BioMed Research International

Volume 2013 (2013), Article ID 875437, 6 pages

http://dx.doi.org/10.1155/2013/875437

Research Article

Evaluation of Multiplex PCR with Enhanced Spore Germination for Detection of Clostridium difficile from Stool Samples of the Hospitalized Patients

Surang Chankhamhaengdecha,¹ Piyapong Hadpanus,¹ Amornrat Aroonnual,² Puriya Ngamwongsatit,³ Darunee Chotiprasitsakul,⁴ Piriyaporn Chongtrakool,⁵ and Tavan Janvilisri⁶

¹Department of Biology, Faculty of Science, Mahidol University, Bangkok 10400, Thailand

²Department of Tropical Nutrition and Food Science, Faculty of Tropical Medicine, Mahidol University, Bangkok 10400, Thailand

³Department of Clinical Sciences and Public Health, Faculty of Veterinary Science, Mahidol University, Nakhon Pathom 73170, Thailand

⁴Department of Medicine, Faculty of Medicine Ramathibodi Hospital, Mahidol University, Bangkok 10400, Thailand

⁵Department of Pathology, Faculty of Medicine Ramathibodi Hospital, Mahidol University, Bangkok 10400, Thailand

⁶Department of Biochemistry, Faculty of Science, Mahidol University, Bangkok 10400, Thailand

Received 23 November 2012; Revised 31 January 2013; Accepted 16 February 2013

Academic Editor: Joy Scaria

Copyright © 2013 Surang Chankhamhaengdecha et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Clostridium difficile poses as the most common etiologic agent of nosocomial diarrhea. Although there are many diagnostic methods to detect C. difficile directly from stool samples, the nucleic acid-based approach has been largely performed in several laboratories due to its high sensitivity and specificity as well as rapid turnaround time. In this study, a multiplex PCR was newly designed with recent accumulated nucleotide sequences. The PCR testing with various C. difficile ribotypes, other Clostridium spp., and non-Clostridium strains revealed 100% specificity with the ability to detect as low as ~22 genomic copy number per PCR reaction. Different combinations of sample processing were evaluated prior to multiplex PCR for the detection of C. difficile in fecal samples from hospitalized patients. The most optimal condition was the non-selective enrichment at 37∘C for 1 h in brain heart infusion broth supplemented with taurocholate, followed by the multiplex PCR. The detection limit after sample processing was shown as being 5 spores per gram of fecal sample. Two hundred and thirty-eight fecal samples collected from the University affiliated hospital were analyzed by the enrichment multiplex PCR procedure. The results suggested that the combination of sample processing with the high-performance detection method would be applicable for routine diagnostic use in clinical setting.

1. Introduction

Clostridium difficile is a motile, rod-shaped, Gram-positive bacterium, which is known to be a leading cause of antibiotic-associated diarrhea, especially nosocomial infections [1]. Though C. difficile is not a major component of natural gut flora, treatment with broad-spectrum antibiotics impedes the growth of other bacterial species and allows C. difficile to colonize. Following the colonization, an enterotoxin, TcdA, which is found in ~70% of C. difficile strains, and a cytotoxin, TcdB, which is found in all C. difficile strains, can be produced, thereby disrupting tight junctions of the intestinal epithelial cells resulting in inflammation and increased permeability of the intestine [2]. Approximately less than 10% of clinical C. difficile isolates possess binary toxins (cdtA/B), which have been associated with increased severity of the symptoms [3]. The pathogenic role of cdtA/B has been suggested to trigger microtubule protrusion, thereby increasing the adherence of C. difficile to the gut epithelium [4]. C. difficile infection (CDI) results in a wide range of symptoms including fever, abdominal pains, mild diarrhea, and pseudomembranous colitis. Although CDI can be treated with certain antibiotics, the emergence of hypervirulent strains that are resistant to current chemotherapy and are able to produce high titers of toxins poses a challenge to the treatment of CDI worldwide [5].

