BioMed Research International

Volume 2013 (2013), Article ID 935351, 12 pages

http://dx.doi.org/10.1155/2013/935351

Clinical Study

Kidney Dosimetry in ¹⁷⁷Lu and ⁹⁰Y Peptide Receptor Radionuclide Therapy: Influence of Image Timing, Time-Activity Integration Method, and Risk Factors

F. Guerriero,¹ M. E. Ferrari,¹ F. Botta,¹ F. Fioroni,² E. Grassi,² A. Versari,³ A. Sarnelli,⁴ M. Pacilio,⁵ E. Amato,⁶ L. Strigari,⁷ L. Bodei,⁸ G. Paganelli,⁸ M. Iori,² G. Pedroli,¹ and M. Cremonesi¹

¹Medical Physics Department, European Institute of Oncology, 20141 Milan, Italy

²Medical Physics Department, IRCCS Arcispedale Santa Maria Nuova, 42123 Reggio Emilia, Italy

³Nuclear Medicine Department, IRCCS Arcispedale Santa Maria Nuova, 42123 Reggio Emilia, Italy

⁴Medical Physics Department, IRCCS Istituto Scientifico Romagnolo per lo Studio e la Cura dei Tumori, 47014 Meldola, Italy

⁵Medical Physics Department, Azienda Ospedaliera S. Camillo Forlanini, 00151 Rome, Italy

⁶Section of Radiological Sciences, Department of Biomedical Sciences and Morphologic and Functional Imaging, University of Messina, 98125 Messina, Italy

⁷Laboratory of Medical Physics and Expert Systems, National Cancer Institute Regina Elena, 00144 Rome, Italy

⁸Nuclear Medicine Department, European Institute of Oncology, 20141 Milan, Italy

Received 30 April 2013; Accepted 31 May 2013

Academic Editor: David J. Yang

Copyright © 2013 F. Guerriero et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Kidney dosimetry in ¹⁷⁷Lu and ⁹⁰Y PRRT requires 3 to 6 whole-body/SPECT scans to extrapolate the peptide kinetics, and it is considered time and resource consuming. We investigated the most adequate timing for imaging and time-activity interpolating curve, as well as the performance of a simplified dosimetry, by means of just 1-2 scans. Finally the influence of risk factors and of the peptide (DOTATOC versus DOTATATE) is considered. 28 patients treated at first cycle with ¹⁷⁷Lu DOTATATE and 30 with ¹⁷⁷Lu DOTATOC underwent SPECT scans at 2 and 6 hours, 1, 2, and 3 days after the radiopharmaceutical injection. Dose was calculated with our simplified method, as well as the ones most used in the clinic, that is, trapezoids, monoexponential, and biexponential functions. The same was done skipping the 6 h and the 3 d points. We found that data should be collected until 100 h for ¹⁷⁷Lu therapy and 70 h for ⁹⁰Y therapy, otherwise the dose calculation is strongly influenced by the curve interpolating the data and should be carefully chosen. Risk factors (hypertension, diabetes) cause a rather statistically significant 20% increase in dose (-test, ), with DOTATATE affecting an increase of 25% compared to DOTATOC (-test, ).

1. Introduction

PRRT is an important option for the treatment of neuroendocrine tumors (NETs) and other somatostatin receptor expressing neoplasms. Overall, the response rate of complete, partial, and minor response reaches 50% for Lu DOTATATE [1]. The cumulative absorbed dose to the tumor is limited by the irradiation of the organs at risk, the kidney, and the red marrow. In particular, specific and nonspecific radionuclide accumulation in the kidneys is of major concern, and considerable variation has been found in patients’ maximal kidney uptake and biological washout.

In general, the biological processes are assumed to follow a first-order kinetics [2], which can be described by the sum of exponential functions.

Renal peptide clearance is characterized by a single- or two-step phase, the first lasting about 24 hours after injection. In order to best extrapolate the renal time-activity curve, calculate the time-integrated activity , and have a reliable estimate of the absorbed dose, several experimental data need to be collected, requiring several planar and/or 3D scans.

When ¹⁷⁷Lu is used for therapy, its gamma decay branch allows imaging at the same time: 3 to 5 whole-body/SPECT scans are taken from 2 to 7 days after the infusion. When ⁹⁰Y is the radiopharmaceutical, either ¹¹¹In- or ⁸⁶Y-labeled peptides are used as a surrogate and 2 to 5 scans are collected up to 2-3 days p.i. [3]. These activity data are usually fitted by means of monoexponential functions [4–6], biexponential [3], or trapezoids [7].

The great value of dosimetry is an established tenet, nonetheless each experimental point requires time-consuming acquisitions. In this respect, an optimal choice of the number of scans and of their temporal location is warranted to balance feasibility, resources, and adequate dosimetric information.

In recent years, much effort has been made to improve the accuracy of image analysis and quantification [5]. However, the step from a set of activity data to absorbed dose passes through time points integration: if data are few and do not properly span the radionuclide renal clearance time, most of the time-activity curve is obtained by extrapolation, and, as a consequence, this can dramatically affect the results.

The issue of experimental-point fitting has been addressed by Glatting and coll in blood serum dosimetry [2], where collecting several data (generally three) for each kinetic phase is feasible from the cost point of view. The aforementioned reasons (expense of data gathering, slow renal clearance) make this more critical for the renal curves in peptide therapy. This question has also been raised by Konijnenberg [8] and Sandström et al. [5]. A dedicated analysis was presented only in a different scenario, that is, when having whole-body scans at 1 h, 1, 2, 7 d for ¹⁷⁷Lu therapy only, demonstrating a high impact of the 7th day point [9].

The aim of the present study was to compare the dosimetric results obtained in 58 patients undergoing ¹⁷⁷Lu therapy when considering (a) SPECT scans at 2(±1), 6(±3), 20(±3), 44(±3), 67(±2) h, (b) when neglecting the 6 h point, (c) and when neglecting the 67 h point. The possibility of a simplified Injected Activity clearance , obtained fitting all sets of data together and the patient-specific ( at ) was also investigated. The impact of time-activity interpolation method (trapezoids, sum of exponentials) on dose and BED estimate was also highlighted, as well as the possible influence of risk factors and of the peptide (DOTATOC versus DOTATATE). The analysis was also extended to ⁹⁰Y, mutatis mutandis.

