BioMed Research International
Volume 2017 (2017), Article ID 8132676, 8 pages
https://doi.org/10.1155/2017/8132676

Research Article

Metabolic Tumor Volume by ¹⁸F-FDG PET/CT Can Predict the Clinical Outcome of Primary Malignant Spine/Spinal Tumors

Yoshihiro Matsumoto,¹ Shingo Baba,² Makoto Endo,¹ Nokitaka Setsu,¹ Keiichiro Iida,¹ Jun-Ichi Fukushi,¹ Kenichi Kawaguchi,¹ Seiji Okada,¹ Hirofumi Bekki,¹ Takuro Isoda,² Yoshiyuki Kitamura,² Hiroshi Honda,² and Yasuharu Nakashima¹

¹Department of Orthopaedic Surgery, Graduate School of Medical Sciences, Kyushu University, 3-1-1 Maidashi, Higashi-ku, Fukuoka 812-8582, Japan
²Department of Clinical Radiology, Graduate School of Medical Sciences, Kyushu University, Japan

Correspondence should be addressed to Yoshihiro Matsumoto; ymatsu@ortho.med.kyushu-u.ac.jp

Received 24 April 2017; Revised 12 June 2017; Accepted 11 July 2017; Published 9 August 2017

Academic Editor: Kwang Gi Kim

Copyright © 2017 Yoshihiro Matsumoto et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Background and Purpose. Primary malignant spine/spinal tumors (PMSTs) are rare and life-threatening diseases. In this study, we demonstrated the advantage of volume-based ¹⁸F-FDG PET/CT metabolic parameter, metabolic tumor volume (MTV), for assessing the aggressiveness of PMSTs. Materials and Methods. We retrospectively reviewed 27 patients with PMSTs and calculated , MTV, and total lesion glycolysis (TLG) to compare their accuracy in predicting progression-free survival (PFS) and overall survival (OS) by receiver operating characteristic (ROC) curve analysis. Univariate and multivariate analyses were used to compare the reliability of the metabolic parameters and various clinical factors. Results. MTV exhibited greater accuracy than or TLG. The cut-off values for PFS and OS derived from the AUC data were MTV 45 ml and 83 ml and TLG 250 SUVml and 257 SUVml, respectively. MTV above cut-off value, but not TLG, was identified as significant prognostic factor for PFS by log-lank test (). In addition, MTV was the only significant predictive factors for PFS and OS in the multivariate analysis. Conclusions. MTV was a more accurate predictor of PFS and OS in PMSTs compared to TLG or and helped decision-making for guiding rational treatment options.

1. Introduction

Primary malignant spine/spinal tumors (PMSTs) are rare tumors and only comprise 4% to 13% of all bone and soft-tissue sarcomas [1]. Management of PMSTs is challenging since those tumors are often inoperable because of the complexity of their surrounding anatomy. Moreover, PMSTs show diverse histological subtypes and degrees of aggressiveness that confuse the treatment of PMSTs. Basically, the clinical behavior of the tumors depends on the aggressiveness of the tumor. Thus, the identification of an aggressive tumor prior to treatment has an essential role in establishment of a rational treatment plan. In different medical fields, various methods that predict a risk of patient and subsequently guide therapy had been reported [2]. However, in the field of spinal oncology, the reports relating to the predictive factors that influence the survival of the PMSTs patients are sparse [3].

Recently, ¹⁸F-fluoro-deoxy-glucose positron-emission-tomography/computed tomography (¹⁸F-FDG PET/CT) becomes the gold standard for preoperative assessment of biological activity and malignant capacity of the tumors and the advantages of ¹⁸F-FDG PET/CT for evaluating histological characteristics, tumor response to treatment, and clinical outcomes in patients with various malignant tumors are reported [4]. In most studies, single pixel values of the maximum standardized uptake value () have been used as an index of tumor metabolism [5, 6]. However, PMSTs often demonstrate heterogeneous biological activities due to the different histological features of cell proliferation, necrosis, and matrix deposition [7]. On the contrary, only represents the maximum value of a single voxel in the tumors; thus may not reflect the true aggressiveness and prognostic properties of the tumors [8].

