BioMed Research International

Volume 2013 (2013), Article ID 314091, 10 pages

http://dx.doi.org/10.1155/2013/314091

Research Article

Heparin and Carboxymethylchitosan Metal Nanoparticles: An Evaluation of Their Cytotoxicity

Adriana Bava,¹ Francesca Cappellini,¹ Elisa Pedretti,¹ Federica Rossi,¹ Enrico Caruso,² Elena Vismara,3,4 Maurizio Chiriva-Internati,⁵ Giovanni Bernardini,1,4 and Rosalba Gornati1,4

¹Dipartimento di Biotecnologie e Scienze della Vita, Università dell'Insubria, 21100 Varese, Italy

²Dipartimento di Scienze Teoriche ed Applicate, Università dell'Insubria, 21100 Varese, Italy

³Dipartimento di Chimica, Materiali e Ingegneria Chimica “G. Natta,” Politecnico di Milano, 20131 Milano, Italy

⁴Interuniversity Center “The Protein Factory,” Politecnico di Milano, ICRM-CNR Milano and Università dell'Insubria, 20131 Milano, Italy

⁵Division of Oncology and Hematology, Texas Tech University Health Sciences Center, Lubbock, TX 79409, USA

Received 23 October 2012; Revised 3 January 2013; Accepted 3 January 2013

Academic Editor: Xudong Huang

Copyright © 2013 Adriana Bava et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

In the search for noninvasive diagnostic techniques and new therapies, “nanosystems”, which are capable of binding and targeting bioactive molecules, are becoming increasingly important. In this context, biocompatible coatings are gaining interest, not only for their biological effects but also because they are considered capable to mask nanoparticle toxicity. In this work, we have compared the toxicity of nanoparticles coated with heparin and carboxymethylchitosan in the SKOV-3 cell line. Our results indicate that heparin and carboxymethylchitosan coatings do not guarantee the decrease of nanoparticle intrinsic toxicity which is often envisaged. Nonetheless, these coatings provide the opportunity for further functionalization with a variety of biomolecules for their use in theranostics.

1. Introduction

Nanomedicine, the application of nanotechnology in healthcare, offers numerous and promising possibilities to significantly improve medical diagnosis and therapy. New sensitive diagnostic devices, in fact, will permit very early personal risk assessment, and the abatement of costs for the disease treatment is a must for healthcare. Due to its high potential, nanomedicine holds the promise to greatly improve the efficacy of pharmaceutical therapy, reduce side effects, and make drug administration more convenient [1].

In this context, nanoparticles (NPs), particularly magnetic nanoparticles (MNPs), coated with biodegradable polymers, are attracting widespread attention for targeted therapy and imaging. These coatings can stabilize the NP systems also in hydrophilic fluids, minimize opsonization by the mononuclear phagocytic system, and prolong blood circulation [2–7]. Furthermore, this surface layer can be functionalized with a variety of biological moieties for tumor-specific targeting [8–10].

Among the biological molecules used for NP coating, chitosan, particularly carboxymethylchitosan (CMCS), and heparin appear very interesting also because they are considered capable to mask NP toxicity [11, 12]. We should not, in fact, oversee the toxicity of cobalt and nickel oxide NPs [13–16] nor their potential effect on the environment [17]. Even though heparin is predominantly used as anticoagulant, its ability to interact with proteins makes it very attractive. NPs coated with heparin (NP@heparin) are extensively studied because of their several biomedical applications ranging from tissue engineering to biosensors passing for its use in cancer therapy [3]. As well as heparin, also chitosan NPs have demonstrated anticancer activity in vitro as well as in vivo even though the mechanisms remain to be elucidated [18].

In this paper, we have reported cytotoxicity and uptake of some transition metal oxide NPs (Co₃O₄, Fe₃O₄, and NiO) coated with heparin and of Fe₃O4 NPs coated with CMCS (Fe₃O₄@CMCS) in SKOV-3 cell. Transition metal NPs are especially used to enhance surface electrochemical reactivity to further improve the performance of lithium-ion batteries [19] as well as in catalysis [20, 21]. Nevertheless, the therapeutic use of transition metal conjugates was already known in the sixteenth century because of their different oxidation states and ability to interact with negatively charged molecules forming chelation complexes [22].

The results here reported indicate that heparin and CMCS alone did not show any cytotoxicity effect at the concentration used in the experiments. Unfortunately, they did not seem to be able to drastically reduce NP toxicity.

2. Materials and Methods

2.1. Chemicals

Iron oxide (Fe₃O₄), cobalt oxide (Co₃O₄) and nickel oxide (NiO) NPs (<50 nm particle size), chitosan powder (75% degree of acetylation), monochloroacetic acid, 1-ethyl-3-(3-dimethylaminopropyl)carbodiimide hydrochloride (EDC·HCl), and N-hydroxysuccinimide (NHS) were purchased from Sigma-Aldrich, Milan, Italy. Heparin, in the form of sodium salt, was kindly provided by LDO Company, Trino Vercellese, Italy. CellTiter-Glo Luminescent Cell Viability Assay was purchased from Promega, Milan, Italy. Isopropanol was purchased from J.T.Baker, Milan, Italy. All other reagents, analytical or cell culture grade, were purchased from Sigma-Aldrich, Milan, Italy. The Milli-Q ultrapure water was used.

