BioMed Research International

Volume 2014 (2014), Article ID 687384, 1 page

http://dx.doi.org/10.1155/2014/687384

Erratum

Erratum to “Estimation of the Lateral Ventricles Volumes from a 2D Image and Its Relationship with Cerebrospinal Fluid Flow”

Bader Chaarani,¹ Cyrille Capel,² Jadwiga Zmudka,³ Joel Daouk,¹ Anthony Fichten,² Catherine Gondry-Jouet,⁴ Roger Bouzerar,¹ and Olivier Balédent¹

¹Department of Imaging, Jules Verne University of Picardy and Amiens University Hospital, 80054 Amiens Cedex, France

²Department of Neurosurgery, Jules Verne University of Picardy and Amiens University Hospital, 80054 Amiens Cedex, France

³Department of Geriatrics, Jules Verne University of Picardy and Amiens University Hospital, 80054 Amiens Cedex, France

⁴Department of Radiology, Jules Verne University of Picardy and Amiens University Hospital, 80054 Amiens Cedex, France

Received 10 March 2014; Accepted 20 March 2014; Published 2 April 2014

Copyright © 2014 Bader Chaarani et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the original paper, the authors’ given and last names were inverted. Here we provide the right authors’ information as shown above.