Advances in Tribology

Volume 2014 (2014), Article ID 763601, 11 pages

http://dx.doi.org/10.1155/2014/763601

Research Article

Studies on Erosion Behavior of Plasma Sprayed Coatings of Glass Microspheres Premixed with Al₂O₃ Particles

Gaurav Gupta and Alok Satapathy

Department of Mechanical Engineering, National Institute of Technology, Rourkela, Odisha 769008, India

Received 20 November 2013; Revised 17 February 2014; Accepted 17 February 2014; Published 31 March 2014

Academic Editor: Huseyin Çimenoǧlu

Copyright © 2014 Gaurav Gupta and Alok Satapathy. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Solid particle erosion (SPE) tests are carried out to evaluate the performance of plasma sprayed coatings of borosilicate glass microspheres (BGM) premixed with Al₂O₃ particles on metallic substrates. For this purpose, an Air Jet Erosion test rig confirming to ASTM G 76 test standards is used. Relative influence of different operating parameters on erosion rate is assessed by statistical analysis of the experimental findings that are based on Taguchi’s L₁₆ orthogonal array. This analysis helps to identify the most significant factor affecting the erosion wear rate of the coating. The study reveals that the impact velocity, impingement angle, erodent size, and Al₂O₃ content in the feed stock, in the declining sequence, are the significant factors influencing the wear rate of these coatings. An Artificial Neural Network (ANN) approach is then implemented taking into account training and test procedure to predict the triboperformance of these coatings under wear conditions beyond the experimental range. Further, the microstructural features of the eroded samples are studied from SEM images to identify possible wear mechanisms.

1. Introduction

Plasma spray coating is a typical thermal spray process that combines particle melting, quenching, and consolidation in a single operation. It utilizes the exotic properties of the plasma medium to different materials and it has the advantage of being able to process various low-grade-ore minerals to obtain value added products and also to deposit ceramics, metals, and so forth generating near homogenous coatings with the desired microstructure [1]. This coating technology has been widely adopted by many industries due to its flexibility, superior quality, and high deposition rate. Plasma sprayed coatings have been widely applied in industrial components in several industries [2, 3] in a wide range of functionalities and engineering designs such as in free standing or near net shape parts [4, 5], environmental clean alternative [6], protection of nuclear equipment [7], and medical purposes [8, 9]. One of the most important and widely used applications of plasma spray coatings is their use as wear resistant coatings [10–14].

Plasma sprayed coatings are being applied on engineering as well as structural components, where erosion occurs frequently. Due to severe dusty industrial environments, the study of solid particle erosive analysis of these coatings becomes highly relevant [15]. Erosion is one of the most important wear phenomena. It is caused by the impact of dispersed particles in a gas or liquid flow on the surface of materials. This in turn reduces the life of the mechanical components used in many industrial applications [16]. There are different types of erosion wear depending on the types of erodent and the methods of impact like slurry erosion, solid particle erosion, liquid impact erosion, and cavitation erosion [16]. Solid particle erosion is the progressive loss of original material from a solid surface due to mechanical interaction between that surface and impinging solid particles. Solid particle erosion (SPE) is a wear process where particles strike against a surface and promote material loss. During flight, a particle carries momentum and kinetic energy, which can be dissipated during impact due to its interaction with a target surface [17]. In some cases, SPE is a useful phenomenon, such as in sand blasting and high speed abrasive water jet cutting; but it is a serious problem in many engineering systems, including steam and jet turbines, pipelines and valves carrying particulate matter, and fluidized bed combustion (FBC) systems [18–21]. To reduce wear, all process parameters are needed to be understood, so as to undertake appropriate steps in the design of substrates and coating materials [22]. As the number of such process variables is too large, statistical techniques could be employed for identification of significant process parameters for optimization. In recent years, the Taguchi experimental design technique has become an excellent tool for improving performance output and optimizing the process [23]. Hence, in this investigation, the Taguchi experimental design has been adopted to find out the relative effects of impingement angle, impact velocity, erodent size, erodent temperature, and alumina content in the feed stock on the erosion wear rate of coatings of borosilicate glass microspheres (BGM) premixed with alumina powder in different proportions.

