BioMed Research International
Volume 2016 (2016), Article ID 4819423, 14 pages
http://dx.doi.org/10.1155/2016/4819423

Review Article

Diagnostic Methods of Helicobacter pylori Infection for Epidemiological Studies: Critical Importance of Indirect Test Validation

Muhammad Miftahussurur1,2,3 and Yoshio Yamaoka1,4

¹Department of Environmental and Preventive Medicine, Oita University Faculty of Medicine, Yufu 879-5593, Japan
²Gastroentero-Hepatology Division, Department of Internal Medicine, Airlangga University, Faculty of Medicine, Surabaya 60131, Indonesia
³Institute of Tropical Disease, Airlangga University, Surabaya 60115, Indonesia
⁴Department of Gastroenterology and Hepatology, Baylor College of Medicine and Michael DeBakey Veterans Affairs Medical Center, Houston, TX 77030, USA

Received 2 October 2015; Accepted 16 December 2015

Academic Editor: Osamu Handa

Copyright © 2016 Muhammad Miftahussurur and Yoshio Yamaoka. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Among the methods developed to detect H. pylori infection, determining the gold standard remains debatable, especially for epidemiological studies. Due to the decreasing sensitivity of direct diagnostic tests (histopathology and/or immunohistochemistry [IHC], rapid urease test [RUT], and culture), several indirect tests, including antibody-based tests (serology and urine test), urea breath test (UBT), and stool antigen test (SAT) have been developed to diagnose H. pylori infection. Among the indirect tests, UBT and SAT became the best methods to determine active infection. While antibody-based tests, especially serology, are widely available and relatively sensitive, their specificity is low. Guidelines indicated that no single test can be considered as the gold standard for the diagnosis of H. pylori infection and that one should consider the method’s advantages and disadvantages. Based on four epidemiological studies, culture and RUT present a sensitivity of 74.2–90.8% and 83.3–86.9% and a specificity of 97.7–98.8% and 95.1–97.2%, respectively, when using IHC as a gold standard. The sensitivity of serology is quite high, but that of the urine test was lower compared with that of the other methods. Thus, indirect test validation is important although some commercial kits propose universal cut-off values.

1. Introduction

Helicobacter pylori (H. pylori) infection is accepted as the primary cause of chronic gastritis [1]. Moreover, severe atrophic gastritis, accompanying intestinal metaplasia caused by persistent H. pylori infection, is closely related to the development of gastric cancer [2]. Although H. pylori was discovered more than 30 years ago by Marshall and Warren [3], which method should be considered as a gold standard for detection of H. pylori infection, especially for epidemiological studies, remains unclear. Currently, several direct diagnostic tests, including histopathology and/or immunohistochemistry (IHC), rapid urease test (RUT), and culture are frequently used as they provide genotype and antibiotic resistance information. However, due to the small amount of bacteria that colonizes the stomach, the direct test sensitivity decreases. Thus, several indirect tests, including antibody-based tests such as serology and urine test, urea breath test (UBT), and stool antigen test (SAT) have been developed to diagnose H. pylori infection [4].

Among the indirect tests, UBT is one of the most accurate to determine H. pylori infection with a sensitivity and specificity of 99% and 98%, respectively [5]. Together with SAT, UBT became the best method to identify active infection, which cannot be detected by serology [6]. However, some providers have modified a number of the UBT parameters, including the dose of isotope, duration of breath collection, requirement to fast, use of a test drink to slow gastric emptying, and analytical equipment [7]. Therefore, it is important to perform local validation. SAT is more economical than UBT and endoscopy to confirm the treatment success. However, differences in the antigens may affect the accuracy of this test in different populations. Although a meta-analysis revealed that SAT global sensitivity and specificity are more than 90% [8], a study reported low accuracy [9]. Moreover, by using new cut-off values after validation, the specificity increased by 20% [10]. On the other hand, antibody-based tests, especially serology, are widely available, inexpensive, not affected by local changes in the stomach, and suitable for special conditions. However, serological testing is less accurate than UBT and SAT, particularly in areas of low H. pylori prevalence [11, 12]. In a low-prevalence area, serological tests are not as effective. In a high prevalence area, a positive serology test result can reasonably be accepted as positive when there are no better alternative tests [7, 11]. The cut-off values should be validated locally although some commercial kits propose universal cut-off values.

We previously reported four epidemiological studies using four to five different tests to examine the prevalence of H. pylori infection in Dominican Republic [13], Bhutan [14], Myanmar [15], and Indonesia [16] (Table 1). To reduce a potential for bias, the same pathologist and microbiologist performed the experiments in all studies. We also used the same kits for culture and antibodies for IHC, RUT, and serology. When the study subjects were categorized as positive for H. pylori with at least one positive result, the overall H. pylori infection rate was 58.9%, 73.4%, 48.0%, and 11.5%, respectively. However, the sensitivity of the serology results in two studies, Bhutan [14] and Myanmar [15], was quite high compared with that of the other methods. In contrast, the sensitivity of the urine test used in the Indonesia [16] survey was lower than that of the other methods.

Table 1: Identification of H. pylori infection using different methods in four countries.

Country [ref.]

Histology + IHC
Culture
RUT
Other tests
At least one positive

Dominican Republic [13]
158
56.3%
43.0%
49.4%
—
58.9%

Bhutan [14]
372
61.6%
56.5%
54.6%
Serology 70.2%
73.4%

Myanmar [15]
252
35.7%
29.4%
34.1%
Serology 36.9%
48.0%

Indonesia [16]
78
7.7%
6.4%
9.0%
Urine test 5.1%
11.5%

IHC: immunohistochemistry; RUT: rapid urease test.

In this review, we highlighted the advantages and disadvantages of several methods used to diagnose H. pylori, including the importance of indirect test validation. We also summarized which methods are preferably recommended by several guidelines.

2. Direct Diagnostic Tests

Fiber optic endoscopy became very popular as it allows access to the stomach for the acquisition of biopsy specimens. Histology, RUT, and culture are methods used to detect H. pylori infection using biopsy specimens. On closer observation with standard endoscopy, especially in young patients, H. pylori-negative corporal mucosa presents star-fish like arrangements of vessels, termed “regular arrangement of collecting venules” with a sensitivity of 100% and a specificity of 90% [22, 23]. Narrow band imaging clearly shows superficial gastric mucosal and capillary patterns, indicating gastric mucosal abnormalities [24]. Moreover, using a novel ultra-high “magnified endoscopy” system (endocytoscopy), a moving bacterium can be visualized and recorded ex vivo at a 1100x magnification during endoscopy [25].

To minimize stomach invasiveness and overcome the lack of endoscopy equipment in our previous study [26], an extendable orogastric brush contained in a plastic tube (Baylor Brush, US Endoscopy, TX, USA) developed by Graham et al. [27] was used. The brush was about 5 mm in diameter and fitted within an enlarged distal sheath portion. Withdrawal of the brush into the sheath closed the brush compartment, allowing its extension and its movement back and forth 3–8 cm, three or four times. It was then immediately placed in a dram vial containing approximately 1 mL of cysteine transport medium with 20% glycerol [28]. This method appears to be reliable for the diagnosis of H. pylori infection in remote areas.

2.1. Histopathology and IHC

One advantage of this method is the possibility to send specimens via regular mail at room temperature, especially for epidemiological studies lacking freezing equipment. Our study in rural parts of Bhutan [14], Myanmar [15], and especially Indonesia [26] used histology confirmed with IHC as a gold standard to assess the sensitivity of the culture method (Table 1). Fixation with 10% formaldehyde provided very stable specimens, in which the morphology of the bacteria was maintained [29]. However, specimens should be stored for no more than one week [30].

For patients with gastric atrophy or intestinal metaplasia, histopathology presents a lower sensitivity [31]. A higher sensitivity was observed in the upper corpus gastric curvature, but not in antral biopsy for patients with gastric cancer [32]. In patients with extensive atrophy, a greater curvature of the corpus represents the optimal biopsy site, which presents a higher sensitivity than a lesser curvature of the corpus or the antrum (84.8%, 47.0%, and 30.3%, resp.) [33]. Therefore, for epidemiological studies, multiple biopsy specimens are necessary to increase the accuracy of this method. The updated Sydney system recommends that, for optimal assessment, biopsy specimens from five different sites should be obtained from the distal lesser and greater curvature of the antrum within 2-3 cm from the pylorus, two from the lesser and greater curvature of the corpus within 8 cm from the cardia, and one from the incisura angularis [34]. In our previous studies, the biopsy specimens were obtained following the Japanese guidelines [18], which recommend that biopsies should be performed on the greater curvature of the gastric antrum and in the upper to middle part of the gastric body, taking into account that H. pylori may be distributed unevenly in the stomach and that intestinal metaplasia can result in a false negative on the antral specimens [35, 36]. Comparison with a previous study showed an increase of about 10% in positivity [37]. In our survey, the detection rate of H. pylori infection using additional corporal biopsy specimens increased by 1–6% compared to that using antral biopsy specimens only (Table 2).

Table 2: Positivity of biopsy specimens by histology confirmed with IHC.

Country [ref.]