To date, there are several diagnostic assays for the detection of C. difficile, each of which reveals the advantages and disadvantages and discrepancies in the performance existing in the literature [6, 7]. Conventional diagnostic methods, including toxigenic bacterial cell culture and tissue cell culture cytotoxicity neutralization assays, have been considered as the reference standard [8]. These assays require technical expertise and several days to obtain results: therefore, they are not appropriate for the clinical setting, where an accurate and rapid diagnosis is needed. An enzyme immunoassay (EIA) for TcdB alone or both TcdA and TcdB has been widely used in most laboratories because it is relatively simple, rapid, and commercially available [9]. However, it has been revealed that the sensitivity of EIA is as low as 23% and the specificity as low as 75% [10]. Therefore, in practice, a symptomatic patient with the EIA-negative result is usually tested by another assay with higher sensitivity. Many laboratories have reported the combination of assays to increase the sensitivity and specificity of the detection [11–13]. An example include a 2-step algorithm, in which the first step is to perform an EIA for glutamate dehydrogenase (GDH) and the second step is to test the GDH-positives with an EIA for toxins. The EIA for GDH step yields a highly sensitive result for C. difficile, but is not specific for toxigenic isolates; therefore, the GDH-positive results must be confirmed with a subsequent specific test such as EIA for toxins [13]. Although these algorithms improve the diagnostic performance, it has been shown that the levels of sensitivity of the EIA for GDH in this two-step algorithm vary depending on the C. difficile ribotypes [14]. Moreover, the two- or more step assays are cost-ineffective [15]. Recently, nucleic acid amplification tests (NAATs) have been developed as a single assay with the same day results for CDI. These assays aim to detect the toxin gene(s) and have been proven to be more superior than other methods, except the toxigenic bacterial cell culture, as they yield the high sensitivity and high negative predictive value [16]. Currently, there are a number of FDA-approved commercially available NAATs including (i) the Xpert C. difficile, (ii) Xpert C. difficile/Epi assays that detect tcdB by real-time PCR, and (iii) the Illumigene C. difficile assay that detects tcdA by loop-mediated isothermal amplification [17].

Although the NAATs have gained popularity for CDI diagnosis, the common drawbacks of this type of assays to detect pathogens directly from stool samples are the presence of PCR inhibitors, contamination of DNA from host and other microorganisms, and low quality and yield of bacterial DNA that is extracted from spores in stool samples from suspected patients. Thus, the objective of this study was to evaluate the multiplex PCR with enhanced spore germination for the detection of C. difficile directly from stool samples of hospitalized patients. The combination of sample processing with the high-performance detection method would be applicable for routine diagnostic use in clinical setting.

2. Materials and Methods

2.1. Specimen Collection and Acquisition

A total of 238 fecal specimens from inpatients that aged more than 15 years and developed diarrhea during hospitalization at Ramathibodi hospital, a 1,000-bed tertiary health care university Hospital, were collected from May 2010 to January 2011. The samples were subjected to the routine EIA test using VIDAS C. difficile Toxin A&B qualitative assay (BioMérieux, Marcy l’Etoile, France) according to the manufacturer’s recommendations. The samples were also subjected to C. difficile selective culture by plating onto cycloserine cefoxitin fructose agar (CCFA) and incubated anaerobically at for up to 5 days. All samples were then subsequently stored at − before use. The use of human materials has been approved by the research ethics committee of the Faculty of Medicine at Ramathibodi Hospital, Mahidol University, Thailand.

2.2. Bacterial Cell Culture

Clostridium strains were grown anaerobically in BHIS medium, brain heart infusion broth at (Oxoid, Basingstoke, UK), supplemented with 5% yeast extract, 0.1% sodium thioglycolate (TCI, Tokyo, Japan), and 0.1% L-cysteine (TCI). Before sterilization, anaerobic conditions were created by boiling the medium for 10 min and, during cooling, flushing the medium with nitrogen gas. All other bacteria were cultivated at in tryptone soy broth (Oxoid).

