BioMed Research International
Volume 2016 (2016), Article ID 2420568, 7 pages
http://dx.doi.org/10.1155/2016/2420568

Research Article

The Effect of the Duration of Basic Life Support Training on the Learners’ Cardiopulmonary and Automated External Defibrillator Skills

Jin Hyuck Lee,¹ Youngsuk Cho,¹ Ku Hyun Kang,¹ Gyu Chong Cho,¹ Keun Jeong Song,² and Chang Hee Lee³

¹Department of Emergency Medicine, Hallym University School of Medicine, Seoul 24252, Republic of Korea
²Department of Emergency Medicine, Samsung Medical Center, Sungkyunkwan University School of Medicine, Seoul 06351, Republic of Korea
³Department of Emergency Medical Service, Namseoul University, Cheonan, Chungnam 331-707, Republic of Korea

Received 27 April 2016; Revised 17 June 2016; Accepted 23 June 2016

Academic Editor: Yan-Ren Lin

Copyright © 2016 Jin Hyuck Lee et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Background. Basic life support (BLS) training with hands-on practice can improve performance during simulated cardiac arrest, although the optimal duration for BLS training is unknown. This study aimed to assess the effectiveness of various BLS training durations for acquiring cardiopulmonary resuscitation (CPR) and automated external defibrillator (AED) skills. Methods. We randomised 485 South Korean nonmedical college students into four levels of BLS training: level 1 (40 min), level 2 (80 min), level 3 (120 min), and level 4 (180 min). Before and after each level, the participants completed questionnaires regarding their willingness to perform CPR and use AEDs, and their psychomotor skills for CPR and AED use were assessed using a manikin with Skill-Reporter™ software. Results. There were no significant differences between levels 1 and 2, although levels 3 and 4 exhibited significant differences in the proportion of overall adequate chest compressions () and average chest compression depth (). All levels exhibited a greater posttest willingness to perform CPR and use AEDs (all, ). Conclusions. Brief BLS training provided a moderate level of skill for performing CPR and using AEDs. However, high-quality skills for CPR required longer and hands-on training, particularly hands-on training with AEDs.

1. Introduction

Bystander-initiated cardiopulmonary resuscitation (CPR) is critical to ensuring successful resuscitation in cases of out-of-hospital cardiac arrest [1]. Thus, layperson CPR training was initiated during the late 1970s by the American Heart Association, and many studies have highlighted that CPR education enhances the rates of bystander CPR [2, 3]. However, the bystander CPR rate remains relatively low and is a major obstacle to improving the survival rate for cases of out-of-hospital cardiac arrest [4, 5]. Several studies have indicated that a lack of CPR knowledge, anxiety regarding an adverse CPR outcome, and reluctance to perform mouth-to-mouth breathing all contribute to the low bystander CPR rate [6, 7]. Therefore, many efforts have been made to develop programs that provide basic life support (BLS) training. Recent studies have demonstrated the relative effectiveness of interactive computer- and video-based synchronous practice instruction, compared to conventional instructor-led courses [8, 9]. Furthermore, hands-only CPR is recommended for bystanders who are unwilling or unable to perform conventional CPR with mouth-to-mouth breathing [10]. Despite the effectiveness of BLS training for improving learners’ performance during simulated cardiac arrest, there are few studies regarding the optimal duration of BLS training [11]. Thus, the present study aimed to compare the effectiveness of various durations of BLS training, based on the acquisition of CPR- and automated external defibrillator- (AED-) related skills, and the willingness and confidence of bystanders to perform CPR and apply an AED.

2. Materials and Methods

2.1. Study Design and Subjects

This study was funded by the Korean Centers for Disease Control & Prevention and approved by the institutional review board of Kangdong Sacred Heart Hospital. All participants were nonmedical college students who volunteered and provided their written informed consent. The participants received free BLS training between March 2015 and August 2015, as well as souvenirs that were worth approximately 10 American dollars.

