BioMed Research International
Volume 2017 (2017), Article ID 3926498, 7 pages
https://doi.org/10.1155/2017/3926498

Research Article

Identification of “BRAF-Positive” Cases Based on Whole-Slide Image Analysis

Vlad Popovici,¹ Aleš Křenek,² and Eva Budinská³

¹Institute of Biostatistics and Analyses, Faculty of Medicine and Research Centre for Toxic Compounds in the Environment, Faculty of Science, Masarykova Univerzita, Kamenice 5, 625 00 Brno, Czech Republic
²Institute of Computer Science, Masarykova Univerzita, Šumavská 15, 602 00 Brno, Czech Republic
³Research Centre for Toxic Compounds in the Environment, Faculty of Science, Masarykova Univerzita, Kamenice 5, 625 00 Brno, Czech Republic

Correspondence should be addressed to Vlad Popovici; popovici@iba.muni.cz

Received 11 November 2016; Accepted 20 March 2017; Published 24 April 2017

Academic Editor: Xudong Huang

Copyright © 2017 Vlad Popovici et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

A key requirement for precision medicine is the accurate identification of patients that would respond to a specific treatment or those that represent a high-risk group, and a plethora of molecular biomarkers have been proposed for this purpose during the last decade. Their application in clinical settings, however, is not always straightforward due to relatively high costs of some tests, limited availability of the biological material and time, and procedural constraints. Hence, there is an increasing interest in constructing tissue-based surrogate biomarkers that could be applied with minimal overhead directly to histopathology images and which could be used for guiding the selection of eventual further molecular tests. In the context of colorectal cancer, we present a method for constructing a surrogate biomarker that is able to predict with high accuracy whether a sample belongs to the “BRAF-positive” group, a high-risk group comprising V600E BRAF mutants and BRAF-mutant-like tumors. Our model is trained to mimic the predictions of a 64-gene signature, the current definition of BRAF-positive group, thus effectively identifying histopathology image features that can be linked to a molecular score. Since the only required input is the routine histopathology image, the model can easily be integrated in the diagnostic workflow.

1. Introduction

The pathologic assessment of the tumor specimen provides the essential information for patient management, outcome estimation, and treatment decision. In the case of colorectal cancer (CRC), the main parameters of the pathologic assessment include the TNM stage, histologic grade, tumor type, vascular infiltration, and status of the resection margins [1]. Aside from these classical parameters, the discovery of molecular drivers and markers for resistance led to refined prognostic and predictive models [2]. For example, it has been shown that KRAS-mutated tumors are resistant to anti-EGFR treatment [3, 4]. In parallel several molecular taxonomies partially explaining intertumoral heterogeneity have been proposed for CRC [5–7]. Of interest for the current study is the identification of a high-risk group of CRC patients consisting of V600E BRAF mutants and a sizeable BRAF-wild type subset of tumors which display a similar pattern of gene activation, the so-called BRAF-mutant-like tumors [8]. This group is collectively called BRAF-positive, as the defining 64-gene signature has positive values for these cases [8]. These are only a few of the plethora of gene expression signatures proposed for CRC (in other types of cancer, the situation being similar) and they all have in common the requirement for profiling a rather large panel of genes and the limited usage in clinical practice. Among the reasons for their slow adoption are the associated costs for tests and limited availability of biological material. On the other hand, if one could robustly predict the outcome of some of these molecular tests directly from the data available for the pathologic assessment, significant speed-ups and cost cuts would be achieved. This is one of the main justifications of the present study, in which we propose an image analysis model for recognizing the “BRAF-positive” cases of CRC, that is, to predict the (dichotomized) outcome of the BRAF signature [8]. A second and broader in scope justification is the interest in identifying and understanding the connections between tumor architecture and gene activity as captured by transcriptomics.