2.3. Multiplex PCR for the Detection of C. difficile Toxin Genes

A multiplex PCR was developed for the detection of toxin genes including tcdA, tcdB, cdtA, and cdtB as well as 16S rDNA as a internal control. A total volume of 20 μL PCR reaction consisted of 1 × PCR buffer (10 mM Tris-HCl, 50 mM KCl, and pH 8.3), 5 mM MgCl₂, 250 μM dNTP, 1 × enhancer (0.5 M betaine, 1% DMSO), 1 U of Taq DNA polymerase (New England Biolabs, MA, USA), and 5 pairs of primers at indicated concentrations (Table 1). Thermal cycling parameters included (i) an initial denaturation at for 2 min; (ii) 30 cycles of denaturation at for 20 s, annealing at for 65 s, and extension at for 70 s; and (iii) a final extension at for 5 min. PCR products were resolved by electrophoresis on a 2% agarose gel stained with ethidium bromide.

Table 1: Primers in the multiplex PCR for the detection of C. difficile.

Target
Primer
Sequence ()
Primer concentration (M)
Amplicon size (bp)

tcdA
tcdA-F
GTATGGATAGGTGGAGAAGTCAGTG
0.025

tcdA-R
CGGTCTAGTCCAATAGAGCTAGGTC
0.025
632

tcdB
tcdB-F
GAAGATTTAGGAAATGAAGAAGGTGA
0.01

tcdB-R
AACCACTATATTCAACTGCTTGTCC
0.01
441

cdtA
cdtA-F
ATGCACAAGACTTACAAAGCTATAGTG
0.2

cdtA-R
CGAGAATTTGCTTCTATTTGATAATC
0.2
260

cdtB
cdtB-F
ATTGGCAATAATCTATCTCCTGGA
0.5

cdtB-R
CCAAAATTTCCACTTACTTGTGTTG
0.5
179

16s rDNA
UFU-L
GCCTAACACATGCAAGTCGA
0.025

UR802
TACCAGGGTATCTAATCC
0.025
800

2.4. Preparation of C. difficile Spores

Spores from C. difficile strain R20291 were produced in a sporulation medium as described previously [18]. Briefly, a culture of C. difficile was spread onto BHIS agar supplemented with 0.1% taurocholate (BHIS/TA). The plates were then incubated at under anaerobic conditions for 5 days. Spores were scraped off the plates and resuspended in deionized water. The samples were then washed ten times with water. The spores were checked for purity and enumerated using phase-contrast microscopy and light microscopy after staining with malachite green and eosin Y. Spore samples were then stored at − until further analysis.

2.5. Enrichment PCR Procedures

In order to evaluate the effects of enhanced spore germination and enrichment on the multiplex PCR detection of C. difficile, two consecutive methods were performed with spore-inoculated feces prior to the multiplex PCR. One hundred C. difficile spores were spiked into 1 gram of homogenized fecal samples. Bulk debris was avoided during sample withdrawal. The spiked samples were then subjected to the pretreatment conditions with or without alcohol shock for 20 min. Alcohol shock should eliminate vegetative bacterial cells from the samples, leaving viable spores to germinate. Following the alcohol shock, either nonselective spore germination medium BHIS/TA alone or selective BHIS/TA/CC medium (BHIS/TA in the presence of 250 mg/L cycloserine and 20 mg/L cefoxitin) was added to the samples, which were incubated anaerobically at 0, 1, 2, and 3 h. The samples were then divided to two halves, one of which was subjected to bacterial DNA extraction using EZNA stool DNA kit (Omega, GA, USA); the other was then cultured on either BHIS or CCFA plates. All experiments were performed in triplicate.