During 2012, the Korean Centers for Disease Control & Prevention and the Korean Association of Cardiopulmonary Resuscitation (KACPR) developed four levels of BLS training for laypersons. For the present study, we randomly assigned participants to one of these four levels of BLS training: level 1 (hands-only CPR, 40 min), level 2 (hands-only CPR, 80 min), level 3 (conventional CPR, 120 min), and level 4 (conventional CPR, 180 min). Each course was administered to 35 participants, and a total of 16 courses (4 courses for each level) were provided during this study. Twenty-five instructors led these courses, and all instructors were doctors, nurses, or emergency medical technicians who were registered and certified as BLS instructors by the KACPR. All instructors were educated regarding the study’s protocol. All BLS training courses were administered under instructor supervision, and training was provided using manikins and an AED-trainer; mouth-to-mouth breathing was performed using a face shield. All participants completed a questionnaire survey before and after each level of BLS training. At the end of each level, their CPR skills were also tested over 2 min using the Resusci Anne® manikin with Skill-Reporter software, and their AED-related skills were evaluated using a checklist. AED performance check list was authorized by KACPR. These tests were all supervised and conducted by certified BLS instructor.

2.2. BLS Course Format

The student-to-instructor ratio was 6 : 1, with at least one manikin and one AED for each group of two students. Each course was administered by first watching a video with the lead instructor and then practical training with a manikin (Little Anne®, Laerdal, Norway) and AED (AED Trainer2®, Laerdal, Norway). The specific contents of each program level are shown below and in Table 1:

(i)Level 1 (hands-only CPR, 40 min): introducing the participants to the course, showing a case of cardiac arrest, recognizing cardiac arrest and asking for help, teaching chest compressions, hands-on practice for hands-only CPR, introducing an AED and how to use it, introducing mouth-to-mouth breathing, and a course summary.(ii) Level 2 (hands-only CPR, 80 min): all level 1 contents, as well as hands-on practice with an AED and hands-on practice of hands-only CPR with an AED.(iii) Level 3 (conventional CPR, 120 min): all level 2 contents, as well as hands-on practice of mouth-to-mouth breathing, hands-on practice of conventional CPR, and hands-on practice of conventional CPR with an AED.(iv) Level 4 (conventional CPR, 180 min): all level 3 contents, as well as a BLS skill test using an AED, and providing feedback regarding CPR and AED skills.

Table 1: Comparing hands-on practice time for basic life support training courses according to program level.

Hands-on practice
Program level

1
2
3
4

Chest compression
10 min
15 min
10 min
10 min

AED
None
15 min
15 min
15 min

Hands-only CPR with AED
None
15 min
None
None

Mouth-to-mouth breathing
None
None
10 min
10 min

Conventional CPR
None
None
25 min
25 min

Conventional CPR with AED
None
None
10 min
10 min

Skill test for CPR and AED
None
None
None
30 min 

Total hands-on practice time
10 min
45 min
70 min
100 min

Total course time
40 min
80 min
120 min
180 min

The manikin-and-AED-to-student ratio was 2 : 1.

Only introduction was provided by video and the lead instructor.

AED: automated external defibrillator; CPR: cardiopulmonary resuscitation.

2.3. Questionnaire

We modified a questionnaire from a previous study, which contained three parts: (a) the participant’s demographics (age and sex) and experience with BLS training, (b) self-assessed confidence to perform bystander CPR and apply an AED, and (c) willingness to perform bystander CPR [6]. The self-assessed confidence to perform bystander CPR and apply an AED was evaluated using a visual analogue scale, with a score of 0 indicating “completely unable to perform CPR or use an AED” and a score of 100 indicating being “able to confidently perform CPR or use an AED.” The participants rated their willingness to perform CPR and use an AED using a 5-point Likert-type scale, with the scores categorized as “definitely no” (score 1), “no” (score 2), “not sure” (score 3), “probably yes” (score 4), and “definitely yes” (score 5).

2.4. Statistical Analysis

All statistical analyses were performed using SPSS software (version 19.0; SPSS Inc., Chicago, IL). Categorical variables were reported as number and percentage, and continuous variables were reported as mean and standard deviation (normal distribution) or median and interquartile range (IQR; nonnormal distribution). The willingness to perform CPR and use an AED before and after each level of the BLS training program was compared using the McNemar test, and confidence to perform CPR and use an AED was compared using the Wilcoxon signed rank test. Analysis of CPR quality among the four levels was performed using the chi-square test for categorical variables and using one-way analysis of variance (normal distribution) or the Kruskal-Wallis method (nonnormal distribution) for continuous variables. Post hoc paired comparisons between the levels were performed using the Mann-Whitney test with Bonferroni corrections. All tests were two-tailed, and differences with a value of <0.05 were considered statistically significant.

