BioMed Research International

Volume 2013 (2013), Article ID 127570, 8 pages

http://dx.doi.org/10.1155/2013/127570

Research Article

Antibiogram, Adhesive Characteristics, and Incidence of Class 1 Integron in Aeromonas Species Isolated from Two South African Rivers

Isoken H. Igbinosa, Vincent N. Chigor, Etinosa O. Igbinosa, Lawrence C. Obi, and Anthony I. Okoh

Applied and Environmental Microbiology Research Group (AEMREG), Department of Biochemistry and Microbiology, University of Fort Hare, Private Bag X1314, Alice 5700, South Africa

Received 29 May 2013; Revised 25 August 2013; Accepted 27 August 2013

Academic Editor: Yanmin Hu

Copyright © 2013 Isoken H. Igbinosa et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Aeromonas species are well distributed in freshwater environments, and their natural susceptibility to antimicrobials renders them interesting candidates for the survey of antimicrobial resistance in freshwater milieu. Water samples were collected from Kat and Tyume rivers in the Eastern Cape province of South Africa, and a total of 45 isolates identified as Aeromonas species were recovered from the two rivers. All Aeromonas isolates were resistant to oxacillin, penicillin, clindamycin, cephalothin, vancomycin, and rifamycin, while appreciable susceptibilities (89.3 : 94.1%, 82.1 : 94.1%, 85.7 : 88.2%, and 92.9 : 88.2%) were observed against ciprofloxacin, chloramphenicol, nitrofurantoin, and gentamicin from Kat and Tyume rivers, respectively. Multiple antibiotic resistance (MAR) indices ranged from 0.016 to 0.044 for the two rivers. Class 1 integron was detected in about 20% of the isolates, and all the isolates except one showed ability to produce biofilm in vitro as weak producers (53.33%), moderate producers (15.56%), and strong producers (28.9%). This investigation provides a baseline data on antibiotic resistance as well as the adhesive characteristics of Aeromonas isolates from Tyume and Kat rivers in the Eastern Cape province of South Africa.

1. Introduction

Aeromonas species are Gram-negative, rod-shaped, non-spore-forming, facultatively anaerobic bacteria that occur ubiquitously and autochthonously in aquatic environments. The Aeromonas genus has undergone a number of taxonomic and nomenclature revisions in the past two decades [1]. Initially, Aeromonas was placed in the family Vibrionaceae, but successive phylogenetic analyses revealed that Aeromonas is not closely related to Vibrios and resulted in moving Aeromonas to a new family, the Aeromonadaceae [2, 3]. Aeromonads share in common many biochemical characteristics with members of the Enterobacteriaceae; however, they are easily differentiated by being oxidase positive.

Aeromonas species are agents of infection in fish [4] and are associated with human diarrheal diseases and wound infections which may result due to contact with contaminated water [5, 6]. Wound infections may become severe and systemic. Aeromonas is also associated with sepsis, respiratory tract, eye and other systemic infections [7]. In fish, Aeromonas causes bacterial infections which may pose relatively high resistance to antibiotics including clinically relevant cases and diseases [8]. Treatment of Aeromonas infection is usually with the use of antibiotics; however, antimicrobial resistance can make these infections difficult to treat.

The ubiquity of Aeromonas species in aquatic ecosystems and their natural susceptibility to antimicrobials render them interesting candidates for the survey of antimicrobial resistance in freshwater environments [9, 10]. Freshwater streams are usually receptors of many industrial, domestic and agricultural wastes, which could contain antimicrobial agents and antimicrobial-resistant bacteria [10, 11]. Due to diverse microbial population in such ecosystems, freshwater environment provides favourable conditions for the spread of antimicrobial resistance.

Aquatic bacteria such as Aeromonas may become reservoirs of antibiotic resistance determinants as a result of influents from diverse sources entering into the river and as such may transfer these antibiotic resistance determinants to other aquatic organisms including pathogenic bacteria [10]. In the United States, a study has shown that several rivers are becoming major reservoirs of antibiotic resistance microorganisms [12]. With widespread commerce and global travel, antibiotic resistant organisms can spread across the globe. The occurrence and distribution of Aeromonas in aquatic ecosystems, its emerging significance as a contaminant of water, and the pathogenic potential mediated by mesophilic Aeromonas species are all of public health concern [13, 14]. The ability of bacteria to develop multiple-drug resistance result in part from their ability to acquire new antibiotic resistance genes. Mobile elements called integrons determine a site-specific recombination system that is responsible for the acquisition of many antibiotic resistance determinants [15, 16].

