BioMed Research International
Volume 2017 (2017), Article ID 3498537, 1 page
https://doi.org/10.1155/2017/3498537

Corrigendum

Corrigendum to “Quantitative Evaluation and Selection of Reference Genes for Quantitative RT-PCR in Mouse Acute Pancreatitis”

Zhaoping Yan,¹ Jinhang Gao,¹ Xiuhe Lv,¹ Wenjuan Yang,¹ Shilei Wen,¹ Huan Tong,² and Chengwei Tang1,2

¹Division of Peptides Related with Human Diseases, State Key Laboratory of Biotherapy of Human Diseases, West China Hospital, Sichuan University, Chengdu, Sichuan 610041, China
²Department of Gastroenterology, West China Hospital, Sichuan University, Chengdu, Sichuan 610041, China

Correspondence should be addressed to Chengwei Tang; shcqcdmed@163.com

Received 11 January 2017; Accepted 5 March 2017; Published 13 April 2017

Copyright © 2017 Zhaoping Yan et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Quantitative Evaluation and Selection of Reference Genes for Quantitative RT-PCR in Mouse Acute Pancreatitis” [1], the affiliation of the first author should be “Division of Peptides Related with Human Diseases, State Key Laboratory of Biotherapy of Human Diseases, West China Hospital, Sichuan University, Chengdu, Sichuan 610041, China” only. The corrected authors’ list and affiliations are shown above.

References

Z. Yan, J. Gao, X. Lv et al., “Quantitative evaluation and selection of reference genes for quantitative RT-PCR in mouse acute pancreatitis,” BioMed Research International, vol. 2016, Article ID 8367063, 11 pages, 2016.