Both antrum and corpus-positive (%)
Antrum-positive (%)
Corpus-positive (%)
One positive of the two (%)

Dominican Republic [13]
158
82 (51.9%)
84 (53.2%)
87 (43.0%)
89 (56.3%)

Bhutan [14]
372
194 (52.2%)
206 (55.4%)
216 (56.5%)
229 (61.6%)

Myanmar [15]
252
72 (28.6%)
76 (30.2%)
86 (34.1%)
90 (35.7%)

Indonesia [16]
78
4 (5.1%)
4 (5.1%)
4 (5.1%)
6 (7.7%)

Several histochemical staining, including Warthin-Starry, Modified Giemsa, acridine orange, cresyl violet, Gimenez, Half Gram, Ziehl-Neelsen, Modified Genta, and H. pylori silver stain were used for the histological detection of H. pylori in gastric biopsies and could enhance the visualization of the organism compared to the routine hematoxylin and eosin (H&E) stain, which provided a weak contrast between bacteria and the mucus [29]. Although H&E sensitivity was comparable to that of Giemsa and Genta, the specificity decreased in low H. pylori density (90%) [38]. Warthin-Starry silver staining allows an excellent visualization, but is expensive, difficult to process, time consuming, and the results are not always reliable [39]. Modified Giemsa stain is feasible for H. pylori detection, being simple and presenting good contrast [29]. Several studies showed that IHC staining with specific H. pylori antibodies has the highest sensitivity and specificity and better interobserver agreement compared to histochemical stains [40]. It can also be used to assess the presence of H. pylori with more certainty, especially if there is evidence of inflammation and if coccoid forms of H. pylori, which mimic bacteria or cell debris and are difficult to identify by standard staining, are predominantly present as a result of hypoxia or other stress conditions [41, 42]. Moreover, IHC might be a useful tool for genotyping H. pylori without individual bias. Recently, we successfully generated an anti-East-Asian type CagA-specific antibody (α-EAS Ab), which was immunoreactivity with the East-Asian type CagA, but not with the Western type CagA [43]. We showed that α-EAS Ab was a useful tool for typing CagA immunohistochemically in Japanese [44], Vietnamese, and Thai [45] individuals with a sensitivity, specificity, and accuracy of 93.2%, 72.7%, and 91.6% and 96.7%, 97.9%, and 97.1%, respectively. Fluorescent in situ hybridization (FISH) is frequently used to detect H. pylori using 16S rRNA gene probe labeled with fluorescein [29]. A study investigated 201 gastric biopsy specimens comparing FISH with the conventional culture method. Although FISH is a more sensitive and rapid technique than the culture method for the detection of H. pylori, the combination of both FISH and conventional culturing significantly increased the sensitivity [46].

Building on current knowledge of the natural history of gastritis and the associated cancer risk, an international group of gastroenterologists and pathologists proposed a system for reporting gastritis in terms of stage, termed “Operative Link for Gastritis Assessment (OLGA)” [47]. Ninety-three Italian patients were followed up for more than 12 years. The data indicated that all invasive or intraepithelial gastric neoplasia were consistently associated with high-risk (III/IV) OLGA stages [48]. Our study showed that the distribution of OLGA score in these four countries tends to mirror the incidence rate of gastric adenocarcinoma (Table 3). Using OLGA score as a gold standard, we determined gastric mucosal atrophy and calculated the optimal cut-off points of pepsinogens in Myanmar and Bhutan [15, 17].

Table 3: Comparison of the OLGA system in Myanmar and Bhutan.

Country [ref.]
ASR for GC
Stage 0
Stage I
Stage II
Stage III
Stage IV

Dominican Republic [13]
8.3
22.1%
64.5%
13.2%
0.0%
0.0%

Myanmar [15]
15.3
43.2%
52.4%
4.0%
0.4%
0.0%

Bhutan [17]
23.0
7.8%
59.0%
27.5%
4.9%
0.8%

Indonesia [16]
3.9
65.3%
33.3%
1.2%
0.0%
0.0%

ASR: age-standardized incidence rate/100,000 (available from the International Agency for Research on Cancer; GLOBOCAN2012, http://globocan.iarc.fr/); GC: gastric cancer; OLGA: operative link for gastritis assessment.

Several limitation of histology methods, including time and cost, dependence on the operator skills, and interobserver variability, should be considered [49]. Although an agreement was reached in the assessment of the density of H. pylori, inflammatory activity, chronic inflammation, and intestinal metaplasia by the Sydney classification updated in 1994, interobserver variability was common in biopsy specimens with lesser degrees of atrophy (weighted value 0.49), particularly in the antrum [50]. Interpretation is especially difficult when tissue sampling is not adequate or if biopsies are not well-oriented. However, if hesitance occurs, the presence of active gastritis can be used as a surrogate pathognomonic of H. pylori infection. With regard to these limitations, we believed that histology using a valid staining is an excellent method and its accuracy can be increased by using IHC or FISH and with the acquisition of adequate multiple biopsy specimens.

2.2. Culture

Culture remains a reference method as it allows the direct detection of H. pylori organisms even though it presents a limited sensitivity and is a time-consuming procedure. It is highly specific and allows the determination of antimicrobial sensitivities. The sensitivity of the bacterium isolation varies greatly among laboratories due to a very fastidious organism. Even experienced laboratories recover the organism from only 50% to 70% of actually infected biopsies [51–53]. In our studies, the isolation sensitivity was between 74.2 and 90.8% when using histology confirmed by IHC as a gold standard method (Table 4). To increase sensitivity, care should be taken regarding the transport of biopsy specimens and storage, media plate, and microaerophilic conditions. Direct plating of biopsy samples may become the solution in areas where freezing equipment is not available, using disposable biopsy specimen grinders and microaerophilic gas generator packs. The transport medium is also essential for the successful detection of the bacteria. Saline solution was reported to be suitable for transport of less than four hours [29]. In our studies, we demonstrated that a cysteine transport medium containing 20% glycerol may be a good choice as we were able to recover 81% of the bacteria after one week of storage at 4°C [28].

Table 4: Accuracy of several tests using histology confirmed by IHC as a gold standard.

Type of tests
Sensitivity (%)
Specificity (%)

Dominican
Republic [13]
Bhutan [14]
Myanmar [15]
Indonesia [16]
Dominican
Republic [13]
Bhutan [14]
Myanmar [15]
Indonesia [16]

Culture
74.2
90.8
80.0
83.3
97.2
98.6
98.8
97.2

RUT
84.3
86.9
86.7
83.3
95.7
97.2
95.1
97.2

Serology
—
95.2
72.2
—
—
69.9
82.7
—

Urine test
—
—
—
50.0
—
—
—
98.6

IHC: immunohistochemistry; RUT: rapid urease test.

To prevent the possible contamination by flora such as Gram-positive cocci from buccal or intestinal flora, in case of duodenal reflux, bacterial overgrowth, and Candida species from ulcers, several selective media such as Skirrow’s, Dent’s CP, modified Glupczynski’s Brussels campylobacter charcoal media and chocolate agar medium were used for the isolation of H. pylori. These media contain antimicrobial compounds: vancomycin or teicoplanin, to inhibit Gram-positive cocci; polymyxin, nalidixic acid, colistin, trimethoprim, or cefsulodin to inhibit Gram-negative rods; and nystatin or amphotericin B to inhibit fungi [29]. Using a combination of two selective media was recommended for the maximum recovery of H. pylori [54]. Interestingly, although H. pylori colonizes the stomach and is sensitive to bile, which is present in the duodenum and colon, several studies succeeded in isolating H. pylori from stools [55–57]. As a fastidious bacterium, the massive number of microorganisms present in stools reduces the chances for H. pylori to grow. Special conditions such as pediatric (shorter intestinal transit time than adults), malnourished conditions (reduces gastric acid secretion), and fresh stool specimens (H. pylori may not survive for a long time in stools) may increase the success rate [58].

Recently, a novel fully automated rapid genetic analyzer was developed, which allows the determination of CAM resistance (e.g., 23S rRNA gene point mutations A2143G and A2144G) within 60–120 min without culture, while culture tests required 7–10 days [59]. This method may be useful in genotypic resistance-therapeutic guidance. However, using culture has other advantages. With PCR and/or next generation sequencing, we can screen mutations related to drug resistance. We previously discovered novel mutations related to clarithromycin resistance (infB and rpl22), which have synergic effects with 23S rRNA, resulting in higher minimum inhibitory concentrations (MICs) [60] using next generation sequencing. A new simple and rapid broth medium method was developed, which supports the growth of H. pylori for 20 hours and allows the bacterium detection using an enzyme-linked immunosorbent assay (ELISA) detection technique. When compared to the agar dilution method as a gold standard, 105 of 111 patients were detected as positive by both methods [61]. Moreover, clarithromycin and metronidazole susceptibilities were detected using this method, although 2 and 10 strains were misdiagnosed for clarithromycin and metronidazole susceptibility, respectively [61].

2.3. RUT

RUT presents the advantage of yielding results in 1–24 hours [12], making it a suitable method to detect H. pylori in epidemiological studies. In the presence of H. pylori urease, urea is hydrolyzed to produce ammonia and bicarbonate, leading to a pH increase in the gastric mucosa, which is indicated by a change in the color of phenol red from yellow to pink or red. After developing a medium to detect H. pylori with a pH indicator [62], McNulty et al. in 1989 performed a large trial on 1,445 patients undergoing upper gastrointestinal endoscopy over a 12-month period using two media, the original and modified Christensen’s urea medium in which the concentration of phenol red is increased and the nutrients, glucose, and peptone are omitted [63]. Both media showed almost 100% specificity when compared with the culture method and histopathology [63]. The first-generation commercial kits were agar-based and were composed of campylobacter-like organism (CLO test; Kimberley-Clark, Neenah, WI, USA) containing antibacterial agents. Strip-based tests with two areas separated by a microporous membrane containing urea, a buffer, and a pH-sensitive indicator (PyloriTek, Serim, Elkhart, IN, USA) represent the new generation of commercial kits [29]. Another test used different indicators to start the reaction at lower pH in order to prevent contamination (false positive) from unrelated organisms (e.g., mouth flora) [64].