Bacterial adherence to surfaces is one of the initial steps leading to biofilm formation and is therefore a significant microbiological event in medicine and the environment [17, 18]. Aeromonas hydrophila can attach to and form biofilms on polystyrene, glass surface, stainless steel, and polyvinyl chloride[19]. Aeromonas can also attach to solid surfaces and form biofilms in aquatic environments. The presence of Aeromonas in biofilm samples from water distribution systems in South Africa has been documented [20]. Biofilm is an irreversible growth of a combination of bacterial micro-colonies on surfaces entrenched in extracellular polysaccharide matrix [21, 22]. The formation of biofilm results in resistance of bacteria to antimicrobial drugs and persistent infections [21] which can lead to the severity of several bacterial diseases affecting both human [23] and animal health [24].

Although Aeromonas species are well distributed in freshwater habitat and have been assigned as an emerging threat to human health [3, 25], no data exists about the antibiotic susceptibility profiles and adhesive properties of aeromonads from Kat and Tyume rivers in the Eastern Cape province of South Africa. The Food and Agriculture Organization/World Health Organization (FAO/WHO) commission recommends that to prevent waterborne diseases in developing countries, aquatic environments having direct impact on human populations should be characterized physically, chemically, and microbiologically. In view of this recommendation, and as part of our surveillance of reservoir of antibiotic resistant commensal bacteria, this present study aimed to (i) evaluate the levels of antimicrobial resistance in aeromonads isolates from Kat and Tyume rivers, (ii) determine the presence of class 1 and 2 integron associated gene cassette, and (iii) evaluate their biofilm forming capabilities.

2. Materials and Methods

2.1. Study Area, Sampling and Processing of Samples

Kat river is located in a semiurban location at geographical coordinates: S32°46.547′ E026°38.456′ while Tyume river is located in a rural community at geographical coordinates: S32°47.279′ E026° 50.520′ in the Eastern Cape province of South Africa. Water samples were collected four times at random between April 2011 and March 2012. Water samples were collected in duplicates using 2 L bottles placed on ice and transported to the laboratory for analysis. Hundred microliter (100 μL) was spread on several Glutamate phenol(GSP) agar (biolab, merck SA); on the other hand, 500 μL was inoculated into 145 mL sterile nutrient broth and incubated in a rotary incubator at 150 rpm overnight at 36°C. At the end of the incubation period, a loopful of the culture was spread and/or streaked on GSP agar, and all agar plates were incubated at 36°C for 24 h. Typical yellow colonies on GSP agar were purified using the same media. Pure colonies were transferred unto nutrient agar plates and subjected to oxidase and catalase tests. Oxidase and catalase positive isolates were further screened for biochemical characteristics using API 20NE kit. The strips were then read, and final identification was made using API lab plus software (bioMerieux, Marcy l’Etoile, France).

2.2. Antimicrobial Susceptibility Testing

Isolates were subcultured on nutrient agar plates incubated for 24 h at 36°C. Colonies were picked from the agar plates, and suspended in normal saline (0.85% w/v), and adjusted to an A₅₆₀ value of (0.5 McFarland standard). The bacterial suspension was spread on the Mueller Hinton agar plates using a sterile swab stick, allowed to dry, and impregnated with antibiotic disk. The antibiotics used were as follows: ciprofloxacin (5 μg), trimethoprim (5 μg), chloramphenicol (3 μg), penicillins (10 μg), clindamycins (2 μg), ofloxacin (5 μg), ampicillin-sulbactam (20 μg), oxacillin (1 μg). ampicillin (25 μg), gentamicin (10 μg), nalidixic acid (30 μg), cefotaxime (30 μg), nitrofurantoin (300 μg), sulfamethoxazole (25 μg), cephalothin (30 μg), erythromycin (15 μg), tetracycline (10 μg), minocycline (30 μg), vancomycin (30 μg), and rifampicin (5 μg). Disks were purchased from Mast Diagnostics (Mast Group Merseyside UK). Plates were incubated at 36°C for 24 h. Diameters of the zones of inhibition were measured and interpreted, as susceptible, intermediate or resistant according to the Clinical Laboratory Standard Guidelines [26]. The frequency of antibiotic-resistant Aeromonas isolates was calculated by the following equation: , where is the number of isolates resistant to an antibiotic and is the total number of isolates from the sample. The multiple antibiotic resistance (MAR) index of each samples was estimated by the following equation: , where represents the aggregate antibiotic resistance score of all isolates from the sample, represents the number of antibiotics, and represents the number of isolates from the sample as outlined in [27–29].

2.3. PCR Detection of Integrons

DNA was extracted following the method described elsewhere [30, 31]. Template DNA was stored at −20°C until it was ready for use. The primer used for the detection of class 1 and class 2 integron is shown in Table 1. The PCR conditions were as follows: initial denaturation at 94°C for 2 min followed by 30 cycles of denaturation at (95°C for 45 s), annealing (56°C for 1 min), extension (72°C for 90 s), and a final extension at 72°C for 10 min.

Table 1: Primer set for the detection of class 1 and 2 integron.