2. Materials and Methods

2.1. Patients and Radiopharmaceutical Administration

The cohort included 28 patients (age 46–82, mean 65 yrs.) undergoing ¹⁷⁷Lu/⁹⁰Y-DOTATATE therapy and 30 patients (age 31–77, mean 58 yrs.) ¹⁷⁷Lu/⁹⁰Y DOTATOC therapy. During the first cycle patients were evaluated for dosimetry with ¹⁷⁷Lu DOTATATE (median [range]: 5.0 [3.5–5.7] GBq) and ¹⁷⁷Lu DOTATOC (5.7 [3.7–7.8] GBq), respectively. All patients received the therapeutic administration of radiolabeled peptides with an infusion of aminoacid solution for renal protection. Details on the synthesis and the administration procedures are described elsewhere [10, 11].

Patients had been diagnosed with metastatic neuroendocrine tumors (primary site: 11 pancreas, 14 gastrointestinal tract, 7 lung, and 3 of unknown origin). The remaining were mainly affected by iodine negative thyroid carcinomas.

The therapy schedule alternated cycles of ¹⁷⁷Lu (5.3 GBq/cycle on average) and ⁹⁰Y (2.50 GBq/cycle on average) radiolabelled peptides, for a total of 5 cycles at maximum, 8–10 weeks apart. The physician determined the specific activity to be administered, according to the dosimetric results, patient’s clinical conditions, and presence of risk factors for the kidneys (blood hypertension, diabetes) [12]. Toxicity was recorded throughout all the study and up to 6 months after completion. A comprehensive description of this clinical study and patients is reported in a companion paper [13].

2.2. Imaging

2.2.1. SPECT-CT Patient Acquisitions

In order to determine the absorbed dose to the kidneys, all patients performed a series of SPECT-CT scans of the abdomen (Symbia T2, Siemens, Germany), at Arcispedale S. Maria Nuova, Reggio Emilia, taken at 2(±1), 6(±3), 20(±3), 44(±3), 67(±2) h after injection. For the sake of simplicity we will refer to these times as 2 h, 6 h, 1 d, 2 d, 3 d in the following.

Acquisitions were performed with a matrix, zoom = 1,32 × 2 views, 30 s time/view, medium-energy general-purpose collimators. The energy windows were centered over ¹⁷⁷Lu photon peaks (208 keV and 113 keV, width 15%) while scatter fraction was evaluated with the triple energy window method, through three scatter windows next to the peaks, defined as lower scatter windows (width 10% and 15%) and upper scatter window (width 8%). The SPECT projections were reconstructed by an iterative algorithm with compensations for attenuation, scatter, and full collimator-detector response (Flash 3D iterative algorithm: 10 iterations; 8 subsets; 4.8 mm cubic voxel).

2.2.2. SPECT-CT Calibration and Activity Quantification

To convert counts/s into activity in volumes of interest, the scanner was calibrated by means of a hollow anthropomorphic Torso phantom (Data Spectrum Corporation, Hillsborough, USA) with a set of hollow spheres (volume: 1.5, 0.6, 0.3 mL) and other home-made inserts (two Eppendorf microtubes of 1.5 mL, two conical tubes of 50 mL). Phantom background, liver, and inserts were filled with different activity concentrations of ¹⁷⁷Lu (conical tubes: 0.8 and 1.2 MBq/mL; spheres with volume of 1.5, 0.6, 0.3 mL: 0.6, 0.75, and 2.5 MBq/mL, resp.; both microtubes: 7 MBq/mL, liver = 0.047 MBq/mL, and phantom background = 0.011 MBq/mL). One microtube and the 0.6 mL sphere were fixed inside the liver region. The acquisition setting and reconstruction algorithm were as described previously (for patients).

The objects were contoured on the CT image, and for each region of interest (ROI), the total counts were divided by the activity, the number of voxels, and the duration of SPECT-CT acquisition to obtain the calibration factor.

The experimental data representing counts/s/voxel/MBq versus volume (cm³) were fitted by the equation . This curve was used to account also for the partial volume effect when converting counts/s into activity in volumes of interest differently sized. Regards patient kidney volumes, the partial volume effect correction was considered negligible, as from our recovery curves (not shown). Kidney volumes were manually measured on CT scan, and the counts inside each ROI averaged over the number of renal voxels.

The activity quantified in kidneys was corrected for physical decay to have biological time-activity curves expressed by means of , the fraction of the total injected activity versus time.

2.2.3. Calculation of Kidney Time-Integrated Activity and Dose

For each patient, time-integrated activity per unit activity (-expressed in h) for the kidneys was computed from experimental by means of seven different methods:

(1)trapezoidal method up to the last experimental data plus physical decay after the 3 d point (hereafter called TRph); (2)trapezoidal method up to the last experimental data plus monoexponential decay after the 3 d point obtained passing through the last two points (); (3)biexponential fit of the experimental data (BI): ;(4)monoexponential fit of the experimental data (MN): ;(5)monoexponential model deriving a unique fit for all the data sets for each radiopeptide (MNfix): ; . This was done in order to evaluate the feasibility of a simplified method for dosimetry in PRRT, based on the best shared fit parameter () specific for the peptide (i.e, DOTATOC and DOTATATE) and the patient-specific initial uptake ;(6)the best fitting function among the analytical functions , , and according to -test (hereafter called FT) (see next section, point (b));(7)the best fitting function among the analytical functions , , and according to the visual choice of trained physician/physicists (VIS) (see next section, point (c)).

All fits for , , were performed using Matlab 7.7.0, Statistics Toolbox.

Once was computed, the absorbed dose per unit of injected activity of ¹⁷⁷Lu was obtained as , where is the self-absorbed dose per nuclear transformation in the kidneys for ¹⁷⁷Lu.

Similar biodistribution and kinetics for peptides labeled with ¹⁷⁷Lu and ⁹⁰Y are generally assumed [14], therefore the results obtained with ¹⁷⁷Lu were extrapolated to ⁹⁰Y, simply substituting physical decay constant and factor in the computation of and .