Beside treatment decision, RUT results could be used to predict the successful culture rate. Moreover, H. pylori could be successfully cultured from 84% and 100% of RUT positive samples [65], when CLO tests were kept at room temperature for 2 hours or at 4°C for 4 hours, respectively. Moreover, RUT samples can be used after 30 days of storage at room temperature for molecular testing to detect clarithromycin susceptibility [66]. However, although the color change usually occurs in less than 2 hours, it only become reliable after 4 hours when making a treatment decision [67]. Based on the literature, RUT samples should be discarded after 24 hours to avoid the detection of false positive from non-H. pylori urease containing organisms and should not be used to make treatment decision [64, 68]. In our experience, using CLO test, holding the samples for 24 hours is very important, especially for studies in low prevalence of H. pylori infection areas due to low colonization of H. pylori. However, we should consider that the main idea of RUT is to get rapid results for treatment decision. Recently, Vaira et al. designed a new RUT (UFT300, ABS Cernusco, Italy), which allows H. pylori detection within five minutes, with a sensitivity of 90.3, 94.5, and 96.2% at 1, 5, and 60 minutes, respectively (specificity was 100%) [69].

When using agar based test (CLO test), approximately 10⁵ of H. pylori bacteria are needed to induce a change in color, indicative of positivity [64]. We should consider that biopsy sample sites are very important based on the presence of this organism. Advanced gastritis and intestinal metaplasia will reduce the sensitivity of the test. Our epidemiological study showed that the sensitivity and specificity of RUT were 83.3–86.9% and 95.1–97.2%, respectively (Table 4). In this study, a single biopsy was taken from the antrum approximately 3 cm from the pyloric ring. Adding the number [70] and increasing the size [71] of biopsy specimens will increase the accuracy of RUT, especially if biopsies are obtained from the antrum and from the corpus, avoiding ulceration and intestinal metaplasia [64]. For bleeding patients and patients taking medications such as bismuth, antibiotics, or proton pump inhibitors (PPIs), the density and/or urease activity of H. pylori could be reduced and the test sensitivity could decrease to 25% [72]. Thus, patients should stop taking their medications two weeks before the diagnosis to prevent false negative. Formalin contamination of biopsy forceps may also generate false negative [73]. Several flora such as Proteus mirabilis, Citrobacter freundii, Klebsiella pneumoniae, Enterobacter cloacae, and Staphylococcus aureus, isolated from the oral cavity and/or stomach, also present urease activity [74] and can be potential false positive when using RUT.

3. Indirect Diagnosis

There are two types of indirect tests. Active tests, which detect active infection (UBT and SAT) and passive tests, which detect a marker of present/previous exposure to H. pylori (serology or urine), but do not indicate whether the infection is ongoing [75]. Although some of the tests present a high accuracy, the choice of the test to be used based on the clinical conditions should be determined taking into account local validation.

3.1. UBT

In a systematic review, Nocon et al. summarized 30 studies comparing the ¹³C-UBT to other tests. The ¹³C-UBT showed higher sensitivity and specificity than the IgG serology and SAT. However, the results were inconsistent when compared with RUT [76]. As mentioned above, this test cannot provide information about genotypes and antibiotic resistance. Moreover, it requires specialized equipment, which may not be available in routine clinical laboratories. Recently, a new portable ¹⁴C-based urea breath test (Heliprobe, Noster AB, Stockholm, Sweden) was produced, which is accurate, reliable, easy to use, fast (20 minutes), inexpensive, and uses low radioactivity of ¹⁴C-based urea capsule comparable to natural radiation [77].

The lower dose of ¹³C-UBT substrate (75–125 mg) was chosen with high accuracy compared to the original (350 mg) dose [78] and was validated in the United States [79] and Europe [80]. In general, UBT presents an excellent reliability when patients received pretreatment with citric acid and when the dose of ¹³C-urea administered is not lower than 75 mg to prevent poor results [81]. Compared to histology, urease test, and conventional UBT, a new UBT, consisting of two tablets each combining citric acid with 37.5 mg of ¹³C-urea, presents sensitivity and specificity >99% before and after treatment [82]. In contrast, Calvet et al. found an unexpectedly large number of false positive tests and an unacceptable low specificity (61%) when citric acid pretreatment was not included [83]. Citric acid could induce the rapid relaxation of the gastric fundus and a marked inhibition of the antral motility. Moreover, the simultaneous administration of substrate and a drink containing citric acid may significantly shorten the time required for the preparation of the test [84].

The progressive hypochlorhydria due to atrophy or use of acid-lowering medication could induce false-negative. The presence of atrophy, resulting in a lower load of bacteria, may produce false negative UBT. However, in combination with a serology test, UBT can be useful to diagnose H. pylori in patients with atrophic gastritis [85]. Some medications, including Bismuth containing compounds, antibiotics, and PPI, could decrease the test sensitivity through reduction of the organism density or urease activity. It is currently recommended that bismuth and antibiotics be withheld for at least 4 weeks and a PPI for 7–14 days prior to the UBT [12]. Udd et al. reported the importance of PPI discontinuation [86]. In fact, the utilization of high doses of PPI during 3 days leads to a negative UBT in 60% of the patients versus 27.5% for regular doses [86]. Moreover, Graham et al. also observed 33% negative UBTs after 6.5 days of PPI treatment and acidification of the stomach with citric acid did not improve the results [87]. On the other hand, false-positives may be due to contamination with non-H. pylori urease-producing bacteria [88, 89]. Sano et al. demonstrated that urease activity was also present in the oropharynx, therefore gurgling to eliminate urease-positive bacteria in the oropharynx and oral cavity is recommended [90].

The calculated optimal cut-off points of UBT expressed as delta over baseline (DOB) in a population in which a low prevalence of infection is expected (e.g., healthy volunteers) should be high. In contrast, a low DOB value should be observed in dyspeptic patients for whom the prevalence of infection is higher than in a normal population [84]. Using histology and microbiology, Mauro et al. calculated the cut-off point for the ¹³C UBT as 3.09%, 30 minutes after oral administration of 75 mg ¹³C-labeled urea in 100 mL of citric acid solution [91]. On the other hand, using a dose of 125-mg ¹³C urea and testing at 30 min, the accuracy was 94.8 with a cut-off point of 2.4% [79]. A multicenter Japanese study [92] defined the best cut-off value for children as 3.5%, 20 minutes after administration of 75–100 mg ¹³C urea with an overall sensitivity and specificity of 97.8% and 98.5%, respectively. Interestingly, DOB could also be used as a histological severity and eradication rate predictor. Pretreated patients with moderate to severe gastritis as assessed by histology presented higher DOB values compared to those with mild gastritis (34.5 ± 4.4 versus 17 ± 2.8), which was associated with a high H. pylori density [93]. High values of DOB (>35%) showed lower eradication rate (81.6% versus 94.7%) than a low DOB value (<35%) [94], and DOB values >15% could predict clarithromycin resistance [95].

3.2. SAT

In 1997, it was reported that the detection of H. pylori antigens in stools using polyclonal anti-H. pylori antibodies (HpSA) with a sensitivity and specificity of 88.8% and 94.5%, respectively [29]. However, due to the difficulty of obtaining polyclonal antibodies with constant quality, the tests using monoclonal antibody showed better accuracy. Gisbert and Pajares summarized 89 studies, including 10,858 untreated patients. The weighted mean sensitivity, specificity, positive predictive value, and negative predictive values were, 91%, 93%, 92%, and 87%, respectively. Even compared with UBT, the weighted mean sensitivity and specificity for SAT were 94% and 94%, respectively [96]. Between the two existing methods, enzyme immunoassay (EIA) presented a better accuracy than the immunochromatographic test, although the latter also used a monoclonal antibody [97, 98]. However, the immunochromatographic test is simple, user friendly, and does not require special equipment. Similar to UBT, the SAT sensitivity is affected by recent bismuth, antibiotics, and PPI treatments [12]. Fortunately, fasting is not needed for SAT and, recently, some monoclonal antibodies unaffected by PPI have been developed [99]. Therefore, SAT is more advantageous than UBT.

However, the submission of the stool sample is the main problem when using this test in epidemiological studies, especially in an area without freezing equipment. Stools should be stored at low temperature (−5 to −25°C) if not tested in short period of time (below seven days). Moreover, the samples should be stored at −80°C to maintain the antigen [98] for long time storage. Yee et al. reported that SAT still presented a good sensitivity and specificity, even with frozen stool samples stored (−80°C) for up to 225 days [100]. The conditions of the stool samples should be also taken into account. The accuracy of SAT decreases when the stool samples are unformed or watery due to diluted antigens [98]. The selection of the appropriate cut-off point represents a crucial factor, which is still debatable. Raguza et al. reported a high sensitivity, but low specificity of SAT using a monoclonal antibody (100% and 76.2%, resp.) when using the manufacturer’s cut-off value. However when using a new cut-off (OD 0.400), the sensitivity remained at 100%, but the specificity improved to 97.7% [10]. Therefore, a local test validation in order to find the best cut-off for each population may become very important.