Target gene
Primer sequence
Size
Reference

Class 1 integron
GGC ATC CAA GCA GCA AG
Variable
[55]

GGC ATC CAA GCA GCA AG

Class 2 integron
CGG GAT CCC CGG CAT GCA CGA TTT GTA
Variable
[55]

GAT GCC ATC GCA AGT ACG AG

2.4. Biofilm Formation Assay

Quantitatively, biofilm formation among Aeromonas isolates was assessed using microtitre plate method described by Stepanovic et al. [32] and Odeyemi et al. [22] with modification. Wells of 96 flat bottomed microtiter plates were filled with 200 μL of Tryptone Soy Broth (TSB) and inoculated with 20 μL of Aeromonas isolates grown overnight and standardized to 0.5 McFarland standard. Plates were incubated at 37°C for 24 h. Positive control wells contained Aeromonas hydrophila ATCC 7699, and the negative control wells contained uninoculated Tryptone Soy Broth. Contents of each well were aspirated and washed three times with sterile phosphate-buffered saline (PBS). After air-drying, wells were stained with 200 μL of 1% crystal violet for 30 min. The wells were carefully washed with distilled water to remove the excess stain. Plates were allowed to dry at room temperature. Dye bound to adherent cells was resolubilized with 150 μL of absolute ethanol. Microplate reader (Synergy mx Biotek, USA) was used to read the plates at 570 nm wavelength. Average optical density (OD) of each duplicate result was taken including positive and negative controls. Isolates were categorized as nonbiofilm producer (ODi < ODc), weak (ODc < ODi < 0.1), moderate (ODi = 0.1 < 0.12) and strong (ODi > 0.12) producers according to the modified methods of [33, 34].

3. Statistical Analysis

Susceptibility data were compared by using a Chi-square test with SPSS software for Windows, version 17.0. Both susceptibility and resistance were calculated as percentages with 95% confidence intervals. A value < 0.05 was considered to be statistically significant.

4. Results

A total of 45 isolates (17 from Kat river and 28 from Tyume river) were identified as Aeromonas hydrophila/caviae. The isolates were evaluated for their antibiotic susceptibilities. Generally, all isolates were resistant to oxacillin, penicillin, clindamycin, cephalothin, vancomycin, and rifamycin, while over 80% of the isolates were susceptible to ciprofloxacin, chloramphenicol, gentamicin, and nitrofurantoin (Table 2). Isolates from both rivers showed a diversified resistance trend to the same antibiotics. For example, all the Aeromonas isolates from Tyume river were resistant to ofloxacin, while 89.3% of isolates from Kat river were susceptible to ofloxacin (Table 2). Also, 70.6% of the isolates from Tyume river were resistant against tetracycline, while 82.1% of the isolates from Kat river were susceptible to the antibiotic. Similarly, Aeromonas isolates showed 94.1% resistance and 60.7% susceptibility against trimethoprim and 82.3% resistance and 78.6% susceptibility against cefotaxime from Tyume and Kat rivers, respectively, as shown in Table 2.

Table 2: Antibiogram of Aeromonas isolates recovered from Kat river and Tyume river.

Antibiotics
Kat river (%)
Tyume river (%)

Ciprofloxacin
89.3
0
10.7
94.1
5.9
0

Trimethoprim
60.7
32.1
7.14
5.9
0
94.1

Chloramphenicol
82.1
17.9
0
94.1
5.9
0

Penicillin
0
0
100
0
0
100

Clindamycin
0
0
100
0
0
100

Ofloxacin
89.3
7.14
3.6
0
0
100

Ampicillin-sulbactam
3.6
0
96.4
0
0
100

Oxacillin
0
0
100
0
0
100

Ampicillin
0
0
100
5.9
0
94.1

Gentamicin
92.9
0
7.14
88.2
0
11.8

Nalidixic acid
14.3
3.6
82.1
70.6
0
29.4

Cefotaxime
78.6
14.3
7.14
11.8
5.9
82.3

Nitrofurantoin
85.7
3.6
10.7
88.2
11.8
0

Sulfamethoxazole
0
3.6
96.4
0
0
100

Cephalothin
0
0
100
0
0
100

Erythromycin
7.14
57.1
35.7
58.8
5.9
35.2

Tetracycline
82.1
21.4
7.14
17.7
11.8
70.6

Minocycline
42.9
57.1
0
23.5
11.8
64.7

Vancomycin
0
0
100
0
0
100

Rifampicin
0
0
100
0
0
100

The frequency of antibiotic resistance among the Aeromonas isolates from Kat and Tyume rivers is shown in Figure 1. The MAR index of Kat river ranged from 0.026 to 0.044 with a mean value of 0.034. The highest MAR index was observed against only one isolate (MAR 0.044), while six isolates exhibited MAR index of 0.029. Aeromonas isolates from Tyume river demonstrated MAR index which ranged from 0.016 to 0.029 with a mean value of 0.0214. Twelve isolates exhibited the lowest MAR index of 0.016. PCR amplification of class 1 and class 2 integron detected class 1 integron in 20% of Aeromonas isolates, while class 2 integron was not detected.