Such connections between phenotypical appearance of the tumor and gene activity have been established before. For example, in the case of breast cancer the lobular phenotype is associated with deletions in the CDH1 gene (encoding E-cadherin) [9] and the mesenchymal/metaplastic features are predictive in the case of AR-positive triple negative breast cancers [10]. In the case of colorectal cancer (CRC) the association of mucinous/serrated carcinomas with BRAF mutations is well known and we have shown that such association can be extended to the group of “BRAF-mutated-like” tumors, characterized by a specific genomic signature [8]. Similarly, connections between nuclear morphometry and molecular data have been identified in glioblastoma [11] and exploited in a multimodal prognostic signature in breast cancer [12]. When deriving molecular subtypes for colorectal cancer, we have also identified tumor architecture patterns preferentially enriched in those subtypes [5]. These observations all support the idea that genomic and phenotypic traits can be put in correspondence and, by consequence, that some phenotypic features could potentially be used as proxies for genomic markers.

In the present work, we propose an approach at building a histology image-based classifier able to predict the “BRAF-positive” status, as defined by the genomic signature. The gene expression data for the signature is supposed to be obtained from the same (or adjacent) tumor section as the histopathology whole-slide image. The key point of our approach resides in a convenient summarization of the imaging data into a code vector used for building the classification model. Apart from our own earlier results [13], there were no other studies to guide our selection of image features useful for this task. Hence, we took a data-driven approach in which the implicit hypothesis was that local tumor appearance contained enough information to build a predictor for the genomic “BRAF-positive” status. Thus, our approach was prior-free, in the sense that we did not restrict ourselves to a set of predefined (by an expert pathologist) measurements, with the potential drawback of limiting interpretability of the results.

Having a tissue-based surrogate biomarker for a genomic test allows an immediate integration in the routine diagnostic workflow and may provide the pathologist with hints for further genomic testing. This integration is supported by the increased adoption of digital pathology solutions. Additionally, such models can be applied to pathology image archives for the selection of cases for retrospective studies.

2. Materials and Methods

2.1. Data

The data collection used consisted of samples for which both histopathology whole-slide images and clinical data (including BRAF and KRAS mutation status) were available, along with gene expression necessary for computing the BRAF score [8]. These samples were a subset of the data collected in the PETACC-3 clinical trial [14] and were selected based on the image quality and availability of the mutation information. A summary of the data is presented in Table 1 detailing the following clinical and molecular parameters, in this order: tumor stage; microsatellite stability status (high microsatellite instability (MSI-M) versus low microsatellite instability (MSI-L) or microsatellite stable (MSS)); mutation status of BRAF (V600E mutation) and KRAS (in codons 12 and 13) oncogenes; BRAF score (from the genomic signature) and the mucinous histology status of the tumor.

Table 1: Summary of main clinical parameters.

Parameter
N
Proportion (%)

Stage

    Stage II
55
18.9

    Stage III
236
81.1

MSI

    MSI-H
12
4.1

    MSI-L & MSS
279
95.6

V600E BRAF status

    Mutated
16
5.5

    Wild type
275
94.5

KRAS (codons 12 and 13) status

    Mutated
113
38.8

    Wild type
178
61.2

BRAF score

    Positive
59
20.3

    Negative
232
79.7

Mucinous

    Yes
33
11.3

    No
258
88.7

For each sample, a whole-slide image of haematoxylin-eosin (H&E) stained tumor sections was acquired at x magnification, using Hamamatsu NanoZoomer C9600 scanner. The resulting images were compressed by the image acquisition software using JPEG standard (at 80% quality) and stored in the proprietary NDPI format. The resolution of the images was 455 nm/pixel (equivalent to 55824 DPI) for a typical size of pixels (varying with the size of the tissue section). The images were exported in standard TIFF format using OpenSlide software library [15].

2.2. Image Preprocessing

The whole-slide images were downscaled to an equivalent x magnification and only tumoral regions were retained from each sample (manually cut following the pathologist’s annotations), the pixels outside the tumors being set to zero. To obtain the intensity signal corresponding to the haematoxylin and eosin dyes, the color deconvolution method from [16] was used, resulting in two single channel (intensity) images (H- and E-images).