3.3. Antibody-Based Tests

Serological tests that detect anti-H. pylori IgG antibodies could also lead to false-negatives. They are also less likely to be confounded by suppression of H. pylori infection by drugs for example, colloidal bismuth, PPI, or antibiotics [101]. Therefore, in particular clinical situations such as gastrointestinal bleeding [102], atrophic gastritis [103], gastric MALT lymphoma [104], and gastric carcinoma [105], serology is the most efficient diagnostic method [4]. However, this test cannot distinguish between current and past infections because H. pylori IgG persist even after the disappearance of this bacterium and returning to baseline values takes months or years although the bacterium eradication was successful [106]. False-negative results may occur for new infection when the antibody levels are not sufficiently elevated [29]. Interestingly, patients with atrophic corpus gastritis and with elevated H. pylori antibody titers, but ¹³C-UBT- and histology-negative for H. pylori, showed significantly decreasing titers in the eradication group compared with the follow-up subjects. Therefore, a positive serology result may indicate ongoing infection in spite of negative UBT and histology [103]. The standard ELISA and its derivatives such as rapid immunoenzymatic assays and immunoblotting are essential techniques with exact composition patient antigen [29].

Laheij et al. [107] reviewed 36 different commercially available H. pylori serology kits which had been used to screen 26,812 patients. Serology showed an excellent diagnostic performance when used in highly selected samples, but the performance decreased when tested in consecutive patient populations. The ranges of sensitivity and specificity were 57% to 100% and 31% to 100%, respectively, in different populations [107]. Another study evaluated 29 commercial kits, 15 of which were based on IgG ELISA. The sensitivity of ELISA ranged from 57.8% to 100%, and the specificity ranged from 57.4% to 97.9% [4]. Moreover, the diagnostic accuracy of kits made in Western countries has been reported to be lower in Chinese patients [108], and the imported serological kits yielded many intermediate results for Japanese patients. Therefore, their effectiveness seems somewhat limited in a Japanese patient population [109]. The difference of diagnostic performance depends on antibody preparation in every kit. Therefore, every serology tests must have been evaluated with indicated study population and the choice of the antigen is critical. In our studies, we quantified anti-H. pylori IgG levels using an ELISA kit (Eiken Co., Ltd., Tokyo, Japan), which was developed using Japanese H. pylori strains. In Bhutan, the serological test showed the highest positive rate (70.2%) compared with the other 3 tests (61.6%, 56.5%, and 54.6% for histology confirmed IHC, cultured, and RUT, resp.). When classifying H. pylori-positive with a H. pylori antibody titer ≥10 U/mL, the sensitivity and specificity were only 95.2% and 69.9% in Bhutan using histology confirmed by IHC as the gold standard. On the other hand, a low sensitivity (72.2%) was observed in Myanmar population (Table 4). Therefore, we calculated the best cut-off values of the IgG ELISA in Bhutan and Myanmar. By receiver operating characteristic curve (ROC), the best cut-off value of IgG ELISA was 13.5 in Bhutan (sensitivity and specificity were 90.4% and 80.3%, resp.), and the area under curve (AUC) was 0.885 (95% CI; 0.844–0.927) (Figure 1(a)). In contrast, the best cut-off value of IgG ELISA was 8.5 in Myanmar (sensitivity and specificity were 81.1% and 80.2%, resp.), and AUC was 0.848 (95% CI; 0.800–0.897) (Figure 1(b)).

(a)

(b)

Figure 1: ROC curve for IgG ELISA in Bhutan (a) and Myanmar (b). The optimal cut-off points for the IgG ELISA were determined by analyzing the receiver-operating characteristic (ROC) using histology and immunohistochemistry as a gold standard.

Serological detection of the cytotoxin-associated gene product A (CagA) of H. pylori appears to correlate with further increases in risk for peptic ulcer disease and gastric cancer [110, 111]. Our meta-analysis showed that CagA seropositivity was higher in patients with gastric cancer than in controls, even in East-Asian countries with an overall OR of 1.26 (95% CI: 1.05–1.52) [112]. Asaka et al. reported that H. pylori antibody titer was significantly higher in patients with early gastric cancer than in advanced cancer [113]. The lower frequency of a higher IgG antibody titer in advanced cancer may be due to the increasing extent of intestinal metaplasia associated with the transition from the intestinal type of early gastric cancer to advanced cancer, such that the local environment is no longer ideal for H. pylori growth [113, 114]. CagA antibodies may be positive in patients who have a negative H. pylori serologic test [46, 47] since CagA antibodies can potentially remain positive for a longer period of time than the anti-H. pylori antibody [105, 115]. Therefore, a negative H. pylori serologic test does not rule out the possibility of a previous exposure to H. pylori and anti-CagA antibody alone is not a superior biomarker to the anti-H. pylori antibody alone.

A urine-based ELISA is an indirect, easy, rapid, and inexpensive test for the detection of an antibody to H. pylori in adults and has shown a high sensitivity and specificity [116–118]. However, in children, specificity was unacceptable (76.4%) and much lower than that for adults (91.5–100%) [118, 119]. The fact that H. pylori specific IgG are excreted in very low concentrations in urine may give rise to false negative results. The urine test presents several advantages and could become an alternative method for epidemiological and screening studies. Urine can be obtained easily and its collection requires little skills, does not require centrifugation, and is cheaper than that of serum [120]. In our studies, a rapid urine test (RAPIRUN H. pylori antibody, Otsuka Pharmaceutical Co., Tokyo, Japan), which has been reported to present a high accuracy, with excellent sensitivity and specificity, in Japanese (92.0%, 93.1%, and 92.3%, resp.) [121] and Vietnamese populations [122] was used. Although the results showed that the urine test was very specific, our study in Indonesia also showed a very low sensitivity (Table 4). It is possible that different genetic background of patients and H. pylori strains could induce different antigen-antibody responses that would affect the results of the urine test [120].

4. Diagnostic Methods Recommended by Several Guidelines

Table 5 provides a list of the available diagnostic tests for H. pylori recommended by several guidelines. Japanese guidelines recommend to simultaneously collecting biopsy specimens for histology when RUT is performed. If RUT is negative, histology examination is required for confirmation [18, 123]. American and Chinese guidelines recommend that biopsies for the RUT be obtained from two sites, the corpus at the gastric angularis and greater curvature of the antrum due to patchy distribution of H. pylori infection after antibiotics or PPIs [12, 19]. American guidelines recommend that RUT should rarely be used and should be combined with other endoscopic or nonendoscopic modalities [12]. In contrast, Chinese guidelines recommend RUT routine performance with high-quality testing reagents [19].

Table 5: Diagnostic methods of H. pylori infection recommended by several guidelines.

Guidelines
Invasive
Noninvasive

Global guidelines for developing
countries [11]
Rapid urease test
Histology
Culture
Fluorescence in situ hybridization polymerase chain reaction
Stool antigen test
Finger-stick serology test
Whole blood serology
Urea breath test

Asia-Pacific consensus [7]
Rapid urease test
Histology
Urea breath test
Stool antigen test
Serum antibody test (ELISA)

Europe [6]
Rapid urease test
Histology
Culture
Urea breath test
Stool antigen test
Serum antibody test (ELISA)

United States [12]
Rapid urease test
Histology
Culture
Polymerase chain reaction
Urea breath test
Stool antigen test
Antibody test (quantitative and qualitative)

Japan [18]
Rapid urease test
Histology
Fluorescence in situ hybridization
Culture
Urea breath test
Antibody test
(serum, whole blood, urine, and saliva)
Stool antigen test

China [19]
Rapid urease test
Culture
Histology
(Immunohistochemistry + fluorescence in situ hybridization)
Urea breath test
Stool antigen test

Republic of Korea [20]
Rapid urease test
Histology
Urea breath test
Serum antibody test
Stool antigen test

ELISA: enzyme-linked immunosorbent assay.

Five guidelines [6, 11, 12, 18, 19] mentioned culture as an optional method. However, they indicated that its sensitivity is lower than that of RUT or histology [12], the need for special transport [18], the demand for high techniques, the high cost, and availability in a limited number of clinical laboratories [12, 18], and it may not be practical in all countries [11].

All seven guidelines discussed the histology method. American guidelines [12] recommend that a minimum of three biopsies should be obtained, one from the angularis, one from the greater curvature of the corpus, and one from the greater curvature of the antrum, to maximize the diagnostic yield of histology. Japanese guidelines [18] also suggest the importance of IHC for distinguishing H. pylori from other microorganisms and for detecting coccoid forms of H. pylori. Chinese guidelines [19] also agree that IHC presents a high specificity, but a relatively high cost and that FISH has a high sensitivity in detecting H. pylori infection. Although PCR was mentioned by two guidelines [11, 12], it is not widely available for clinical use and not routinely recommended.

The UBT using essentially urea ¹³C [6, 7, 11, 12, 18, 19] or ¹⁴C [7, 11, 12, 19] remains accepted by the seven guidelines. The Asia-pacific consensus emphasized on the importance of local validation [7]. On the other hand, when UBT is positive, but the value of UBT is close to the cut-off value, the test could be resumed at a later period or H. pylori should be detected by using other methods [19].

SAT is accepted by seven guidelines, especially using monoclonal antibodies [6, 7, 18]. Despite being a good test, SAT may be underused due to its high costs in some countries/regions [11, 19].