The standard values for the kidney of the OLINDA/EXM software (¹⁷⁷Lu: 0.29 Gy/GBq/h; ⁹⁰Y: 1.76 Gy/GBq/h) were rescaled for the actual patient kidney mass [15].

2.3. Comparison of Methods and Statistical Analysis

Different criteria were considered to identify the method providing the most accurate estimate of kidney .

The two trapezoidal methods and cannot be analyzed from a statistical point of view. Their results were simply compared with the best fit identified by a statistical test and the visual criterion.

(a) Considering the three methods using analytical functions , , and , the coefficient of determination [16] given by was computed for each fit, where SSE is the sum of the squared residuals ; ; is the experimental at time ; is the fitting-extrapolated at each time ; and is the mean value of the experimental data.

Although most frequently used within pharmacological and dosimetry papers, indeed this criterion just says how a model fits the data better than a constant function equal to the mean value (see Discussion). For this reason is not be a very helpful indicator in assessing nonlinear fit quality, as in our case [16].

(b) To properly identify the best method, the one-tailed -test was used, which is indicated for nested functions [2]. This is the case of BI, MN, and MNfix, MN being a particular case of BI and MNfix, a particular case of MN.

Given a pair of fitting functions, one with “reduced” and the other with “full” parameters, with the corresponding sum of squared residuals SSEreduced and and the number of Degrees of Freedom as , , the value was obtained by the equation:

The value of the -test selects which of the two models is better, the null hypothesis being that the simpler (i.e., the one with lower parameters) model is better. The level of significance was set as , so if the simpler model was rejected. Although is more often quoted in the literature, its value is more or less arbitrary [2]; our choice was required to increase the statistical power in this case of quite small sample size (5 points).

(c) Besides, the statistical criteria, the best function among BI, MN, MNfix describing the experimental data was also chosen visually. This was done by three expert physicians/physicists to give more weight to the clinical evidence about the peptide kinetics in the kidneys especially long after the experimental points.

In addition, all the interpolating functions (except MNfix) were computed skipping either the 6 h or the 3 d point to discern their relevance on the determination of values. Both the values, determined by the test () and visually (), were only evaluated in the five-point case.

Finally, the equal-variance one-tailed -test was applied to the two peptide data sets, in order to assess whether the mean time-integrated activity for DOTATOC and DOTATATE was significantly different, despite the interpatient variability, as previously derived in an intrapatient study of 7 patients [4]. To this, a value 0.05 was considered significant, and a value 0.1 rather statistically significant. Similarly, the possible influence of risk factors on was investigated.

2.4. BED

For radionuclide therapy with an absorbed dose per cycle given in cycles, assuming complete decay and full repair of sublethal damage between cycles, the BED takes the following form [17]:

where and RE is the Relative Effectiveness factor, expressed using the Lea-Catcheside factor in the last term, which reduces to

for a biexponential clearance (either or could be <0, if an accumulation phase is present (Figure 1)) and to

for a monoexponential clearance , being the normal tissue repair constant. Following Wessels and coll [18] we set and for the kidneys. The amount of administered radiopharmaceutical activity varied among patients according to their clinical situation, nonetheless in the following we considered, irrespective of the patient, 4 cycles, 7.4 GBq each for ¹⁷⁷Lu peptides and 2 cycles, 3.7 GBq each for ⁹⁰Y peptides. This choice allowed interpatient comparison and also comparison with the typical schedules used in the clinic.

Figure 1: Examples of observed pharmacokinetic behaviour: with-accumulation (blue line, pt no. 45), single-slope clearance (red line, pt no. 43), two-slope clearance (violet line, pt no. 38).

BED was only computed for the analytical time-activity fits (methods MNfix, MN, BI), even though a recent work [19] illustrated a procedure for BED computation for piecewise defined fits as well.

For a same patient, relative absorbed dose differences found using diverse fitting functions could result in an amplified difference in BED, which is the dosimetric parameter used, together with absorbed dose, for clinical implementation of treatment planning in PRRT.

3. Results

3.1. SPECT-CT Calibration

Exponential fit of scanner counts as a function of the source volume gave the following sensitivity parameters:   counts/s/voxel/MBq,  counts/s/voxel/MBq, .

3.2. Time-Activity Trends

In the majority of cases (41 out of 58 pts, 71%), the experimental data had a maximum value in the first time point and subsequent values depictable with exponential decrease. A single-slope clearance was observed in 29 pts, while in 12 patients a faster elimination phase followed by a slower one after about 24 h. Conversely, 17 patients showed an accumulation trend until 24 hours after injection. Accumulation was associated with DOTATATE in ten patients and with DOTATOC in seven.

Figure 1 offers three biological curves which are representative of the three observed pharmacokinetic behaviours.

In all but six cases (90% of pts), the elimination persisted even after 2 d, although at a slower rate as compared to the first day after injection. In particular, the mean () value of the kidney activity fraction at 3 d showed, on average, a further 20–25% decrease as compared to the 2 d renal uptake (namely for DOTATATE , and ; for DOTATOC , and ).

Table 1 reports the results concerning the biological pharmacokinetic parameters , obtained by using methods MN, BI, and MNfix. Results are provided separately for DOTATOC and DOTATATE and, with the exception of MNfix, with distinction between cases with accumulation and with clearance only. In 12 cases (21%) biexponential fittings gave , that is, a monoexponential function in the inspected time interval. Six times a negative was found when fitting with accumulation cases with MNfix, meaning that a constant function equal to the mean data value would better fit the data.

Table 1: Statistical results ( and SSE) and computed by means of different fitting functions, with distinction between DOTATOC and DOTATATE peptides, with and without accumulation behaviour. Concerning , a single value for each peptide was computed, irrespective of the kinetic behaviour. A negative (obtained in 6 MNfix fits) means that a constant function equal to the mean value of the data would fit better; that is, the fit is of very poor quality.

