagnosis. Operative variables of interest included operative room (OR) time, instrumentation type, blood loss, length of hospital stay, levels operated on and surgical morbidity/mortality. Outcome variables of interest are the Numeric Rating Scales for Back and Leg (NRS-B/L) pain, Oswestry Disability Index (ODI), patient satisfaction, and time to return to work. Clinical outcome data (ODI and NRS-B/L) were collected at 3, 12, 24 months and continued at a 24-month interval up to a maximum of 8 years postoperatively. Patient satisfaction was collected at the patient’s final follow-up. When applicable, timing of instrumentation removal and reasoning was reported.

The AOSpine Classification system has been shown to have reasonable reliability and accuracy for clinical validation of a unified system to effectively communicate case-specific details of patient injuries [17, 18]. The ISS assesses severity of trauma and correlates with mortality and morbidity [19]. Patient satisfaction was measured through a 5-point Likert scale (1 = extremely dissatisfied, 2 = somewhat dissatisfied, 3 = neither satisfied nor dissatisfied, 4 = somewhat satisfied, and 5 = extremely satisfied) asking “Are you satisfied with the results of your surgery?”. The NRS-B/L and ODI questionnaire were used to quantify disability related to leg and back pain [20]. ODI has been shown to have excellent test-retest reliability [21]. Leg and back pain intensity (NRS-B/L) were measured through an 11-point numeric pain rating scale. Pain ratings represented the typical pain experienced over the preceding 24 hours, with potential scores ranging from 0 (“no pain”) to 10 (“worst pain imaginable”). Ratings are categorized as “mild” (0–3), “moderate” (4–6), or “severe” (7–10). The numeric pain rating scale has excellent test-retest reliability and responsiveness [22–24].

Instrumentation removal was not applied as a standard. Instrumentation removal was provided based on clinical complaint, physical exam findings, and imaging findings at the discretion of the surgeon and in shared decision-making with the patient. Without specific justification, instrumentation was not removed.

3. Surgical Technique

All patients received PercStab under general anesthesia. The patient was positioned prone on the OSI spine table with chest, hip, and leg bolsters placed to optimize alignment at the fracture site. Standard antiseptic skin preparation and draping was completed, and preoperative antibiotics were provided. Two C-arm fluoroscopy units provided simultaneous anteroposterior (AP) and lateral imaging capabilities. AP fluoroscopy guided placement of 1.5 cm stab incisions overlying each pedicle to be instrumented. The Pedicle Access Kit cannulated trochar (Medtronic Sofamor Danek) was tamped through the pedicle assuring that the tip of the trochar remained lateral to the medial pedicle wall at all times until the tip of the trochar passed into the vertebral body. Trochar position was confirmed on AP and lateral C-arm imaging. Guidewire was passed through the trochar followed by trochar removal. Guidewires were placed at each pedicle to be instrumented. The pedicles were then tapped, and cannulated screws were placed by hand.

The pedicle screw-rod construct was placed utilizing the Longitude or Sextant II systems (Medtronic Sofamor Danek; Legacy 5.5 titanium). The Sextant II system was utilized if the construct spanned one or two motion levels. The Longitude system was utilized if the construct was greater than two motion levels. Screws of 6.5 mm diameter were most commonly utilized. Screws were positioned to optimize construct stability and fracture alignment. If the spine and traumatic pathology permitted, screws were placed at the level of pathology as well. Bilateral titanium rods, 5.5 mm in diameter were measured, contoured, and passed in a subfascial plane through the pedicle screw extenders. Construct and fracture alignment were optimized with compression and distraction maneuvers, and final tightening of the set screws was completed. Insertion tools were removed. Final AP and lateral C-arm imaging were used to confirm the appropriate instrumentation placement and spinal alignment. Incisions were closed in layers and dressing was applied.