Borosilicate glass has excellent thermal properties with its low coefficient of expansion and high softening point; it also offers a high level of resistance to attack from water, acids, salt solutions, organic solvents, and halogens. Borosilicate glass is mainly composed of silica (70–80%), boric oxide B₂O₃ (7–13%), and smaller amounts of the alkalis such as 4–8% of Na₂O and K₂O and 2–7% aluminum oxide (Al₂O₃) [24]. Boron gives greater resistance to thermal changes and chemical corrosion. It is suitable for industrial chemical process plants, in laboratories, in the pharmaceutical industry, in bulbs for high powered lamps, and so forth. Borosilicate glass is also used at home for cooking plates and other heat resistant products. It is used for domestic kitchens and chemistry laboratories; this is because it has greater resistance to thermal shock and allows for greater accuracy in laboratory measurements in heating and cooling experiments. Glass microspheres are potential coating materials and can be preferred over irregular ones due to low surface area to volume ratio, high density, free flowing ability and close sizing, and so forth [25].

In the present work artificial neural network (ANN) approach has also been applied for predicting erosion wear rate of BGM-Al₂O₃ coatings. ANN is a powerful mathematical tool and has been successfully used in many fields in the past [26–28]. Inspired by the biological nervous system, the neural networks are composed of elements called neurons operating in parallel. The transfer function between the elements, which is often nonlinear, plays an important role in the prediction quality and a definite function of this ANN can be trained through adjusting the values of weights.

2. Experimental Details

The most important step in plasma spray coating technique is the surface preparation of the substrate in order to increase the mechanical anchoring between the substrate and the coating. The substrates are therefore subjected to grit blasting to have the desired surface roughness. For this, high pressure compressed air carrying alumina particles is used. Surface roughness of about 7-8 μm is obtained in order to get better mechanical anchoring [29]. The coating process is carried out at the Institute of Minerals and Materials Technology, Bhubaneswar, India, using an 80 kW atmospheric plasma spray system working in the nontransferred arc mode (Figure 1). This setup mainly consists of a spray torch, six-axis robot, powder feeder, power supply, mass flow controller, a robot controller, control console, substrate holder, plasma gas supply, cooling water, and spray booth. Grit blasted aluminium and mild steel specimens of size 120 × 60 × 4 mm are fixed on the substrate holder and deposition of glass microspheres premixed with spray grade aluminium oxide particles in different proportions (10, 20 and 30 wt%) is carried out at a constant powder feed rate of 25 g min⁻¹. Coating deposition is made at five different torch input power levels (8, 12, 16, 20, and 24 kW) by suitably varying the plasma arc current and arc voltage. Primary gas flow is varying in between 25 and 35 NL/min and secondary gas flow is varying in between 2 and 6 NL/min. Torch to base distance is kept fixed at 100 mm.

Figure 1: 80 kW atmospheric plasma spray system.

The set up for the solid particle erosion wear test used in this study is capable of creating reproducible erosive situations for assessing erosion wear resistance of the prepared samples. The schematic diagram of the erosion test rig is given in Figure 2. Mainly the test rig consists of an air compressor, an air drying unit, a conveyor belt-type particle feeder, and an air particle mixing and accelerating chamber. In the present study, dry silica sand of different particle sizes (50 μm, 100 μm, 150 μm, and 200 μm) are used as the erodent. The dried and compressed air is mixed with the erodent which is fed constantly by a conveyor belt feeder into the mixing chamber and then is accelerated by passing the mixture through a convergent brass nozzle of 3 mm internal diameter. The erodent particles impact the specimen which can be held at different angles with respect to the direction of erodent flow using a swivel and an adjustable clip. The velocity of the eroding particles is determined using the standard double disc method [30]. The apparatus is equipped with a heater which can regulate and maintain the erodent temperature at any predetermined fixed value during an erosion trial. The samples are cleaned in acetone, dried, and weighed before and after the erosion trials using a precision electronic balance to an accuracy of ±0.1 mg. The weight loss is recorded for subsequent calculation of erosion rate. The process is repeated till the erosion rate attains a constant value called steady state erosion rate.

Figure 2: Solid particle erosion test setup.

Specimens of size 10 × 13 mm are sliced from the uneroded and eroded samples for microscopic observation. The top surfaces of the specimens are observed under scanning electron microscope JEOL JSM-6480LV, by using the secondary electron imaging. To enhance the electrical conductivity of the samples, a thin film of platinum is vacuum-evaporated onto them before the photomicrographs are taken.

Functional coatings have to fulfill various requirements when employed in tribological applications. The wear rate is one of the requirements because it is directly related to the service life period of the coating. In order to achieve a certain degree of erosion wear resistance accurately and repeatedly, the influence parameters of the process have to be controlled accordingly. Taguchi’s experimental design can thus be used as a tool in such a case to make parametric appraisal of such processes in a real-time parameter space.