Figure 1: The Frequency of antibiotic-resistant Aeromonas isolates from Kat and Tyume rivers. CIP: ciprofloxacin, TM: trimethoprim, C: chloramphenicol, PG: penicillin, CD: clindamycin, OFX: ofloxacin, SAM: ampicillin-sulbactam, OX: oxacillin, AP: ampicillin, GM: gentamicin, NA: nalidixic acid, CTX: cefotaxime, NI: nitrofurantoin, SMX: sulfamethoxazole, KF: cephalothin, E: erythromycin, T: tetracycline, MN: minocycline, VA: vancomycin, RP: rifamycin.

Aeromonas in this study was able to form biofilms in vitro on a polystyrene microtitre plate. Optical densities and biofilm production status of Aeromonas isolates from Kat and Tyume rivers are as shown in Table 3. Isolates were categorized into four groups according to the criteria as described above. Weak producers of biofilm which make up 53.33% of the isolates were highest among the groups classified. Thirteen isolates (28.9%) were strong producers while, 7 (15.56%) demonstrated moderate capabilities for biofilm production (Figure 2). Table 4 shows the adherent characteristics of Aeromonas isolates from Tyume and Kat rivers.

Table 3: Optical densities and biofilm production status of Aeromonas species isolated from both Kat and Tyume rivers.

Isolate code
Isolate source (river)
Mean ODi ± SD
Biofilm producing status

Control (TSB)

ISKAE001
Kat

Weak

ISKAE002
Kat

Weak

ISKAE003
Kat

Weak

ISKAE004
Kat

Weak

ISKAE005
Kat

Moderate

ISKAE006
Kat

Weak

ISKAE007
Kat

Weak

ISKAE008
Kat

Strong

ISKAE009
Kat

Strong

ISKAE010
Kat

Weak

ISKAE011
Kat

Weak

ISKAE012
Kat

Strong

ISKAE020
Kat

Weak

ISKWA003
Kat

Weak

ISKWA007
Kat

Weak

ISKWA013
Kat

Weak

ISKWA034
Kat

Weak

ISKJA001
Tyume

Moderate

ISKJA006
Tyume

Strong

ISKJA008
Tyume

Weak

ISKJA011
Tyume

Strong

ISKJA014
Tyume

Weak

ISKJA015
Tyume

Strong

ISKJA016
Tyume

Weak

ISKJA017
Tyume

Weak

ISKJA018
Tyume

Strong

ISKJA019
Tyume

Strong

ISKJA 021
Tyume

Strong

ISKJA 030
Tyume

Non-producer

ISKJA 031
Tyume

Weak

ISKJA 032
Tyume

Strong

ISKJA 033
Tyume

Strong

ISKJA 038
Tyume

Weak

ISKJA 053
Tyume

Weak

ISKJA054
Tyume

Weak

ISKJA 055
Tyume

Moderate

ISKJA 056
Tyume

Weak

ISKJA 062
Tyume

Weak

ISKJA 064
Tyume

Moderate

ISKWA 033
Tyume

Moderate

ISKWA 035
Tyume

Moderate

ISKWA 060
Tyume

Strong

ISKXA 063
Tyume

Weak

ISKXA 074
Tyume

Strong

ISKXA 076
Tyume

Moderate

Table 4: Adherence capability of Aeromonas isolates from Kat and Tyume rivers.

River
No. of isolates
Adherence properties

NA
WA
MA
SA

Kat
17
0
13
1
3

Tyume
28
1
11
6
10

NA: nonadherent, WA: weakly adherent, MA: moderately adherent, and SA: strongly adherent.

Figure 2: Occurrence of biofilm production of Aeromonas isolates in microtitre plates.

5. Discussion

The presence of multidrug resistant bacteria in surface water is a major public health burden as drug resistant bacteria could be transferred to humans by means of drinking contaminated water which subsequently contributes to the spread and persistence of antibiotic resistance bacteria in general population and environment [29]. Aeromonas species are well distributed in freshwater ecosystems, and their potential to enter distribution systems increases as a result of ineffective water treatment [35]. The result of this investigation demonstrates the presence of multidrug resistant aeromonads in the two rivers assayed. Absolute resistance was observed against several antibiotics with no complete susceptibility to any; however, appreciable susceptibility was observed against ciprofloxacin, chloramphenicol, and nitrofurantoin. Considerable susceptibility was observed for the aminoglycosides tested (gentamicin) with higher susceptibility occurring with isolates from Kat river. Our findings corroborate with the study carried out by Abulhamd [1], which reports susceptibility of Aeromonas species isolated from environmental water source to gentamicin. Similar findings of aminoglycosides susceptibility from water sources have been observed [36].