3. Results and Discussion

Toxigenic C. difficile strains are recognized as the main cause of nosocomial diarrhea [1–3]. Therefore, a rapid and cost-effective method to detect C. difficile directly from stool samples facilitates patient management to control CDI. The aim of this work was to design an optimized multiplex PCR for the detection of toxigenic C. difficile from stool samples of hospitalized patients and to evaluate the combination of various sample processing conditions and multiplex PCR on such detection.

3.1. Multiplex PCR for the Detection of Toxigenic C. difficile

In the past years, there have been an increasing number of C. difficile genome and toxin gene sequences deposited in the GenBank database, enabling us to design more specific primers. The 5-plex PCR primers were developed for the detection of the four C. difficile toxin genes including tcdA, tcdB, cdtA, and cdtB, together with 16S rDNA as an internal PCR control (Figure 1). The primer set was chosen to amplify products with distinguishable sizes on agarose gel electrophoresis. The individual primer pairs for the amplification of the regions in the tcdA, tcdB, cdtA and cdtB genes were tested in single-plex PCRs (Figure 1; lanes 1–4, respectively). The multiplex PCR with a combination of all five primer pairs was optimized (Figure 1; lane 5) and was tested with different PCR C. difficile ribotypes (Figure 2). Our results are consistent with the previously reported data [19].

Figure 1: Agarose gel electrophoresis of the PCR products tested with five primer pairs using 20 ng of genomic DNA of C. difficile R20291 as template. Each primer pair was tested individually and in combination with all 5 primer pairs in the multiplex PCR. Lane M: 100-bp DNA ladder marker. Lanes 1–5, single-plex PCR reactions using primers specific to tcdA, tcdB, cdtA, cdtB, and 16s rDNA, respectively. Lane 6: multiplex PCR with all four toxin-specific primers and 16S rDNA primers.

Figure 2: Multiplex PCR toxin gene amplification profiles of various C. difficile ribotypes. Lane M: 100 bp DNA ladder marker. The ribotypes and PCR products of detected genes are indicated.

3.2. Sensitivity and Specificity Test

The sensitivity and specificity of the developed multiplex PCR for the detection of C. difficile were evaluated. The detection limit as measured with genomic DNA from toxigenic reference strain C. difficile R20291 was 0.1 pg or ~22 genomic copy number per reaction. To further evaluate the primer specificities for C. difficile, 7 other Clostridium spp. strains including C. septicum, C. glycolicum, C. perfringens, C. tetani, C. sordellii, C. sporogenes, and C. botulinum, as well as 7 of non-Clostridium strains including Bacillus cereus, Salmonella Typhi, Shigella dysenteriae, Escherichia coli, Enterobacter faecalis, Klebsiella ozaenae, and Citrobacter fundi were tested. None of the non-C. difficile strains gave rise to the PCR-positive results, thereby indicating the specificity of the multiplex PCR assay.

3.3. Enrichment Multiplex PCR for Detection of Toxigenic C. difficile

The multiplex PCR assays for detection of toxigenic C. difficile directly from fecal specimens have been previously reported [20–22]. However, the detection limit has been shown to be as low as 5 × 10⁴ cfu per 1 g of feces [22]. The sensitivity of the PCR is usually affected by inhibitors found in stool samples including bile salts, complex polysaccharides, proteinases, a high concentration of background flora, and a low concentration and uneven distribution of target microorganism [23], rendering it not suitable for PCR detection of the pathogen from direct stool samples. In this study, different combinations of pretreatment conditions, enrichment conditions, and enrichment times prior to both multiplex PCR and conventional bacterial cell culture methods were evaluated to determine the possibility of detecting 100 C. difficile spores per 1 g of feces (Table 2). This low spore concentration was not detected by nonenrichment multiplex PCR and culture methods. Regarding the pretreatment step, the C. difficile colonies were observed on CCFA after 1 h of enrichment without alcohol shock, compared to 3 h with the alcohol shock. Under nonselective plating, most conditions yielded uninterpretable results due to the high levels of contamination of other microorganisms. Positive PCR results were obtained under the conditions of the 1 h enrichment time, regardless of pretreatment or enrichment broth. Therefore, the condition of no alcohol shock and enrichment with BHIS/TA for 1 h was identified as the optimal combination with practical working hours in laboratories and was appropriate for both bacterial cell culture and multiplex PCR diagnosis. Furthermore, the sensitivity of the developed multiplex PCR under the described conditions was also tested with fecal samples spiked with different numbers of spores. We found that the multiplex PCR was able to detect as low as 5 spores/g feces. Therefore, the enrichment broth could enhance spore germination and transformation into vegetative cells, allowing them to grow to PCR-detectable levels.