Statistical methods are commonly used to improve the quality of a product or process. Such methods enable the user to define and study the effect of every single condition possible in an experiment where numerous factors are involved. Solid particle erosion is such a process in which a number of control factors collectively determine the performance output, that is, the erosion rate. In this context, Taguchi experimental design happens to be a powerful analysis tool for modeling and analyzing the influence of control factors on performance output. Taguchi’s method uses a statistical measure of performance called signal-to-noise ratio (), which is the logarithmic function of desired output to serve as objective functions for optimization. The ratio depends on the qualitative characteristics/attributes of the product/process/experimental variables to be optimized. The three categories of ratios that are used are smaller-the-better (SB), higher-the-better (HB), and nominal-the-best (NB). The ratio for minimum erosion rate (ER) falling under smaller-the-better norm can be calculated as logarithmic transformation of the loss function as shown below:

Here, “” is the number of observations and “” is the observed data.

The erosion wear tests on the coatings are carried out under different operating conditions listed in Table 1. Different control factors and their selected levels are given in Table 2.

Table 1: Setting of parameters.

Control factors
Symbols
Fixed parameters

Impact velocity
Factor A
Erodent
Silica sand

Impingement angle
Factor B
Erodent feed rate
10.0 ± 1.0 g min⁻¹

Erodent size
Factor C
Stand-off distance
100 mm

Erodent temperature
Factor D
Nozzle diameter
3 mm

Alumina content
Factor E

Table 2: Levels of the variables used in the experiment.

Control factor
Level

I
II
III
IV
Unit

Impact velocity
32
40
48
56
m s⁻¹

Impingement angle
30
45
60
90
Degree

Erodent size
50
100
150
200
µm

Erodent temperature
30
60
90
120
°C

Alumina content
0
10
20
30
wt%

The plan of the experiments is as follows: the first column is assigned to impact velocity (), the second column to impingement angle (), the third column to erodent size (), the fourth column to erodent temperature (), and the fifth column to alumina content (), respectively, to estimate erosion rate. The impacts of these five parameters are studied using an L₁₆ orthogonal array (Table 3). The experimental observations, that is, the wear rates are further transformed into corresponding signal-to-noise () ratios.

Table 3: Orthogonal array for L₁₆ (4⁵) Taguchi design.

Experiment number
A
B
C
D
E

1
1
1
1
1
1

2
1
2
2
2
2

3
1
3
3
3
3

4
1
4
4
4
4

5
2
1
2
3
4

6
2
2
1
4
3

7
2
3
4
1
2

8
2
4
3
2
1

9
3
1
3
4
2

10
3
2
4
3
1

11
3
3
1
2
4

12
3
4
2
1
3

13
4
1
4
2
3

14
4
2
3
1
4

15
4
3
2
4
1

16
4
4
1
3
2

In conventional full factorial experimental design, it would require runs to study five factors each at four levels, whereas Taguchi’s factorial experiment approach reduces it to only 16 runs offering a great advantage in terms of experimental time and cost.

An artificial neural network is a technique that involves database training to predict input-output evolutions. Basically this technology is suitable for some complex, nonlinear, and multidimensional problems because it is able to imitate the learning capability of human beings. This means that the network can learn directly from the examples without any prior formulae about the nature of the problem and generalize by itself some knowledge, which could be applied for new cases. A neural network is a system composed of many cross-linked simple processing units called neurons. The network generally consists of three parts connected in series: input layer, hidden layer, and output layer. The coarse information is accepted by the input layer and processed in the hidden layer. Finally the results are exported via the output layer [31]. The details of this methodology are described by Rajasekaran and Vijayalakshmi Pai [32]. Input parameters for training are given in Table 4. The three-layer neural network used in this work is shown in Figure 3. A software package NEURALNET for neural computing based on a back propagation algorithm is used as the prediction tool for erosion wear rate of the coatings under various test conditions.

Table 4: Input parameters for training.

Input parameters for training
Values

Error tolerance
0.003

Learning rate (β)
0.002

Momentum parameter (α)
0.002

Noise factor (NF)
0.001

Number of epochs
1, 00, 00,000

Slope parameter (£)
0.6

Number of hidden layer neurons (H)
7

Number of input layer neurons (I)
5

Number of output layer neurons (O)
1

Figure 3: The three-layer neural network.