Asia-pacific, European, and American guidelines recommend ELISA for IgG detection [6, 12], in addition to latex agglutination techniques or qualitative assessment using office-based kits [12]. Interestingly, while serology was not a recommended method for initial diagnosis of H. pylori infection in the absence of endoscopy by the Maastricht II consensus [124], the Maastricht III and IV consensus modified the guidelines stating that “some serological tests with good sensitivity and specificity can be used to perform the initial diagnosis of infection with H. pylori” [125] and only the validated commercial tests should be used [6]. Global and Japan guidelines also considered another source than serum: whole blood [11, 18], urine [18], and saliva [18]. All guidelines recommended the use of only validated commercial tests. H. pylori antibody kits with antigens extracted from domestic strains have been reported to be suitable for use in Japan, and the accuracy of testing for H. pylori antibody in urine samples is equal to or higher than that of serum testing [18]. Asia-pacific guidelines indicate that a high titer serological test is helpful to strengthen the diagnosis when histology is highly suggestive of infection. Serological testing may be helpful when the use of medication (PPI and antibiotic) cannot be avoided. Additionally, this method remains practical and reasonable for epidemiological studies [7, 19] and can be used as a diagnostic approach of current infection in patients with peptic ulcer bleeding or gastric MALT lymphoma [19].

Several guidelines indicate that not one single test can be considered the gold standard for the diagnosis of H. pylori [12] and that one should be chosen after considering the advantages and disadvantages of several tests [6, 11, 12, 18]. The Chinese consensus is that a current H. pylori infection can be diagnosed when one of the following three criteria is fulfilled: one of RUT, stained tissue section, and bacterial culture of gastric mucosal tissue is (1) positive; (2) positive ¹³C- or ¹⁴C-UBT; and (3) positive H. pylori stool antigen detection (by clinically verified monoclonal antibody). Republic of Korea guidelines indicate that the diagnosis H. pylori infection should include either one of the indirect methods (UBT, stool antigen test, or serum H. pylori IgG antibody test) or invasive methods (RUT or gastric biopsy for histology) [20].

5. Conclusions

Direct diagnostic methods, including histopathology and/or IHC, RUT, and culture are frequently used as they provide genotype and antibiotic resistance information. Among the indirect tests, UBT and SAT became the best methods to determine an active infection. On the other hand, antibody-based tests, especially serology, are widely available, very sensitive, but not specific. Based on four epidemiological studies, culture and RUT present a sensitivity of 74.2–90.8% and 83.3–86.9% and a specificity of 97.7–98.8% and 95.1–97.2%, respectively, when using histology and IHC as a gold standard. The sensitivity of the serology test is quite high, but that of the urine test was lower when compared with other methods. Several guidelines indicate that not one single test can be considered as the gold standard for the diagnosis of H. pylori and that the choice of the test should be made taking into consideration advantages and disadvantages of different methods (Table 6). Although there was no perfect test, the combination of culture confirmed by histology and IHC or combination of a validated serology and UBT will be complementary. The low sensitivity of culture will be complemented by histology, and IHC could increase the sensitivity of histology. On the other hand, serology will cover the weaknesses of UBT which has less ability in the presence of atrophy. However it should be noted that validation of indirect tests is important, although some commercial kits propose universal cut-off values.

Table 6: Diagnostic test for H. pylori infection.

Diagnostic test
Sensitivity 
[18, 21]
Specificity 
[18, 21]
Advantages
Disadvantages

Direct test

Histology
95%
99%
High accuracy, a possibility to send specimens at room temperature, and combination with IHC increase accuracy.
Low sensitivity for patients with gastric atrophy or intestinal metaplasia, time and cost, dependent on the operator skills, and interobserver variability.

Culture
69–98%
100%
Direct detection of H. pylori, excellent specificity, and allowing determination of antibiotic sensitivities.
Limited sensitivity, time-consuming procedure, and need of a special transport.

RUT
90%
93%
Inexpensive and provides rapid results, adding the number and increasing the size of biopsy specimens will increase the accuracy.
Sensitivity significantly reduced by bismuth, PPI and antibiotics, and formalin contamination of biopsy forceps generate false negative.

Indirect test

UBT
95%
95%
Higher accuracy than serology and SAT, having a new portable type.
Atrophy, bismuth, PPI and antibiotics induce false-negative and need a local validation.

SAT
94%
92%
More economical than UBT and monoclonal antibody showed better accuracy.
Differences in the antigens may affect the accuracy, influence by bismuth, PPI, and antibiotics, and accuracy was influenced by stool condition.

Serology
90%
80%
Inexpensive, widely available, and the most efficient method in particular condition.
Less accurate than UBT and SAT and the cut-off values should be validated locally and cannot distinguish between current and past infections.

PPI: proton pump inhibitor; UBT: urea breath test; SAT: stool antigen test; RUT: rapid urease test.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

This work was supported in part by grants from the National Institutes of Health (DK62813) and the Grants-in-Aid for Scientific Research from the Ministry of Education, Culture, Sports, Science, and Technology (MEXT) of Japan (24406015, 24659200, 25293104, 26640114, and 15H02657) (Yoshio Yamaoka). It was also supported by the Japan Society for the Promotion of Science (JSPS) Institutional Program for Young Researcher Overseas Visits (Yoshio Yamaoka) and the Strategic Funds for the Promotion of Science and Technology from Japan Science and Technology Agency (JST) (Yoshio Yamaoka).

References

S. Suerbaum and P. Michetti, “Helicobacter pylori infection,” The New England Journal of Medicine, vol. 347, no. 15, pp. 1175–1186, 2002.

P. Correa, “Human gastric carcinogenesis: a multistep and multifactorial process—first American cancer society award lecture on cancer epidemiology and prevention,” Cancer Research, vol. 52, no. 24, pp. 6735–6740, 1992.

B. J. Marshall and J. R. Warren, “Unidentified curved bacilli in the stomach of patients with gastritis and peptic ulceration,” The Lancet, vol. 323, no. 8390, pp. 1311–1315, 1984.

C. Burucoa, J.-C. Delchier, A. Courillon-Mallet et al., “Comparative evaluation of 29 commercial Helicobacter pylori serological kits,” Helicobacter, vol. 18, no. 3, pp. 169–179, 2013.

J. P. Gisbert and J. M. Pajares, “Review article: ¹³C-urea breath test in the diagnosis of Helicobacter pylori infection—a critical review,” Alimentary Pharmacology & Therapeutics, vol. 20, no. 10, pp. 1001–1017, 2004.

P. Malfertheiner, F. Megraud, C. A. O'Morain et al., “Management of Helicobacter pylori infection—the maastricht IV/ florence consensus report,” Gut, vol. 61, no. 5, pp. 646–664, 2012.

K. M. Fock, P. Katelaris, K. Sugano et al., “Second Asia-Pacific consensus guidelines for Helicobacter pylori infection,” Journal of Gastroenterology and Hepatology, vol. 24, no. 10, pp. 1587–1600, 2009.

A. Iranikhah, M.-R. Ghadir, S. Sarkeshikian, H. Saneian, A. Heidari, and M. Mahvari, “Stool antigen tests for the detection of Helicobacter pylori in children,” Iranian Journal of Pediatrics, vol. 23, no. 2, pp. 138–142, 2013.

E. Z. Chehter, M. R. Bacci, F. L. A. Fonseca et al., “Diagnosis of the infection by the Helicobacter pylori through stool examination: method standardization in adults,” Clinical Biochemistry, vol. 46, no. 15, pp. 1622–1624, 2013.

D. Raguza, R. S. MacHado, S. K. Ogata, C. F. H. Granato, F. R. S. Patrício, and E. Kawakami, “Validation of a monoclonal stool antigen test for diagnosing Helicobacter pylori infection in young children,” Journal of Pediatric Gastroenterology and Nutrition, vol. 50, no. 4, pp. 400–403, 2010.

R. H. Hunt, S. D. Xiao, F. Megraud et al., “Helicobacter pylori in developing countries. World gastroenterology organisation global guideline,” Journal of Gastrointestinal and Liver Diseases, vol. 20, no. 3, pp. 299–304, 2011.

W. D. Chey and B. C. Y. Wong, “American College of Gastroenterology guideline on the management of Helicobacter pylori infection,” The American Journal of Gastroenterology, vol. 102, no. 8, pp. 1808–1825, 2007.

S. Shiota, M. Cruz, J. A. J. Abreu et al., “Virulence genes of Helicobacter pylori in the Dominican Republic,” Journal of Medical Microbiology, vol. 63, no. 9, pp. 1189–1196, 2014.

R.-K. Vilaichone, V. Mahachai, S. Shiota et al., “Extremely high prevalence of Helicobacter pylori infection in bhutan,” World Journal of Gastroenterology, vol. 19, no. 18, pp. 2806–2810, 2013.

T. Myint, S. Shiota, R.-K. Vilaichone et al., “Prevalence of Helicobacter pylori infection and atrophic gastritis in patients with dyspeptic symptoms in Myanmar,” World Journal of Gastroenterology, vol. 21, no. 2, pp. 612–619, 2015.

M. Miftahussurur, S. Shiota, R. Suzuki et al., “Identification of Helicobacter pylori infection in symptomatic patients in Surabaya, Indonesia, using five diagnostic tests,” Epidemiology and Infection, vol. 143, no. 5, pp. 986–996, 2015.

S. Shiota, V. Mahachai, R.-K. Vilaichone et al., “Seroprevalence of Helicobacter pylori infection and gastric mucosal atrophy in Bhutan, a country with a high prevalence of gastric cancer,” Journal of Medical Microbiology, vol. 62, no. 10, pp. 1571–1578, 2013.

M. Asaka, M. Kato, S.-I. Takahashi et al., “Guidelines for the management of Helicobacter pylori infection in Japan: 2009 revised edition,” Helicobacter, vol. 15, no. 1, pp. 1–20, 2010.