3. Results

3.1. Demographic Characteristics

A total of 502 participants signed up for and completed the BLS training. However, we excluded 10 participants who submitted incomplete questionnaires and 7 participants who had an error during the CPR quality check using the skill reporter. Therefore, 485 participants were included in the analyses. There was a significant, albeit small, difference when we compared the participants’ ages for the various levels (21 years for levels 1-2 and 20 years for levels 3-4). However, there were no significant differences in the participants’ sex, height, weight, body mass index, and prior BLS training. Among the 485 participants, 309 (63.7%) participants did not have prior BLS training experience (Table 2).

Table 2: The characteristics of the 485 participants.

Characteristics
Program level
value

1 ()
2 ()
3 ()
4 ()

Age (y/o)
21.0
(19.0–22.0)
21.0
(19.0–22.0)
20.0
(19.0–21.0)
20.0
(19.0–22.0)
0.003

Sex (male)
55 (45.5%)
49 (41.2%)
52 (41.9%)
46 (38.0%)
0.707

Height (cm)
168.0
(162.5–175.0)
168.0
(162.0–174.0)
169.0
(163.0–174.8)
168.0
(163.0–175.0)
0.764

Weight (kg)
59.0
(53.0–70.0)
56.0
(51.0–68.0)
57.0
(52.0–66.8)
57.0
(51.0–68.0)
0.616

Body mass index (kg/m²)
20.8
(19.6–23.2)
20.4
(19.2–22.2)
20.2
(19.2–22.1)
20.5
(19.3–22.1)
0.205

Prior BLS training (yes)
48 (39.7%)
34 (28.6%)
46 (37.1%)
48 (39.7%)
0.231

All values were calculated using the Kruskal-Wallis method and expressed as median (interquartile range).

Chi-square test (, %).

BLS: basic life support.

3.2. Analysis of CPR Quality according to Experience and Program Level

We analysed the CPR quality results among all participants and the novice participants. Among all participants, level 4 group had better CPR quality results (average compression depth and proportion of overall adequate compressions), compared to levels 1–3. There was no significant difference in the average compression rate, depth, and proportion of overall adequate compressions when we compared levels 1 and 2. However, the average compression depth exhibited a significant difference between level 3 (median: 51 mm, IQR: 44–57 mm) and level 4 (median: 55 mm, IQR: 50–59 mm; ), and the proportion of overall adequate compressions also exhibited a significant difference between level 3 (median: 30.9%, IQR: 3.2–69.3%) and level 4 (median: 74.4%, IQR: 24.8–92.9%; ). Post hoc paired comparison between levels 2 and 3 showed no difference in proportion of adequate compression depth () and proportion of overall adequate compression (). The proportion of adequate recoils exhibited a significant difference among levels 1–4 (), and the post hoc paired comparison revealed a significant difference between level 1 and level 3 (). Only levels 3 and 4 involved mouth-to-mouth breathing, and there was no significant difference between level 3 (median: 25.0%, IQR: 0–44.4%) and level 4 (median: 20%, IQR: 0–50%; ) (Table 3).

Table 3: Comparing cardiopulmonary resuscitation quality among all participants according to program level.

Quality variables during CPR
Program level
value

1 ()
2 ()
3 ()
4 ()
Between 1 and
Between 3 and
Among 1–

Number of total compressions
225.0 (207.0–243.0)
216.0
(196.0–232.0)
150.0
(129.2–150.0)
148.0
(124.5–151.0)
0.018
0.734
<0.001

Average compression rate (per min)
122.0 (113.5–130.5)
120.0
(109.0–126.0)
120.0
(114.0–126.7)
119.0
(113.5–125.0)
0.037
0.467
0.110

Average compression depth (mm)
51.0 (46.0–56.0)
52.0
(46.0–56.0)
51.0
(44.0–57.0)
55.0
(50.0–59.0)
0.367
0.003

Proportion of adequate compression depth (%)
63.2 (19.0–97.9)
82.5 (25.5–98.6)
68.1
(8.0–98.7)
91.7
(45.2–98.7)
0.252
0.023
0.053

Proportion of adequate recoil (%)
100.0 (98.9–100.0)
100.0 (99.5–100.0)
100.0
(100.0–100.0)
100.0
(99.3–100.0)
0.050
0.170
0.006