Resistance to the penicillin group of antibiotics was observed which can be attributed to Aeromonas instinctive resistance to penicillins especially to ampicillin due to the production of β-lactamases. Among the cephalosporins tested, 100% resistance was observed against cephalothin, relative susceptibility was observed against cefotaxime with isolates from Kat river, and insignificant susceptibility with Aeromonas isolates from Tyume river. Bizani and Brandelli [36] reported 100% resistance of Aeromonas species isolated from water distribution system used in a bovine abattoir; however in contrast to our observation, other studies have documented a rare incidence of cephalosporin resistance from Aeromonas isolated from water sources [37, 38].

Aeromonas isolates from both sources showed similar behaviours to some antibiotics; for instance, isolates from both sources showed high level of susceptibility against chloramphenicol, and none was resistant. Similarly, none of the isolates were susceptible to sulfamethoxazole or cephalothin, while the isolates demonstrated a diversified variation in their susceptibility and resistance against trimethoprim and nalidixic acids. These differences in resistance patterns to antibiotics of the isolates from Kat and Tyume rivers could be as a result of sampling locations (rural and semiurban), anthropogenic activities, and other environmental factors.

Variable susceptibility against the quinolones was observed for Aeromonas isolates from both sources, but ofloxacin showed a distinct pattern as it showed 89% susceptibility with isolates from Kat river and absolute resistance against isolates from Tyume river. The reason for these differences may be attributed to enzymatic conduction and selective environmental pressure of Aeromonas isolates from these two settings. The presence of multidrug resistant Aeromonas hydrophila from aquatic animals including fish [39], eel, and catfish [40, 41] could be as a result of widespread distribution of multidrug resistance among A. hydrophila in aquatic (freshwater) habitat; hence, the need for continuous surveillance of emerging and resistance pool of antibiotic resistance determinant.

Integrons are elements that encode a site-specific recombination system that identifies and captures mobile gene cassettes and are closely related to multiple resistances of environmental microorganisms [42]. The role of class 1 integrons in conferring antibiotic resistance to clinical isolates of different bacterial strains is well documented [43–45]. Studies have also shown link between incidence of class 1 integron and antibiotic resistance in bacterial pathogens such as Escherichia coli and Aeromonas salmonicida [46, 47]. The incidences of integron-bearing Aeromonas isolates in our study suggest that these isolates are potential contaminants and that have the possibility for horizontal gene transfer exits. Lukkana et al. [41] has documented the presence of class 1 integron in Aeromonas hydrophilia isolated from Nile Tilapia, in Thailand. Rosser and Young [48] documented the incidence of class 1 integrons in 3.6% of bacteria isolated from the Tay estuary, and Lin and Biyela [49] reported the presence of class 1 integron in 58% of Enterobacteriaceae isolated from Mhlathuze river in KwaZulu-Natal, Republic of South Africa, and this may imply a wide distribution and persistence of class 1 integron in South African aquatic milieu. The presence of integron in a wide variety of bacteria and in different habitat substantiates the horizontal mobility and stability of this gene capture system [50].

Biofilm-producing bacteria have been shown to be associated with numerous human diseases and capable of colonizing a wide range of environments. In aquatic environment, microbial adhesion initiates biofilm formation, exacerbates contamination, reduces the aesthetic quality of the water body, and reduces microbiological safety through augmented survival of pathogens [18, 51]. The result obtained in this study is consistent with the observation of Saidi et al. [52] who found high percentage (95%) of biofilm forming Aeromonas species isolated from a river near the seacoast of Monastir, Tunisia. Also, our findings are also similar to the result documented by Odeyemi et al. [22] who found Aeromonas isolates from estuary in Malaysia to be biofilm formers with high percentage of weak biofilm producers and strong producers trailing as the second in occurrence. This is the first carried out study on the adhesive properties of environmental A. hydrophila strains isolated from aquatic source in the Eastern Cape province of South Africa. Ability of Aeromonas to form biofilm in aquatic environment enhances the recycling of nutrients and minerals in aquatic environment, thereby promoting the growth of potential pathogen in the aquatic milieu. Motility and flagella play a vital role in adhesion, biofilm formation, and colonization of several pathogenic bacteria, such as Aeromonas hydrophila [52, 53]. Our previous study has shown that Aeromonas isolates from the studied microhabitat possess some virulent potential [31], and the ability of these virulent strains to form biofilm in aquatic environment may enhance an elevated waterborne dispersal capacity, an attribute that has been related to an elevated risk of bacterial transmission and infectivity [54]. Biofilm formation and development by microorganisms play a vital role in the pathogenesis of a disease; hence, the biofilm forming capability demonstrated in vitro by Aeromonas isolates from Tyume and Kat rivers further suggests enhanced pathogenic status of these isolates.