Biological constants

Cases with accumulation
Clearance only cases

Mean
median
SEE median
Mean
median
SEE median

(range)
(range)
(range)
(range)
(range)
(range)

DOTATATE

8.6
0.71 1.6–0.99)
0.89 (0.07–5.30)
8.6
0.81 (0.40–0.99)
0.58 (0.004–4.04)

(2–13)
0.82 (0.08–0.98)
0.59 (0.007–1.83)
(5–21)
0.94 (0.57–0.99)
0.25 (0.002–1.07)

(42–427)
0.99 (0.75–1)
0.017 (0.001–0.147)
(9–311)
0.98 (0.75–0.99)
0.092 (0–1.057)

(6–21)

(0–162)

DOTATOC

11.04
−0.71 1.47–0.60)
2.32 (1.05–11.24)
11.04
0.82 (0.36–0.98)
0.49 (0.05–9.09)

(1–7)
0.57 (0.01–0.93)
0.34 (0.13–4.71)
(7–24)
0.97 (0.66–1.00)
0.17 (0.002–5.26)

(28–308)
1 (0.89–1)
0.01 (0–0.02)
(9–443)
0.99 (0.80–1)
0.025 (0–0.364)

(6–22)

(0–22)

Concerning MNfix, the biological half time () was 81 h for DOTATATE and 63 h for DOTATOC; these results are in the middle of the mean MN results: for DOTATATE  h and 69 h patients with and without accumulation, respectively, for DOTATOC  h and 53 h. Concerning the other methods (TRph, TRexp, BI), comparisons are more easily made referring to time-integrated activity .

3.3. Values

Box and whisker plots in Figure 2 illustrate the values for all the methods applied to ¹⁷⁷Lu peptides (Figure 2(a)) and ⁹⁰Y peptides (Figure 2(b)), with distinction made between DOTATOC and DOTATATE.

(a)

(b)

Figure 2: ¹⁷⁷Lu (a) and ⁹⁰Y (b) time-integrated activities in hours for methods TRph, TRexp, BI, MN, MNfix, VIS, FT. Boxes draw the 25th percentile (lower box bound, indicating 25th of data fall below it), 50th percentile (i.e., median value), and 75th percentile (upper box bound). Crosses indicate outliers defined as observations out of 1.5(75th percentile value −25th percentile value). Whiskers extend to the most extreme values that are not outliers.

The graph emphasizes that ¹⁷⁷Lu time-integrated activities are consistently overestimated by TRph and slightly underestimated by TRexp as compared to BI, MN, and MNfix. Smaller differences concern ⁹⁰Y because of the minor influence from the curve tail in consequence of the smaller physical half-time (64.1 h for ⁹⁰Y versus 164.2 h for ¹⁷⁷Lu). The mean ratio between the tail contribution to (i.e., the area under the time-activity curve from last experimental data point on) and the whole is reported in Table 2, for all the different methods. These ratios point out that the curve after the last experimental point takes about 40% of the total for ¹⁷⁷Lu peptides and 25–30% for ⁹⁰Y peptides, while for TRph the accounts for 70% (Lu) and 55% (Y) of the total .

Table 2: The mean fraction of time-integrated activity per unit activity situated after the last experimental datum is reported for the methods TRph, TRexp, BI, MN, MNfix, VIS, FT.

TRph
TRexp
BI
MN
MNfix
FT
VIS

177Lu TOC
0.73
0.29
0.40
0.38
0.45
0.43
0.38

177Lu TATE
0.73
0.34
0.42
0.43
0.35
0.38
0.41

90Y TOC
0.56
0.28
0.26
0.24
0.39
0.33
0.25

90Y TATE
0.57
0.32
0.27
0.28
0.28
0.28
0.26

Figure 3 points out whether it is possible to univocally identify a “best” through the analysis of the residuals. MN and BI methods are compared, with the relative difference of the values plotted against the relative difference of SSE . Points are spread out, showing no correlation between and . Thus, two curves with similar residuals could lead to very different values, in other words the best could not be identified.

Figure 3: Relative difference of values for ¹⁷⁷Lu-DOTATATE between MN and BI methods plotted against the relative difference of the squared residuals SSE .

3.4. Best

The values of the best method indicated by the -test () and those identified by visual analysis () were considered as reference.

The -test preferred monoexponential methods in most cases (MNfix: 50%, MN: 38%), while BI in only 12% of cases. According to the visual analysis, the MN was chosen in 50% of cases, and BI was selected in the 50% left (see Figure 4 for the ¹⁷⁷Lu cases in which the discrepancy among FT and VIS was larger than 10%). Although close to the MN in 21% of cases, the MNfix was avoided in general and definitely considered inappropriate in 79% cases (46 over 58).

Figure 4: ¹⁷⁷Lu and for the cases in which there was a discrepancy greater than 10% between the visual and the -test (8 cases for TATE, 11 for TOC).

For ¹⁷⁷Lu, in 24% cases (14 over 58), MN discrepancies of with the best visual model were larger than 20% (reaching even 70%), while for ⁹⁰Y discrepancies higher than 20% were seldom found (3 out of 58 cases only), the largest discrepancy being 25%.

3.5. Comparison

Table 3 reports the mean ± SD values of the ratio—case by case—between the values from methods TRexp, BI, MN, and MNfix and the and values. Mean ratios are close to 1, in agreement with the reference method (-test or visual), although SD values are not negligible especially for ¹⁷⁷Lu peptides, reaching 0.20–0.30 (¹⁷⁷Lu) and 0.10–0.15 (⁹⁰Y).

Table 3: Ratio of computed with BI, MN, MNfix, TRexp methods with best determined by means of -test and visual choice. “6 h-point excluded” and “3 d-point excluded” mean that fitting was conducted skipping the 6 h and the 3 d point, respectively. The shared (MNfix) was only computed in the 5-point case.

Mean 1SD
ratios

177Lu peptides

90Y peptides

5 points
6 h point excluded
3 d point excluded
5 points
6 h point excluded
3 d point excluded

F-test

BI/FT

MN/FT

MNfix/FT

TRexp/FT

Visual

BI/VIS

MN/VIS

MNfix/VIS

TRexp/VIS

Table 3 reports also the results obtained excluding either the experimental point at 6 h or at 3 d.

