BioMed Research International

Volume 2014 (2014), Article ID 736259, 8 pages

http://dx.doi.org/10.1155/2014/736259

Research Article

First Record of Isolation and Characterization of Methicillin Resistant Staphylococcus lugdunensis from Clinical Samples in Iraq

Alaa H. Al-Charrakh and Mohammed H. Obayes

Department of Microbiology, College of Medicine, Babylon University, Hilla, Babylon Governorate, Iraq

Received 7 February 2014; Revised 28 June 2014; Accepted 28 June 2014; Published 13 July 2014

Academic Editor: Paul M. Tulkens

Copyright © 2014 Alaa H. Al-Charrakh and Mohammed H. Obayes. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

This study was conducted to determine the frequency of Staphylococcus lugdunensis in different clinical samples. Out of 690 clinical samples, a total of 178 coagulase negative staphylococci (CoNS) isolates were recovered. CoNS were identified as 10 different species; 22 isolates belonged to Staphylococcus lugdunensis. Two specific genes for S. lugdunensis were used ( tanA gene and fbl gene) to confirm identification. Both of these specific genes were detected in 15 (68.1%) of 22 isolates that were identified phenotypically. The results of oxacillin MIC showed that 7 of the 15 (46.6%) S. lugdunensis isolates were oxacillin resistant. The antibiotic susceptibility testing against 16 antibiotics showed that resistance rates were variable towards these antibiotics. Eight of fifteen S. lugdunensis isolates (53.3%) were β-lactamase producer. Results of molecular detection of mecA gene found that mecA gene was detected in 6 (40%) of 15 S. lugdunensis. All of these 6 isolates (S1, S2, S3, S4, S5, and S6) were resistant to oxacillin. One isolate (S7) was resistant to oxacillin but mecA was not detected in this isolate. This study is a first record of isolation and characterization of methicillin resistant S. lugdunensis (MRSL) from clinical samples in Iraq.

1. Introduction

The coagulase-negative staphylococci (CoNS) is a large group of Gram-positive bacteria most often found colonizing the skin and mucosal surfaces of humans and other mammals [1]. Several species of CoNS are recognized as potential pathogens, mainly causing nosocomial infections, often involved in infections related to implanted medical devices such as intravenous catheters, prosthetic heart valves, and orthopedic implants. Staphylococcus lugdunensis is a coagulase-negative staphylococci first described by Freney and his colleagues in 1988 [2]. The organism is found as a skin commensal in healthy individuals. S. lugdunensis has been implicated in invasive diseases, especially fulminant native and prosthetic-valve endocarditis [3]. Other invasive infections include brain abscess, meningitis, skin abscesses, soft tissue infections, spondylodiscitis, foreign body infections, and peritonitis [4].

S. lugdunensis shares a number of potential virulence factors with S. aureus. In particular, S. lugdunensis may express a clumping factor and produce a thermostable DNase [5]. S. lugdunensis produces a tannase (tannin acyl hydrolase) that degrades hydrolysable tannins [6]. The phenotypic biological tests, such as the ornithine decarboxylase test and genotypic molecular tests, have been developed to identify these bacteria [7]. Several nucleic acid targets that permit the differentiation of S. lugdunensis from other CoNS have been exploited using molecular methods. These include the 16S rRNA gene, which was used to confirm identity of S. lugdunensis isolate [8], and the rpoB gene, which is also specific to S. lugdunensis [4]. The tanA gene that coded tannase acyl hydrolase was detected in S. lugdunensis [6]. A fibrinogen-binding protein known as Fbl that encoded by fbl gen is specific to S. lugdunensis [9]. The mecA gene has been reported in several data, the first in a neonate [10] with methicillin resistant S. lugdunensis (MRSL) that produces an alternative penicillin binding protein (PBP2A). Although several researchers have been reported phenotypic and molecular characterizations of methicillin resistant S. lugdunensis (MRSL) worldwide, no information are available about these resistant bacteria in Iraq. Therefore the main goals of this study were to isolate and determine the antibiotic resistance patterns of these important bacteria from clinical samples and detect the presence of mecA gene that encodes methicillin resistance to confirm being MRSL.

2. Materials and Methods

2.1. Patients and Samples Collection

This study included 630 patients (aged 2 days–70 years) suffering from different infections who were admitted to four health centers in Al-Hilla city, Iraq. These patients were admitted to different hospital wards, in addition to swabs taken from private clinics during a period extending from November 2012 to the end of May 2013.