One of the promising approaches to overcome the shortcomings of based estimation of aggressiveness of PMSTs is volume-based ¹⁸F-FDG PET/CT imaging markers such as metabolic tumor volume (MTV) and total lesion glycolysis (TLG) [9]. MTV is defined as the sum of the volume of voxels with SUV surpassing a threshold value in a tumor [9]. TLG is calculated by multiplying MTV and the mean SUV of the MTV [10]. Importantly, recent studies confirm the superiority of MTV and TLG compared to with regard to prognostic value in head-and-neck cancer, non-small-cell lung cancer, and epithelial ovarian cancer [11, 12]. In contrast, clinical relevance of MTV and TLG in patients with bone and soft-tissue sarcoma remains obscure and controversial [13–15]. To the best of our knowledge, this is the first report that has demonstrated the advantage of metabolic parameters for assessing the aggressiveness of PMSTs.

2. Materials and Methods

2.1. Patients

We retrospectively reviewed 27 patients with primary malignant spine (19 cases) and spinal (8 cases) tumors. The inclusion criteria were as follows: (1) newly diagnosed and histologically proven PMSTs and (2) having undergone 18F-FDG PET/CT before the initiation of treatment. Patients with previous history of another malignancy, less than 3 months’ follow-up, and insufficient clinical data were excluded.

Patient characteristics are summarized in Table 1. The study patients comprised 13 men and 14 women. The median patient age was 53.9 years (range, 12–82 years). Tumor locations included the cervical vertebra (), thoracic vertebra (), lumbar vertebra (), and sacral vertebra (). Maximal lesion diameters ranged from 3.5 to 12 cm; the mean maximal diameter was  cm. The maximal diameters of 14 cases were greater than 5 cm. Histological examination showed the following: 5 cases of malignant peripheral nerve sheath tumor, 4 cases of undifferentiated pleomorphic sarcoma, 3 cases of osteosarcoma and chondrosarcoma, 2 cases of chordoma, giant cell tumors of bone, and leiomyosarcoma, and 1 case each of malignant solitary fibrous tumor, malignant myoepithelioma, plasmacytoma, malignant lymphoma, histiocytic sarcoma, and hemangiopericytoma. Sixteen of the 27 cases were managed with surgery (59%). Among the surgically treated cases, tumor resection with wide margin was carried out in 5 patients, while the remaining 11 patients underwent intralesional resection (81%). Various regimens of chemotherapy were followed by 15 patients. Sixteen patients received radiotherapy: 6 received conventional radiotherapy, and 10 received carbon-ion radiotherapy with curative intent. In this study, opt-out method was applied to obtain the consent of the patients and this clinical study was approved by the institutional review board at Kyushu university hospital (26–224).

Table 1: Clinical characteristics of patients.

Characteristics
Value

Total number of patients
27 (100%)

Sex

    Male
13 (48%)

    Female
14 (52%)

Age (years) mean (range)
53.9 (12–82)

Location

    Cervical
7 (26%)

    Thoracic
10 (37%)

    Lumbar
6 (22%)

    Sacral
4 (15%)

Size

    ≧5 cm
14 (52%)

    <5 cm
13 (48%)

Histology

    MPNST
5

    UPS
4

    Osteosarcoma
3

    Chondrosarcoma
3

    Leiomyosarcoma
2

    Chordoma
2

    GCTB
2

    Others
6

Surgery

    Total
16 (59%)

    with wide margin
5

Chemotherapy
15 (56%)

Radiotherapy
16 (59%)

MPNST: malignant peripheral nerve sheath tumor, UPS: undifferentiated pleomorphic sarcoma, and GCTB: giant cell tumor of bone.