Regarding the TRexp method, the 6 h point has negligible impact, while the lack of the 3 d point causes a remarkable underestimation versus both the -test and the visual results: for example, for ¹⁷⁷Lu peptides, the mean ratio of 0.7 indicated a mean 30% underestimate .

At first glance, MN and MNfix may seem to perform similarly on average, the ratios with the FT and VIS methods being quite close (SD 0.20 for Lu, 0.10 for Y). Actually, we found that in 9 cases MNfix gave a result closer to VIS than the one obtained by MN. However, this might just be due to chance, as the quality of the MN fit, having one parameter more, must be better than the MNfix one (this emerges looking at and SSE values in Table 1). This unintended occurrence biased the MNfix results, whose SD would have been worse than MN otherwise.

Excluding TRexp, concerning ¹⁷⁷Lu, it should be noted that standard deviations are around 0.20 in all situations, regardless of the analytical function considered and of the number of data points –5 versus 4 (see Table 3). This suggests that the gathered data are either inadequate or not properly temporally placed. Conversely, concerning ⁹⁰Y the method used and the 6 h datum have a very negligible influence on ; in addition, if the 3d datum is lacking, SDs are higher (around 0.15).

The influence of the 6 h and 3 d points on the fits is shown in Figure 5 by means of the datasets of two patients. For these specific examples, biexponential fits are the best according to the visual method, while -test would have preferred the MNfix method for (a), the MN for (b). For the same patient, varies according to the following ratios: ; .

(a)

(b)

Figure 5: (a) pt no. 35 ¹⁷⁷Lu DOTATATE: MNfix and BI obtained with all experimental points (red and violet lines, resp.) and MN and BI skipping the 3 d point (green and blue lines, resp.); (b) pt no. 45 ¹⁷⁷Lu DOTATOC: MN and BI obtained with all experimental points (red and violet lines, resp.) and BI skipping the 6 h point (blue line).

3.6. Impact of Different Kinetic on BED

Relative differences on due to different methods extend to and BED. Figure 6 reports and BED to the kidneys calculated with methods BI, MN, MNfix, VIS, for ¹⁷⁷Lu and ⁹⁰Y, respectively. -test results are neglected because they are similar to VIS results on average (see Figure 2).

(a)

(b)

Figure 6: and BED in case of ¹⁷⁷Lu therapy (upper panels) and ⁹⁰Y therapy (lower panels). The histograms report mean and 1 SD. ¹⁷⁷Lu and ⁹⁰Y-therapy administer a similar total dose for the specific schemes considered (29.8 GBq in 4 cycles versus 7.4 GBq in 2 cycles, resp.). Conversely, BED is noticeably greater for ⁹⁰Y because of the lower fractionation. Mean ± SD values are similar, but relevant differences among patients can be found (see also Figure 4).

Regards the absorbed dose, intermethod variations are the same as those found for (see comparison). Concerning the BED, it is remarkable that for ¹⁷⁷Lu the relative effectiveness factor (RE) for each patient is almost the same irrespective of the method (BI, MN, or MNfix) by means of computation. For ¹⁷⁷Lu the relative variation of RE for both MN and MNfix compared to BI () is with a maximum of 5%, for ⁹⁰Y is with a maximum of 22%.

For ¹⁷⁷Lu, the mean RE is barely 1.1 with a narrow inter-patient variability range (0.05), while for ⁹⁰Y it is about 1.5 with a greater variability (0.30).

3.7. Influence of the Peptide and of Risk Factors

Irrespective of the radionuclide and of the method used for computation, the time-integrated activity in kidneys, as well as , was significantly higher for DOTATATE (-test: ). This is in agreement with Esser and coll [4] whose finding showed for the same patient undergoing ¹⁷⁷Lu therapy, (DOTATATE) = (DOTATOC). It should be noted that regarding tumor , they found (DOTATATE) = (DOTATOC). However, we were not concerned with tumor dosimetry in this study.

According to the visual choice, for ¹⁷⁷Lu, the mean ± SD value of was 3.9 ± 1.4 h for DOTATATE and 3.2 ± 1.2 h for DOTATOC. The corresponding absorbed dose values were 1.0 ± 0.2 Gy/GBq and 0.7 ± 0.2 Gy/GBq.

For ⁹⁰Y, was 2.7 ± 0.9 h for DOTATATE and 2.1 ± 0.7 h for DOTATOC and absorbed doses 3.7 ± 1.5 Gy/GBq and 2.9 ± 1.3 Gy/GBq, respectively.

The -test analysis highlighted a rather statistically significant difference between the mean values for patients with (RF) and without risk factors (NRF) (one-tailed -test: ). The RF cohort on average received a 1.20–1.25 higher than the NRF one (Figure 7). An increased number of patients could confirm this explorative finding with a higher level of significance (e.g., ).

Figure 7: Time-integrated activity per unit activity for patients with risk factors (RF) (diamonds) and without (NRF) (dots). For each population, the mean value is indicated by the horizontal line, and the box extends to . For DOTATATE, 11 patients were RF and 17 NRF, and the -values of -test were 0.05 and 0.06, for ¹⁷⁷Lu and ⁹⁰Y, respectively. For DOTATOC, 12 patients were RF and 17 NRF (one outlier was excluded), and -values were 0.09 and 0.06, for ¹⁷⁷Lu and ⁹⁰Y, respectively.

4. Discussion

Tailoring peptide receptor radionuclide therapy (PRRT) according to dosimetry has been shown to be of great value in clinical practice and should replace the criteria of administering a fixed of radioactivity amount or an activity correct for the patient body weight or surface [20].

Besides the red marrow, it is the kidneys that are the critical organs in this therapy, especially with ⁹⁰Y-peptides [1, 3, 21]. Much effort is being put into improving dosimetric accuracy in the quantification of activity: correcting factors for patient-specific kidney mass [22], using SPECT instead of whole-body images [5], taking into account scatter and attenuation correction [23], including collimator response correction [7], computing a 3D activity distribution [6] to consider the equivalent uniform dose (EUD) instead of the mean absorbed dose.

Conversely, the impact of kinetics and image timing on the absorbed dose estimate specific for the kidneys has been neglected to a certain extent.