Swabs of different samples 690 were generally collected from different sites (wound, burn, blood culture, subaxillary, urine, stool, sputum, throat, ear, skin lesion, high vaginal, and other different swabs). Each sample was immediately inoculated on the blood agar plates and mannitol salt agar. The swab has been inoculated on culture media and incubated aerobically for 24 hours at 37°C. Information about age, antibiotic usage, residence, and hospitalization of patients was taken into consideration.

2.2. Bacterial Isolates

Staphylococcus lugdunensis isolates were recovered and identified based on their morphology, Gram-staining, catalase test, coagulase test, and ornithine decarboxylation test [11]. Identification was confirmed using two specific genes (tanA and fbl genes) by PCR assay [12].

2.3. Screening of β-Lactam Resistant Isolates

Fifteen S. lugdunensis isolated were subjected to β-lactam resistance screening test as a phenotypic selection test. Preliminary screening of S. lugdunensis isolates resistance to β-lactam antibiotics was carried out by using pick and patch method on Muller-Hinton agar plates supplemented with ampicillin. All of 15 S. lugdunensis isolates were subjected to oxacillin resistance screening test by using the same method on Muller-Hinton agar plates supplemented with 4% NaCl and oxacillin 6 μg/mL [13].

2.4. Antimicrobial Susceptibility Testing

The antimicrobial susceptibility patterns of isolates to different antibiotics were determined using disk diffusion test and interpreted according to CLSI guidelines [13]. The following antibiotics were obtained (from Oxoid, UK, and Himedia, India) as standard reference disks as known potency for laboratory use: ampicillin (10 μg), oxacillin (5 μg), cloxacillin (5 μg), cefoxitin (30 μg), amoxicillin-clavulanate (20/10 μg), cefexime (30 μg), ceftriaxone (30 μg), imipenem (10 μg), azithromycin (15 μg), and doxycycline (30 μg). The susceptibility to ampicillin, oxacillin, and vancomycin was also determined using twofold agar dilution method [14].

2.5. Detection of β-Lactamase Production

Nitrocefin diagnostic disk (Fluka, Switzerland) was used to detect the ability of 15 isolates to produce β-lactamase. A number of required nitrocefin disks were placed into sterile empty Petri dish and moistened with one drop of sterile D.W.; then the disk was holed by sterile forceps and wiped across a young colony on agar plate. The development of a red color in the area of the disk where the culture was applied indicated a positive result.

2.6. Detection of tanA, fbl, and mecA Genes

Three genes were detected in present study, first tanA gene that coded to tannase acyl hydrolase enzyme that degrades tannin. The second gene was fbl gene that coded to fibrinogen binding protein. The third gene that was detected in the present study was mecA that was responsible for oxacillin/methicillin resistance by coding for penicillin binding protein (PBP2a); the primer sequence of these genes were (tanA F: AGCATGGGCAATAACAGCAGTAA, tanA R: GCTGCGCCAATTTGTTCTAAATAT) 239 bp; the conditions were 95°C 3 min 1x, 94°C 20 sec, 60°C 20 sec 25x, 72°C, 20 sec, and 72°C 5 min 1x [12].

For (fbl F: GTAAATAGCGAGGCACAAGC, fbl R: GGTAAATCGTATCTGCCGCT) 425 bp, the conditions were 94°C 3 min 1x, 94°C 1 min, 60°C 1 min 30x, 72°C 1 min, and 72°C 5 min 1x [15]. For (mecA F: TCCAGGAATGCAGAAAGACCAAAGC, mecA R: GACACGATAGCCATCTTCATGTTGG) 499 bp, the conditions were 94°C 3 min 1x, 94°C 1.5 min, 55°C 1 min 36x, 72°C 1 min, and with final step 72°C 10 min 1x [16].

2.7. Bacteriological Analysis and Antibiotic Susceptibility of “S. pseudolugdunensis” Isolates

“Staphylococcus pseudolugdunensis” isolates recovered in this study were identified using the same methods as in S. lugdunensis. According to [17], any isolate that diagnosed phenotypically as S. lugdunensis but it was negative to tanA and fbl genes was rediagnosed as “S. pseudolugdunensis.” The antibiogram, β-lactamase production, and presence of mecA gene for these isolates were also determined as above.