2.2. ¹⁸F-FDG PET/CT Acquisition and Volumetric Analysis

¹⁸F-FDG PET/CT acquisition was performed for all patients. In each patient, 4 MBq/kg of ¹⁸F-FDG was intravenously administered after fasting for at least 4 h. Scans were conducted from the middle of the thigh to the top of the skull 60 min after the ¹⁸F-FDG administration. Scan range was extended to the extremities as needed according to the location of the primary tumor. ¹⁸F-FDG PET/CT images were obtained using an integrated PET/CT scanner, the Discovery STE (GE Medical Systems, Milwaukee, WI) or Biograph mCT (Siemens Healthcare). All emission scans were performed in the three-dimensional mode, and the acquisition time per bed position was 3 min for the Discovery STE and 2 min for the Biograph mCT. We reconstructed the PET images using the ordered-subset expectation-maximization method (VUE Point Plus) with two full iterations of 28 subsets for the Discovery STE and iterative True-X algorithm and time of flight (TOF) (Ultra HD-PET) with two full iterations of 21 subsets. The CT scan was reconstructed by filtered backprojection into pixels’ images with a slice thickness of 5 mm to match the PET scan. The PET/CT fusion images were generated using GENIE–Xeleris software on a dedicated work station, Xeleris (GE Medical Systems, Milwaukee, WI).

¹⁸F-FDG accumulation higher than the background was defined as ¹⁸F-FDG-positive. The maximum standardized uptake value () and MTV and TLG in ¹⁸F-FDG PET images were measured using dedicated software (Multi-Modality Tumor Tracking software; IntelliSpace Portal 6 workstation, Philips Medical Systems, Milpitas, CA). A spherical volume-of-interest (VOI), corresponding to the tumor, was drawn and for the VOI was automatically calculated. The highest voxel value in the tumor on ¹⁸F-FDG PET/CT was determined as . Using a SUV of 2.5 as the threshold, the volume of tumor with SUV ≥ 2.5 was determined as MTV (ml), and was defined as mean SUV in the delineated tumor volume. The product of the MTV multiplied by was defined as TLG (SUVml).

2.3. Clinical Endpoints

Progression-free survival (PFS) and overall survival (OS) were used as the clinical endpoint to evaluate the prognostic value of the metabolic parameters. PFS was defined as the date of initial treatment to the date of histological or radiological evidence of local recurrence and/or distant metastasis. OS was defined as the time from initial diagnosis to death. For patients without progression or death, the last follow-up time was used as the endpoint.

2.4. Statistical Analysis

Receiver operating characteristics (ROC) curve analysis was applied to identify the best discriminating cut-off values for , MTV, and TLG. Appropriate cut-off was defined as the point on the curve nearest to the upper left corner of the ROC graph. The area under the curve (AUC) was used to evaluate the accuracy of the metabolic parameters as a prognostic factor. Kaplan-Meier survival analysis and the log-rank test were used to evaluate the degree of equality of predictive values across variables regarding PFS and OS. A Cox proportional hazards regression model was applied to determine the effect of potential factors that were found significant on univariate and multivariate analysis. Statistical significance was set at . JMP version 13 software was used for statistical analysis.

3. Results

3.1. Clinical Outcome

The median follow-up period was 21.9 months (range 3–58 months, median 18 months). Five patients died of disease during follow-up (17%). Disease progression occurred in 9 patients (31%). Distant metastases and local recurrence were identified in 5 and 8 patients, respectively. Four patients experienced both local and distant progression. The probabilities of 2-year PFS and overall survival were 66% and 81%, respectively.