4. Results

The sample includes thirty-two consecutive trauma patients (24 males and 8 females; mean age 38.3 years; see Table 1 for demographics). The MOI for 75% of patients was motor vehicle crash (MVC) and the remaining 25% was caused by a fall. Of the sample, 40.62% had polytrauma with an ISS mean score of 9.5 showing moderate injury. Burst fractures account for 68.75% of the diagnoses; patient fracture diagnosis was classified using the AOSpine Classification System (Table 2). Within the sample, the presence of comorbidities was low with 15.62% of the sample impacted (see Table 1). Most patients received PercStab to treat spinal instability over a mean of 2 levels (range 1–6 levels).

Table 1: Demographics.

Sample (N = 32)
NRG (n = 26)
IRG (n = 6)

Mean
Range
Mean
Range
Mean
Range

Age
38.3
(18–61)
40.7
(18–61)
27.6
(19–36)

Gender

    Male
24

19

5

    Females
8

7

1

BMI
22.1
(17.3–34.3)
23.7
(18.8–34.4)
20.8
(17.3–29.5)

Injury Severity Score
9.5
(8–41)
9
(8–34)
9.5
(9–27)

Numeric pain rating scale
7
(3–10)
7
(3–10)
7
(5–9)

%

%

%

Comorbidities

    Diabetic
6.2

7.7

0

    Smoker
6.2

7.7

0

    Morbidly obese
3.1

3.8

0

Mechanism of injury

    MVC
75

73

67

    Fall
25

27

33

    Polytrauma
40.62

34.61

66.67

Table 2: Diagnosis details.