Table 2: Evaluation of pretreatment and enrichment conditions prior to multiplex PCR and bacterial cell culture for the detection of C. difficile directly from stool samples.

Pretreatment condition
Enrichment condition
Incubation time (h)
Typical C. difficile colony
Multiplex PCR toxin genes detection

CCFA agar plate
BHI agar plate

Alcohol shock
BHIS/TA

0
−
−
−

1
−
−

2
−
ND
+

3
+
ND
+

BHIS/TA/CC
0
−
−
−

1
−
−

2
−
ND
+

3
+
ND
+

No alcohol shock
BHIS/TA

0
−
ND
−

1
−/+
ND

2
+
ND
+

3
+
ND
+

BHIS/TA/CC
0
−
ND
−

1
−/+
ND

2
+
ND
+

3
+
ND
+

ND stands for “not determined” because there were too many contaminated bacterial species, rendering it impossible to distinguish C. difficile colonies on the plates. −/+ indicates that typical C. difficile colonies could not be observed in at least one of the three replicates.

3.4. Detection of Toxigenic C. difficile in Clinical Stool Samples

To examine the efficacy of the assay described in this study, 238 stool samples of patients suspected of CDI were subjected to multiple PCR with the enhanced spore germination as above. Routine EIA and bacterial cell culture assays were also performed. All samples were tested positive for the 16S rDNA control gene. Comparison of different diagnostic assays is shown in Table 3. Sixteen cases were tested positive while 166 cases gave rise to negative results in all three assays. Eighteen samples were EIA positive, but both PCR and culture negative, and were, therefore, considered to be negative due to the low level of EIA specificity that requires the second assay to confirm the EIA results. Twenty-four cases were shown to be PCR positive with either EIA positive or culture positive. These results represented another two-step diagnostic process that increased the reliability of the PCR outcomes. Twenty-four samples were PCR positive, but both EIA and culture turned out negative. Although anaerobic culture was considered the most sensitive assay for the detection of C. difficile, it is also likely that the low spore counts in fecal samples and different rates of spore viability would account for such results. However, another confirmatory assay should be performed to support the PCR results. Of 54 PCR-positive samples, 7 were , 13 were , 30 were , and 4 were . Although, there are previous reports on C. difficile toxin types in Thailand [24, 25], this is the first time that the isolates were detected. It is also noteworthy that PCR detection of C. difficile toxin genes might only detect DNA without the presence of toxin production; therefore, the PCR-positive cases should be carefully interpreted.

Table 3: Comparison of different diagnostic assays including toxin EIA, multiplex PCR, and bacterial cell culture.

Toxin EIA
Multiplex PCR
Bacterial cell culture
Number of cases

+
+
+
16

+
+
−
4

+
−
−
18

−
+
+
10

−
+
−
24

−
−
−
166

Although the enrichment multiplex PCR in this study showed superiority over the other two diagnostic methods, the limitations of our experimental setting include the lack of another confirmatory diagnostic test such as cell cytotoxicity; so the false positives or negatives in cases of discordant test results could not be identified. However, analytical sensitivity with the reference C. difficile strain and spore-inoculated fecal samples and specificity of the multiplex PCR assay with various C. difficile ribotypes, other Clostridium spp., and other bacteria species revealed high sensitivity with no false positive or false negative.