Proportion of
overall adequate compression (%)
27.0 (2.8–76.1)
42.7 (8.8–85.6)
30.9
(3.2–69.3)
74.4
(24.8–92.9)
0.094
<0.001
<0.001

Number of mouth-to-mouth breaths
—
—
8.0
(8.0–10.0)
8.0
(8.0–10.0)
—
0.368
—

Average ventilation volume (mL)

—
591.0
(326.0–886.0)
648.0
(354.5–902.5)
—
0.733
—

Proportion of adequate mouth-to-mouth breathing (%)
—
—
25.0
(0–44.4)
20.0
(0–50.0)
—
0.825
—

Hands-off time (s)
15.0 (13.0–17.0)
15.0 (13.0–17.0)
52.0
(48.0–56.0)
50.0
(47.0–55.5)
0.420
0.093
<0.001

Post hoc paired comparisons between the levels were performed using the Mann-Whitney U test with Bonferroni corrections (statistical significance was ).

Calculated using the Kruskal-Wallis method.

Post hoc paired comparisons between levels 1 and 4 () and levels 2 and 4 ().

Post hoc paired comparisons between levels 1 and 4 ().

CPR: cardiopulmonary resuscitation.

When we analysed only the novice participants, the proportion of overall adequate compressions exhibited a significant difference between level 3 (median: 29.8%, IQR: 2.4–67.8%) and level 4 (median: 56.7%, IQR: 9.8–88.9%; ) (Supplemental Table  1 in Supplementary Material available online at http://dx.doi.org/10.1155/2016/2420568).

3.3. Analysis of AED Use according to Program Level

AED use was evaluated using a checklist at all steps for each level and between the various levels, with the highest performance observed in level 4. The correct location for the AED pads was observed for 85 (70.2%) participants in level 1, 107 (89.9%) participants in level 2, 114 (91.9%) participants in level 3, and 112 (92.6%) participants in level 4 (). The correct “immediate chest compression after shock” step was observed for 30 (24.8%) participants in level 1, 105 (88.2%) participants in level 2, 96 (77.4%) participants in level 3, and 110 (90.9%) participants in level 4 (). All participants successfully administered the shock within 90 s, although significant differences were observed when we compared to level 1 (median: 59 s, IQR: 55–65 s), level 2 (median: 53 s, IQR: 50–60 s), level 3 (median: 55 s, IQR: 50–60 s), and level 4 (median: 52 s, IQR: 48–56 s) () (Table 4). The post hoc analysis revealed that level 1 participants exhibited poor performance for every step, except for “turn on the AED” step, compared to all other levels. The analysis of the novice group provided the same results as the analysis of all participants.

Table 4: Comparing automated external defibrillator application among all participants according to program level.

Program level
value

1 ()
2 ()
3 ()
4 ()

Turn on the AED
Correct
115 (95.0%)
114 (95.8%)
119 (96.0%)
120 (99.2%)
0.094

Correct location of AED pads
Correct
85 (70.2%)
107 (89.9%)
114 (91.9%)
112 (92.6%)
<0.001

Clear during analysis
Correct
50 (41.3%)
104 (87.4%)
104 (83.9%)
110 (90.9%)
<0.001

Clear before shock
Correct
44 (36.4%)
95 (79.8%)
95 (76.6%)
108 (89.3%)
<0.001

Immediate chest compression after shock
Correct
30 (24.8%)
105 (88.2%)
96 (77.4%)
110 (90.9%)
<0.001

Time from AED arrival
until shock
—
59.0 (55.0–65.0)
53.0 (50.0–60.0)
55.0 (50.0–60.0)
52.0 (48.0–56.0)
<0.001

Comparisons were performed using the chi-square test.

Calculated using the Kruskal-Wallis method and reported as median (interquartile range).

AED: automated external defibrillator.

3.4. Effect of BLS Training on Willingness and Confidence to Perform Bystander CPR and Use an AED

The willingness to perform bystander CPR increased after BLS training, although there was no significant difference between the various levels. The willingness to use an AED also increased after BLS training, although there was no significant difference between the various levels. The self-assessed confidence in performing bystander CPR and using an AED increased after BLS training, although there was no significant difference between the various levels (Table 5). The analysis of the novice group provided the same results as the analysis of all participants.

Table 5: Effect of basic life support training on willingness and confidence among all participants according to program level.