It has been stated [5] that a margin of error of 20% or less would be of great value when evaluating normal tissue complication probability (NTCP) [24].

In this work we have shown that data-collection/image-acquisition timing and the method for data interpolation cannot be overlooked, since calculation of absorbed dose could lead to errors even greater than 20% and greater than those originating from activity quantification. This is not acceptable, especially because such errors can be easily avoided by an adequate kinetic analysis.

Concerning the two issues of data-acquisition timings and interpolation, several dosimetric approaches exist in clinical practice, as shown in Table 4.

Table 4: Characteristics of different dosimetric approaches concerning acquisition timing and interpolation method.

Investigator
Therapeutic nuclide
Acquisition timings
Interpolation method

Esser et al. [4], Sandström et al. [5], Larsson et al. [9]
177Lu
1, 4, 7 d
MN

Hindorf et al. [25]
90Y
Not fixed, up to 19–48 h, 2–4 acquisitions
Not reported for kidneys

Baechler et al. [17]
90Y, ¹⁷⁷Lu, ¹¹¹In
0.5, 4 h, 1, 2 d
MN of last three points

Cremonesi et al. [3]
90Y, ¹⁷⁷Lu
1, 4 h, 1, 2, 3 d
MN or BI

Garkavij et al. [7]
177Lu
1 h, 1, 4, 7 d
TRexp

According to the EANM guidelines on internal dosimetry [26] three measurements for each kinetic phase are needed. Because the kinetics of DOTATOC and DOTATATE peptides in the kidneys are often associated with more than one phase—generally two—this would be demanding for patients as well as clinicians, since the acquisition of at least six images is difficult and time consuming. Consequently, finding a compromise that optimally balances accuracy and feasibility is of the utmost importance. The current situation for most clinical studies, in which no more than five points are available, is reflected in Table 4.

The choice of many investigators [5, 7, 9] has been to focus only on the slower phase which starts after 24 h, because this takes more than 70% of total time-integrated activity. Sandstrom pointed out that doing so there could be an overestimation, when extrapolating the first 24 h part. According to our results, a slight underestimation could be possible as well.

In our cohort we stopped data collection 3 days after therapy for logistic reasons, as it is cumbersome for most patients to stay one whole week in the proximity of the hospital.

Our data showed that the method used to compute is crucial if data collection is stopped when the remaining administered activity is higher than 30% of the activity present in the kidneys at time zero; in contrast, we found that a careful choice of the method (excluding trapezoidal methods) results in negligible importance (differences smaller than 10%) when data reach two radionuclide effective half-lives. Moreover, in this situation the 6h point could be spared. This finding therefore illustrates that the use of radionuclides with half-life shorter than (¹⁷⁷Lu/⁹⁰Y), like the -emitter ⁸⁶Y [3], is not advisable for PRRT dosimetry. For example, taking a median biological decay constant of (Table 1), (⁹⁰Y) 35 h, (¹⁷⁷Lu) 50 h, it would turn out that data are needed up to 70 h for ⁹⁰Y peptides and 100 h for ¹⁷⁷Lu peptides. If this is not possible, it must be pointed out that the obtained values could differ up to 70% depending on the method used for their calculation and the acquisition timings. In particular, a unique interpolating function cannot be used without taking into consideration the specific individual kinetics, because the weight of the tail becomes of major relevance. Thus, the question of choosing the best method among the several available (exponential functions, trapezoidal methods) arises. Moreover, establishing a principle for the selection of the most appropriate model allows an increased reproducibility of the results, as the user dependence is reduced [2].

Several criteria exist to choose the preferable model, but the small number of data points (five) is a major drawback in our study. The modified Akaike information criterion (AIC) proved to be an efficient approach [2] in blood serum dosimetry for radioimmunotherapy with anti-CD66 antibody, but in our case, it cannot be applied because of the small sample size () as compared to the number of parameters (), four in a biexponential function, as the condition for its use () does not apply. In our scenario, the AIC could be only used to evaluate the model most supported by the data for the whole data set, not for each single patient [27].

The -test is feasible in principle, bearing in mind that the statistical power is low though (i.e., the probability density function is broad). Moreover, these tests (-test, AIC) are based on the residuals between the fitting function and the measured data which stop at 3 days p.i., when 30%–40% of the activity reaching the kidneys at time zero is still not decayed (and in this way considered just by extrapolation): the great impact of the tail led to the paradox that on several occasions MNfix performed better than MN, although the former has one degree of freedom less (see comparison). For this reason it is important to use all the available information—theoretical and empirical—in the model selection, besides the statistical criteria [2], which is why we put side by side the best models as determined by the -test and visually, the latter is being used, as it was, as “reference.”

It is important to remember that the determination coefficient (), although commonly used, is not actually a very useful indicator when using nonlinear regression functions [16], because it compares the sum of residuals with the distance of the data from their mean (; see comparison of methods and statistical analysis). When data are distanced from their mean value, as most often occurs in exponential curves, could be a misleadingly high parameter.

Despite all the limitations described previously for the various candidate criteria with so few data points (five, as generally available in practice), useful information could be gained analyzing our data.