4. Conclusions

This work revealed the comprehensive evaluation of sample processing prior to the multiplex PCR diagnosis of C. difficile directly from clinical stool samples. The results demonstrated that the enrichment of nonselective medium for 1 h prior to both PCR or bacterial cell culture assays yielded the most optimal condition. The performance of the enrichment multiplex PCR was proven to be more superior to that of the routine EIA. This rapid and cost-effective diagnostic assay provides an alternative approach for the detection of C. difficile, thereby improving the CDI management. However, a large-scale clinical testing is warranted to further validate this assay.

Acknowledgments

The authors thank Professor Nigel Minton, University of Nottingham for providing us with C. difficile reference strains. They also thank Nattamon Malaisree for technical assistance. This work is supported by a Joint Grant from the Faculty of Science and Faculty of Medicine Ramathibodi Hospital, Mahidol University and a Supplementary Grant from the Faculty of Science, Mahidol University, Thailand.

References

K. C. Carroll and J. G. Bartlett, “Biology of Clostridium difficile: implications for epidemiology and diagnosis,” in Annual Review of Microbiology, vol. 65, pp. 501–521, 2011.

N. Oezguen, T. D. Power, P. Urvil et al., “Clostridial toxins: sensing a target in a hostile gut environment,” Gut Microbes, vol. 3, no. 1, pp. 35–41, 2012.

S. Bacci, K. Mølbak, M. K. Kjeldsen, and K. E. P. Olsen, “Binary toxin and death after Clostridium difficile infection,” Emerging Infectious Diseases, vol. 17, no. 6, pp. 976–982, 2011.

C. Schwan, B. Stecher, T. Tzivelekidis et al., “Clostridium difficile toxin CDT induces formation of microtubule-based protrusions and increases adherence of bacteria,” PLoS Pathogens, vol. 5, no. 10, article e1000626, 2009.

S. T. Cartman, J. T. Heap, S. A. Kuehne, A. Cockayne, and N. P. Minton, “The emergence of 'hypervirulence' in Clostridium difficile,” International Journal of Medical Microbiology, vol. 300, no. 6, pp. 387–395, 2010.

E. J. Kuijper, R. J. van den Berg, and J. S. Brazier, “Comparison of molecular typing methods applied to Clostridium difficile,” Methods in Molecular Biology, vol. 551, pp. 159–171, 2009.

M. Delmée, J. Van Broeck, A. Simon, M. Janssens, and V. Avesani, “Laboratory diagnosis of Clostridium difficile-associated diarrhoea: a plea for culture,” Journal of Medical Microbiology, vol. 54, part 2, pp. 187–191, 2005.

L. R. Peterson, P. J. Kelly, and H. A. Nordbrock, “Role of culture and toxin detection in laboratory testing for diagnosis of Clostridium difficile-associated diarrhea,” European Journal of Clinical Microbiology and Infectious Diseases, vol. 15, no. 4, pp. 330–336, 1996.

H. Snell, M. Ramos, S. Longo, M. John, and Z. Hussain, “Performance of the TechLab C. DIFF CHEK-60 enzyme immunoassay (EIA) in combination with the C. difficile tox A/B II EIA kit, the triage C. difficile panel immunoassay, and a cytotoxin assay for diagnosis of Clostridium difficile-associated diarrhea,” Journal of Clinical Microbiology, vol. 42, no. 10, pp. 4863–4865, 2004.

H. Vanpoucke, T. De Baere, G. Claeys, M. Vaneechoutte, and G. Verschraegen, “Evaluation of six commercial assays for the rapid detection of Clostridium difficile toxin and/or antigen in stool specimens,” Clinical Microbiology and Infection, vol. 7, no. 2, pp. 55–64, 2001.

B. M. Shin, Y. K. Eun, J. L. Eun, and J. G. Songer, “Algorithm combining toxin immunoassay and stool culture for diagnosis of Clostridium difficile infection,” Journal of Clinical Microbiology, vol. 47, no. 9, pp. 2952–2956, 2009.