2.2. Nanoparticles Characterization

The particle size distribution was studied by transmission electron microscopy (TEM) using a 90 keV JEOL-1010 electron microscope (Tokyo, Japan). TEM samples were prepared by placing 10 μL of a dilute suspension of Fe₃O₄ nanoparticles in ethanol on a carbon-coated copper grid and allowing the solvent to evaporate at room temperature. The average particle size () and distribution were evaluated by measuring the largest internal dimension of 100 particles.

2.3. Synthesis of Carboxymethylchitosan (CMCS)

CMCS was prepared as reported by Zhu et al. [23]. The chemical structures of chitosan and CMCS are reported in Figure 1.

Figure 1: Chemical structure of chitosan (A) and carboxymethylchitosan (B).

2.4. Coating of Metal Nanoparticles

2.4.1. NP@heparin

A suspension of NPs (Co₃O₄ or Fe₃O₄ or NiO) in distilled water (100 mg/5 mL) obtained by ultrasonication for 5 min (Sonica 5300MH-Soltec) was transferred into a solution of heparin, (1.045 g/25 mL, pH 7 adjusted with 0.01 N NaOH). The mixture was stirred overnight (130 rpm, 25°C, Julabo SW22). Co₃O₄@heparin and NiO@heparin were separated by centrifugation (1 h, 6300 ×g, Hettich Zentrifugen-Rotina 35 F), while Fe₃O₄@heparin was separated by a neodymium magnet (NdFeB Nickel plated, magnetization N45). NP@heparin were collected in diethyl ether, recovered after solvent elimination and dried at 50°C for 1 h.

2.4.2. Fe₃O₄@CMCS Electrostatic Bound

A suspension of 100 mg of Fe₃O₄NPs in 5 mL water was prepared by ultrasonic bath for 10 min. Separately, 100 mg of CMCS was dissolved in 20 mL of water using a magnetic stirrer until complete dissolution, then added to the Fe₃O₄ NPs dispersion and mixed by ultrasonic bath at 0°C for 1 h. After reaction, the Fe₃O₄@CMCS was separated from unbound CMCS by a neodymium magnet, washed several times with water, and centrifuged at 15000 ×g, 20 min. The pellet was resuspended in ethyl alcohol then, after anhydrification, Fe₃O₄@CMCS was dried overnight at 50°C.

2.4.3. Fe₃O₄@CMCS-Covalent Bound

The covalent immobilization of CMCS on Fe₃O₄NPs was conducted following Liang and Zhang method [24] with some modifications. Briefly, 75 mg of Fe₃O₄NPs were added to 4 mL of sodium phosphate buffer (200 mM, pH 5) containing 25 mg of EDC·HCl and 20 mg of NHS; the mixture was left in an ultrasonic bath for 30 min. The Fe₃O₄NPs activated were separated from excess of reagents by magnetic decantation, then resuspended in 3 mL of 200 mM sodium phosphate buffer (pH 7) by sonication for 10 min. 1 mL of CMCS solution (25 mg/mL in 200 mM sodium phosphate buffer, pH 7) was added to the suspension of the NPs and the reaction mixture was sonicated for 3 h. Finally, the Fe₃O₄@CMCS was recovered by magnet, washed with water, and dried overnight at 50°C.

2.4.4. Determination of Unbound Fe

5 mg of Fe₃O₄NPs, or Fe₃O₄@heparin, or Fe₃O₄@CMCS electrostatically bound or Fe₃O₄@CMCS covalently bound were resuspended in 5 mL of H₂O, sonicated for 20 min, and left at 37°C for 72 h. Afterwards, NP systems were separated from the supernatant by a neodymium magnet, centrifuged twice at 15000 ×g for 15 min at 4°C, then ultracentrifuged at 300000 ×g for 2 h at 4°C. After centrifugation, supernatants were filtered using a 0.22 μm pore size membrane. The amount of Fe (II), eventually released in solution, was determined by complexometric analysis with the o-phenanthroline [25]. The Fe (II), in the presence of o-phenanthroline, form the stable red-orange complex [(C₁₂H₁₈N₂)₃Fe]²⁺. The intensity of the color does not vary in the range of pH between 3 and 9. The maximum absorption wavelength occurs at 510 nm. The possible Fe (III) is reduced to Fe (II) by treatment with hydroxylamine hydrochloride.

2.5. FT-IR Spectra Analysis

Characterization of the samples was performed using the solid phase Fourier transform infrared spectroscopy (FT-IR). Spectra were obtained using a Nicolet, Avatar 360. Samples were mixed with infrared grade KBr in a proportion of 2 : 100 (w/w).