W. Z. Liu, Y. Xie, H. Cheng et al., “Fourth Chinese National Consensus Report on the management of Helicobacter pylori infection,” Journal of Digestive Diseases, vol. 14, no. 5, pp. 211–221, 2013.

S.-Y. Lee, “Current progress toward eradicating Helicobacter pylori in East Asian countries: differences in the 2013 revised guidelines between China, Japan, and South Korea,” World Journal of Gastroenterology, vol. 20, no. 6, pp. 1493–1502, 2014.

N. Vakil, D. Rhew, A. Soll, and J. J. Ofman, “The cost-effectiveness of diagnostic testing strategies for Helicobacter pylori,” The American Journal of Gastroenterology, vol. 95, no. 7, pp. 1691–1698, 2000.

N. Hidaka, Y. Nakayama, A. Horiuchi, S. Kato, and K. Sano, “Endoscopic identification of Helicobacter pylori gastritis in children,” Digestive Endoscopy, vol. 22, no. 2, pp. 90–94, 2010.

R. Ji and Y.-Q. Li, “Diagnosing Helicobacter pylori infection in vivo by novel endoscopic techniques,” World Journal of Gastroenterology, vol. 20, no. 28, pp. 9314–9320, 2014.

T. Tahara, T. Shibata, M. Nakamura et al., “Gastric mucosal pattern by using magnifying narrow-band imaging endoscopy clearly distinguishes histological and serological severity of chronic gastritis,” Gastrointestinal Endoscopy, vol. 70, no. 2, pp. 246–253, 2009.

S. Kimura, H. Inoue, Y. Sato et al., “Ex vivo visualization of Helicobacter pylori using an endocytoscopic probe,” Biomedical Research, vol. 27, no. 5, pp. 255–257, 2006.

M. Miftahussurur, J. Tuda, R. Suzuki et al., “Extremely low Helicobacter pylori prevalence in North Sulawesi, Indonesia and identification of a Maori-tribe type strain: a cross sectional study,” Gut Pathogens, vol. 6, no. 1, article 42, 2014.

D. Y. Graham, M. Kudo, R. Reddy, and A. R. Opekun, “Practical rapid, minimally invasive, reliable nonendoscopic method to obtain Helicobacter pylori for culture,” Helicobacter, vol. 10, no. 1, pp. 1–3, 2005.

S. W. Han, R. Flamm, C. Y. Hachem et al., “Transport and storage of Helicobacter pylori from gastric mucosal biopsies and clinical isolates,” European Journal of Clinical Microbiology & Infectious Diseases, vol. 14, no. 4, pp. 349–352, 1995.

F. Mégraud and P. Lehours, “Helicobacter pylori detection and antimicrobial susceptibility testing,” Clinical Microbiology Reviews, vol. 20, no. 2, pp. 280–322, 2007.

A. Fich, N. J. Talley, R. G. Shorter, and S. F. Phillips, “Histological evaluation of Campylobacter pylori from tissue specimens stored in formaldehyde can be misleading,” Journal of Clinical Gastroenterology, vol. 11, no. 5, article 585, 1989.

C. M. Shin, N. Kim, H. S. Lee et al., “Validation of diagnostic tests for Helicobacter pylori with regard to grade of atrophic gastritis and/or intestinal metaplasia,” Helicobacter, vol. 14, no. 6, pp. 512–519, 2009.

C. G. Kim, I. J. Choi, J. Y. Lee et al., “Biopsy site for detecting Helicobacter pylori infection in patients with gastric cancer,” Journal of Gastroenterology and Hepatology, vol. 24, no. 3, pp. 469–474, 2009.

J. H. Lee, Y. S. Park, K.-S. Choi et al., “Optimal biopsy site for Helicobacter pylori detection during endoscopic mucosectomy in patients with extensive gastric atrophy,” Helicobacter, vol. 17, no. 6, pp. 405–410, 2012.

M. F. Dixon, R. M. Genta, J. H. Yardley, and P. Correa, “Classification and grading of gastritis. The updated Sydney System. International Workshop on the Histopathology of Gastritis, Houston 1994,” The American Journal of Surgical Pathology, vol. 20, no. 10, pp. 1161–1181, 1996.

H. Enomoto, H. Watanabe, K. Nishikura, H. Umezawa, and H. Asakura, “Topographic distribution of Helicobacter pylori in the resected stomach,” European Journal of Gastroenterology & Hepatology, vol. 10, no. 6, pp. 473–478, 1998.

K. Satoh, K. Kimura, Y. Taniguchi et al., “Biopsy sites suitable for the diagnosis of Helicobacter pylori infection and the assessment of the extent of atrophic gastritis,” The American Journal of Gastroenterology, vol. 93, no. 4, pp. 569–573, 1998.

M. C. van Ijzendoorn, R. J. F. Laheij, W. A. de Boer, and J. B. M. J. Jansen, “The importance of corpus biopsies for the determination of Helicobacter pylori infection,” Netherlands Journal of Medicine, vol. 63, no. 4, pp. 141–145, 2005.

L. Laine, D. N. Lewin, W. Naritoku, and H. Cohen, “Prospective comparison of H&E, Giemsa, and Genta stains for the diagnosis of Helicobacter pylori,” Gastrointestinal Endoscopy, vol. 45, no. 6, pp. 463–467, 1997.

C. Doglioni, M. Turrin, E. Macri, C. Chiarelli, B. Germanà, and M. Barbareschi, “HpSS: a new silver staining method for Helicobacter pylori,” Journal of Clinical Pathology, vol. 50, no. 6, pp. 461–464, 1997.

D. Jonkers, E. Stobberingh, A. de Bruine, J. W. Arends, and R. Stockbrügger, “Evaluation of immunohistochemistry for the detection of Helicobacter pylori in gastric mucosal biopsies,” Journal of Infection, vol. 35, no. 2, pp. 149–154, 1997.

N. Aggarwal, P. Snyder, and S. R. Owens, “Unusual Helicobacter pylori in gastric resection specimens: an old friend with a new look,” International Journal of Surgical Pathology, vol. 19, no. 3, pp. 297–302, 2011.

M. Ashton-Key, T. C. Diss, and P. G. Isaacson, “Detection of Helicobacter pylori in gastric biopsy and resection specimens,” Journal of Clinical Pathology, vol. 49, no. 2, pp. 107–111, 1996.

T. Uchida, R. Kanada, Y. Tsukamoto et al., “Immunohistochemical diagnosis of the cagA-gene genotype of Helicobacter pylori with anti-East Asian CagA-specific antibody,” Cancer Science, vol. 98, no. 4, pp. 521–528, 2007.

R. Kanada, T. Uchida, Y. Tsukamoto et al., “Genotyping of the cagA gene of Helicobacter pylori on immunohistochemistry with East Asian CagA-specific antibody,” Pathology International, vol. 58, no. 4, pp. 218–225, 2008.

L. T. Nguyen, T. Uchida, A. Kuroda et al., “Evaluation of the anti-East Asian CagA-specific antibody for CagA phenotyping,” Clinical and Vaccine Immunology, vol. 16, no. 11, pp. 1687–1692, 2009.

H. Rüssmann, V. A. J. Kempf, S. Koletzko, J. Heesemann, and I. B. Autenrieth, “Comparison of fluorescent in situ hybridization and conventional culturing for detection of Helicobacter pylori in gastric biopsy specimens,” Journal of Clinical Microbiology, vol. 39, no. 1, pp. 304–308, 2001.

M. Rugge, A. Meggio, G. Pennelli et al., “Gastritis staging in clinical practice: the OLGA staging system,” Gut, vol. 56, no. 5, pp. 631–636, 2007.

M. Rugge, M. de Boni, G. Pennelli et al., “Gastritis OLGA-staging and gastric cancer risk: a twelve-year clinico-pathological follow-up study,” Alimentary Pharmacology& Therapeutics, vol. 31, no. 10, pp. 1104–1111, 2010.

J. Y. Lee and N. Kim, “Diagnosis of Helicobacter pylori by invasive test: histology,” Annals of Translational Medicine, vol. 3, no. 1, p. 10, 2015.

X.-Y. Chen, R. W. M. van der Hulst, M. J. Bruno et al., “Interobserver variation in the histopathological scoring of Helicobacter pylori related gastritis,” Journal of Clinical Pathology, vol. 52, no. 8, pp. 612–615, 1999.

S. K. Patel, C. B. Pratap, A. K. Jain, A. K. Gulati, and G. Nath, “Diagnosis of Helicobacter pylori: what should be the gold standard?” World Journal of Gastroenterology, vol. 20, no. 36, pp. 12847–12859, 2014.

D. I. Grove, G. Koutsouridis, and A. G. Cummins, “Comparison of culture, histopathology and urease testing for the diagnosis of Helicobacter pylori gastritis and susceptibility to amoxycillin, clarithromycin, metronidazole and tetracycline,” Pathology, vol. 30, no. 2, pp. 183–187, 1998.

R. J. L. F. Loffeld, E. Stobberingh, J. A. Flendrig, and J. W. Arends, “Helicobacter pylori in gastric biopsy specimens. Comparison of culture, modified giemsa stain, and immunohistochemistry. a retrospective study,” The Journal of Pathology, vol. 165, no. 1, pp. 69–73, 1991.

W. Tee, S. Fairley, R. Smallwood, and B. Dwyer, “Comparative evaluation of three selective media and a nonselective medium for the culture of Helicobacter pylori from gastric biopsies,” Journal of Clinical Microbiology, vol. 29, no. 11, pp. 2587–2589, 1991.