2.3. Feature Extraction and Image Summarization

Our main assumption for image data modeling was that local appearance of the tissue section (local texture) contains enough information to yield discriminative features. However, the representation of an image in terms of a set of local descriptors still does not allow a direct comparison of two images (required for building a classifier); hence further summarization and standardization of the representation are needed. A suitable framework is represented by the image-retrieval applications based on Bag-of-Visual-Words methods [17]. In this framework, the local descriptors are used to construct a codebook for image representation (the information in the image is highly compressed) and the image is recoded in terms of frequencies of elements (visual codewords) from the codebook. We adapted this general approach to the problem at hand, as follows.

We decided to use a two-level approach to image representation with the first level (L1) being generic for all images and the second one (L2) specific to each class. The main reason behind this approach was that the first coding level was designed to capture the appearance of small structures (several cells, patches of stroma, parts of the colon crypts, etc.), while the second level was intended to capture larger arrangements of basic structures, which might be specific to each class. Additionally, since the classification problem was highly imbalanced, such separation would allow structures of both classes to be equally represented. Such multilevel approach has been already used in natural scene categorization [18]; however in our method we used the class label in generating the second level representation.

The first level (L1) of coding considered local patches of size pixels as the basic processing unit. For such patches, we used the Gabor descriptors computed on both H- and E-images for each sample. These descriptors were based on the real component of the Gabor filter [19]:

where and was the frequency, the orientation, and the bandwidth of the Gaussian kernel, respectively. The parameters were fixed throughout all experiments: , and In total, there were 24 Gabor filters that led to a 48-valued descriptor vector for each H- and E-image, with the first 24 values representing the mean response and the last 24 values representing the variance of the filter responses, over the considered pixels’ patch. Thus, to each local patch from the original images corresponded 96-value descriptor vectors obtained by concatenating the Gabor descriptors of the H- and E-images.

From each image in the training set (which will be generated within the cross-validation loop, see Classifier Design), random patch descriptors were selected for building the L1 codebook using the standard k-means clustering, with clusters. Then, all the patches were assigned a code based on the closest cluster (codeword) from the L1 codebook.

The second level of coding (L2) considered neighborhoods of 15 × 15 L1 patches (i.e., 480 × 480 pixels). For each such neighborhood, the descriptor computed was the vector of frequencies of the L1 codes (a vector with values). Similarly to L1 coding, a new codebook was constructed by clustering L2 descriptors ( random L2 descriptors selected from each image) with clusters. Two such codebooks were constructed, one of each class (BRAF-positive and BRAF-negative), and then both used for coding each image, leading to a representation with codes .

The process described above led to a recoding of each image in terms of a histogram with bins, each corresponding to an L2 code. We note that, in all the steps for image coding, the patches containing more than of background pixels were excluded.

2.4. Classifier Design

After the image recoding step, to each image corresponded a -value vector which constituted the input data for the classifier design. The classifier design included the following main steps:

(1)Classifier feature selection: features (elements of the input vectors) were ordered based on recursive feature elimination (RFE) method [20] and subsets of features of sizes (approximately half of total number of features) were considered for Step  (2).(2)For each subset of features, a Support Vector Machine (SVM) [21] with Radial Basis Function (RBF) kernel was trained and its metaparameters were optimized in an inner cross-validation loop. Its performance was estimated by cross-validation and the estimated area under the ROC curve (AUC) recorded.(3)The number of features yielding the maximum AUC was deemed optimal and the final SVM was trained on that number of features.

To estimate the performance of the system, the image recoding procedure followed by Steps  (1)–(3) above was embedded into an external 10-fold stratified cross-validation loop, thus ensuring an unbiased estimation. The vector of predicted labels within this outer cross-validation was taken to represent typical predictions of the model and used in statistical analyses to avoid overly optimistic conclusions that would have been obtained from the predictions made by the model trained on the full data set.

2.5. Statistical Analyses

The main performance parameter for the classifier was AUC, but sensitivity and specificity were equally measured. For sensitivity and specificity 95% confidence intervals were computed using Agresti-Coull approximation [22] while for AUC they were obtained by bootstrap [23]. To test the association between individual image features and the class label, univariable logistic regression models were fit and the sign of the resulting coefficient was used to determine the sense of the association. To test for the association between clinical variables and classifier predictions we used -test on 2 × 2 contingency tables. Survival analysis was performed using survival package (version 2.39-4) from R statistical computing environment (version 3.3.1, http://www.r-project.org). The estimation of hazard ratios was obtained from Cox proportional hazards regression in the absence of any other covariates, while the comparison of survival experiences of different subgroups was assessed by log-rank test (Mantel-Haenszel test). Statistical significance level was chosen to be and no adjustment for multiple hypotheses testing was performed.