6. Conclusion

This study provides a baseline data on the antibiotic resistance profile of Aeromonas species isolated from Kat and Tyume rivers in the Eastern Cape province of South Africa. The result of this study reveals that the antibiotic resistance patterns of Aeromonas species isolated from the two rivers and the incidence of class 1 integron suggest the possibility of horizontal gene transfer of antibiotic resistance determinants in these isolates. The result of this study shows that Aeromonas strains from Kat and Tyume rivers have ability to bind to surfaces and form biofilms which is of public health significance as biofilm formation results in resistance of bacteria to conventional antimicrobial agents and persistent infections.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgment

The authors are grateful to the University of Fort Hare for the financial support.

References

A. T. Abulhamd, “Characterization of Aeromonas hydrophila isolated from aquatic environments using phenotypic and genotyping methods,” Research Journal of Agriculture and Biological Sciences, vol. 5, no. 6, pp. 923–931, 2009.

R. R. Colwell, M. T. MacDonell, and J. De Ley, “Proposal to recognize the family Aeromonadaceae fam. nov,” International Journal of Systematic Bacteriology, vol. 36, no. 3, pp. 473–477, 1986.

I. H. Igbinosa, E. U. Igumbor, F. Aghdasi, M. Tom, and A. I. Okoh, “Emerging Aeromonas species infections and their significance in public health,” The Scientific World Journal, vol. 2012, Article ID 625023, 13 pages, 2012.

M. J. Saavedra, S. Guedes-Novais, A. Alves et al., “Resistance to β-lactam antibiotics in Aeromonas hydrophila isolated from rainbow trout (Oncorhynchus mykiss),” International Microbiology, vol. 7, no. 3, pp. 207–211, 2004.

I. Kühn, G. Allestam, G. Huys et al., “Diversity, persistence, and virulence of Aeromonas strains isolated from drinking water distribution systems in Sweden,” Applied and Environmental Microbiology, vol. 63, no. 7, pp. 2708–2715, 1997.

S. W. Joseph, “Aeromonas gastrointestinal disease: a case study in causation?” in The Genus Aeromonas, B. Austin, M. Altwegg, P. J. Gosling, and S. W. Joseph, Eds., pp. 311–326, John Wiley & Sons, Chichester, UK, 1996.

J. M. Janda and P. S. Duffey, “Mesophilic aeromonads in human disease: current taxonomy, laboratory identification, and infectious disease spectrum,” Reviews of Infectious Diseases, vol. 10, no. 5, pp. 980–997, 1988.

M. J. Figueras, A. Alperi, M. J. Saavedra et al., “Clinical relevance of the recently described species Aeromonas aquariorum,” Journal of Clinical Microbiology, vol. 47, no. 11, pp. 3742–3746, 2009.

J. R. Huddleston, J. C. Zak, and R. M. Jeter, “Antimicrobial susceptibilities of Aeromonas spp. isolated from environmental sources,” Applied and Environmental Microbiology, vol. 72, no. 11, pp. 7036–7042, 2006.

L. Gordon, A. Cloeckaert, B. Doublet et al., “Complete sequence of the floR-carrying multiresistance plasmid pAB5S9 from freshwater Aeromonas bestiarum,” Journal of Antimicrobial Chemotherapy, vol. 62, no. 1, pp. 65–71, 2008.

B. Halling-Sørensen, S. Nors Nielsen, P. F. Lanzky, F. Ingerslev, H. C. Holten Lützhøft, and S. E. Jørgensen, “Occurrence, fate and effects of pharmaceutical substances in the environment: a review,” Chemosphere, vol. 36, no. 2, pp. 357–393, 1998.

R. J. Ash, B. Mauck, and M. Morgan, “Antibiotic resistance of gram-negative bacteria in rivers, United States,” Emerging Infectious Diseases, vol. 8, no. 7, pp. 713–716, 2002.

N. Borrell, M. J. Figueras, and J. Guarro, “Phenotypic identification of Aeromonas genomospecies from clinical and environmental sources,” Canadian Journal of Microbiology, vol. 44, no. 2, pp. 103–108, 1998.

S. W. Joseph and A. M. Carnahan, “Update on the genus Aeromonas,” ASM News, vol. 66, pp. 218–223, 2000.

R. M. Hall and H. W. Stokes, “Integrons: novel DNA elements which capture genes by site-specific recombination,” Genetica, vol. 90, no. 2-3, pp. 115–132, 1993.

R. M. Hall and C. M. Collis, “Mobile gene cassettes and integrons: capture and spread of genes by site-specific recombination,” Molecular Microbiology, vol. 15, no. 4, pp. 593–600, 1995.

S. Bayoudh, L. Ponsonnet, H. B. Ouada, A. Bakhrouf, and A. Othmane, “Bacterial detachment from hydrophilic and hydrophobic surfaces using a microjet impingement,” Colloids and Surfaces A, vol. 266, no. 1–3, pp. 160–167, 2005.

L. C. Simões, N. Azevedo, A. Pacheco, C. W. Keevil, and M. J. Vieira, “Drinking water biofilm assessment of total and culturable bacteria under different operating conditions,” Biofouling, vol. 22, no. 2, pp. 91–99, 2006.