2.6. Cell Culture

SKOV-3 cell line was maintained as adherent cells in RPMI 1640 medium, at 37°C in a humidified 5% CO₂ atmosphere. Medium was supplemented with 10% fetal bovine serum and 2 mM L-glutamine. Cells were passaged as needed using 0.5% trypsin EDTA.

2.7. Cell Viability

Cell viability was determined measuring ATP content by the CellTiter-Glo Assay according to the manufacturer’s instructions. In details, 200 μL of cell suspension (containing , , , cells depending of the exposure time) were seeded into 96-well assay plates and cultivated for 24 h at 37°C in 5% CO₂ to equilibrate and become attached prior to the treatment. Then, cells were exposed to 100 μL of increasing concentrations of heparin, NP@heparin, CMCS, Fe₃O₄@CMCS electrostatic, and Fe₃O₄@CMCS covalent for 0.5, 1, 2, 24, 48, and 72 h. After the treatment, plates were equilibrated for 30 min at room temperature and then 100 μL of CellTiter-Glo reagent was added to each well. Plates were shaken for 2 min and left at room temperature for 10 min prior recording luminescent signals using the Infinite F200 plate reader (Tecan Group, Switzerland). Cell viability, expressed as ATP content and normalized against control values, was recorded. All the experiments were performed in triplicate.

2.8. Cellular Uptake

10⁴ cells were seeded on a coverslip (12 mm Ø) into 12-well assay plate and cultivated for 24 h at 37°C in 5% CO₂ to equilibrate and become attached before treatment. Cells were then incubated for 4 or 24 h with 25, 50, and 100 μg/mL Fe₃O₄@heparin, Fe₃O₄@CMCS electrostatic, and Fe₃O₄@CMCS covalent and visualized by Prussian blue staining for iron detection. For this microscopic technique, the cells were fixed in ice-cold ethanol for 5 min, stained with an equal volume of 2% hydrochloric acid and 2% potassium ferrocyanide trihydrate for 15 min, and counterstained with 0.5% neutral red for 3 min. The preparations were then washed with distilled water and dried by increasing concentrations of ethanol, than mounted in DePeX (Serva, Germany). Observations were performed by a Zeiss Axiophot microscope under bright light illumination and photographs were acquired by a Zeiss AxioCam ERc5s camera.

Furthermore, for TEM studies, 10⁶ cells, seeded in a 10 cm Petri dish, are exposed to 40 μg/mL of NP@heparin, Fe₃O₄@CMCS electrostatic, and Fe₃O₄@CMCS covalent, for 30 min or 3 h. Then cells were harvested, fixed in 2% glutaraldehyde in 0.1 M sodium cacodylate buffer (pH 7.2) for 10 min on ice and for 30 min at room temperature, washed in the same buffer, and postfixed in dark for 1 h with 1% osmium tetroxide in 0.1 M sodium-cacodylate buffer (pH 7.2) at room temperature. After dehydration standard steps with a series ethyl alcohol, samples were embedded in an Epon-Araldite 812 1 : 1 mixture. Thin sections (90 nm), obtained with a ReichertUltracut S Ultratome (Leica, Nussloch, Germany), were stained with uranyl acetate and lead citrate according to the standard methods and observed with a Jeol 1010 electron microscope (Jeol, Tokyo, Japan) operated at 90 keV.

2.9. Statistical Analysis

Cell viability values were expressed as mean ± standard error (SE). Analysis of variance (two-way ANOVA), for balanced mixed-effect experiments (uncoated NPs, coated NPs, and exposure times), was performed using KaleidaGraph 4.0 (Synergy Software). Statistical significant differences were fixed at (*), (**), and (***).

3. Results

3.1. Nanoparticles Characterization

To confirm the characteristics reported on the product label by Sigma-Aldrich, we have measured Fe₃O₄NPs diameter. was 25.08 nm ± SD 4.09. The amount of Fe released from Fe₃O₄NPs, or Fe₃O₄@heparin, or Fe₃O₄@CMCS-electrostatic bound or Fe₃O₄@CMCS-covalent bound, in our experimental conditions, was under the limit of detection of the method (0.02 ppm).

3.2. FT-IR Spectra Analysis

In Figure 2, we have reported, as example, the FT-IR spectra of Fe₃O₄NPs (A) and Fe₃O₄@heparin (B). Spectrum (B) shows, at 591 cm⁻¹, the characteristic peak of Fe–O stretch, while, between 1000 and 1400 cm⁻¹, peaks associated to C–O and C–C bonds due to the presence of heparin are present. Other peaks at 814, 1225, and 1612 cm⁻¹ can be assigned to the stretching of –C–O–S, –S=O, and –COO⁻ of the sulphates and carboxylate groups. Lambda shifts toward lower values compared to heparin alone are probably ascribable to the interaction with iron oxide.

Figure 2: FT-IR spectra of Fe₃O4 NPs (A) and Fe₃O₄@heparin (B). The peaks at 814 cm⁻¹, between 1000 and 1400 cm⁻¹ and those at 1225, and 1612 cm⁻¹ are indicative of the heparin coating.