S. M. Kelly, M. C. L. Pitcher, S. M. Farmery, and G. R. Gibson, “Isolation of Helicobacter pylori from feces of patients with dyspepsia in the United Kingdom,” Gastroenterology, vol. 107, no. 6, pp. 1671–1674, 1994.

M. P. Dore, M. S. Osato, H. M. Malaty, and D. Y. Graham, “Characterization of a culture method to recover Helicobacter pylori from the feces of infected patients,” Helicobacter, vol. 5, no. 3, pp. 165–168, 2000.

J. E. Thomas, G. R. Gibson, M. K. Darboe, A. Dale, and L. T. Weaver, “Isolation of Helicobacter pylori from human faeces,” The Lancet, vol. 340, no. 8829, pp. 1194–1195, 1992.

S. Kabir, “Detection of Helicobacter pylori in faeces by culture, PCR and enzyme immunoassay,” Journal of Medical Microbiology, vol. 50, no. 12, pp. 1021–1029, 2001.

M. Sugimoto and T. Furuta, “Efficacy of tailored Helicobacter pylori eradication therapy based on antibiotic susceptibility and CYP2C19 genotype,” World Journal of Gastroenterology, vol. 20, no. 21, pp. 6400–6411, 2014.

T. T. Binh, S. Shiota, R. Suzuki et al., “Discovery of novel mutations for clarithromycin resistance in Helicobacter pylori by using next-generation sequencing,” The Journal of Antimicrobial Chemotherapy, vol. 69, no. 7, Article ID dku050, pp. 1796–1803, 2014.

F. Perna and D. Vaira, “A new 24 h ELISA culture based method for Helicobacter pylori chemosusceptibility,” Journal of Clinical Pathology, vol. 63, no. 7, pp. 648–651, 2010.

C. M. McNulty and R. Wise, “Rapid diagnosis of Campylobacter-associated gastritis,” The Lancet, vol. 325, no. 8443, pp. 1443–1444, 1985.

C. A. M. McNulty, J. C. Dent, J. S. Uff, M. W. L. Gear, and S. P. Wilkinson, “Detection of Campylobacter pylori by the biopsy urease test: an assessment in 1445 patients,” Gut, vol. 30, no. 8, pp. 1058–1062, 1989.

T. Uotani and D. Y. Graham, “Diagnosis of Helicobacter pylori using the rapid urease test,” Annals of Translational Medicine, vol. 3, no. 1, article 9, 2015.

H. M. Windsor, G. Y. Ho, and B. J. Marshall, “Successful recovery of H. pylori from rapid urease tests (CLO tests),” The American Journal of Gastroenterology, vol. 94, no. 11, pp. 3181–3183, 1999.

Y. Li, E. Rimbara, S. Thirumurthi et al., “Detection of clarithromycin resistance in Helicobacter pylori following noncryogenic storage of rapid urease tests for 30 days,” Journal of Digestive Diseases, vol. 13, no. 1, pp. 54–59, 2012.

D. Vaira, J. Holton, S. Cairns, M. Falzon, and P. Salmon, “Four hour Rapid Urease Test (RUT) for detecting Campylobacter pylori: is it reliable enough to start treatment?” Journal of Clinical Pathology, vol. 41, no. 3, pp. 355–356, 1988.

D. Vaira, J. Holton, S. Cairns et al., “Urease tests for Campylobacter pylori: care in interpretation,” Journal of Clinical Pathology, vol. 41, no. 7, pp. 812–813, 1988.

D. Vaira, L. Gatta, C. Ricci et al., “A comparison amongst three rapid urease tests to diagnose Helicobacter pylori infection in 375 consecutive dyspeptic,” Internal and Emergency Medicine, vol. 5, no. 1, pp. 41–47, 2010.

H. M. T. el-Zimaity, M. T. al-Assi, R. M. Genta, and D. Y. Graham, “Confirmation of successful therapy of Helicobacter pylori infection: number and site of biopsies or a rapid urease test,” The American Journal of Gastroenterology, vol. 90, no. 11, pp. 1962–1964, 1995.

M. M. Yousfi, H. M. T. El-Zimaity, R. A. Cole, R. M. Genta, and D. Y. Graham, “Detection of Helicobacter pylori by rapid urease tests: is biopsy size a critical variable?” Gastrointestinal Endoscopy, vol. 43, no. 3, pp. 222–224, 1996.

P. Midolo and B. J. Marshall, “Accurate diagnosis of Helicobacter pylori. Urease tests,” Gastroenterology Clinics of North America, vol. 29, no. 4, pp. 871–878, 2000.

E. Ozaslan, T. Koseoglu, T. Purnak, and A. Yildiz, “A forgotten cause of false negative rapid urease test: formalin contamination of the sample,” Hepato-Gastroenterology, vol. 57, no. 99-100, 2 pages, 2010.

T. Osaki, K. Mabe, T. Hanawa, and S. Kamiya, “Urease-positive bacteria in the stomach induce a false-positive reaction in a urea breath test for diagnosis of Helicobacter pylori infection,” Journal of Medical Microbiology, vol. 57, no. 7, pp. 814–819, 2008.

D. Vaira, L. Gatta, C. Ricci, V. Bernabucci, M. Cavina, and M. Miglioli, “Non-invasive analyses for the diagnosis of Helicobacter pylori infection. A critical review of the literature,” Annali Italiani di Medicina Interna, vol. 20, no. 1, pp. 23–27, 2005.

M. Nocon, A. Kuhlmann, A. Leodolter et al., “Efficacy and cost-effectiveness of the ¹³C-urea breath test as the primary diagnostic investigation for the detection of Helicobacter pylori infection compared to invasive and non-invasive diagnostic tests,” GMS Health Technology Assessment, vol. 5, article Doc14, 2009.

L. V. Jonaitis, G. Kiudelis, and L. Kupcinskas, “Evaluation of a novel 14C-urea breath test ‘Heliprobe’ in diagnosis of Helicobacter pylori infection,” Medicina, vol. 43, no. 1, pp. 32–35, 2007.

D. Y. Graham, D. Evans Jr., L. Alpert et al., “Campylobacter pylori detected noninvasively by the 13C-urea breath test,” The Lancet, vol. 329, no. 8543, pp. 1174–1177, 1987.

P. D. Klein, H. M. Malaty, R. F. Martin, K. S. Graham, R. M. Genta, and D. Y. Graham, “Noninvasive detection of Helicobacter pylori infection in clinical practice: the 13C urea breath test,” The American Journal of Gastroenterology, vol. 91, no. 4, pp. 690–694, 1996.

R. P. H. Logan, R. J. Poison, J. J. Misiewicz et al., “Simplified single sample ¹³Carbon urea breath test for Helicobacter pylori: comparison with histology, culture, and ELISA serology,” Gut, vol. 32, no. 12, pp. 1461–1464, 1991.

X. Calvet, P. Lehours, S. Lario, and F. Mégraud, “Diagnosis of Helicobacter pylori infection,” Helicobacter, vol. 15, supplement 1, pp. 7–13, 2010.

D. Vaira, L. Gatta, C. Ricci, F. Di Mario, and A. Lanzini, “Accuracy of urea breath tests tablets after 10 minutes compared with standard 30 minutes to diagnose and monitoring Helicobacter pylori infection: a randomized controlled trial,” Journal of Clinical Gastroenterology, vol. 43, no. 7, pp. 693–694, 2009.

X. Calvet, J. Sánchez-Delgado, A. Montserrat et al., “Accuracy of diagnostic tests for Helicobacter pylori: a reappraisal,” Clinical Infectious Diseases, vol. 48, no. 10, pp. 1385–1391, 2009.

F. Parente and G. Bianchi Porro, “The (13)C-urea breath test for non-invasive diagnosis of Helicobacter pylori infection: which procedure and which measuring equipment?” European Journal of Gastroenterology & Hepatology, vol. 13, no. 7, pp. 803–806, 2001.

A. Korstanje, S. van Eeden, G. J. A. Offerhaus et al., “The ¹³carbon urea breath test for the diagnosis of Helicobacter pylori infection in subjects with atrophic gastritis: evaluation in a primary care setting,” Alimentary Pharmacology & Therapeutics, vol. 24, no. 4, pp. 643–650, 2006.

M. Udd, P. Miettinen, A. Palmu, and R. Julkunen, “Effect of short-term treatment with regular or high doses of omeprazole on the detection of Helicobacter pylori in bleeding peptic ulcer patients,” Scandinavian Journal of Gastroenterology, vol. 38, no. 6, pp. 588–593, 2003.

D. Y. Graham, A. R. Opekun, F. Hammoud et al., “Studies regarding the mechanism of false negative urea breath tests with proton pump inhibitors,” The American Journal of Gastroenterology, vol. 98, no. 5, pp. 1005–1009, 2003.

R. S. Machado, E. Kawakami, F. R. Da Silva Patrício, and M. Reber, “Urease activity does not reflect the degree of colonization by Helicobacter pylori in children,” Pediatrics International, vol. 48, no. 4, pp. 398–402, 2006.

M. Y. Cirak, Y. Akyön, and F. Mégraud, “Diagnosis of Helicobacter pylori,” Helicobacter, vol. 12, supplement 1, pp. 4–9, 2007.

N. Sano, S. Ohara, T. Koike et al., “Influence of urease activity of the oral cavity and oropharynx on 13C-urea breath test,” The Japanese Journal of Gastroenterology, vol. 101, no. 12, pp. 1302–1308, 2004.