3. Results and Discussion

3.1. Isolation and Identification of S. lugdunensis Isolates

A total of 690 clinical samples were collected; 602 (87.24%) gave positive growth on blood agar medium, while 88 (12.76%) gave no growth. Out of 393 Gram-positive bacteria, 306 (77.8%) were identified as staphylococci based on morphological characteristics and biochemical tests. According to result of coagulase test, the 306 staphylococci isolates were divided into coagulase positive 128 (41.8%) and coagulase negative 178 (58.2%) (Table 1).

Table 1: Numbers, sources, and percentages of coagulase negative staphylococci isolates.

Source
Number (%)
CoNS No. (%)

Wound swabs
105 (17.4)
42 (23.56)

Ear swabs
28 (4.6)
6 (3.37)

Urine swabs
50 (8.3)
11 (6.17)

Skin lesion swabs
25 (4.1)
10 ( 5.6)

Throat swabs
32 (5.3)
11 (6.17)

Burn swabs
80 (13.2)
15 (8.4)

Blood culture
69 (11.4)
13 (7.3)

Sputum
36 (5.9)
4 (2.24)

Sub axillary swabs*
64 (10.6)
52 (29.2)

HVS**
23 (8.3)
2 (1.12)

Stool swabs
38 (6.3)
2 (1.12)

Other
52 (8.6)
10 ( 5.6)

Total
602 (100)
178 (100)

These samples were taken from immature patients in neonate intensive care unit.

High vaginal swabs.

Result of present study was similar to that of Bouza and his colleagues [18], who found that bacterial isolates from clinical samples included 70.7% Gram-positive, 22.2% of Gram-negative, and 7.2% of yeast; they also found that S. aureus and CoNS constituted 40% and 60%, respectively. In a local study in Iraq, Al-Fuadi [19] found that total of 148 bacterial isolates represented by different Gram-positive and Gram-negative bacteria in percentage of 77% and 23% respectively. He also found that a total of 31 of 100 Staphylococcus isolates belonged to S. aureus. This difference may have belonged to variation of samples collected in this study.

Results also showed that the highest percentages of CoNS in subaxillary swabs and wound swabs were 29.2% and 23.5%, respectively. The prevalence of S. lugdunensis was 22 (12.3%), which is higher than results of several researchers. This may be due to the fact that depending on phenotypic characteristics alone is insufficient and may result in misidentification of S. lugdunensis. So, the present study depended (in addition to phenotypic characteristics) on the genotypic characteristics (PCR) to confirm the result. Depending on PCR results, out of 22 of CoNS that were identified phenotypically as S. lugdunensis isolates, 15 (8%) were identified as S. lugdunensis, while the other seven isolates were belonged to “S. pseudolugdunensis.”

Clinical isolates were as follows: subauxiliary swab (4), skin swabs (2), wound (3), burn (1), blood (1), throat swab (2), ear swab (1), and peritonitis (1), while no S. lugdunensis isolates were recovered from urine, sputum swabs, stool swabs, and high vaginal swabs. Skin swabs represented folliculitis, boils, and abscesses. Koksal and his colleagues [20] found that it constituted 9% of CoNS isolates from blood culture, while other researchers found that S. lugdunensis constituted only 3.3% of CoNS collected from different samples [21].

Results revealed that the seven “S. pseudolugdunensis” isolates were recovered from clinical samples of skin (1), urine (1), burn swabs (2), subauxiliary swabs (2), and acne (1).

3.2. Molecular Characterization of S. lugdunensis Isolates

Definite phenotypic identification of a Gram-positive, catalase-positive coccus as S. lugdunensis implies a negative tube coagulase test and positive ornithine decarboxylase activities [22]. However, complete hemolytic, yellow pigmentation, and detection of a fibrinogen affinity factor, although not consistently expressed by S. lugdunensis, may leadto its misidentification as S. aureus [1]. S. lugdunensis is an unusually virulent coagulase-negative species, associated with severe infection. So, using single-step, species-specific PCR protocol for S. lugdunensis identification is very important [15].