FT-IR spectra of chitosan (A) and CMCS (B) are shown in Figure 3. Spectrum A shows the basic characteristic peaks of chitosan: 3550 cm⁻¹ (O–H stretch), 2930 cm⁻¹ (C–H stretch), 1648 cm⁻¹ (NH bending), 1405 cm⁻¹ (O–H bending), and 1080 cm⁻¹ (C–O stretch). In addition to the peaks at 3550, 2930, 1405, and 1080 cm⁻¹, CMCS spectrum (B) reports an expanded and intense peak at 1612 cm⁻¹ probably due to the overlapping of the signals of NH bending (1648 cm⁻¹) and COO⁻ (1598 cm⁻¹) [23].

Figure 3: FT-IR spectra chitosan (A) and CMCS (B). Chemical modification of chitosan is confirmed by the presence of the intense peak at 1612 cm⁻¹, attributed to the overlapping of the signals of NH bending and –COO⁻.

Fe₃O₄NPs (A) and Fe₃O₄@CMCS (B) spectra are shown in Figure 4. In spectrum A, the peak at 561 cm⁻¹ is that characteristic of Fe–O stretch. Spectrum B, beside to the peak at 561 cm⁻¹, reports the absorbance of CMCS molecule, in particular 1067 cm⁻¹ (C–O stretch), 1406 cm⁻¹ (O–H bend), 1608 cm⁻¹ (overlapping of the peaks of NH₂, COOH, and COO⁻), and 3550 cm⁻¹ (O–H stretch). No significant differences were observed between spectra of Fe₃O₄@CMCS electrostatically and covalently bound.

Figure 4: FT-IR spectra Fe₃O4 NPs (A) and Fe₃O₄@CMCS (B). The peaks at 1067, 1406, 1608, and 3550 cm⁻¹ indicate the presence of CMCS on the Fe₃O₄NPs surface.

3.3. Cell Viability after NP@heparin Treatment

As reported in Figure 5(a), heparin alone was not toxic in the examined concentration range. A dose- and time-dependent reduction in cell viability was observed for all the examined NP systems, although Fe₃O₄NPs appear less toxic than Co₃O₄ NPs which is less toxic than NiO NPs, see Figures 6(a), 7(a), and 8(a).

(a)

(b)

Figure 5: Percentage of ATP content, normalized to control, in SKOV-3 exposed to heparin (a) and carboxymethylchitosan (b) for different times.

(a)

(b)

Figure 6: Percentage of ATP content, normalized to control, in SKOV-3 exposed to Co₃O4 NPs (a) and Co₃O₄@heparin (b) for different times.

(a)

(b)

Figure 7: Percentage of ATP content, normalized to control, in SKOV-3 exposed to Fe₃O4 NPs (a) and Fe₃O₄@heparin (b) for different times.

(a)

(b)

Figure 8: Percentage of ATP content, normalized to control, in SKOV-3 exposed to NiO NPs (a) and NiO@heparin (b) for different times.

Regarding the comparison between uncoated and coated NPs, our data indicate that the coating did not decrease the NPs toxicity. As demonstrated in Figure 6, Co₃O₄NPs were less toxic than Co₃O₄@heparin for all the examined concentrations and time of treatment. The differences were less indicative for Fe₃O₄NPs and NiO NPs (Figures 7 and 8). For further details, see Supplementary Material Tables 1, 2, and 3 available online at http://dx.doi.org/10.1155/2013/314091.

3.4. Cell Viability after Fe₃O₄@CMCS Treatment

The ATP content of SKOV-3 treated with Fe₃O₄NPs, Fe₃O₄@CMCS-electrostatic, and Fe₃O₄@CMCS covalent are displayed in Figure 9. The percentage of CMCS bound to NPs was less than 4% of the total weight; therefore, it was reasonable to compare the amount of coated and uncoated Fe₃O₄NPs neglecting the weight of CMCS bound. As previously reported (Figure 5(b)), CMCS itself did not show cytotoxicity at the tested concentrations. On the contrary, Fe₃O₄@CMCS covalent, and electrostatic, caused a dose-dependent reduction of ATP (Figures 9(a), 9(b) and 9(c)) more pronounced compared to the bare Fe₃O₄NPs. For further details see Supplementary Material Table 4.

(a)

(b)

(c)

Figure 9: Percentage of ATP content, normalized to control, in SKOV-3 exposed to Fe₃O4 NPs (a), Fe₃O₄@CMCS electrostatic (b), and Fe₃O₄@CMCS covalent (c) for different times.

3.5. Cellular Uptake

Figures 10(a)–10(d) show the uptake of coated Fe₃O₄NPs by using the classical Prussian blue method. The cytoplasm is full of NPs around the nucleus but never inside. Fe₃O₄@heparin (Figure 10(d)) are more internalized compared to Fe₃O₄@CMCS covalent (Figure 10(b)) and electrostatic (Figure 10(c)). Apparently, no differences are observed between the two chitosan systems. Coated Fe₃O4 NPs are readily incorporated into the cells already after 4 h; therefore, it is not possible to assert a time and dose dependence. In addition, for all the NP systems, it is observed that internalized NP did not interfere with mitosis process (Figures 10(b)–10(d)).