(a)

Program level
Total  
()
value

1 ()
2 ()
3 ()
4 ()

Prewillingness score for CPR
Yes
77 (63.6%)
58 (48.7%)
73 (58.9%)
75 (62.0%)
283 (58.4%)
0.802
<0.001

Postwillingness score for CPR
Yes
118 (97.5%)
115 (96.6%)
124 (100.0%)
117 (96.7%)
474 (97.7%)
0.879

Prewillingness score for AED
Yes
46 (38.0%)
42 (35.3%)
48 (38.7%)
56 (46.3%)
192 (39.6%)
0.158
<0.001

Postwillingness score for AED
Yes
117 (96.7%)
113 (95.0%)
123 (99.2%)
119 (98.3%)
472 (97.3%)
0.162

A Likert scale was used to categorize responses as no (1, 2, and 3) or yes (4 and 5).

The chi-square test was used to compare each program level.

The pre- and postwillingness for each program level were compared using the McNemar test (all, ).

CPR: cardiopulmonary resuscitation; AED: automated external defibrillator.

(b)

Program level
value

1 ()
2 ()
3 ()
4 ()

Preconfidence for CPR
55.0 (30.0–70.0)
50.0
(30.0–80.0)
50.0
(40.0–70.0)
50.0
(30.0–80.0)
0.533
<0.001

Postconfidence for CPR
90.0 (80.0–100.0)
90.0
(80.0–100.0)
90.0
(80.0–100.0)
90.0
(80.0–100.0)
0.177

Preconfidence for AED
50.0
(15.0–70.0)
50.0
(20.0–70.0)
50.0
(20.0–60.0)
50.0
(30.0–70.0)
0.579
<0.001

Postconfidence for AED
90.0
(70.0–100.
0)
90.0
(80.0–100.0)
90.0
(80.0–100.0)
90.0
(80.0–100.0)
0.167

Program levels were compared using the Kruskal-Wallis method and expressed as median (interquartile range).

Pre- and postconfidence were compared using the Wilcoxon signed rank test (all, ).

CPR: cardiopulmonary resuscitation; AED: automated external defibrillator.

4. Discussion

Our results confirmed that a relatively short duration of training improves CPR quality and the bystander’s attitude towards CPR and AED use, although a longer duration of training was needed to achieve optimal CPR quality and AED use. Similarly, several previous studies have reported that relatively short durations of training improved CPR quality. For example, Hirose et al. reported improvements in CPR quality after a 45 min CPR training program using a personal manikin [12]. In the present study, level 1 (hands-only, 40 min) achieved an average compression rate of 122/min and a median compression depth of 51 mm, although the median of proportion of overall adequate compressions was 27.0%, which was lower than those for the other levels. This difference may be due to improper positioning of the chest compression site. In contrast, Panchal et al. evaluated ultrabrief video training and found that the median compression depth was 37 mm, which was not significantly different from that in their control group [13]. This difference may indicate that BLS training is limited when it is not led by an instructor and that there is some baseline training duration that is needed to achieve a significant improvement. For example, levels 1 and 2 provided similar CPR quality-related outcomes, although level 2 provided better AED use scores. Thus, level 2 may be more appropriate for general training regarding CPR and AED use.

When we compared levels 3 and 4 (120 min and 180 min of conventional CPR), we observed that level 4 provided better CPR quality-related outcomes. Similarly, Andresen et al. have reported that a longer duration of training improves CPR quality [14]. In this context, level 3 included 70 min of hands-on training, and level 4 included 100 min of hands-on training; the 30 min difference included hands-on skills testing after completing the training in level 4. This additional testing and feedback appear to have helped achieve a significantly higher proportion of overall adequate compressions in level 4 (74.4%), compared to those in the other levels. Interestingly levels 2 and 3 showed similar CPR quality outcome. We assume that level 3 group had to learn mouth-to-mouth breath in their given time which could distract their concentration but, level 2 group can concentrate their skill on only compression. Therefore, these results suggest that prolonged hands-on practice and immediate instructor feedback help improve the quality of chest compressions after completing a BLS course.