M. Mauro, V. Radovic, P. Zhou et al., “¹³C urea breath test for Helicobacter pylori: determination of the optimal cut-off point in a Canadian community population,” Canadian Journal of Gastroenterology, vol. 20, no. 12, pp. 770–774, 2006.

S. Kato, K. Ozawa, M. Konno et al., “Diagnostic accuracy of the ¹³C-urea breath test for childhood Helicobacter pylori infection: a multicenter Japanese study,” The American Journal of Gastroenterology, vol. 97, no. 7, pp. 1668–1673, 2002.

G. M. Matthews, A. G. Cummins, A. Lawrence, B. Johnson, F. Campbell, and R. N. Butler, “¹³C-urea breath test: reproducibility and association with the severity of Helicobacter pylori-associated antral gastritis,” Journal of Gastroenterology and Hepatology, vol. 20, no. 2, pp. 270–274, 2005.

Y.-C. Lai, J.-C. Yang, and S.-H. Huang, “Pre-treatment urea breath test results predict the efficacy of Helicobacter pylori eradication therapy in patients with active duodenal ulcers,” World Journal of Gastroenterology, vol. 10, no. 7, pp. 991–994, 2004.

A.-W. Kao, H.-C. Cheng, B.-S. Sheu et al., “Posttreatment 13C-urea breath test is predictive of antimicrobial resistance to H. pylori after failed therapy,” Journal of General Internal Medicine, vol. 20, no. 2, pp. 139–142, 2005.

J. P. Gisbert and J. M. Pajares, “Stool antigen test for the diagnosis of Helicobocter pylori infection: a systematic review,” Helicobacter, vol. 9, no. 4, pp. 347–368, 2004.

K. A. Krogfelt, P. Lehours, and F. Mégraud, “Diagnosis of Helicobacter pylori infection,” Helicobacter, vol. 10, supplement 1, pp. 5–13, 2005.

T. Shimoyama, M. Sawaya, A. Ishiguro, N. Hanabata, T. Yoshimura, and S. Fukuda, “Applicability of a rapid stool antigen test, using monoclonal antibody to catalase, for the management of Helicobacter pylori infection,” Journal of Gastroenterology, vol. 46, no. 4, pp. 487–491, 2011.

M. Kodama, K. Murakami, T. Okimoto et al., “Infuence of proton pump inhibitor treatment on Helicobacter pylori stool antigen test,” World Journal of Gastroenterology, vol. 18, no. 1, pp. 44–48, 2012.

Y. K. Yee, K. T. Yip, T. L. Que et al., “Efficacy of enzyme immunoassay for the detection of Helicobacter pylori antigens in frozen stool specimens: local validation,” Alimentary Pharmacology & Therapeutics, vol. 16, no. 10, pp. 1739–1742, 2002.

B. E. Dunn, H. Cohen, and M. J. Blaser, “Helicobacter pylori,” Clinical Microbiology Reviews, vol. 10, no. 4, pp. 720–741, 1997.

U. Peitz, M. Baumann, B. Tillenburg et al., “Insufficient validity of a rapid blood test for diagnosis of helicobacter pylori infection,” Medizinische Klinik, vol. 96, no. 12, pp. 703–707, 2001.

A. Kokkola, H. Rautelin, P. Puolakkainen et al., “Diagnosis of Helicobacter pylori infection in patients with atrophic gastritis: comparison of histology, 13C-urea breath test, and serology,” Scandinavian Journal of Gastroenterology, vol. 35, no. 2, pp. 138–141, 2000.

P. Lehours, A. Ruskone-Fourmestraux, A. Lavergne, F. Cantet, and F. Mégraud, “Which test to use to detect Helicobacter pylori infection in patients with low-grade gastric mucosa-associated lymphoid tissue lymphoma?” The American Journal of Gastroenterology, vol. 98, no. 2, pp. 291–295, 2003.

A. M. Ekström, M. Held, L.-E. Hansson, L. Engstrand, and O. Nyrén, “Helicobacter pylori in gastric cancer established by CagA immunoblot as a marker of past infection,” Gastroenterology, vol. 121, no. 4, pp. 784–791, 2001.

T. U. Kosunen, K. Seppälä, S. Sarna, and P. Sipponen, “Diagnostic value of decreasing IgG, IgA, and IgM antibody titres after eradication of Helicobacter pylori,” The Lancet, vol. 339, no. 8798, pp. 893–895, 1992.

R. J. F. Laheij, H. Straatman, J. B. M. J. Jansen, and A. L. M. Verbeek, “Evaluation of commercially available Helicobacter pylori serology kits: a review,” Journal of Clinical Microbiology, vol. 36, no. 10, pp. 2803–2809, 1998.

W. K. Leung, E. K. W. Ng, F. K. L. Chan, S. C. S. Chung, and J. J. Y. Sung, “Evaluation of three commercial enzyme-linked immunosorbent assay kits for diagnosis of Helicobacter pylori in Chinese patients,” Diagnostic Microbiology and Infectious Disease, vol. 34, no. 1, pp. 13–17, 1999.

H. Miwa, S. Kikuchi, K. Ohtaka et al., “Insufficient diagnostic accuracy of imported serological kits for Helicobacter pylori infection in Japanese population,” Diagnostic Microbiology and Infectious Disease, vol. 36, no. 2, pp. 95–99, 2000.

C. E. Grimley, R. L. Holder, D. E. Loft, A. Morris, and C. U. Nwokolo, “Helicobacter pylori-associated antibodies in patients with duodenal ulcer, gastric and oesophageal adenocarcinoma,” European Journal of Gastroenterology & Hepatology, vol. 11, no. 5, pp. 503–509, 1999.

J. Parsonnet, “The incidence of Helicobacter pylori infection,” Alimentary Pharmacology & Therapeutics, vol. 9, supplement 2, pp. 45–51, 1995.

S. Shiota, O. Matsunari, M. Watada, and Y. Yamaoka, “Serum Helicobacter pylori CagA antibody as a biomarker for gastric cancer in east-Asian countries,” Future Microbiology, vol. 5, no. 12, pp. 1885–1893, 2010.

M. Asaka, T. Kimura, M. Kato et al., “Possible role of Helicobacter pylori infection in early gastric cancer development,” Cancer, vol. 73, no. 11, pp. 2691–2694, 1994.

M. E. Craanen, W. Dekker, P. Blok, J. Ferweda, and G. N. J. Tytgat, “Intestinal metaplasia and Helicobacter pylori: an endoscopic bioptic study of the gastric antrum,” Gut, vol. 33, no. 1, pp. 16–20, 1992.

J. Rudi, C. Kolb, M. Maiwald et al., “Serum antibodies against Helicobacter pylori proteins VacA and CagA are associated with increased risk for gastric adenocarcinoma,” Digestive Diseases and Sciences, vol. 42, no. 8, pp. 1652–1659, 1997.

K. Katsuragi, A. Noda, T. Tachikawa et al., “Highly sensitive urine-based enzyme-linked immunosorbent assay for detection of antibody to Helicobacter pylori,” Helicobacter, vol. 3, no. 4, pp. 289–295, 1998.

H. Miwa, M. Hirose, S. Kikuchi et al., “How useful is the detection kit for antibody to Helicobacter pylori in urine (URINELISA) in clinical practice?” American Journal of Gastroenterology, vol. 94, no. 12, pp. 3460–3463, 1999.

M. Kato, M. Asaka, M. Saito et al., “Clinical usefulness of urine-based enzyme-linked immunosorbent assay for detection of antibody to Helicobacter pylori: a collaborative study in nine medical institutions in Japan,” Helicobacter, vol. 5, no. 2, pp. 109–119, 2000.

T. Shimizu, Y. Yarita, H. Haruna et al., “Urine-based enzyme-linked immunosorbent assay for the detection of Helicobacter pylori antibodies in children,” Journal of Paediatrics and Child Health, vol. 39, no. 8, pp. 606–610, 2003.

F.-C. Kuo, S.-W. Wang, I.-C. Wu et al., “Evaluation of urine ELISA test for detecting Helicobacter pylori infection in Taiwan: a prospective study,” World Journal of Gastroenterology, vol. 11, no. 35, pp. 5545–5548, 2005.

D. Y. Graham and S. Reddy, “Rapid detection of anti-Helicobacter pylori IgG in urine using immunochromatography,” Alimentary Pharmacology and Therapeutics, vol. 15, no. 5, pp. 699–702, 2001.

L. T. Nguyen, T. Uchida, Y. Tsukamoto et al., “Evaluation of rapid urine test for the detection of Helicobacter pylori infection in the Vietnamese population,” Digestive Diseases and Sciences, vol. 55, no. 1, pp. 89–93, 2010.

S. K. Lam and N. J. Talley, “Report of the 1997 Asia Pacific Consensus Conference on the management of Helicobacter pylori infection,” Journal of Gastroenterology and Hepatology, vol. 13, no. 1, pp. 1–12, 1998.

P. Malfertheiner, F. Mégraud, C. O'Morain et al., “Current concepts in the management of Helicobacter pylori infection—the Maastricht 2-2000 Consensus Report,” Alimentary Pharmacology & Therapeutics, vol. 16, no. 2, pp. 167–180, 2002.

P. Malfertheiner, F. Megraud, C. O'Morain et al., “Current concepts in the management of Helicobacter pylori infection: the Maastricht III Consensus Report,” Gut, vol. 56, no. 6, pp. 772–781, 2007.