(a)

(b)

(c)

(d)

Figure 10: Uptake of SKOV-3 cells after 24 h of incubation with 25 mg/mL of anionic NPs. (a) Control cells; (b) Fe₃O₄@CMCS covalent; (c) Fe₃O₄@CMCS electrostatic; (d) Fe₃O₄@heparin. As shown in (b, c, and d) internalized NPs did not interfere with mitosis process. Magnification: 40x.

TEM images (Figure 11) confirmed that NP@heparin are readily internalized; in fact, already after 30 min of incubation NPs appeared inside the cells. Once entered most of the NPs remained in the cytoplasm, free or inside vesicles (Figures 11(a)–11(c)). As already highlighted by optical microscope, besides being rapid, internalization of the nanoparticles was aspecific. In these pictures, NP@heparin are identified as high electron density objects since NPs maintained the morphology observed in cell-free environment (Figure 11(d)). Worth to note is that, also after 3 h of exposure, no NP@heparin was observed in the nuclei even though the massive internalization of NPs can modify nucleus shape (Figure 12).

(a)

(b)

(c)

(d)

Figure 11: TEM pictures of SKOV-3 cells exposed to Co₃O₄@heparin (a), Fe₃O₄@heparin (b), and NiO@heparin (c) for 30 min. (d) A picture of Fe₃O₄@heparin deposited on a formvar carbon coated grid.

Figure 12: TEM picture showing a large agglomerate of Co₃O₄@heparin which modifies the shape of a SKOV-3 nucleus. Cells were fixed after 30 min of exposure.

From our observations, the internalization did not seem to be influenced by the coating. Our hypothesis is confirmed by TEM picture (Figure 13) that did not show appreciable differences in cellular localization between Fe₃O₄@CMCS electrostatically or covalently bound and NP@heparin (Figures 11 and 12).

(a)

(b)

Figure 13: TEM pictures of SKOV-3 cells exposed for 30 min to Fe₃O₄@CMCS electrostatic (a) and covalent (b).

4. Discussion

In recent years, the use of NPs, particularly MNPs, has expanded into biomedical research. Due to their unique properties such as small size, large surface area, and high reactivity, they are particularly suitable for diagnosis and therapy [1, 26–29]. Often, NPs have to be covered with molecules to get a core@shell system capable to bind bioactive molecules, stable in physiological fluids and possibly not toxic to the body. Among the innumerable coating materials, polymers such as heparin, dextran, carboxydextran, chitosan, and polyethylene glycol are considered more advantageous to satisfy the above-mentioned characteristics [30–33].

In particular, the literature reports several applications of NPs covered with heparin, ranging from use as imaging agent to apoptosis-induced agent in cancer cell, as well as components of nanodevices [34–36]. Unfortunately, this wide number of publications does not include toxicity studies of the synthesized systems. In particular, the literature lacks data on the comparison between the toxicity of core and core@shell. To try to fill this gap, in our laboratory, we have studied the characteristics and behavior of Co₃O₄, Fe₃O₄, and NiO NPs covered with heparin.

From our experiments resulted that the coating had significantly increased the colloid stability and hydrophilic property of metal NPs. In fact, the systems NP@heparin did not agglomerated thanks to the presence of negatively charged groups around the metallic core. The experiments on cytotoxicity, performed on SKOV-3 cells, have shown that heparin itself was not toxic within the range of the examined concentrations (see Figure 5(a)). Furthermore, as expected, Fe₃O₄@heparin was the less toxic system, while NiO@heparin was the most toxic one. Contrary to what one would expect, NP@heparin had not been found less toxic compared to the naked NPs for all the examined metals (see Figures 6, 7, and 8). Depletion of ATP content, observed in these experiments, could be due to the massive internalization of NP@heparin by the cells, phenomenon substantiated by Prussian blue staining for iron detection. Nevertheless, at the concentrations used in these experiments, internalized Fe₃O₄@heparin did not arrest mitosis process and nanoparticles were shared between the daughter cells. Further analysis by TEM have demonstrated that NP@heparin were already present inside the cell after 30 min of exposure (Figures 11(a), 11(b), and 11(c)). In this work, we have not investigated the mechanisms of internalization even though, as shown in Figures 11(a), 11(b), and 11(c) and as reported by the literature [37–39], endocytosis is certainly a possible way. Notwithstanding in our previous work we had observed the presence of NPs also in the mitochondria and in the nuclei [40], in these experiments NPs were confined only in cytoplasmic vesicles, even though, sometimes, the vesicle size was so enormous to modify nuclear shape and/or cause mechanical damages to the cell (see Figure 12). When the endocitotic vesicles had sizes that did not justify the mechanical damage, we could assume that cell toxicity could be due to the release of metal ions by the NP system; this hypothesis was supported by the data of cell viability in which Fe₃O₄ NPs resulted the least toxic metal.