Many recent studies’ results support the use of hands-only CPR for out-of-hospital CPR [15–17]. This is because hands-only CPR is as effective as conventional CPR and also because mouth-to-mouth breathing is a major barrier to bystander performance of CPR [6, 7]. Furthermore, our results indicate that levels 3 and 4 (conventional CPR training) achieved a poor quality of mouth-to-mouth breathing, even after 45 min of hands-on practice, and that the proportions of adequate mouth-to-mouth breathing were similar to the proportion in the novice group. This finding may indicate that it is important to emphasise hands-only CPR for laypersons, as a substantial amount of time would likely be needed to acquire an optimal level of skill in performing mouth-to-mouth breathing.

In the present study, we found that level 4 provided the highest score in applying an AED. In contrast, level 1 provided significantly lower scores in every step, with the exception of turning on the AED. This difference is likely related to the training in each level, as level 1 only introduced the participants to AEDs and did not include hands-on practice. Furthermore, many of the participants in level 1 did not say “clear” during their analysis and before the shock, which could lead to accidents when using AEDs, and three-quarters of the participants forgot to perform chest compressions after administering the shock. Although AEDs are intended for use by untrained laypersons [18], a short introduction without any hands-on practice does not appear to provide sufficient training for novices to adequately use these devices. Moreover, Gonzalez et al. have reported that two-thirds of laypersons can identify an AED and its purpose, although only approximately 50% of laypersons are willing to use AEDs [19]. Therefore, these results may indicate that relatively short BLS training with hands-on practice of AED is needed for laypersons to achieve satisfactory performance.

The present study demonstrated that improvements in willingness and confidence regarding CPR and applying an AED were independent of the BLS training duration. Similarly, Hirose et al. have reported that a simplified CPR training significantly increased the participants’ confidence in performing CPR and applying an AED after the training [12]. Another study has demonstrated that even self-training (by watching a 22 min video) improved willingness and confidence regarding bystander CPR [20]. Therefore, relatively short BLS training may be sufficient to improve the willingness to perform bystander CPR among the general public.

5. Study Limitations

This study has several limitations that warrant consideration when interpreting our findings. First, every BLS course was administered by a qualified BLS instructor, but different combinations of the instructors were assigned to the same level at each time. Therefore, the emphasis on the training content may have varied according to each instructor’s lecturing style, although we attempted to minimise this effect by training the instructors regarding each level’s timeline. Second, the participants were all college student who were in their early twenties, which may have made them more capable of acquiring CPR and AED skills and more motivated to receive BLS training, than individuals from the general population. Therefore, the appropriate duration of BLS training may vary according to the laypersons’ demographic characteristics (e.g., age and education level).

6. Conclusions

Our results indicate that a relatively short duration of BLS training helped the participants acquire CPR- and AED-related skills. However, a longer duration of training and hands-on practice was needed to achieve a high quality of skills for performing CPR and using AEDs. Furthermore, BLS training increased the participants’ willingness and confidence to perform bystander CPR and to use an AED during cardiac arrest, regardless of the training duration.

Abbreviations

AED: | Automated external defibrillator
BLS: | Basic life support
CPR: | Cardiopulmonary resuscitation
IQR: | Interquartile range
KACPR: | Korean Association of Cardiopulmonary Resuscitation.

Disclosure

The Centers for Disease Control & Prevention of Korea did not have role in the study design, analysis, interpretation of the data, and the writing of the paper.

Competing Interests

The authors declare that no competing interests exist.

Authors’ Contributions

Jin Hyuck Lee and Youngsuk cho contributed equally to this study.

Acknowledgments

This study was funded by the Centers for Disease Control & Prevention of Korea.

References

C. Sasson, M. A. M. Rogers, J. Dahl, and A. L. Kellermann, “Predictors of survival from out-of-hospital cardiac arrest a systematic review and meta-analysis,” Circulation: Cardiovascular Quality and Outcomes, vol. 3, no. 1, pp. 63–81, 2010.

A. Møller Nielsen, D. Lou Isbye, F. Knudsen Lippert, and L. S. Rasmussen, “Engaging a whole community in resuscitation,” Resuscitation, vol. 83, no. 9, pp. 1067–1071, 2012.

A. M. Nielsen, D. L. Isbye, F. K. Lippert, and L. S. Rasmussen, “Persisting effect of community approaches to resuscitation,” Resuscitation, vol. 85, no. 11, pp. 1450–1454, 2014.

T. Taniguchi, K. Sato, T. Fujita, M. Okajima, and M. Takamura, “Attitudes to bystander cardiopulmonary resuscitation in Japan in 2010,” Circulation Journal, vol. 76, no. 5, pp. 1130–1135, 2012.