3.2.1. Detection of tanA Gene

The specific tanA gene for S. lugdunensis was detected in 15 (68.1%) of 22 isolates that were identified phenotypically. These 15 isolates were identified as S. lugdunensis (Figure 1). The remaining 7 isolates (31.9%) were reidentified as “S. pseudolugdunensis” [17]. Result also found that S. aureus and S. epidermidis that were used as negative control had no tanA gene which confirms the result of Noguchi and his coworkers [12] who found that no gene or protein homologous to tanA were found in a similarity search using published databases such as Gen Bank. These results strongly suggest that tanA is specific to S. lugdunensis.

(a)

(b)

Figure 1: Gel electrophoresis of PCR of tanA amplicon (239 bp) product: Lane L: ladder (1000-bp ladder); Lanes S1, 2, 3, 4, 5, 6, 7, 8, 9, 10, 11, 12, 13, and 14: number of S. lugdunensis isolates from different clinical samples.

3.2.2. Detection of fbl Gene of S. lugdunensis Isolates

A suitable nucleic acid target to diagnosed S. lugdunensis is fbl gene, which encods a fibrinogen-binding adhesin [15]. The gene was detected in all 15 S. lugdunensis isolates that were positive to tanA in this study (Figure 2), while no amplification product was obtained from S. aureus and S. epidermidis isolates that were used as negative control as in Figure 3.

Figure 2: Gel electrophoresis of PCR of fbl amplicon (425 bp) product: Lane L: ladder (1000-bp ladder); Lanes S1, 2, 3, 4, 5, 6, and 7: number of S. lugdunensis isolates from different clinical samples.

Figure 3: Gel electrophoresis of PCR of fbl amplicon (425 bp) product: Lane L: ladder (1000-bp ladder); Lanes S1, and 15: number of S. lugdunensis isolates. C1: S. aureus, C2: S. epidermidis.

According to results of PCR results, among 22 S. lugdunensis that diagnosed phenotypically, 15 isolates were found to be positive to tanA and fbl genes that were specific to S. lugdunensis [4], so other isolates (number = 7) were diagnosed as “S. pseudolugdunensis” [17].

3.3. Primary Screening of β-Lactam Resistant Isolates

The results of screening test showed that 11 isolates (73.3%) of S. lugdunensis were resistant to ampicillin. All these isolates were able to grow normally in the presence of ampicillin; this may be attributed to most of S. lugdunensis isolates (about 90% of them) that are coming from several infectious sources (nosocomial infections and other anatomical sites) that are resistant to penicillin [23] due to production of β-lactamases that acts in the hydrolysis of β-lactam ring of penicillin which is transformed into acid neutralizing its bactericidal effect [23].

The results of oxacillin resistant screening test showed that 7 of the 11 (63.6%) β-lactam resistant S. lugdunensis isolates were oxacillin resistant. This result was in concordance with study of Mateo and her coworkers [24] who referred to identifying methicillin resistance using the Vitek 2 system and the Wider system, and they found that 47.1% of strains were considered resistant to methicillin.

3.4. Susceptibility to β-Lactam Antibiotics

The results revealed that 11 of 15 S. lugdunensis isolates showed high resistance (73.3%) to ampicillin (Figure 4). Results also showed that the resistance rate to oxacillin and cloxacillin was 46.6%. Methicillin replaces methicillin as oxacillin which is stable under storage conditions, and methicillin actually is an excellent inducer of the mecA gene. Ezekiel and Adebayo [25] isolated three strains of S. lugdunensis of 149 CoNS; all isolates were resistant to oxacillin and other β-lactam antibiotics. Tan and his colleagues [22] in Singapore found that resistance to oxacillin was detected in 5% of the isolates.

Figure 4: Percentages of antibiotic resistance among Staphylococcus lugdunensis isolates. Amp: ampicillin; Clx: cloxacillin; Oxn: oxacillin; Cfx: cefoxitin; Cft: ceftriaxone; Cfz-Clv: ceftazidime clavulunate; Cfm: cefixime; Ipm: imipenem; Amv: amoxiclav; Azn: azithromycin; Akn: amikacin; Cln: clindamycin; Rfn: rifampicin; Dox: doxycycline; Vcn: vancomycin; TMP-SMZ: trimethoprim/sulfamethoxazole.

Results of cefoxitin (2nd generation), ceftriaxone, and cefexime (3rd generation) showed that the percentages of S. lugdunensis resistant isolates were substantial to these antibiotics: 46.6%, 53.3%, and 40%, respectively (Figure 4). These results can be explained by the fact that all staphylococcal strains produce β-lactamase which destroys the β-lactam ring resulting in inactive products [26]. Tan and his colleagues [22] found that resistance to cefoxitin was detected in 5% of isolates.