Chitosan, but even better CMCS, preferred because the carboxymethylation increases the chitosan solubility in physiological fluids, is widely studied for theranostic applications [41, 42]. Despite the Prussian blue staining indicated that Fe₃O₄@chitosan uptake was less efficient compared to that of Fe₃O₄@heparin, TEM analysis showed that no differences were noticeable between the two NP systems. Furthermore, as previously reported for heparin, the presence of negative charges on NP surface enhances interactions with the cell membrane facilitating cellular uptake [6, 38]. Thanks to its biocompatibility and the presence of active functional groups (amino, carboxyl, and hydroxyl), CMCS is a valid instrument to design novel biocompatible materials with tailored chemical and biophysical properties [43–46]. Despite the wide use of CMCS little or nothing is known about its behavior when it is associated with metal NPs. This lack of data suggested us to evaluate the properties and the potential toxicity of the system Fe₃O₄@CMCS itself and compared to the naked Fe₃O₄NPs. For our studies, we have set up two different systems: Fe₃O₄@CMCS-electrostatic bound and Fe₃O₄@CMCS-covalent bound. The interest in coating Fe₃O₄NPs by covalent bond resided in an attempt to get a system characterized by a more stable shell in hydrophilic fluids.

Our studies on cell viability confirmed the biocompatibility of free CMCS at the tested conditions. When cells are exposed to Fe₃O₄@CMCS electrostatic, viability decreases with the same trend of Fe₃O₄NPs treatment (Figures 9(a) and 9(b)). The higher toxicity observed for Fe₃O₄@CMCS-covalent bond (Figure 9(c)) suggested that the method of preparation of the NPs could influence the cellular response.

Also in this case, uptake by SKOV-3 cells was relevant showing massive internalization already after 30 min with NPs stored in cytoplasmic vesicles (Figure 13) with no detectable difference between NP@heparin and Fe₃O₄@CMCS.

Our results have confirmed the data present in the literature about the biocompatibility of heparin and CMCS and their capability to get stable suspensions in hydrophilic fluids when conjugated to metal NPs, but not the ability to reduce the cytotoxicity of metal NPs coated with these polymers. Nevertheless, it is difficult to compare data derived from different experimental conditions such as different concentration ranges rather than diverse cell types which can give diverse responses to the same treatment [2, 47]. Moreover, the published data are often related to the whole system prepared and not to the single component, as we did, then the comparison is very difficult if not impossible.

In conclusion, the reactive groups, present on the surface of core@shell systems that we have synthesized, provide the opportunity for further functionalization so that a variety of biomolecules may be immobilized to enhance specific cell recognition for their use in targeting studies. Moreover, as regards Fe₃O₄NPs, even though the coating does not reduce their toxicity, the amount of NPs present in the systems is usually so low to render their toxicity negligible. Furthermore, due to their magnetic properties, Fe₃O₄NPs can be directed to the site of interest thanks to an external magnet. From this point of view, they could be promising tools as drug carrier for diagnosis and therapy.

Conflict of Interests

No conflict of interests is present. The authors have no financial involvement or interest with any organization or company about subjects or materials discussed in the paper.

Acknowledgments

A. Bava was supported by Consorzio Interuniversitario Biotecnologie and by Associazione Amici dell’Università grants.

References

A. G. Cattaneo, R. Gornati, E. Sabbioni et al., “Nanotechnology and human health: risks and benefits,” Journal of Applied Toxicology, vol. 30, no. 8, pp. 730–744, 2010.

H. Eidi, O. Joubert, G. Attik et al., “Cytotoxicity assessment of heparin nanoparticles in NR8383 macrophages,” International Journal of Pharmaceutics, vol. 396, no. 1-2, pp. 156–165, 2010.

M. M. Kemp and R. J. Linhardt, “Heparin-based nanoparticles,” Wiley Interdisciplinary Reviews: Nanomedicine and Nanobiotechnology, vol. 2, no. 1, pp. 77–87, 2010.

V. K. Mourya, N. N. Inamdar, and A. Tiwari, “Carboxymethyl chitosan and its applications,” Advanced Materials Letters, vol. 1, no. 1, pp. 11–33, 2010.

R. Riva, H. Ragelle, A. des Rieux, N. Duhem, C. Jérôme, and V. Préat, “Chitosan and chitosan derivatives in drug delivery and tissue engineering,” Advances in Polymer Science, vol. 244, pp. 19–44, 2011.

A. Zhu, L. Yuan, and T. Liao, “Suspension of Fe₃O₄ nanoparticles stabilized by chitosan and o-carboxymethylchitosan,” International Journal of Pharmaceutics, vol. 350, no. 1-2, pp. 361–368, 2008.

H. Y. Hwang, I. S. Kim, I. C. Kwon, and Y. H. Kim, “Tumor targetability and antitumor effect of docetaxel-loaded hydrophobically modified glycol chitosan nanoparticles,” Journal of Controlled Release, vol. 128, no. 1, pp. 23–31, 2008.