(i)TRph: the TRph cannot be applied with physical only decay starting from the 3 d point (or even before), because the physiological clearance in 52 on 58 cases was found after that; moreover, some investigators [5, 9] found biological clearance even up to 7 days (i.e., at 7 d, the measured activity was from 20% to 30% that of the one at 1 h and from 25% to 40% that of the one at 1 d). Pursuing this way, the overestimation of is evident and is marked (Figure 2). Our interest in this method was drawn after its implementation in commercial software for dosimetry [28].(ii)TRexp: concerning TRexp, it comes to light that fitting a monoexponential function by means of only two points is not a reliable choice: is very dependent on which ones are being used. For example we found that using the 1-2 d points instead of the 2-3 d for extrapolation, decreased on average of 18% for either ¹⁷⁷Lu and ⁹⁰Y. Therefore, this method is not recommended when experimental data span is less than two effective radionuclide half-lives. (iii)MNfix: trying to use a single for all patients did not give satisfactory results for ¹⁷⁷Lu, as differences with the best visual model were (and could even be worse, because it was shown that in 9 cases the value was close to just by chance). Conversely, for ⁹⁰Y it was not to be rejected (the mean ratio between the best and is , with a maximum discrepancy of 35%). This is explained because of the lower effective half-life of ⁹⁰Y as compared to ¹⁷⁷Lu. It must be remembered that in the MNfix method the decay constant was fixed, but the initial activity was patient specific. (iv)MN and BI: for ¹⁷⁷Lu a monoexponential function is a safe choice only having taken data after 24 h and reaching two effective radionuclide half-lives; conversely, when data are available from the injection up to 2-3 days a biexponential function is highly recommended (above all if accumulation or fast clearance is observed during the first day), as in this case the ratio of for the monoexponential over the best visual model is , while with the biexponential model is ; that is, BI has a lower SD meaning a better agreement.(v)VIS: when radio-peptide therapy cannot rely on the benefit of a dosimetry-based planning, Figure 7 might be of some help, providing the mean ± SD of the best values calculated from the visual method, for DOTATOC and DOTATATE peptides and ¹⁷⁷Lu and ⁹⁰Y radionuclides. Regarding 7.4 GBq ¹⁷⁷Lu DOTATATE administration, our findings are consistent with those from Sandstrom and coll, who reported an absorbed dose to the kidneys of  Gy in a 24-patient cohort (cfr [5], small VOI method, mean value between left and right kidney ), to be compared with  Gy of our 25-patient cohort, having excluded 3 outlier patients with doses of about 14 Gy/cycle.(vi)Risk factors: it was recently shown [29] that impairment in renal function assessed by glomerular filtration rate led to higher mean kidney absorbed doses. We found that risk factors (hypertension, diabetes, lesions close to renal parenchyma, etc.), which are an evidence of renal impairment, led to a statistically significant increase in absorbed dose to the kidneys. In our cohort, patients with risk factors (RF) on average received a dose 1.20–1.25 times higher than patients without. This finding should be considered together with the clinical evidence [12] that the maximum tolerable BED is lower for patients with RF than without RF (28 Gy vs 40 Gy). (vii)BED: finally, to take into account the effect related to the dose rate and to the response of the irradiated tissue, planning treatments are conducted constraining the BED as well [12, 17]. We found that for ¹⁷⁷Lu using formula (3) even with a fixed value (i.e., obtained from formula (4) with ) does not give a dissimilar result if the more complicated of formula (3) is being used. To give an example, the mean ratio of the RE values using the for MNfix and BI functions is . In other words, what is important in the estimation of the BED for ¹⁷⁷Lu is the dose calculation accuracy only (besides the reliability of the coefficient, obviously). For ⁹⁰Y, the same RE ratios were slightly greater, leading to a mean value of .

5. Conclusions

Accurate dosimetry is mandatory to fully exploit the potential of PRRT. Nonetheless, not only it does make high demands on the level of staff commitment and facilities, but also on the patients themselves who in most cases can be discharged two days after therapy.

We found that if data are not available up to two effective half-lives (4 days for ¹⁷⁷Lu, 3 days for ⁹⁰Y), the estimation of kidney absorbed dose is consistently influenced by the interpolation method: concerning MNfix, MN, and BI, in 30% of cases for ¹⁷⁷Lu and 20% of cases for ⁹⁰Y differences between methods were higher than 10%, reaching 60% and even higher when considering also TRph and TRexp.

A monoexponential clearance with an averaged could be used in exceptional cases in ⁹⁰Y therapy, whereas for ¹⁷⁷Lu is totally inadequate. Concerning BED, RE is almost insensitive to the analytical time-activity curve being used, differences between analytical methods being within 10%.

The use of DOTATATE instead of DOTATOC caused a D increase of 1.25–1.30 (-test, ), while the effect on tumor was not evaluated. The risk-factor group had a D increase of 1.20–1.25 compared to the group without risk factors (-test, ).

Conflicts of Interests

The authors have no potential conflict of interests.

Acknowledgment

The authors are grateful to Mrs. Lorraine Yin for her kind English editing revision.

References

D. J. Kwekkeboom, B. L. Kam, M. Van Essen et al., “Somatostatin receptor-based imaging and therapy of gastroenteropancreatic neuroendocrine tumors,” Endocrine-Related Cancer, vol. 17, no. 1, pp. R53–R73, 2010.

G. Glatting, P. Kletting, S. N. Reske, K. Hohl, and C. Ring, “Choosing the optimal fit function: comparison of the Akaike information criterion and the F-test,” Medical Physics, vol. 34, no. 11, pp. 4285–4292, 2007.

M. Cremonesi, F. Botta, A. Di Dia et al., “Dosimetry for treatment with radiolabelled somatostatin analogues. A review,” Quarterly Journal of Nuclear Medicine and Molecular Imaging, vol. 54, no. 1, pp. 37–51, 2010.

J. P. Esser, E. P. Krenning, J. J. M. Teunissen et al., “Comparison of [¹⁷⁷Lu-DOTA⁰,Tyr³] octreotate and [¹⁷⁷Lu-DOTA⁰,Tyr³] octreotide: which peptide is preferable for PRRT?” European Journal of Nuclear Medicine and Molecular Imaging, vol. 33, no. 11, pp. 1346–1351, 2006.

M. Sandström, U. Garske, D. Granberg, A. Sundin, and H. Lundqvist, “Individualized dosimetry in patients undergoing therapy with ¹⁷⁷Lu-DOTA-D-Phe¹-Tyr³-octreotate,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 37, no. 2, pp. 212–225, 2010.

S. Baechler, R. F. Hobbs, A. Boubaker et al., “Three-dimensional radiobiological dosimetry of kidneys for treatment planning in peptide receptor radionuclide therapy,” Medical Physics, vol. 39, pp. 6118–6128, 2012.

M. Garkavij, M. Nickel, K. Sjögreen-Gleisner et al., “¹⁷⁷Lu-[DOTA0,Tyr³] octreotate therapy in patients with disseminated neuroendocrine tumors: analysis of dosimetry with impact on future therapeutic strategy,” Cancer, vol. 116, no. 4, pp. 1084–1092, 2010.