E. J. Kvach, D. Ferguson, P. F. Riska, and M. L. Landry, “Comparison of BD GeneOhm Cdiff real-time PCR assay with a two-step algorithm and a toxin A/B enzyme-linked immunosorbent assay for diagnosis of toxigenic Clostridium difficile infection,” Journal of Clinical Microbiology, vol. 48, no. 1, pp. 109–114, 2010.

M. E. Reller, C. A. Lema, T. M. Perl et al., “Yield of stool culture with isolate toxin testing versus a two-step algorithm including stool toxin testing for detection of toxigenic Clostridium difficile,” Journal of Clinical Microbiology, vol. 45, no. 11, pp. 3601–3605, 2007.

F. C. Tenover, S. Novak-Weekley, C. W. Woods et al., “Impact of strain type on detection of toxigenic Clostridium difficile: comparison of molecular diagnostic and enzyme immunoassay approaches,” Journal of Clinical Microbiology, vol. 48, no. 10, pp. 3719–3724, 2010.

S. M. Novak-Weekley, E. M. Marlowe, J. M. Miller et al., “Clostridium difficile testing in the clinical laboratory by use of multiple testing algorithms,” Journal of Clinical Microbiology, vol. 48, no. 3, pp. 889–893, 2010.

J. A. Barkin, N. Nandi, N. Miller, A. Grace, J. S. Barkin, and D. A. Sussman, “Superiority of the DNA amplification assay for the diagnosis of C. difficile infection: a clinical comparison of fecal tests,” Digestive Diseases and Sciences, vol. 57, no. 10, pp. 2592–2599, 2012.

K. C. Carroll, “Tests for the diagnosis of Clostridium difficile infection: the next generation,” Anaerobe, vol. 17, no. 4, pp. 170–174, 2011.

D. Heeg, D. A. Burns, S. T. Cartman, and N. P. Minton, “Spores of Clostridium difficile clinical isolates display a diverse germination response to bile salts,” PLoS One, vol. 7, no. 2, article e32381, 2012.

M. Rupnik, “Heterogeneity of large clostridial toxins: importance of Clostridium difficile toxinotypes,” FEMS Microbiology Reviews, vol. 32, no. 3, pp. 541–555, 2008.

F. Barbut, M. Monot, A. Rousseau et al., “Rapid diagnosis of Clostridium difficile infection by multiplex real-time PCR,” European Journal of Clinical Microbiology & Infectious Diseases, vol. 30, no. 10, pp. 1279–1285, 2011.

R. A. Luna, B. L. Boyanton Jr., S. Mehta et al., “Rapid stool-based diagnosis of Clostridium difficile infection by real-time PCR in a children's hospital,” Journal of Clinical Microbiology, vol. 49, no. 3, pp. 851–857, 2011.

S. D. Bélanger, M. Boissinot, N. Clairoux, F. J. Picard, and M. G. Bergeron, “Rapid detection of Clostridium difficile in feces by real-time PCR,” Journal of Clinical Microbiology, vol. 41, no. 2, pp. 730–734, 2003.

P. Lantz, W. Abu Al-Soud, R. Knutsson, B. Hahn-Hagerdal, and P. Rådstrom, “Biotechnical use of polymerase chain reaction for microbiological analysis of biological samples,” Biotechnology Annual Review, vol. 5, pp. 87–130, 2000.

S. Wongwanich, S. Rugdeekha, P. Pongpech, and C. Dhiraputra, “Detection of Clostridium difficile toxin A and B genes from stool samples of Thai diarrheal patients by polymerase chain reaction technique,” Journal of the Medical Association of Thailand, vol. 86, no. 10, pp. 970–975, 2003.

D. Chotiprasitsakul, T. Janvilisri, S. Kiertiburanakul et al., “A superior test for diagnosis of Clostridium difficile-associated diarrhea in resource-limited settings,” Japanese Journal of Infectious Diseases, vol. 65, pp. 326–329, 2012.