3. Results and Discussion

3.1. Coating Thickness

The coating thickness varies appreciably with torch input power. The thickness is found to be varying in between 61 μm to 220 μm for mild steel substrates and 56 μm to 200 μm for aluminium substrates with different aluminium oxide content mixed with BGM as the power level changes gradually from 8 kW to 24 kW. The gradual increase in coating thickness with increasing power level is due to better plasma-particle interaction leading to higher degree of particle melting at higher power levels.

3.2. Coating Hardness

Microhardness measurement of the coating specimens which are metallographically polished is made using a Leitz Microhardness Tester equipped with a monitor and a microprocessor based controller. Different optically distinguishable phases bear different hardness values and the average of these values is recorded as the mean hardness of the coating. Each data point therefore is the mean of at least six or seven such readings taken on a single specimen. The values of microhardness are shown in Table 5.

Table 5: Variation of micro-hardness with torch input power.

Torch Input power (kW)
Coating Micro-hardness (GPa)

BGM
BGM + 10% Al₂O₃
BGM + 20% Al₂O₃
BGM + 30% Al₂O₃

8
9.92
9.55
9.41
9.27

12
10.12
9.81
9.74
9.59

16
11.23
10.98
10.89
10.65

20
11.67
11.41
11.29
11.13

24
11.42
11.12
11.02
10.89

3.3. Coating Adhesion Strength

To evaluate the coating adhesion strength, a horizontal table model universal testing machine PC-2000 Electronic Tenso-meter is used. The test is conducted by the pull-out method in which two cylindrical specimens are taken. The test is performed as per ASTM C-633.

The variations of coating adhesion strength with torch input power level for mild steel and aluminium substrates are shown in Figures 4(a) and 4(b), respectively. Each data point on the variation curve is actually the average of values recorded in three test runs on identical specimens. From the figures, it is clear that the adhesion strength varies appreciably with operating power of the plasma torch. The strength also differs from substrate to substrate. The adhesion strength is relatively higher in case of aluminium substrate in comparison to mild steel substrate which is due to the superior thermal conductivity of aluminium.

(a)

(b)

Figure 4: Variation of coating adhesion strength with plasma torch input power.

Initially, when the operating power level is increased from 8 kW to 20 kW, the melting fraction and velocity of the particles also increase. Therefore, there is better splashing and mechanical interlocking of molten particles on the substrate surface leading to an increase in adhesion strength. But, at higher power level (beyond 20 kW), the amount of fragmentation and vaporization of the particles are likely to increase. There is also a greater chance of smaller particles (during in-flight traverse through the plasma) to fly off during spraying. This has resulted in poor adhesion strength of the coatings. During in-flight traverse through the plasma, BGM-Al₂O₃ particles would melt either partially or fully depending on the temperature and the flame residence time of that particular particle. The fully molten particles take the form of spherical droplets and the partially molten ones reduce in size. Moreover, at higher operating power, due to high temperature and high enthalpy, more particles are fragmented into smaller particles. These smaller particles tend to fly off during spraying [33–35].

During the plasma particle interaction, some amount of Al from Al₂O₃ may be getting diffused and the presence of the diffusion layers within the splats enhances the cohesive forces between the splats which in turn establishes true metallurgical bonds between splat-splat and splat-substrate. Ageorges and Fauchais reported such an increase of adhesion strength from 50 to 80 MPa by adding Al₂O₃ to stainless steel particles [36]. Similar observations have also been reported by previous investigators for coatings of different materials [33, 37].

3.4. Scanning Electron Micrographs

SEM micrographs of uneroded and eroded surfaces for the plasma sprayed BGM-Al₂O₃ coatings deposited at torch input power of 20 kW are shown in Figures 5(a) and 5(b) and Figures 5(c) and 5(d), respectively. Microstructures revealed are typical for a plasma spray process consisting of splats, which are of irregular shape with distinguished boundaries. A considerable amount of molten and semimolten particles are observed for the uneroded samples. The particles injected into the plasma stream get heated to temperatures much above the melting point of the materials and the molten drops are propelled through the plasma jet. The particles leave the jet fall through the atmospheric air and get quenched before they get collected in the collection chamber. The particles get spheroidized because of surface tension forces. No sizable cracks are noticed on the coating surface; however, some cavities are observed. Particle distribution seems to be uniform along the coating surface. Figures 5(c) and 5(d) show SEM micrographs of eroded surfaces of BGM-Al₂O₃ coatings. As a result of repeated impact of high velocity erodent particles there is formation of grooves of different sizes. However, there is no sign of cracks seen on these micrographs.