Patient
Injury
AO classification
Instrumentation

1
L2 burst fracture
L2:A4, N0
Medtronic Sextant II

2
L1 chance fracture
L1:B1, N0
Medtronic Sextant II

3
T12-L1 chance fracture, L1 burst fracture
T12-L1:B2 (L1:A4), N2
Medtronic Longitude CD Horizon

4
T12-L1 chance fracture, L1 burst fracture, T11 compression
T12-L1:B2 (L1:A4, T11:A1), N2
Medtronic Sextant II

5
T12 burst fracture, scoliosis
T12:A4 (M2), N0
Medtronic Longitude

6
T12-L1 chance fracture
T12-L1:C, N0
Medtronic Longitude

7
T12 burst fracture, L1 burst fracture
T12:A4, L1:A4, N1
Medtronic Longitude

8
L1 burst fracture and burst fracture
L1:B1 (L1:A4), N0
Medtronic Longitude

9
L2 burst fracture
L2:A4, N3
Medtronic Longitude

10
T10-11 instability, T6 extension
T10-11:c, T6:B3, N0
Medtronic Legacy

11
L1 burst fracture
L1:A4, N3
Medtronic Sextant

12
T3-4 chance fracture, T4 burst fracture
T3-4:B2 (T4:A4), N3
Medtronic Longitude CD Horizon

13
T10 extension
T10:B3 (M2), N0
Medtronic Longitude

14
T11-12 chance Fracture, T12 burst fracture
T11-12:B2 (T12:A4), N0
Medtronic Sextant II

15
L1 burst fracture
L1:A4, N0
Medtronic Longitude

16
T3 chance fracture, T4 compression
T3:B1 (T3:A4), T4:A1, N0
Medtronic CD Horizon Legacy

17
T11-12 PLC, T12 burst fracture
T11-12:B2 (T12:A4), N0
Medtronic Sextant

18
T2 and T3 chance fracture, T4 compression
T2:B1, T3:B1, T4:A1, N0
Medtronic Sextant

19
T12 chance fracture
T12:B1, N0
Medtronic Horizon Sextant

20
T10 chance fracture
T10:B2, N0
Medtronic Sextant

21
L4 burst fracture
L4:A4, N0
Medtronic Sextant

22
T4-5 PLC, T5 chance fracture, T6 burst fracture
T4-5:c (T4:A4), T6:A4, N0
Medtronic Sextant

23
L1 burst fracture, chance fracture
L1:B1 (L1:A4), N0
Medtronic Sextant

24
T12 burst fracture, L1 chance fracture
L1:B1, T12:A4, N0
Medtronic Longitude

25
T10-11 PLC, T8, 11, 12 compression
T10-11:c (T11:A1), T8:A1, T12:A1, N0
Medtronic Sextant II

26
T6-7 instability
T6-7:c (T6:A4, T7:A4), N0
Medtronic Sextant

27
L1 burst fracture and PLC
T12-L1:B2 (L1:A4), N0
Medtronic Longitude CD Horizon

28
T12 burst fracture
T12:A4, N0
Medtronic Horizon Sextant

29
L5 burst fracture
L5:A4, N0
Medtronic Sextant II

30
L1 burst fracture
L1:A4, N0
Medtronic Longitude

31
T12 burst fracture and PLC
T12-L1:B2 (T12:A2), N0
Medtronic Longitude

32
L1 burst fracture, L2 compression
L1:A4, L2:A1, N0
Medtronic Sextant II

Patients who later require removal. PLC = posterior ligamentous complex injuries.

PercStab as a surgical option resulted in no surgical induced morbidity/mortality but injury related morbidity preoperatively was seen in 21.87% of the sample which included superventricular tachycardia, blood abnormalities, urinary retention, low hemoglobin, sepsis, compromised respiratory function, and exacerbation of injuries due to poor compliance. Operative room morbidity was seen in 6.2% of the sample which included coagulation abnormalities and respiratory decline during intubation. Postoperative morbidity was seen in 35.9% of the sample which included poor pain control, hypervolemia, oxygen saturation fluctuations, low oxygen, E. coli in septum, staph epidemia in blood, fluid collection, ileus, staph aureus, and vomiting. The majority of patients were followed up for 48 months (time of final follow-up ranged from 4 to 8 years).

The majority of patients in this case series, 26 of 32 (19 males and 7 females; mean age of 40.7 years; see Table 1), did not require instrumentation to be removed; these patients will be referred to as the nonremoval group (NRG). Only 6 of 32 patients required instrumentation removal. The instrumentation removal group (IRG; 5 males and 1 female; mean age of 27.6 years; see Table 1) required removal due to radiologically confirmed screw loosening causing back pain or discomfort (4) or due to screw prominence causing discomfort with direct pressure (2). Time of removal ranged from 16 to 45 months. Patients who required removal completed a follow-up prior to their second surgery and were followed up for 24 months after removal. Operative details for both the NRG and IRG can be seen in Table 3.

Table 3: Operative details.

OR time
Sample (N = 32)
NRG (n = 26)
IRG (n = 6)

Mean
Range
Mean
Range
Mean
Range

3 h 00 min
(38 min–7 h 15 m)
2 h 51 min
(38 m–7 h 15 m)
2 h 8 min
(50 m–4 h 50 m)

Blood loss (ml)
179.6
(50–600)
188.5
(50–600)
141.6
(50–250)

Length of hospital stay (days) (median)
5
1–37
4.5
1–37
6.5
1–15

Number of levels (median)
2
1–6
2
1–6
3.5
2–5

OR time was inclusive of preparation time, induction, incision, closure, and patient being transferred onto the floor.

Overall pain at baseline averaged 7 points. All patients show clinically meaningful reduction in pain from baseline to final follow-up from severe to mild. Patients who did not require removal on average reported moderate back and leg pain at 3 months postsurgery then mild back and leg pain at 12, 24, and 48 months (see Table 4). Patient presented with L1 burst fracture injury after a snowmobile accident (see Figure 1) is shown to have instrumentation retention at 12-month follow-up and back to rigorous activities (see Figure 2). Patients who required removal reported moderate back pain at all follow-up points until instrumental removal; after removal, reported back and leg pain dropped to mild (see Table 4). Reported ODI for both the NRG and IRG was within the lower range of moderate disability for 3, 12, and 24 months. At 48 months after surgery, the NRG reported minimal disability and 24 months after removal (48 months after surgery), the IRG reported minimal disability (see Table 4).

Table 4: Pain and disability scores.

NRG
IRG

NRS-B
NRS-L
ODI
NRS-B
NRS-L
ODI

3 months
4
4.5
26
6
5
23

12 months
3
2
23
4
4
21

24 months
2
1
21
5
5
27

48 months
2
1
16
3
3
14

24-month follow-up ranged for the IRG cohort from 16 to 24 months depending on time of instrumentation removal. This is an average of final follow-up periods which ranged from 4 to 8 years depending on time of surgery.