C. Vaillancourt, I. G. Stiell, and G. A. Wells, “Understanding and improving low bystander CPR rates: a systematic review of the literature,” Canadian Journal of Emergency Medicine, vol. 10, no. 1, pp. 51–65, 2008.

G. C. Cho, Y. D. Sohn, K. H. Kang et al., “The effect of basic life support education on laypersons' willingness in performing bystander hands only cardiopulmonary resuscitation,” Resuscitation, vol. 81, no. 6, pp. 691–694, 2010.

R. Swor, I. Khan, R. Domeier, L. Honeycutt, K. Chu, and S. Compton, “CPR training and CPR performance: do CPR-trained bystanders perform CPR?” Academic Emergency Medicine, vol. 13, no. 6, pp. 596–601, 2006.

B. Lynch, E. L. Einspruch, G. Nichol, L. B. Becker, T. P. Aufderheide, and A. Idris, “Effectiveness of a 30-min CPR self-instruction program for lay responders: A Controlled Randomized Study,” Resuscitation, vol. 67, no. 1, pp. 31–43, 2005.

K. H. Todd, A. Braslow, R. T. Brennan et al., “Randomized, controlled trial of video self-instruction versus traditional CPR training,” Annals of Emergency Medicine, vol. 31, no. 3, pp. 364–369, 1998.

M. R. Sayre, R. A. Berg, D. M. Cave, R. L. Page, J. Potts, and R. D. White, “Hands-only (compression-only) cardiopulmonary resuscitation: a call to action for bystander response to adults who experience out-of-hospital sudden cardiac arrest: a science advisory for the public from the American Heart Association Emergency Cardiovascular Care Committee,” Circulation, vol. 117, no. 16, pp. 2162–2167, 2008.

J. Soar, K. G. Monsieurs, J. H. W. Ballance et al., “European Resuscitation Council Guidelines for Resuscitation 2010 Section 9. Principles of education in resuscitation,” Resuscitation, vol. 81, no. 10, pp. 1434–1444, 2010.

T. Hirose, T. Iwami, H. Ogura et al., “Effectiveness of a simplified cardiopulmonary resuscitation training program for the non-medical staff of a university hospital,” Scandinavian Journal of Trauma, Resuscitation and Emergency Medicine, vol. 22, no. 1, article 31, 2014.

A. R. Panchal, O. Meziab, U. Stolz et al., “The impact of ultra-brief chest compression-only CPR video training on responsiveness, compression rate, and hands-off time interval among bystanders in a shopping mall,” Resuscitation, vol. 85, no. 9, pp. 1287–1290, 2014.

D. Andresen, H. R. Arntz, W. Gräfling et al., “Public access resuscitation program including defibrillator training for laypersons: a randomized trial to evaluate the impact of training course duration,” Resuscitation, vol. 76, no. 3, pp. 419–424, 2008.

SOS-KANTO Study Group, “Cardiopulmonary resuscitation by bystanders with chest compression only (SOS-KANTO): an observational study,” The Lancet, vol. 369, no. 9565, pp. 920–926, 2007.

M. E. H. Ong, F. S. P. Ng, P. Anushia et al., “Comparison of chest compression only and standard cardiopulmonary resuscitation for out-of-hospital cardiac arrest in Singapore,” Resuscitation, vol. 78, no. 2, pp. 119–126, 2008.

T. M. Olasveengen, L. Wik, and P. A. Steen, “Standard basic life support vs. continuous chest compressions only in out-of-hospital cardiac arrest,” Acta Anaesthesiologica Scandinavica, vol. 52, no. 7, pp. 914–919, 2008.

C. D. Deakin, J. P. Nolan, K. Sunde, and R. W. Koster, “European Resuscitation Council Guidelines for Resuscitation 2010 Section 3. Electrical therapies: automated external defibrillators, defibrillation, cardioversion and pacing,” Resuscitation, vol. 81, no. 10, pp. 1293–1304, 2010.

M. Gonzalez, M. Leary, A. L. Blewer et al., “Public knowledge of automatic external defibrillators in a large U.S. urban community,” Resuscitation, vol. 92, pp. 101–106, 2015.

B. Lynch and E. L. Einspruch, “With or without an instructor, brief exposure to CPR training produces significant attitude change,” Resuscitation, vol. 81, no. 5, pp. 568–575, 2010.