(a)

(b)

(c)

(d)

Figure 5: SEM micrographs of worn surfaces of the BGM coatings.

3.5. Taguchi Experimental Design

The experiments have been carried out using Taguchi experimental design (L₁₆ orthogonal array) given in Table 3 and the subsequent analysis of the test results is made using the popular software specifically used for design of experiment applications known as MINITAB 14.

The results of erosion experiments carried out according to the predetermined design on BGM coatings premixed with Al₂O₃ particles are presented in Table 6. This table provides the experimental erosion rate along with the signal-to-noise ratio for each individual test run. Each value of the erosion rate is the average of three replications. The overall mean of the ratios is found to be −24.3731 db. The ratio response analysis presented in Table 7 indicates the hierarchical order of the control factors as impact velocity (), impingement angle (), erodent size (), alumina content (), and erodent temperature () in decreasing order according to their significance on the erosion rate. It can thus be concluded that the erodent temperature () has negligible effect on the wear rate. The effects of control factors on erosion rate are shown in Figure 6.

Table 6: Experimental design using L₁₆ orthogonal array and the wear test results.

A  

Impact velocity (m s⁻¹)
B   

Impingement angle (degree)
C   

Erodent size (µm)
D   

Erodent temperature (°C)
E   

Alumina content (wt%)
Erosion rate (mg kg⁻¹)
S/N ratio (db)

32
30
50
30
0
8.56667
−18.6562

32
45
100
60
10
11.65643
−21.3313

32
60
150
90
20
14.23695
−23.0683

32
90
200
120
30
17. 04751
−24.6332

40
30
100
90
30
13.34126
−22.5039

40
45
50
120
20
15.56129
−23.8409

40
60
200
30
10
20.98768
−26.4393

40
90
150
60
0
18.81183
−25.4886

48
30
150
120
10
16.23178
−24.2073

48
45
200
90
0
16.53376
−24.3674

48
60
50
60
30
17.43003
−24.8260

48
90
100
30
20
20.46321
−26.2195

56
30
200
60
20
19.00984
−25.5796

56
45
150
30
30
19.14336
−25.6404

56
60
100
120
0
20.44331
−26.2110

56
90
50
90
10
22.27585
−26.9567

Table 7: S/N ratio response table for erosion rate.

Level
A
B
C
D
E

1
−21.92
−22.74
−23.57
−24.24
−23.68

2
−24.57
−23.80
−24.07
−24.31
−24.73

3
−24.91
−25.14
−24.60
−24.22
−24.68

4
−26.10
−25.82
−25.25
−24.72
−24.40

Delta
4.17
3.09
1.68
0.50
1.05

Rank
1
2
3
5
4

Figure 6: Main effect plot for ratio. Signal-to-noise: Smaller-is-better.

Analysis of the results leads to the conclusion that factor combination of (impact velocity), (impingement angle), (erodent size), (erodent temperature), and (alumina content) gives minimum erosion rate (Figure 6) for coatings.

3.6. Artificial Neural Network

The ANN predictive results of erosion wear rate for all the 16 test conditions are shown and compared with the experimental values along with the associated percentage errors in Table 8. It is observed that the errors lie in the range of 0–10%, which establishes the validity of the neural computation. The errors, however, can still be reduced and the quality of predictions can be further improved by enlarging the data sets and optimizing the construction of the neural network. A well-trained ANN is expected to be very helpful for the analysis of erosion wear characteristics of any given coating and permits us to study quantitatively the effect of each of the considered input parameters on the wear rate. The range of any chosen parameter can be beyond the actual experimental limits, thus offering the possibility to use the generalization property of ANN in a large parameter space.

Table 8: Percentage error between experimental result and ANN prediction.