The resistance rates to amoxiclav and ceftazidime-clavulanic acid were 60% and 53.3%, respectively. Clavulanic acid can inhibit the action of β-lactamase enzyme that causes decrease in the resistance of bacteria to β-lactam antibiotics [27]. Results found that S. lugdunensis isolates were susceptible to imipenem (80%). Imipenem inhibits bacterial cell wall synthesis by binding to and inactivating PBPs [28].

3.5. Susceptibility to Non-β-Lactam Antibiotics

Result of this study regarding susceptibility to amikacin found that the isolates showed low level of resistance (46.6%) to this antibiotic. The resistance rate of azithromycin was 53% (Figure 4). This resistance may be attributed to the efflux mechanism in staphylococci which is mediated by MsrA, a protein that induced by clarithromycin, azithromycin, and telithromycin and encoded by msrA gene [29]. Result of this study regarding susceptibility to clindamycin found that the isolates showed low level of resistance (46.6%) to this antibiotic. Hellbacher et al. [30] found 10% of S. lugdunensis isolates were resistant to clindamycin. Staphylococcus lugdunensis isolates results showed (73%) resistance to doxycycline. Tan and his colleagues [22] in Singapore found that resistance to tetracycline was 12% of isolates. The percentage of resistance for both trimethoprim-sulfamethoxazole and rifampin was 66%. Rifampin resistance in Escherichia coli and S. aureus is due to alterations in the target leading to a reduced affinity of the enzyme for the antibiotic [31].

3.6. Results of Antibiotic Resistance by MIC

In this study, 11 of 15 (73.3%) S. lugdunensis isolates were resistant to ampicillin (≥128 μg/mL), while 4 of 15 were having MIC values reached 2 μg/mL. The MIC values of S. lugdunensis isolates against oxacillin revealed that 5 of 15 isolates reached 32 μg/mL, while MIC value of 2 isolates was ≥ 64 μg/mL. Six oxacillin resistant isolates (S1, S2, S3, S4, S5, and S6) had mecA gene, but one isolate (S7) did not have such gene. Out of 15 S. lugdunensis isolates (detected by MIC method), 14 isolates (93.2%) were sensitive to vancomycin, while only one isolate (6.8%) showed reduced susceptibility to vancomycin 8 μg/mL (intermediate resistant). Bourgeois and his coworkers [31] found that 6/13 S. lugdunensis isolates were tolerant to vancomycin. No isolates showed any degree of resistance to vancomycin as in many data. The vanA genes that are responsible for resistance (van genes) are inducible and transferable and confer high-level resistance to vancomycin [32].

3.7. β-Lactamase Production

Eight isolates (53.3%) were β-lactamase producer. All these isolates were ampicillin resistant; seven of eight β-lactamase producing isolates were oxacillin resistant, while the remaining one was oxacillin sensitive. Six of eight were having mecA gene (Table 2).

Table 2: Relationship between ampicillin, oxacillin resistance with presence of mecA gene, and β-lactamase production in Staphylococcus lugdunensis isolates.

Isolate number
Ampicillin resistant
Oxacillin resistant
mecA
β-Lactamase production

S1
+
+
+
+

S2
+
+
+
+

S3
+
+
+
+

S4
+
+
+
+

S5
+
+
+
+

S6
+
+
+
+

S7
+
+
−
+

S8
+
−
−
−

S9
+
−
−
−

S10
+
−
−
−

S11
+
−
−
+

S12
−
−
−
−

S13
−
−
−
−

S14
−
−
−
−

S15
−
−
−
−

Mateo and her coworkers [24] found that 11.8% of S. lugdunensis were β-lactamase producers. Several authors reported that the percentages of β-lactamase-positive S. lugdunensis vary from 24 to 40% in US isolates collections [33]. Papapetropoulos and his colleagues [34] isolated 14 S. lugdunensis strains from clinical specimens (abscesses and wounds) of 250 bed-hospital in Athens, Greece; 5 (30.2%) of S. lugdunensis were β-lactamase positive. The difference between this study and other studies may be due to the fact that the global using of β-lactam antibiotics in Iraq may result in induction of bacterial resistance to β-lactams via production of β-lactamases [35].