3. Results and Discussion

3.1. Image-Based Predictor

The estimated performance of the classifier was , 95% CI = (0.903–0.972), with a default operating point yielding a sensitivity , 95% CI = (0.733–0.920), and a specificity , 95% CI = (0.917–0.974), corresponding to an accuracy , 95% CI = (0.896–0.956). The optimal number of features varied throughout the cross-validation iterations between 70 and 110. In Table 2, the confusion matrix from the cross-validation predictions is shown.

Table 2: Confusion matrix for classifier predictions. The ground truth is given by the genomic signature.

Predicted BRAF-negative
Predicted BRAF-positive

Genomic BRAF-negative
221
11

Genomic BRAF-positive
9
50

The relationship between the image-based classifier predictions (from cross-validation) and the genomic score can be seen in Figure 1. The misclassified samples are covering the whole range of genomic scores (Figure 1(a)). For the SVMs, the margin of a sample can be viewed as a confidence in the prediction; hence we were interested in studying the classification errors in the context of their corresponding margins. In Figure 1(b), the margins are shown as a function of genomic score. It appears that smaller margin corresponds to larger (in absolute value) BRAF scores indicating that the confidence in those (erroneous) predictions is rather low.

(a)

(b)

Figure 1: Analysis of the classifier’s predictions. (a) Waterfall plot of the BRAF scores and the corresponding predictions (color-coded). (b) The relationship between the genomic score (-axis) and the prediction margin (-axis) for the misclassified samples.

A different trade-off between sensitivity and specificity could be obtained by adapting the classifier’s threshold: for example, an operating point yielding , 95% CI = (0.812–0.967), and , 95% CI = (0.718–0.825), would favor the detection of BRAF-positives.

3.2. Relationship with Clinical Parameters

Further investigation of the classifier’s errors showed that most of the false negatives were KRAS mutants (6 out of 9) while the majority of the false positives were double wild type (BRAF and KRAS wild type). We also note that the classifier labeled two cases (out of 16) of BRAF mutant tumors as “BRAF-negative”; however, one of them had also a negative genomic score. The predictions were also associated with the mucinous status of the tumors (, the microsatellite instability status (, and the grade ( as expected [8] but not with other clinical parameters including KRAS mutation status and tumor stage.

The BRAF genomic signature was shown to have a strong prognostic value for overall survival (OS) and survival after relapse (SAR) and limited value for relapse-free survival (RFS) [8]. In the subset of samples considered, the genomic signature maintained its prognostic value and the classifier predictions inherited, to some degree, this property: the predictions were prognostic for OS (, 95% CI = (1.17–2.81)) and SAR (, 95% CI = (1.16–3.10)) but not for RFS (, 95% CI = (0.97–2.13)).

3.3. The Predictive Image Features

We investigated the structure of the final model generated using the complete data set, on which both image recoding and the classifier design steps were applied as described above. For this model, 90 features (corresponding to codewords from the L2 codebook) were selected as the optimal set and using the logistic regression coefficient (from single-variable models) they were divided into “positive features” (preferentially present in BRAF-positive cases, 58 features in total, see Figure 2) and “negative features” (preferentially present in BRAF-negative cases, 32 features in total, see Figure 3). We note that a number of features were dedicated to representing the border of the tumors and that some were partially affected by the markings present on the slides. It appears that the color deconvolution used in combination with Gabor descriptors made the representation robust to this type of noise. A second observation was that there were, roughly, twice as many image features representing the positive class compared to the negative one. This was to some degree not unexpected: indeed, in general, the BRAF-mutated and MSI-H CRC tumors show more intratumoral heterogeneity than the rest; however our results may suggest that this characteristic is common to a larger group of tumors.

Figure 2: “Positive features”: image patterns associated with BRAF-positive class. Each feature is a 480 480 image patch and corresponds to an L2 codeword. Higher resolution image is available at DOI: 10.5281/zenodo.376999.