Test run
Erosion rate (mg kg⁻¹)

Experimental result
ANN prediction
Error (%)

1
8.56667
9.0548
5.698013

2
11.65643
11.7859
1.110717

3
14.23695
13.254
6.90422

4
17. 04751
18.4587
8.277983

5
13.34126
13.3369
0.03268

6
15.56129
14.589
6.24813

7
20.98768
21.4589
2.245222

8
18.81183
18.1495
3.52082

9
16.23178
15.5895
3.95693

10
16.53376
16.4859
0.28947

11
17.43003
17.2458
1.05697

12
20.46321
21.5487
5.304593

13
19.00984
18.865
0.76192

14
19.14336
20.0014
4.482181

15
20.44331
20.221
1.08745

16
22.27585
24.3568
9.341731

In the present investigation, this possibility has been explored by selecting the most significant factor; that is, the impact velocity in a range from 25 to 75 m s⁻¹. Sets of predictions for erosion rate of coatings of different compositions at different impact velocities are evolved and this predicted evolution is illustrated in Figures 7(a) and 7(b). It is interesting to see that the erosion rate presents an exponential type evolution with the impact velocity. As the velocity of impact of the erodent increases, the kinetic energy carried by it also increases. This causes transfer of greater amount of energy to the target coating surface upon impact and leads to higher material loss due to erosion. It has also been reported by previous investigators that impact velocity happens to be an important test variable in any erosion test and can easily overshadow changes in other variables such as target material and impingement angle [38]. Erosion rate (ER) depends on velocity () by a power law, given as , where is a material constant. However, the exponent is reported to be material independent and is governed by test conditions including particle characteristics and the erosion test apparatus [39–41].

(a)

(b)

Figure 7: Effect of impact velocity for different (a) impingement angle and (b) erodent size.

3.7. Wear Prediction Using Predictive Equation

For the present investigation, an attempt has been made to find out optimal setting of control factors for minimum erosion wear rate. The single objective optimization requires quantitative determination of the relationship between erosion wear rate and control factors. In order to derive the wear rate in terms of a mathematical model, the following equation is suggested:

ER is the erosion rate in mg kg⁻¹ and (–5) are the model constants. is the impact velocity (m s⁻¹), is the impingement angle (degree), is the erodent size (μm), is the erodent temperature (°C), and is the alumina content in the feedstock (wt%). The constants are calculated using nonlinear regression analysis with the help of SYSTAT 7 software and the following relation is obtained:

The correctness of the calculated constants is confirmed as high correlation coefficient () to the tune of 0.995 is obtained for erosion wear rate and therefore the model is quite suitable to be used for predictive purpose. A comparison of erosion rate of the coatings with the experimental values is presented in Table 9 which indicates that the percentage error associated with the predicted values with respect to the experimental one varies in the range of 0 to 12%.

Table 9: Comparison between experimental and predicted values for erosion rat.

Erosion rate (mg kg⁻¹)
Percentage error

Obtained from experimentation
Obtained from predictive equation

8.56667
9.487
10.743

11.65643
12.139
4.140

14.23695
14.444
1.454

17. 04751
18.114
6.256

13.34126
13.31
0.234

15.56129
13.735
11.736

20.98768
19.56
6.802

18.81183
19.15
1.798

16.23178
16.086
0.898

16.53376
18.111
9.540

17.43003
17.496
0.379

20.46321
20.886
2.066

19.00984
19.282
1.432

19.14336
19.987
4.407

20.44331
20.132
1.523

22.27585
22.202
0.332

4. Conclusions

Borosilicate glass microspheres premixed with Al₂O₃ can be used as a potential material for producing wear resistant coatings. Samples coated with BGM-Al₂O₃ exhibit properties like good adhesion strength and hardness desirable for tribological applications. Erosion wear characteristics of these coating can be analyzed following a design of experiment approach. This study reveals that among all the control factors, impact velocity is the most significant factor affecting the wear rate of these coatings. Premixing of Al₂O₃ with glass microspheres improves the coating adhesion strength without significantly affecting the erosion wear performance of the coatings. ANN technique is successfully applied in this investigation and it is seen that the use of the neural network model to simulate experiments with parametric design strategy is quite effective for prediction of wear response of such coatings within and beyond the experimental domain.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

References

S. C. Mishra, S. Das, A. Satapathy, S. Sarkar, P. V. Ananthapadmanabhan, and K. P. Sreekumar, “Investigation on composite coating of low grade minerals,” Journal of Reinforced Plastics and Composites, vol. 28, no. 24, pp. 3061–3067, 2009.

F. Kassabji, J. P. Durand, and G. Jacq, “Thermal spray application for the next millennium a business development perspective,” in Proceedings of the International Thermal Spray Conference: Thermal Spray Meeting the Challenges of the 21st Century, pp. 1677–1680, Cincinnati, Ohio, USA, May 1998.

W. Hangong and W. Liuying, “Thermal spray connects: explore its surface potential,” in Proceedings of the International Thermal Spray Conference (ITSC '05), E. Lugscheider, Ed., p. 29, ASM International, Basel, Switzerland, 2005.