3.8. Detection of mecA Gene in MRSL Isolates

In this study mecA gene was detected in 6 (40%) of 15 S. lugdunensis (Figure 5). All of these 6 isolates (S1, S2, S3, S4, S5, and S6) were resistant to oxacillin (Table 2). One isolate (S7) was resistant to oxacillin, but mecA was not detected in this isolates.

(a)

(b)

Figure 5: Gel electrophoresis of PCR of mecA amplicon (499 bp) product: Lane L: ladder (1000-bp ladder); Lanes S1, 2, 3, 4, 5, and 6: mecA positive; Lanes S7, 8, 9, 10, 11, 12, 13, and 14: mecA negative samples.

Staphylococcus lugdunensis is generally considered to be susceptible to oxacillin. Several studies reported negative PCR results when screening for mecA, but among reports in the English literature mecA has been detected in two S. lugdunensis isolates [8, 36]. Tee and his colleagues [8] reported a case of MRSL causing bloodstream infection in a neonate with an oxacillin MIC > 256 mg/L having mecA gene. In 2008, Tan and his colleagues [22] found five (4.7%) S. lugdunensis strains carrying the mecA gene in a collection of 106 clinical isolates.

3.9. Antibiotic Susceptibility and Detection of mecA Gene in “S. pseudolugdunensis” Isolates

The antibiotic susceptibility profile of “S. pseudolugdunensis” isolates (number = 7) is shown in Table 3. In addition to the results discussed earlier, this study represents the first record of characterization of oxacillin resistant and mecA positive “S. pseudolugdunensis” isolates recovered from clinical specimens in Iraqi hospitals (Table 4).

Table 3: Antibiotic susceptibility profile of “S. pseudolugdunensis” isolates.

Isolate number

Ceftazidime-clavulanate
Ceftriaxone
Azithromycin

Imipenem
Doxycycline
amikacin
Cefixim
Amoxiclav
Vancomycin
Clindamycin
Rifampicin
TMP-SMZ

SP1
S
S
S
S
R
R
R
S
S
R
S
R

SP2
S
S
S
S
R
S
R
S
S
S
S
S

SP3
R
R
R
S
R
R
R
S
S
R
R
R

SP4
S
S
S
S
R
S
S
R
S
S
S
R

SP5
R
R
S
R
R
S
S
S
S
S
S
R

SP6
S
R
S
S
S
S
R
S
S
R
S
S

SP7
S
S
S
S
S
R
R
R
S
S
S
S

Table 4: Relationship between oxacillin resistance with presence of mecA gene and β-lactamase production in “S. pseudolugdunensis” isolates.

Isolate number
Resistance to
β-Lactamase production
mecA gene

Ampicillin
Oxacillin 4 g/ml
Oxacillin 6 g/ml
Cefoxitin

SP1
+
+
+
−
+
−

SP2
+
+
+
+
+
+

SP3
+
+
+
+
+
+

SP4
+
+
+
+
+
+

SP5
+
+
−
−
−
−

SP6
+
+
+
+
+
+

SP7
+
−
−
−
−
−

4. Conclusion

The highest percentages of S. lugdunensis isolates were recovered from subaxillary, wound swabs, and skin swabs samples, so this study reinforces the propensity of S. lugdunensis to be associated with acute cutaneous infections. Although many other reports stated that mecA gene presents low percentages in S. lugdunensis; however, the present study found high rate of mecA in these bacteria.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

References

K. L Frank, J. L. del Pozo, and R. Patel, “From clinical microbiology to infection pathogenesis: how daring to be different works for Staphylococcus lugdunensis,” Clinical Microbiology Review, vol. 21, no. 1, pp. 111–133, 2008.

J. Freney, Y. Brun, M. Bes, et al., “Staphylococcus lugdunensis sp. nov. and Staphylococcus schleiferi sp. nov. , two species from human clinical specimens,” International Journal of Systematic Bacteriology, vol. 38, no. 2, pp. 168–172, 1988.

R. M. Jones, M. A. Jackson, C. Ong, and G. K. Lofland, “Endocarditis caused by Staphylococcus lugdunensis,” Pediatric Infectious Disease Journal, vol. 21, no. 3, pp. 265–268, 2002.