Figure 3: “Negative features”: image patterns associated with BRAF-negative class. Each feature is a 480 480 image patch and corresponds to an L2 codeword. Higher resolution image is available at DOI: 10.5281/zenodo.376999.

The exact contribution of each feature to the final decision is less obvious as their involvement in the classifier’s prediction is through the RBF kernel and since the support vectors (actually a number of images from the training set) are defining the separation boundary between classes. However, a visualization of their spatial distribution in images may help in qualitatively understanding the model: in Figure 4 two examples of correctly classified tumors are shown. It appears that the features identified as “positive features” cover a relatively larger region in the BRAF-positive tumors than the “negative features.” The inverse relationship holds for the BRAF-negative tumors.

(a)

(b)

(c)

(d)

Figure 4: Spatial distribution of (positive and negative) features in two correctly classified images. The regions with low contrast were not involved in the classification process. (a-b) A BRAF-positive tumor: (a) positive image features; (b) negative image features. (c-d) A BRAF-negative tumor: (c) positive image features; (d) negative image features. Higher resolution images are available at DOI: 10.5281/zenodo.376999.

We also investigated whether the codebooks (for both levels of coding, L1 and L2) are biased towards one or a small group of images. We recall that the codebooks have been generated using an equal number of image patches randomly selected from the images. None of the clusters of the codebooks was dominated by a particular image, indicating that the codebooks capture general features.

4. Conclusions

We presented an image-based classifier that was able to predict with high accuracy the outcome of a genomic score. The input images were scans of H&E pathology slides making the system suitable for integration in the routine diagnostic procedures. Since the predictions of the classifier (as those of the corresponding genomic score) were not correlated with the TNM staging, they brought an independent indication of high-risk tumors (in the case of positive predictions). The system could also be applied for the retrospective selection of cases from tumor archives, reducing the volume of cases that an expert would need to evaluate.

Another important outcome is the observation that some gene expression based signatures may be translated into an image-based surrogate biomarker. Such tissue-based biomarkers may be used as a filtering step before the genomic tests.

Disclosure

This article reflects only the author’s views and the Union is not liable for any use that may be made of the information contained therein.

Conflicts of Interest

The authors declare that they have no conflicts of interest.

Acknowledgments

This project is financed by the SoMoPro II programme. The research leading to this result has acquired a financial grant from the People Programme (Marie Curie action) of the Seventh Framework Programme of EU according to the REA Grant Agreement no. 291782. The research is further cofinanced by the South Moravian Region. The necessary computational resources were provided by the CESNET LM2015042 and the CERIT Scientific Cloud LM2015085 projects under the programme “Projects of Projects of Large Research, Development, and Innovations Infrastructures.” The authors also thank PETACC3 translational research group and Professor Fred Bosman in particular, for making the data for the present study available.

References

C. C. Compton, “Colorectal carcinoma: diagnostic, prognostic, and molecular features,” Modern Pathology, vol. 16, no. 4, pp. 376–388, 2003.

F. T. Bosman and P. Yan, “Molecular pathology of colorectal cancer,” Polish Journal of Pathology, vol. 65, no. 4, pp. 257–266, 2014.

A. Lièvre, J. B. Bachet, D. le Corre et al., “KRAS mutation status is predictive of response to cetuximab therapy in colorectal cancer,” Cancer Research, vol. 66, no. 8, pp. 3992–3995, 2006.

S. Benvenuti, A. Sartore-Bianchi, F. di Nicolantonio et al., “Oncogenic activation of the RAS/RAF signaling pathway impairs the response of metastatic colorectal cancers to anti-epidermal growth factor receptor antibody therapies,” Cancer Research, vol. 67, no. 6, pp. 2643–2648, 2007.

E. Budinska, V. Popovici, S. Tejpar et al., “Gene expression patterns unveil a new level of molecular heterogeneity in colorectal cancer,” Journal of Pathology, vol. 231, no. 1, pp. 63–76, 2013.