J. M. Guilemany, J. Nin, and J. R. Miguel, “Thermal spray connects: explore its surface potential,” in Proceedings of the International Thermal Spray Conference (ITSC '05), E. Lugscheider, Ed., p. 36, ASM International, Basel, Switzerland, 2005.

T. Mckechnie, “Near-net shape spray forming-metals,” in Thermal Spray: Surface Engineering Through Applied Research, C. C. Berndt, Ed., pp. 1105–1116, ASM International, Materials Park, Ohio, USA, 2000.

T. Mckechnie, “Hard chrome replacement and other thermal spray application in the Chilean Navy,” in Thermal Spray: Surface Engineering Through Applied Research, C. C. Berndt, Ed., pp. 1145–1148, ASM International, Materials Park, Ohio, USA, 2000.

W. Mallèner, W. Hohenauer, and D. Stover, “Tungsten coatings for nuclear-fusion devices,” in Thermal Spray: Practical Solutions Goes Engineering Problems, C. C. Berndt, Ed., pp. 1–6, ASM International, Materials Park, Ohio, USA, 1996.

Y. Wang, K. A. Khor, and P. Cheang, “Thermal spraying of functionally graded calcium phosphate coatings for biomedical implants,” Journal of Thermal Spray Technology, vol. 7, no. 1, pp. 50–57, 1998.

C. R. C. Lima and J. M. Guilemany, “Adhesion improvements of Thermal Barrier Coatings with HVOF thermally sprayed bond coats,” Surface and Coatings Technology, vol. 201, no. 8, pp. 4694–4701, 2007.

A. R. M. Sahab, N. H. Saad, S. Kasolang, and J. Saedon, “Impact of plasma spray variables parameters on mechanical and wear behaviour of plasma sprayed Al₂O₃ 3%wt TiO₂ coating in abrasion and erosion application,” Procedia Engineering, vol. 41, pp. 1689–1695, 2012.

S. B. Mishra, S. Prakash, and K. Chandra, “Studies on erosion behaviour of plasma sprayed coatings on a Ni-based superalloy,” Wear, vol. 260, no. 4-5, pp. 422–432, 2006.

S. J. Matthews, B. J. James, and M. M. Hyland, “Microstructural influence on erosion behaviour of thermal spray coatings,” Materials Characterization, vol. 58, no. 1, pp. 59–64, 2007.

V. P. Singh, A. Sil, and R. Jayaganthan, “A study on sliding and erosive wear behaviour of atmospheric plasma sprayed conventional and nanostructured alumina coatings,” Materials and Design, vol. 32, no. 2, pp. 584–591, 2011.

M. Mohanty, R. W. Smith, M. De Bonte, J. P. Celis, and E. Lugscheider, “Sliding wear behavior of thermally sprayed 75/25 Cr₃C₂/NiCr wear resistant coatings,” Wear, vol. 198, no. 1-2, pp. 251–266, 1996.

S. P. Sahu, A. Satapathy, A. Patnaik, K. P. Sreekumar, and P. V. Ananthapadmanabhan, “Development, characterization and erosion wear response of plasma sprayed fly ash-aluminum coatings,” Materials and Design, vol. 31, no. 3, pp. 1165–1173, 2010.

S. K. Acharya, V. Dikshit, and P. Mishra, “Erosive wear behaviour of redmud filled metal matrix composite,” Journal of Reinforced Plastics and Composites, vol. 27, no. 2, pp. 145–152, 2008.

S. C. Mishra, S. Das, A. Satapathy, P. V. Ananthapadmanabhan, and K. P. Sreekumar, “Erosion wear analysis of plasma sprayed ceramic coating using the taguchi technique,” Tribology Transactions, vol. 52, no. 3, pp. 401–404, 2009.

S. P. R. Sahu, A. Satapathy, D. Mishra, A. Patnaik, and K. P. Sreekumar, “Tribo-performance analysis of fly ash-aluminum coatings using experimental design and ANN,” Tribology Transactions, vol. 53, no. 4, pp. 533–542, 2010.

T. H. Kosel, “Solid particle erosion,” in ASM Handbook, vol. 18 of Friction, Lubrication, and Wear Technology, pp. 199–213, American Society for Metals, 1992.

Y. Zhang, Y.-B. Cheng, and S. Lathabai, “Erosion of alumina ceramics by air- and water-suspended garnet particles,” Wear, vol. 240, no. 1-2, pp. 40–51, 2000.