M. Konijnenberg, “From imaging to dosimetry and biological effects,” Quarterly Journal of Nuclear Medicine and Molecular Imaging, vol. 55, no. 1, pp. 44–56, 2011.

M. Larsson, P. Bernhardt, J. B. Svensson, B. W. Wängberg, H. Ahlman, and E. Forssell-Aronsson, “Estimation of absorbed dose to the kidneys in patients after treatment with ¹⁷⁷Lu-octreotate: comparison between methods based on planar scintigraphy,” EJNMMI Research, vol. 2, pp. 49–53, 2012.

E. Grassi, R. Sghedoni, M. Asti, F. Fioroni, D. Salvo, and G. Borasi, “Radiation protection in ⁹⁰Y-labelled DOTA-D-Phe1-Tyr³-octreotide preparations,” Nuclear Medicine Communications, vol. 30, no. 2, pp. 176–182, 2009.

R. Sghedoni, E. Grassi, F. Fioroni et al., “Personnel exposure in labelling and administration of ¹⁷⁷Lu- DOTA-D-Phe¹-Tyr³-octreotide,” Nuclear Medicine Communications, vol. 32, no. 10, pp. 947–953, 2011.

L. Bodei, M. Cremonesi, M. Ferrari et al., “Long-term evaluation of renal toxicity after peptide receptor radionuclide therapy with ⁹⁰Y-DOTATOC and ¹⁷⁷Lu-DOTATATE: the role of associated risk factors,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 35, no. 10, pp. 1847–1856, 2008.

A. Filice, A. Fraternali, A. Frasoldati et al., “Radiolabeled somatostatin analogues therapy in advanced neuroendocrine tumors: a single centre experience,” Journal of Oncology, vol. 2012, Article ID 320198, 10 pages, 2012.

S. Walrand, F. X. Hanin, S. Pauwels, and F. Jamar, “Tumour control probability derived from dose distribution in homogeneous and heterogeneous models: assuming similar pharmacokinetics, ¹²⁵Sn-¹⁷⁷Lu is superior to ⁹⁰Y-¹⁷⁷Lu in peptide receptor radiotherapy,” Physics in Medicine and Biology, vol. 57, no. 13, pp. 4263–4275, 2012.

M. G. Stabin, R. B. Sparks, and E. Crowe, “OLINDA/EXM: the second-generation personal computer software for internal dose assessment in nuclear medicine,” Journal of Nuclear Medicine, vol. 46, no. 6, pp. 1023–1027, 2005.

A.-N. Spiess and N. Neumeyer, “An evaluation of R² as an inadequate measure for nonlinear models in pharmacological and biochemical research: a monte carlo approach,” BMC Pharmacology, vol. 10, article 6, 2010.

S. Baechler, R. F. Hobbs, A. R. Prideaux, R. L. Wahl, and G. Sgouros, “Extension of the biological effective dose to the MIRD schema and possible implications in radionuclide therapy dosimetry,” Medical Physics, vol. 35, no. 3, pp. 1123–1134, 2008.

B. W. Wessels, M. W. Konijnenberg, R. G. Dale et al., “MIRD pamphlet no. 20: the effect of model assumptions on kidney dosimetry and response—implications for radionuclide therapy,” Journal of Nuclear Medicine, vol. 49, no. 11, pp. 1884–1899, 2008.

R. F. Hobbs and G. Sgouros, “Calculation of the biological effective dose for piecewise defined dose-rate fits,” Medical Physics, vol. 36, no. 3, pp. 904–907, 2009.

A. Imhof, P. Brunner, N. Marincek et al., “Response, survival, and long-term toxicity after therapy with the radiolabeled somatostatin analogue [⁹⁰Y-DOTA]-TOC in metastasized neuroendocrine cancers,” Journal of Clinical Oncology, vol. 29, no. 17, pp. 2416–2423, 2011.

S. Walrand, R. Barone, S. Pauwels, and F. Jamar, “Experimental facts supporting a red marrow uptake due to radiometal transchelation in ⁹⁰Y-DOTATOC therapy and relationship to the decrease of platelet counts,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 38, no. 7, pp. 1270–1280, 2011.

M. W. Konijnenberg, “Is the renal dosimetry for [⁹⁰Y-DOTA⁰, Tyr³]octreotide accurate enough to predict thresholds for individual patients?” Cancer Biotherapy and Radiopharmaceuticals, vol. 18, no. 4, pp. 619–625, 2003.

B. He, R. L. Wahl, G. Sgouros et al., “Comparison of organ residence time estimation methods for radioimmunotherapy dosimetry and treatment planning-patient studies,” Medical Physics, vol. 36, no. 5, pp. 1595–1601, 2009.

A. Jackson, G. J. Kutcher, and E. D. Yorke, “Probability of radiation-induced complications for normal tissues with parallel architecture subject to non-uniform irradiation,” Medical Physics, vol. 20, no. 3, pp. 613–625, 1993.

C. Hindorf, S. Chittenden, L. Causer, V. J. Lewington, H. R. Mäcke, and G. D. Flux, “Dosimetry for ⁹⁰Y-DOTATOC therapies in patients with neuroendocrine tumors,” Cancer Biotherapy and Radiopharmaceuticals, vol. 22, no. 1, pp. 130–135, 2007.

M. Lassmann, C. Chiesa, G. Flux, and M. Bardiès, “EANM Dosimetry Committee guidance document: good practice of clinical dosimetry reporting,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 38, no. 1, pp. 192–200, 2011.

P. Kletting, T. Kull, S. N. Reske, and G. Glatting, “Comparing time activity curves using the Akaike information criterion,” Physics in Medicine and Biology, vol. 54, no. 21, pp. N501–N507, 2009.

E. Grassi, F. Fioroni, M. A. Sarti et al., “Validation of a voxel-based method for dosimetry in radionuclide therapy and comparison with a conventional tridimensional approach,” in Proceedings of the 25th Annual Meeting of the EANM, pp. 27–31, October 2012.

J. Svensson, R. Hermann, M. Larsson et al., “Impairment in renal function predicts higher mean absorbed kidney doses in peptide receptor radionuclide therapy,” in Proceedings of the 25th Annual Meeting of the EANM, pp. 27–31, October 2012.