R. Dinarvand, N. Sepehri, S. Manoochehri, H. Rouhani, and F. Atyabi, “Polylactide-co-glycolide nanoparticles for controlled delivery of anticancer agents,” International Journal of Nanomedicine, vol. 6, pp. 877–895, 2011.

C. E. Mora-Huertas, H. Fessi, and A. Elaissari, “Polymer-based nanocapsules for drug delivery,” International Journal of Pharmaceutics, vol. 385, no. 1-2, pp. 113–142, 2010.

A. Bava, R. Gornati, F. Cappellini, L. Caldinelli, L. Pollegioni, and G. Bernardini, “D-amino acid oxidase-nanoparticle system: a potential novel approach for cancer enzymatic therapy,” Nanomedicine, 2013.

A. Nel, T. Xia, L. Mädler, and N. Li, “Toxic potential of materials at the nanolevel,” Science, vol. 311, no. 5761, pp. 622–627, 2006.

S. Singh and H. S. Nalwa, “Nanotechnology and health safety - Toxicity and risk assessments of nanostructured materials on human health,” Journal of Nanoscience and Nanotechnology, vol. 7, no. 9, pp. 3048–3070, 2007.

E. Papis, R. Gornati, J. Ponti, M. Prati, E. Sabbioni, and G. Bernardini, “Gene expression in nanotoxicology: a search for biomarkers of exposure to cobalt particles and ions,” Nanotoxicology, vol. 1, no. 3, pp. 198–203, 2007.

E. Papis, R. Gornati, M. Prati, J. Ponti, E. Sabbioni, and G. Bernardini, “Gene expression in nanotoxicology research: analysis by differential display in BALB3T3 fibroblasts exposed to cobalt particles and ions,” Toxicology Letters, vol. 170, no. 3, pp. 185–192, 2007.

M. Di Gioacchino, N. Verna, L. Di Giampaolo et al., “Immunotoxicity and sensitizing capacity of metal compounds depend on speciation,” International Journal of Immunopathology and Pharmacology, vol. 20, no. 2, pp. 15–22, 2007.

A. Munoz and M. Costa, “Elucidating the mechanisms of nickel compound uptake: a review of particulate and nano-nickel endocytosis and toxicity,” Toxicology and Applied Pharmacology, vol. 260, pp. 1–16, 2012.

A. G. . Cattaneo, R. Gornati, M. Chiriva-Internati, and G. Bernardini, “Ecotoxicology of nanomaterials: the role of invertebrate testing,” Invertebrate Survival Journal, vol. 6, pp. 78–97, 2009.

Y. Xu, Z. Wen, and Z. Xu, “Chitosan nanoparticles inhibit the growth of human hepatocellular carcinoma xenografts through an antiangiogenic mechanism,” Anticancer Research, vol. 29, no. 12, pp. 5103–5109, 2009.

P. Poizot, S. Laruelle, S. Grugeon, L. Dupont, and J. M. Tarascon, “Nano-sized transition-metal oxides as negative-electrode materials for lithium-ion batteries,” Nature, vol. 407, no. 6803, pp. 496–499, 2000.

L. D. Pachón and G. Rothenberg, “Transition-metal nanoparticles: synthesis, stability and the leaching issue,” Applied Organometallic Chemistry, vol. 22, no. 6, pp. 288–299, 2008.

M. Moreno-Mañas and R. Pleixats, “Formation of carbon-carbon bonds under catalysis by transition-metal nanoparticles,” Accounts of Chemical Research, vol. 36, no. 8, pp. 638–643, 2003.

S. Rafique, M. Idrees, A. Nasim, H. Akbar, and A. Athar, “Transition metal complexes as potential therapeutic agents,” Biotechnology and Molecular Biology Reviews, vol. 5, no. 2, pp. 38–45, 2010.

A. Zhu, M. B. Chan-Park, S. Dai, and L. Li, “The aggregation behavior of O-carboxymethylchitosan in dilute aqueous solution,” Colloids and Surfaces B, vol. 43, no. 3-4, pp. 143–149, 2005.

Y. Y. Liang and L. M. Zhang, “Bioconjugation of papain on superparamagnetic nanoparticles decorated with carboxymethylated chitosan,” Biomacromolecules, vol. 8, no. 5, pp. 1480–1486, 2007.

D. R. Kester, I. W. Duedall, D. N. Connors, and R. M. Pytkowicz, “Preparation of artificial sea water,” Limnology and Oceanography, vol. 12, no. 1, pp. 176–179, 1967.

R. Bhattacharya and P. Mukherjee, “Biological properties of "naked" metal nanoparticles,” Advanced Drug Delivery Reviews, vol. 60, no. 11, pp. 1289–1306, 2008.

J. Conde, G. Doria, and P. Baptista, “Noble metal nanoparticles applications in cancer,” Journal of Drug Delivery, vol. 2012, Article ID 751075, 12 pages, 2012.