R. J. K. Wood, “The sand erosion performance of coatings,” Materials and Design, vol. 20, no. 4, pp. 179–191, 1999.

ASM, ASM Handbook: Friction, Lubrication, and Wear Technology, vol. 18, ASM International, 1992.

Y. Sahin, “The prediction of wear resistance model for the metal matrix composites,” Wear, vol. 258, no. 11-12, pp. 1717–1722, 2005.

G. Gupta and A. Satapathy, “Modified mechanical and wear characteristics of epoxy filled with borosilicate glass micro-spheres,” in Proceedings of the International Conference on Advancements in Polymeric Materials, CIPET, Lucknow, India, 2013.

S. P. Sahu, A. Satapathy, A. Patnaik, K. P. Sreekumar, and P. V. Ananthapadmanabhan, “Development, characterization and erosion wear response of plasma sprayed fly ash-aluminum coatings,” Materials and Design, vol. 31, no. 3, pp. 1165–1173, 2010.

V. Singh, V. Tathavadkar, S. M. Rao, and K. S. Raju, “Predicting the performance of submerged arc furnace with varied raw material combinations using artificial neural network,” Journal of Materials Processing Technology, vol. 183, no. 1, pp. 111–116, 2007.

A. Bezazi, S. G. Pierce, K. Worden, and E. H. Harkati, “Fatigue life prediction of sandwich composite materials under flexural tests using a Bayesian trained artificial neural network,” International Journal of Fatigue, vol. 29, no. 4, pp. 738–747, 2007.

M. S. Al-Haik, M. Y. Hussaini, and H. Garmestani, “Prediction of nonlinear viscoelastic behavior of polymeric composites using an artificial neural network,” International Journal of Plasticity, vol. 22, no. 7, pp. 1367–1392, 2006.

G. Gupta, S. K. Mishra, S. Mantry, and A. Satapathy, “Preparation and characterization of thermal spray coating of glass micro-spheres on metal substrate,” Advanced Materials Research, vol. 585, pp. 502–506, 2012.

H. A. Aglan and T. A. Chenock Jr., “Erosion damage features of polyimide thermoset composites,” Sampe Quarterly, vol. 24, no. 2, pp. 41–47, 1993.

S. Haykin, Neural Networks: A Comprehensive Foundation, Prentice Hall, Upper Saddle River, NJ, USA, 1999.

S. Rajasekaran and G. A. Vijayalakshmi Pai, Neural Networks, Fuzzy Logic and Genetic Algorithms-Synthesis and Applications, Prentice Hall, New Delhi, India, 2003.

A. Satapathy, Thermal spray coating of red mud on metals [Ph.D. thesis], NIT, Rourkela, India, 2006.

A. Satapathy, S. C. Mishra, P. V. Ananthapadmanabhan, and K. P. Sreekumar, “Development of ceramic coatings using red mud—a solid waste of alumina plants,” Journal of Solid Waste Technology and Management, vol. 33, no. 2, pp. 108–113, 2007.

A. Satapathy, S. P. Sahu, and D. Mishra, “Development of protective coatings using fly ash premixed with metal powder on Aluminium substrates,” Waste Management and Research, vol. 28, no. 7, pp. 660–666, 2010.

H. Ageorges and P. Fauchais, “Plasma spraying of stainless-steel particles coated with an alumina shell,” Thin Solid Films, vol. 370, no. 1, pp. 213–222, 2000.

M. Ahmaruzzaman, “A review on the utilization of fly ash,” Progress in Energy and Combustion Science, vol. 36, no. 3, pp. 327–363, 2010.

B. A. Lindsley and A. R. Marder, “The effect of velocity on the solid particle erosion rate of alloys,” Wear, vol. 225–229, pp. 510–516, 1999.

Q. Chen and D. Y. Li, “Computer simulation of solid particle erosion,” Wear, vol. 254, no. 3-4, pp. 203–210, 2003.

J. John Rajesh, J. Bijwe, B. Venkataraman, and U. S. Tewari, “Effect of impinging velocity on the erosive wear behaviour of polyamides,” Tribology International, vol. 37, no. 3, pp. 219–226, 2004.

D. López, J. P. Congote, J. R. Cano, A. Toro, and A. P. Tschiptschin, “Effect of particle velocity and impact angle on the corrosion-erosion of AISI 304 and AISI 420 stainless steels,” Wear, vol. 259, no. 1–6, pp. 118–124, 2005.