Figure 1: Axial and coronal CT scan of L1 burst fracture after a snowmobile accident.

Figure 2: Lateral and AP X-ray of percutaneous stabilization of L1 burst fracture treated percutaneously at T12–L2 at 12-month follow-up.

The median time to return to work following surgery reported by patients in the NRG was 6 months and 7 months for the IRG with all patients returning to full-time work by 12 months, aside from 5 patients who retired. All patients reported being somewhat satisfied to extremely satisfied with their surgery (NRG mean = 4.8, range = 4-5; IRG mean = 4.8, range = 4-5).

5. Discussion

Our case series supports the previous literature demonstrating favorable outcomes following MIS management of spinal trauma independent of removal or retention [11, 15, 25]. All patients showed positive outcomes following surgery, reporting minimal disability, mild pain, and high satisfaction with their surgery. PercStab is a reliable and accurate treatment for thoracic and lumbar spine fractures [26]. This case series demonstrated PercStab offers minimal surgical morbidity and blood loss similar to previous studies [27]. Minimally invasive percutaneous pedicle screw fixation without fusion for thoracolumbar fractures did not result in instrumentation failure or surgery-related complications [28] and resulted in patient satisfaction [29].

Previous research investigating PercStab as a treatment for thoracic and lumbar spine fractures followed a criteria of instrumentation removal as the standard of care; however, Yang et al. (2011) reported a small subset of their samples (10.94%) declined the second operation as the patients reported high satisfaction with their results [11]. The current case series was conducted to see how patients would fare if the standard was to retain the instrumentation, avoiding the patient burden, costs, and resource allocation that a second surgery requires. In the current case series, 81.25% of the sample retained their instrumentation and reported long-term minimal disability, mild pain, and satisfaction with their surgery.

Removal is usually done to avoid an instrumentation failure, loosening at the bone-screw interface, or other instrument related complications [25]. In the current case series, this occurred but in only 18.75% of the sample, suggesting that instrumentation removal could be decided based on clinical indications (loosening of screws, reported pain) instead of being the standard of treatment for all cases. In the current study, the primary indicator for instrumentation removal was patient-reported pain. Patients who required removal report moderate back and leg pain until removal. When follow-up occurred after removal, patients reported mild back and leg pain. The largest difference is seen at the 24-month follow-up; patients who needed removal reported more pain than those patients who did not require removal (difference score of 3 points for back pain and 4 points for leg pain).

Patients who retained their instrumentation were also older on average, had a lower incidence of polytrauma at admission, shorter average hospital stay, and fewer levels operated on. Comorbidities did not appear to influence removal though the low rate of reported comorbidities in the current sample (15.62% of the sample) could be responsible for this finding. None of these patients required removal.

Limitations of the presented study include the fact that it is a case series so no cause and effect conclusions can be drawn. The current case study had a variable final follow-up time with the majority having final follow-up at 4 years (range 4–8). It would be beneficial to extend the follow-up to ensure facet arthrosis and possible instrument failure do not occur at a later time. However, sustaining follow-up rates becomes more problematic as the time extends. The current study has a reasonably small sample and the proportion of patients needing removal could change with a larger population. Despite the limitations mentioned given the patient outcomes reported, we would suggest that compulsory instrumentation removal is not always required following minimally invasive percutaneous screw-rod stabilization for thoracolumbar pathology. Instrumentation removal can be safely guided by clinical complaints. Average follow-up of 4 years would suggest that no risk is posed to these patients by instrumentation retention. In fact, minimal pain and disability with good work capacity can be realized despite instrumentation retention. Thus, the elimination of a second surgery for instrumentation removal as a treatment standard could be considered.

6. Conclusions

Minimally invasive percutaneous screw-rod stabilization for thoracolumbar pathology resulted in high levels of patient satisfaction, minimal disability, mild pain, and high return to work with low perioperative risk. These findings were sustained despite eliminating the second surgery for instrumentation removal usually performed following this nonfusion procedure. While instrumentation removal may be provided for specific indications, removal in all cases may be unnecessary.