S. M. Kirov, M. Castrisios, and J. G. Shaw, “Aeromonas flagella (polar and lateral) are enterocyte adhesins that contribute to biofilm formation on surfaces,” Infection and Immunity, vol. 72, no. 4, pp. 1939–1945, 2004.

S. M. September, F. A. Els, S. N. Venter, and V. S. Brözel, “Prevalence of bacterial pathogens in biofilms of drinking water distribution systems,” Journal of Water and Health, vol. 5, no. 2, pp. 219–227, 2007.

R. M. Donlan, “Biofilm formation: a clinically relevant microbiological process,” Clinical Infectious Diseases, vol. 33, no. 8, pp. 1387–1392, 2001.

O. A. Odeyemi, A. Asmat, and G. Usup, “Antibiotics resistance and putative virulence factors of Aeromonas hydrophila isolated from estuary,” Journal of Microbiology, Biotechnology and Food Sciences, vol. 1, no. 6, pp. 1339–1357, 2012.

H. M. Probert and G. R. Gibson, “Bacterial biofilms in the human gastrointestinal tract,” Current Issues in Intestinal Microbiology, vol. 3, no. 2, pp. 23–27, 2002.

M. B. Melchior, H. Vaarkamp, and J. Fink-Gremmels, “Biofilms: a role in recurrent mastitis infections?” Veterinary Journal, vol. 171, no. 3, pp. 398–407, 2006.

M. J. Figueras, A. Suarez-Franquet, M. R. Chacón et al., “First record of the rare species Aeromonas culicicola from a drinking water supply,” Applied and Environmental Microbiology, vol. 71, no. 1, pp. 538–541, 2005.

Clinical and Laboratory Standards Institute (CLSI), Methods for Dilution of Antimicrobial Susceptibility Tests for Bacteria that Grow Aerobically: Approved Standard M7-A7, Clinical and Laboratory Standards Institute, Wayne, Pa, USA, 7th edition, 2006.

P. H. Krumperman, “Multiple antibiotic resistance indexing of Escherichia coli to identify high-risk sources of fecal contamination of foods,” Applied and Environmental Microbiology, vol. 46, no. 1, pp. 165–170, 1983.

C. D. Miranda and R. Zemelman, “Antimicrobial multiresistance in bacteria isolated from freshwater Chilean salmon farms,” Science of the Total Environment, vol. 293, no. 1–3, pp. 207–218, 2002.

R. Tao, G. G. Ying, H. C. Su, H. W. Zhou, and J. P. S. Sidhu, “Detection of antibiotic resistance and tetracycline resistance genes in Enterobacteriaceae isolated from the Pearl rivers in South China,” Environmental Pollution, vol. 158, no. 6, pp. 2101–2109, 2010.

J. Sambrook and D. W. Russell, Molecular Cloning: A Laboratory Manual, Cold Spring Harbor Laboratory Press, Cold Spring Harbor, NY, USA, 3rd edition, 2001.

I. H. Igbinosa and A. I. Okoh, “Detection and distribution of putative virulence associated genes in Aeromonas species from freshwater and wastewater treatment plant,” Journal of Basic Microbiology, 2013.

S. Stepanovic, D. Vukovic, I. Davic, B. Savić, and M. Švabić-Vlahović, “A modified microtiter-plate test for quantification of staphylococcal biofilm formation,” Journal of Microbiological Methods, vol. 40, no. 2, pp. 175–179, 2000.

N. Cevahir, M. Demir, I. Kaleli, M. Gurbuz, and S. Tikvesli, “Evaluation of biofilm production, gelatinase activity, and mannose-resistant hemagglutination in Acinetobacter baumannii strains,” Journal of Microbiology, Immunology and Infection, vol. 41, no. 6, pp. 513–518, 2008.

A. Hassan, J. Usman, F. Kaleem, M. Omair, A. Khalid, and M. Iqbal, “Evaluation of different detection methods of biofilm formation in the clinical isolates,” Brazilian Journal of Infectious Diseases, vol. 15, no. 4, pp. 305–311, 2011.

P. Holmes, L. M. Niccolls, and D. P. Sartory, “The ecology of mesophilic Aeromonas in the aquatic environment,” in The Genus Aeromonas, B. Austin, M. Altwegg, P. J. Gosling, and S. Joseph, Eds., pp. 127–150, Wiley, New York, NY, USA, 1996.

D. Bizani and A. Brandelli, “Antimicrobial susceptibility, hemolysis, and hemagglutination among Aeromonas spp. isolated from water of a bovine abattoir,” Brazilian Journal of Microbiology, vol. 32, no. 4, pp. 334–339, 2001.

C. D. Miranda and G. Castillo, “Resistance to antibiotic and heavy metals of motile aeromonads from Chilean freshwater,” Science of the Total Environment, vol. 224, no. 1–3, pp. 167–176, 1998.