L. Marisa, A. de Reyniès, A. Duval et al., “Gene expression classification of colon cancer into molecular subtypes: characterization, validation, and prognostic value,” PLoS Medicine, vol. 10, no. 5, Article ID e1001453, 2013.

A. Sadanandam, C. A. Lyssiotis, K. Homicsko et al., “A colorectal cancer classification system that associates cellular phenotype and responses to therapy,” Nature Medicine, vol. 19, no. 5, pp. 619–625, 2013.

V. Popovici, E. Budinska, S. Tejpar et al., “Identification of a poor-prognosis BRAF-mutant—like population of patients with colon cancer,” The Journal of Clinical Oncology, vol. 30, no. 12, pp. 1288–1295, 2012.

G. Berx, A.-M. Cleton-Jansen, F. Nollet et al., “E-cadherin is a tumour/invasion suppressor gene mutated in human lobular breast cancers,” EMBO Journal, vol. 14, no. 24, pp. 6107–6115, 1995.

B. D. Lehmann, J. A. Bauer, X. Chen et al., “Identification of human triple-negative breast cancer subtypes and preclinical models for selection of targeted therapies,” Journal of Clinical Investigation, vol. 121, no. 7, pp. 2750–2767, 2011.

J. Kong, L. A. D. Cooper, F. Wang et al., “Integrative, multimodal analysis of glioblastoma using TCGA molecular data, pathology images, and clinical outcomes,” IEEE Transactions on Biomedical Engineering, vol. 58, no. 12, pp. 3469–3474, 2011.

Y. Yuan, H. Failmezger, O. M. Rueda et al., “Quantitative image analysis of cellular heterogeneity in breast tumors complements genomic profiling,” Science Translational Medicine, vol. 4, no. 157, Article ID 3004330, 2012.

V. Popovici, “Towards the identification of tissue-based proxy biomarkers,” in Proceedings of the AMIA Joint Summits on Translational Science, 2016.

E. van Cutsem, R. Labianca, G. Bodoky et al., “Randomized phase III trial comparing biweekly infusional fluorouracil/leucovorin alone or with irinotecan in the adjuvant treatment of stage III colon cancer: PETACC-3,” Journal of Clinical Oncology, vol. 27, no. 19, pp. 3117–3125, 2009.

M. Satyanarayanan, A. Goode, B. Gilbert, J. Harkes, and D. Jukic, “OpenSlide: a vendor-neutral software foundation for digital pathology,” Journal of Pathology Informatics, vol. 4, no. 1, p. 27, 2013.

A. C. Ruifrok and D. A. Johnston, “Quantification of histochemical staining by color deconvolution,” Analytical and Quantitative Cytology and Histology, vol. 23, no. 4, pp. 291–299, 2001.

G. Csurka, C. R. Dance, L. Fan, J. Willamowski, and C. Bray, “Visual categorization with bags of keypoints,” Proceeding of the Workshop on Statistical Learning in Computer Vision, 2004.

S. Lazebnik, C. Schmid, and J. Ponce, “Beyond bags of features: spatial pyramid matching for recognizing natural scene categories,” in Proceedings of the IEEE Computer Society Conference on Computer Vision and Pattern Recognition (CVPR '06), pp. 2169–2178, June 2006.

J. G. Daugman, “Uncertainty relation for resolution in space, spatial frequency, and orientation optimized by two-dimensional visual cortical filters,” Journal of the Optical Society of America A: Optics and Image Science, and Vision, vol. 2, no. 7, pp. 1160–1169, 1985.

I. Guyon, J. Weston, S. Barnhill, and V. Vapnik, “Gene selection for cancer classification using support vector machines,” Machine Learning, vol. 46, no. 1–3, pp. 389–422, 2002.

C. Cortes and V. Vapnik, “Support-vector networks,” Machine Learning, vol. 20, no. 3, pp. 273–297, 1995.

A. Agresti and B. A. Coull, “Approximate is better than “exact'' for interval estimation of binomial proportions,” The American Statistician, vol. 52, no. 2, pp. 119–126, 1998.

X. Robin, N. Turck, A. Hainard et al., “pROC: an open-source package for R and S+ to analyze and compare ROC curves,” BMC Bioinformatics, vol. 12, article 77, 2011.