Data Availability

The data used to support the findings of this study were from the patient’s medical records and the Canadian Spine Society Registry Study forms. Medical records were supplied by Horizon Health Network and so cannot be made freely available. The Research Ethics Board for the Horizon Health Network is organized and operates according to the principles of the ICH Harmonized Tripartite Guidelines: Good Clinical Practice, Tri-Council Policy Statement, and Division of the Food and Drug Regulations. Requests for access to deidentified data from the study forms should be made to Dana El-Mughayyar at dana.el-mughayyar@horizonnb.ca.

Conflicts of Interest

The authors declare that they have no conflicts of interest.

Acknowledgments

The authors thank Saint John Regional Hospital, Dalhousie University, and Canada East Spine Centre for supporting them.

References

RL DeWald, “Burst fractures of the thoracic and lumbar spine,” Clinical Orthopaedics and Related Research, vol. 189, pp. 150–161, 1984.

C. P. Oboynick, M. F. Kurd, B. V. Darden, A. R. Vaccaro, and M. G. Fehlings, “Timing of surgery in thoracolumbar trauma: is early intervention safe?” Neurosurgical Focus, vol. 37, no. 1, 2014.

A. Patel and A. Joaquim, “Thoracolumbar spine trauma: evaluation and surgical decision-making,” Journal of Craniovertebral Junction and Spine, vol. 4, no. 1, pp. 3–9, 2013.

S. H. Han, S.-H. Kang, Y.-J. Cho, and T. G. Cho, “Single incision percutaneous pedicle screw fixation for transforaminal lumbar interbody fusion,” Korean Journal of Spine, vol. 9, no. 2, p. 92, 2012.

W. W. G. Ee, W. L. J. Lau, W. Yeo, Y. Von Bing, and W. M. Yue, “Does minimally invasive surgery have a lower risk of surgical site infections compared with open spinal surgery?” Clinical Orthopaedics and Related Research, vol. 472, pp. 1718–1724, 2014.

P. Huang, Y. Wang, J. Xu et al., “Minimally invasive unilateral pedicle screws and a translaminar facet screw fixation and interbody fusion for treatment of single-segment lower lumbar vertebral disease: surgical technique and preliminary clinical results,” Journal of Orthopaedic Surgery and Research, vol. 12, no. 1, Article ID 117, 2017.

B. Skovrlj, J. Gilligan, H. S. Cutler, and S. A. Qureshi, “Minimally invasive procedures on the lumbar spine,” World Journal of Clinical Cases, vol. 3, no. 1, pp. 1–9, 2015.

E. Kast, K. Mohr, H.-P. Richter, and W. Börm, “Complications of transpedicular screw fixation in the cervical spine,” European Spine Journal, vol. 15, no. 3, pp. 327–334, 2005.

Y. R. Rampersaud, N. Annand, and M. B. Dekutoski, “Use of minimally invasive surgical techniques in the management of thoracolumbar trauma: current concepts,” Spine, vol. 31, no. 11S, pp. S96–S102, 2006.

J. S. Smith, A. T. Ogden, and R. G. Fessler, “Minimally invasive posterior thoracic fusion,” Neurosurgical Focus, vol. 25, no. 2, p. E9, 2008.

H. Yang, J.-h. Shi, M. Ebraheim et al., “Outcome of thoracolumbar burst fractures treated with indirect reduction and fixation without fusion,” European Spine Journal, vol. 20, no. 3, pp. 380–386, 2011.

S. S. Sadrameli, R. Jafrani, B. N. Staub, M. Radaideh, and P. J. Holman, “Minimally invasive, stereotactic, wireless, percutaneous pedicle screw placement in the lumbar spine: accuracy rates with 182 consecutive screws,” International Journal of Spine Surgery, vol. 12, no. 6, pp. 650–658, 2018.

H. W. Alpert, F. A. Farley, M. S. Caird, R. N. Hensinger, Y. Li, and K. L. Vanderhave, “Outcomes following removal of instrumentation after posterior spinal fusion,” Journal of Pediatric Orthopaedics, vol. 36, no. 6, pp. 612–617, 2014.