N. Kaabia, D. Scauarda, G. Lena, et al., “Molecular identification of Staphylococcus lugdunensis in a patient with meningitis,” Journal of Clinical Microbiology, vol. 40, no. 5, pp. 1824–1825, 2002.

A. Zinkernagel, M. Zinkernagel, M. Elzi, et al., “Significance of Staphylococcus lugdunensis: report of 28 cases and review of the literature,” Infection, vol. 36, no. 4, pp. 314–321, 2008.

N. Noguchi, O. Takashi, and S. Taisei, “Association of tannase-producing Staphylococcus lugdunensis with colon cancer and characterization of a novel tannase gene,” Journal of Gastroenterology, vol. 42, no. 5, pp. 346–351, 2007.

S. Fujita, Y. Senda, T. Iwagami, et al., “Rapid identification of staphylococcal strains from positive-testing blood culture bottles by internal transcribed spacer PCR followed by microchip gel electrophoresis,” Journal of Clinical Microbiology, vol. 43, no. 3, pp. 1149–1157, 2005.

W. S. Tee, S. Y. Soh, and R. Lin, “Staphylococcus lugdunensis carrying the mecA gene causes catheter-associated blood stream infection in premature neonate,” Journal of Clinical Microbiology, vol. 41, no. 1, pp. 519–520, 2003.

J. Mitchell, A. Tristan, and T. J. Foster, “Characterization of the fibrinogen binding surface protein Fbl of Staphylococcus lugdunensis,” Microbiology, vol. 150, no. 11, pp. 3831–3841, 2004.

I. Anguera, A. Del Rio, J. M. Miro, et al., “Staphylococcus lugdunensis infective endocarditis: description of 10 cases and analysis of native valve, prosthetic valve, and pacemaker lead endocarditis clinical profiles,” Heart, vol. 91, no. 2, pp. 1–10, 2005.

B. A. Forbes, F. S. Daniel, and S. W. Alice, Bailey and Scott Diagnostic Microbiology, Mosby, Elsevier, St. Louis, Mo, USA, 12th edition, 2007.

N. Noguchi, G. Keiko, R. Tokihiro, et al., “Using the tannase gene to rapidly and simply identify Staphylococcus lugdunensis,” Diagnostic Microbiology and Infectious Disease, vol. 66, no. 1, pp. 120–123, 2010.

Clinical and Laboratory Standards Institute, “Performance standards for Antimicrobial susceptibility testing; twenty-second informational supplement,” Approved Standard M100-S20, CLSI, Wayne, Pa, USA, 2012.

National Committee for Clinical Laboratory Standards, Methods for Dilution Antimicrobial Susceptibility Tests for Bacteria that Grow Aerobically, Approved standard M7-A6, NCCLS, Wayne, Pa, USA, 6th edition, 2003.

M. P. Eliezer, L. O. Fred, P. S. Ricardo, et al., “Detection of Staphylococcus lugdunensis by a new species-species PCR based on the fbl gene,” FEMS Immunology and Medical Microbiology, vol. 58, no. 2, pp. 295–298, 2009.

J. M. William, J. S. Blevins, K. Beenken, et al., “Multiplex PCR protocol for the diagnosis of Staphylococcal infection,” Journal of Clinical Microbiology, vol. 39, no. 9, pp. 3332–3338, 2001.

T. Yi-Wei, H. Jian, A. Melinda, et al., “Staphylococcus pseudolugdunensis sp. nov., a pyrrolidonyl arylamidase/ornithine decarboxylase-positive bacterium isolated from blood cultures,” Diagnostic Microbiology and Infectious Diseases, vol. 60, no. 4, pp. 351–359, 2008.

E. Bouza, O. Cuevas, and E. Cercenado, “Evolution of the antimicrobial resistance of Staphylococcus spp. in Spain: five nationwide prevalence studies, 1986 to 2002,” Journal of Antimicrobial Agents and Chemotherapy, vol. 48, no. 11, pp. 4240–4245, 2004.

A. H. Al-Fuadi, Phenotypic and genotypic (mec A gene) of methicillin resistant Staphylococcus aureus (MRSA) isolates in Dewaniya City, College of medicine, Babylon University, 2010.

F. Koksal, H. Yasar, and M. Samasti, “Antibiotic resistance patterns of coagulase-negative staphylococcus strains isolated from blood cultures of septicemic patients in Turkey,” Microbiology Research, vol. 164, no. 4, pp. 404–410, 2009.

