BioMed Research International

Volume 2014 (2014), Article ID 307473, 1 page

http://dx.doi.org/10.1155/2014/307473

Erratum

Erratum to “Evidence for the Use of Isoflurane as a Replacement for Chloral Hydrate Anesthesia in Experimental Stroke: An Ethical Issue”

Maud Pétrault,1,2 Thavarak Ouk,1,2 Cédrick Lachaud,1,2 Michèle Bastide,1,3 Vincent Bérézowski,1,4 Olivier Pétrault,1,4 and Régis Bordet1,2

¹EA 1046-Département de Pharmacologie Médicale, Faculté de Médecine, CHU Lille, 1 Place de Verdun, 59045 Lille Cedex, France

²UDSL, 59000 Lille, France

³IUT A, Université de Lille 1, 59653 Villeneuve d’Ascq Cedex, France

⁴Université d’Artois, 62307 Lens, France

Received 7 July 2014; Accepted 21 July 2014; Published 28 August 2014

Copyright © 2014 Maud Pétrault et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The first and the last names of the authors were reversed in the published paper. The corrected names are as shown above.