M. Zotti, T. Fisher, W. W. Yoon et al., “The outcome of pedicle screw instrumentation removal for chronic low back pain,” Global Spine Journal, vol. 5, no. 1_suppl, pp. s–0035, 2015.

P. Vanek, O. Bradac, R. Konopkova, P. de Lacy, J. Lacman, and V. Benes, “Treatment of thoracolumbar trauma by short-segment percutaneous transpedicular screw instrumentation: prospective comparative study with a minimum 2-year follow-up,” Journal of Neurosurgery: Spine, vol. 20, no. 2, pp. 150–156, 2014.

A. Malhotra, V. B. Kalra, X. Wu, R. Grant, R. A. Bronen, and K. M. Abbed, “Imaging of lumbar spinal surgery complications,” Insights Into Imaging, vol. 6, no. 6, pp. 579–590, 2015.

S. N. Divi, G. D. Schroeder, F. C. Oner et al., “AOSpine-spine trauma classification system: the value of modifiers: a narrative review with commentary on evolving descriptive principles,” Global Spine Journal, vol. 9, no. 1_suppl, pp. 77S–88S, 2019.

“Spinal fractures classification system,” https://aosla.com.br/fractures/classification.pdf.

S. P. Baker and B. OʼNeill, “The injury severity score,” The Journal of Trauma: Injury, Infection, and Critical Care, vol. 16, no. 11, pp. 882–885, 1976.

R. W. J. G. Ostelo, R. A. Deyo, P. Stratford et al., “Interpreting change scores for pain and functional status in low back pain,” Spine, vol. 33, no. 1, pp. 90–94, 2008.

J. M. Fritz and J. J. Irrgang, “A comparison of a modified Oswestry low back pain disability questionnaire and the quebec back pain disability scale,” Physical Therapy, vol. 81, no. 2, pp. 776–788, 2001.

E. E. Krebs, T. S. Carey, and M. Weinberger, “Accuracy of the pain numeric rating scale as a screening test in primary care,” Journal of General Internal Medicine, vol. 22, no. 10, pp. 1453–1458, 2007.

D. C. Zelman, E. Dukes, N. Brandenburg, A. Bostrom, and M. Gore, “Identification of cut-points for mild, moderate and severe pain due to diabetic peripheral neuropathy,” Pain, vol. 115, no. 1, pp. 29–36, 2005.

J. D. Childs, S. R. Piva, and J. M. Fritz, “Responsiveness of the numeric pain rating scale in patients with low back pain,” Spine, vol. 30, no. 11, pp. 1331–1334, 2005.

A. J. Smits, L. D. Ouden, A. Jonkergouw, J. Deunk, and F. W. Bloemers, “Posterior implant removal in patients with thoracolumbar spine fractures: long-term results,” European Spine Journal, vol. 26, no. 5, pp. 1525–1534, 2016.

F. Tian, L.-Y. Tu, W.-F. Gu et al., “Percutaneous versus open pedicle screw instrumentation in treatment of thoracic and lumbar spine fractures,” Medicine, vol. 97, no. 41, Article ID e12535, 2018.

M. H. Wild, M. Glees, C. Plieschnegger, and K. Wenda, “Five-year follow-up examination after purely minimally invasive posterior stabilization of thoracolumbar fractures: a comparison of minimally invasive percutaneously and conventionally open treated patients,” Archives of Orthopaedic and Trauma Surgery, vol. 127, no. 5, pp. 335–343, 2007.

M. Takami, H. Yamada, K. Nohda, and M. Yoshida, “A minimally invasive surgery combining temporary percutaneous pedicle screw fixation without fusion and vertebroplasty with transpedicular intracorporeal hydroxyapatite blocks grafting for fresh thoracolumbar burst fractures: prospective study,” European Journal of Orthopaedic Surgery & Traumatology, vol. 24, no. S1, pp. 159–165, 2013.

S.-T. Wang, H.-L. Ma, C.-L. Liu, W.-K. Yu, M.-C. Chang, and T.-H. Chen, “Is fusion necessary for surgically treated burst fractures of the thoracolumbar and lumbar spine?” Spine, vol. 31, no. 23, pp. 2646–2652, 2006.