M. Goñi-Urriza, M. Capdepuy, C. Arpin, N. Raymond, and C. Q. Pierre Caumette, “Impact of an urban effluent on antibiotic resistance of riverine Enterobacteriaceae and Aeromonas spp.,” Applied and Environmental Microbiology, vol. 66, no. 1, pp. 125–132, 2000.

M. Hatha, A. A. Vivekanandhan, G. Julie Joice, and C. Christol, “Antibiotic resistance pattern of motile aeromonads from farm raised fresh water fish,” International Journal of Food Microbiology, vol. 98, no. 2, pp. 131–134, 2005.

J. Penders and E. E. Stobberingh, “Antibiotic resistance of motile aeromonads in indoor catfish and eel farms in the southern part of The Netherlands,” International Journal of Antimicrobial Agents, vol. 31, no. 3, pp. 261–265, 2008.

M. Lukkana, J. Wongtavatchai, and R. Chuanchuen, “Class 1 integrons in Aeromonas hydrophila isolates from farmed Nile Tilapia (Oreochromis nilotica),” Journal of Veterinary Medical Sciences, vol. 74, no. 4, pp. 435–440, 2012.

L. Ma, X. X. Zhang, S. Cheng et al., “Occurrence, abundance and elimination of class 1 integrons in one municipal sewage treatment plant,” Ecotoxicology, vol. 20, no. 5, pp. 968–973, 2011.

D. Kücken, H. H. Feucht, and P. M. Kaulfers, “Association of qacE and qacEΔ1 with multiple resistance to antibiotics and antiseptics in clinical isolates of Gram-negative bacteria,” FEMS Microbiology Letters, vol. 183, no. 1, pp. 95–98, 2000.

P. A. White and W. D. Rawlinson, “Current status of the aadA dfr gene cassette families,” Journal of Antimicrobial Chemotherapy, vol. 47, no. 4, pp. 495–496, 2001.

M. A. Leverstein-Van Hall, H. E. M. Blok, A. R. T. Donders, A. Paauw, A. C. Fluit, and J. Verhoe, “Multidrug resistance among enterobacteriaceae is strongly associated with the presence of integrons and is independent of species or isolate origin,” Journal of Infectious Diseases, vol. 187, no. 2, pp. 251–259, 2003.

H. Sørum, T. M. L'Abée-Lund, A. Solberg, and A. Wold, “Integron-containing IncU R plasmids pRAS1 and pAr-32 from the fish pathogen Aeromonas salmonicida,” Antimicrobial Agents and Chemotherapy, vol. 47, no. 4, pp. 1285–1290, 2003.

W. H. Gaze, N. Abdouslam, P. M. Hawkey, and E. M. H. Wellington, “Incidence of class 1 integrons in a quaternary ammonium compound-polluted environment,” Antimicrobial Agents and Chemotherapy, vol. 49, no. 5, pp. 1802–1807, 2005.

S. J. Rosser and H. K. Young, “Identification and characterization of class 1 integrons in bacteria from an aquatic environment,” Journal of Antimicrobial Chemotherapy, vol. 44, no. 1, pp. 11–18, 1999.

J. Lin and P. T. Biyela, “Convergent acquisition of antibiotic resistance determinants amongst the Enterobacteriaceae isolates of the Mhlathuze River, KwaZulu-Natal (RSA),” Water SA, vol. 31, no. 2, pp. 257–260, 2005.

V. Dubois, M. P. Parizano, C. Arpin, L. Coulange, M. C. Bezian, and C. Quentin, “High genetic stability of integrons in clinical isolates of Shigella spp. of worldwide origin,” Antimicrobial Agents and Chemotherapy, vol. 51, no. 4, pp. 1333–1340, 2007.

Y. P. Tsai, “Simulation of biofilm formation at different assimilable organic carbon concentrations under lower flow velocity condition,” Journal of Basic Microbiology, vol. 45, no. 6, pp. 475–485, 2005.

N. Saidi, M. Snoussi, D. Usai, S. Zanetti, and A. Bakhrouf, “Adhesive properties of Aeromonas hydrophila strains isolated from Tunisian aquatic biotopes,” African Journal of Microbiology Research, vol. 5, no. 31, pp. 5644–5655, 2011.

A. A. Rabaan, I. Gryllos, J. M. Tomás, and J. G. Shaw, “Motility and the polar flagellum are required for Aeromonas caviae adherence to HEp-2 cells,” Infection and Immunity, vol. 69, no. 7, pp. 4257–4267, 2001.

C. A. Fux, J. W. Costerton, P. S. Stewart, and P. Stoodley, “Survival strategies of infectious biofilms,” Trends in Microbiology, vol. 13, no. 1, pp. 34–40, 2005.

M. Nawaz, S. A. Khan, A. A. Khan et al., “Detection and characterization of virulence genes and integrons in Aeromonas veronii isolated from catfish,” Food Microbiology, vol. 27, no. 3, pp. 327–331, 2010.