E. Carretto, V. Emmi, D. Barbarini, et al., “Extended-spectrum beta-lactamase-producing Enterobacteriaceae in an Italian intensive care unit: clinical and therapeutical remarks,” Journal of Chemotherapy, vol. 16, no. 2, pp. 145–150, 2004.

T. Y. Tan, S. Y. Ng, and J. He, “Microbiological characteristics, presumptive identification and antibiotic susceptibilities of Staphylococcus lugdunensis,” Journal of Clinical Microbiology, vol. 46, no. 7, pp. 2393–2395, 2008.

M. C. Booth, L. M. Pence, P. Mahasreshti, et al., “Clonal associations among Staphylococcus aureus isolates from various sites of infection,” Infection and Immunity, vol. 69, no. 1, pp. 345–352, 2001.

M. Mateo, M. Juan-Ramón, A. Lorenzo, et al., “Genotypic versus phenotypic characterization, with respect to susceptibility and identification, of 17 clinical isolates of Staphylococcus lugdunensis,” Journal of Antimicrobial Chemotherapy, vol. 56, no. 2, pp. 287–291, 2005.

O. A. Ezekiel and L. Adebayo, “Species distribution and antibiotic resistance in coagulase-negative staphylococci colonizing the gastrointestinal tract of children in Ile-Ife, Nigeria,” Journal of Pharmaceutical Research, vol. 9, no. 1, pp. 35–43, 2010.

A. S. Prince, “Staphylococcal infections,” in Krugman's Infectious Diseases of Children, S. L. Kats, A. A. Gershon, and P. J. Hoyez, Eds., Mosby, Harcourt Sciences, 10th edition, 1998.

A. Aggarwal, S. Kanna, and U. Arova, “Characterization biotyping antibiogram and klebocin typing of Klebsiella,” Indian Journal of Medicine, vol. 57, no. 2, pp. 68–70, 2003.

E. Goldman and H. G. Lorrence, Practical Handbook of Microbiology, Taylor and Francis Group, 2nd edition, 2009.

L. Katz and G. W. Ashley, “Translation and protein synthesis: macrolides,” Chemical Reviews, vol. 105, no. 2, pp. 499–527, 2004.

C. Hellbacher, E. Tornqvist, and B. Soderquist, “Staphylococcus lugdunensis: clinical spectrum, antibiotic susceptibility, and phenotypic and genotypic patterns of 39 isolates,” Clinical Microbiology and Infection, vol. 12, no. 1, pp. 43–49, 2006.

I. Bourgeois, M. Pestel-Caron, J.-F. Lemeland, J.-L. Pons, and F. Caron, “Tolerance to the glycopeptides vancomycin and teicoplanin in coagulase-negative staphylococci,” Antimicrobial Agents and Chemotherapy, vol. 51, no. 2, pp. 740–743, 2007.

S. Evers and P. Courvalin, “Regulation of VanB-type vancomycin resistance gene expression by the VanSB-VanRB two-component regulatory system in Enterococcus faecalis V583,” Journal of Bacteriology, vol. 178, no. 5, pp. 1302–1309, 1996.

T. E. Herchline and L. W. Ayers, “Occurrence of Staphylococcus lugdunensis in consecutive clinical cultures and relationship of isolation to infection,” Journal of Clinical Microbiology, vol. 29, no. 3, pp. 419–421, 1991.

N. Papapetropoulos, M. Papapetropoulou, and A. Vantarakis, “Abscesses and wound infections due to Staphylococcus lugdunensis: report of 16 cases,” Infection, vol. 41, no. 2, pp. 525–528, 2013.

A. H. Al-Charrakh, S. Y. Yousif, and H. S. Al-Janabi, “"Occurrence and detection of extended-spectrum β-lactamases in Klebsiella isolates in Hilla , Iraq,” African Journal of Biotechnology, vol. 10, no. 4, pp. 657–665, 2011.

K. Becker, I. Pagnier, B. Schuhen, et al., “Does nasal cocolonization by methicillin-resistant coagulase-negative staphylococci and methicillin-susceptible Staphylococcus aureus strains occur frequently enough to represent a risk of false-positive methicillin-resistant S. aureus determinations by molecular methods,” Journal of Clinical Microbiology, vol. 44, no. 1, pp. 229–231, 2006.