J. L. Martinez-Hurtado, “Metallic nanoparticle block copolymer vesicles with enhanced optical properties,” Nanomaterials, vol. 1, pp. 20–30, 2011.

P. Tartaj, M. Del Puerto Morales, S. Veintemillas-Verdaguer, T. González-Carreño, and C. J. Serna, “The preparation of magnetic nanoparticles for applications in biomedicine,” Journal of Physics D, vol. 36, no. 13, pp. R182–R197, 2003.

M. M. Kemp, A. Kumar, S. Mousa et al., “Synthesis of gold and silver nanoparticles stabilized with glycosaminoglycans having distinctive biological activities,” Biomacromolecules, vol. 10, no. 3, pp. 589–595, 2009.

H. Khurshid, S. H. Kim, M. J. Bonder et al., “Development of heparin-coated magnetic nanoparticles for targeted drug delivery applications,” Journal of Applied Physics, vol. 105, no. 7, Article ID 07B308, 3 pages, 2009.

C. Sun, J. S. H. Lee, and M. Zhang, “Magnetic nanoparticles in MR imaging and drug delivery,” Advanced Drug Delivery Reviews, vol. 60, no. 11, pp. 1252–1265, 2008.

O. Veiseh, J. W. Gunn, and M. Zhang, “Design and fabrication of magnetic nanoparticles for targeted drug delivery and imaging,” Advanced Drug Delivery Reviews, vol. 62, no. 3, pp. 284–304, 2010.

D. Y. Lee, “Highly effective T2 MR contrast agent based on heparinized superparamagnetic iron oxide nanoparticles,” Macromolecular Research, vol. 19, no. 8, pp. 843–847, 2011.

K. Lee, H. Lee, K. H. Bae, and T. G. Park, “Heparin immobilized gold nanoparticles for targeted detection and apoptotic death of metastatic cancer cells,” Biomaterials, vol. 31, no. 25, pp. 6530–6536, 2010.

K. A. Min, F. Yu, V. C. Yang, X. Zhang, and G. R. Rosania, “Transcellular transport of heparin-coated magnetic iron oxide nanoparticles (Hep-MION) under the influence of an applied magnetic field,” Pharmaceutics, vol. 2, no. 2, pp. 119–135, 2010.

A. Villanueva, M. Cãete, A. G. Roca et al., “The influence of surface functionalization on the enhanced internalization of magnetic nanoparticles in cancer cells,” Nanotechnology, vol. 20, no. 11, Article ID 115103, 9 pages, 2009.

E. Sabbioni, S. Fortaner, M. Farina et al., “Interaction with culture medium components, cellular uptake and intracellular distribution of cobalt nanoparticles, microparticles and ions in Balb/3T3 mouse fibroblasts,” Nanotoxicology, 2012.

C. Wilhelm and F. Gazeau, “Universal cell labelling with anionic magnetic nanoparticles,” Biomaterials, vol. 29, no. 22, pp. 3161–3174, 2008.

E. Papis, F. Rossi, M. Raspanti et al., “Engineered cobalt oxide nanoparticles readily enter cells,” Toxicology Letters, vol. 189, no. 3, pp. 253–259, 2009.

H. Arami, Z. Stephen, O. Veiseh, and M. Zhang, “Chitosan-coated iron oxide nanoparticles for molecular imaging and drug delivery,” Advances in Polymer Science, vol. 243, pp. 63–184, 2011.

X. G. Chen and H. J. Park, “Chemical characteristics of O-carboxymethyl chitosans related to the preparation conditions,” Carbohydrate Polymers, vol. 53, no. 4, pp. 355–359, 2003.

A. P. Zhu, N. Fang, M. B. Chan-Park, and V. Chan, “Interaction between O-carboxymethylchitosan and dipalmitoyl-sn-glycero-3- phosphocholine bilayer,” Biomaterials, vol. 26, no. 34, pp. 6873–6879, 2005.

P. Agrawal, G. J. Strijkers, and K. Nicolay, “Chitosan-based systems for molecular imaging,” Advanced Drug Delivery Reviews, vol. 62, no. 1, pp. 42–58, 2010.

D. Bhattacharya, M. Das, D. Mishra et al., “Folate receptor targeted, carboxymethyl chitosan functionalized iron oxide nanoparticles: a novel ultradispersed nanoconjugates for bimodal imaging,” Nanoscale, vol. 3, no. 4, pp. 1653–1662, 2011.

T. T. Trang Mai, P. T. Ha, H. N. Pham et al., “Chitosan and O-carboxymethylchitosan modified Fe₃O₄ for hyperthermic treatment,” Advances in Natural Sciences: Nanoscience and Nanotechnology, vol. 3, Article ID 015006, 5 pages, 2012.

C. F. Jones and D. W. Grainger, “In vitro assessments of nanomaterial toxicity,” Advanced Drug Delivery Reviews, vol. 61, no. 6, pp. 438–456, 2009.