3.2. ROC Curve Analysis, AUC, and Cut-Off Values

The mean of the primary lesions was  SUV (median = 6.11) and the mean MTV and TLG of the primary lesions were  ml (median = 40.2) and  SUVml (median = 150), respectively. The abilities of the , MTV, and TLG values for various SUV thresholds to predict PFS were calculated by their ROC curves (Figure 1). The area under the curve (AUC) of was 0.48, suggesting that would be inappropriate to evaluate the clinical outcome of PMSTs. On the other hand, the AUC values of MTV and TLG were 0.76 and 0.67, respectively. The optimal cut-off values for PFS derived from the AUC data were MTV 45 ml (sensitivity: 78%, specificity: 75%) and TLG 150 SUVml (sensitivity: 78%, specificity: 60%). Meanwhile, the abilities of the , MTV, and TLG values to predict OS were also calculated by their ROC curves and we found that the AUCs of , MTV, and TLG were 0.50, 0.65, and 0.58, respectively. The optimal cut-off values for OS derived from the AUC data were MTV 83 ml (sensitivity: 80%, specificity: 73%) and TLG 257 SUVml (sensitivity: 80%, specificity: 68%) (Figure 2).

(a)

(b)

(c)

Figure 1: ROC curve analysis comparing the prognostic accuracy for disease progression and determining the optimal cut-off values. AUCs of (a), MTV (b), and TLG (c) were 0.48, 0.76, and 0.67, respectively. The optimal cut-off values for PFS derived from the AUC data were MTV 45 ml (sensitivity: 78%, specificity: 75%) and TLG 150 SUVml (sensitivity: 78%, specificity: 60%).

(a)

(b)

(c)

Figure 2: ROC curve analysis comparing the prognostic accuracy for overall survival and determining the optimal cut-off values. AUCs of (a), MTV (b), and TLG (c) were 0.50, 0.65, and 0.58, respectively. The optimal cut-off values for PFS derived from the AUC data were MTV 83 ml (sensitivity: 80%, specificity: 73%) and TLG 257 SUVml (sensitivity: 80%, specificity: 68%).

3.3. Kaplan-Meier Survival Estimates

Patients were divided according to the below and above cut-off value for MTV and TLG. We found that MTV were identified as significant prognostic factor for PFS by log-lank test (). In addition, TLG was not significantly correlated with PFS () (Figure 3).

(a)

(b)

Figure 3: Kaplan-Meier estimate of progression-free survival by MTV and by TLG. Data were categorized according to the optimal cut-off value for MTV (a) and TLG (b) defined with ROC curve analysis.

We also observed that MTV, but not TLG, was significantly correlated with OS ( and 0.07, resp.) (Figure 4).

(a)

(b)

Figure 4: Kaplan-Meier estimate of overall survival by MTV and by TLG. Data were categorized according to the optimal cut-off value for MTV (a) and TLG (b) defined with ROC curve analysis.

3.4. Prognostic Values of the Metabolic Parameters

The univariate analysis with variables affecting PFS demonstrated that MTV above the optimal discriminating cut-off value was associated with poor outcome (). In the multivariate analysis, MTV above the optimal discriminating cut-off value was the only significant prognostic factor for PFS (HR 14.6 [95% CI 1.78–333]), (Table 2). In addition, the univariate analysis with variables affecting OS demonstrated that MTV and TLG above the optimal discriminating cut-off value were associated with poor outcome ( and 0.03, resp.). In the multivariate analysis, MTV, but not TLG, above the optimal discriminating cut-off value was significantly associated with poorer OS (HR 46.1 [95% CI 1.20–216]), (Table 3).

Table 2: Factors affecting progression-free survival in the univariate and multivariate analyses.

Factor
Cut-off value
Univariate
Multivariate

value
HR
95% CI
value

MTV
45 ml
0.04
14.6
1.78–333
0.01

TLG
150 SUVml
0.12

Size
5 cm
0.05
2.97
0.69–11.8
0.14

Surgery
Yes
0.78

Surgery with wide margin
Yes
0.42

Chemotherapy
Yes
0.03
1.67
0.50–5.69
0.40

Radiotherapy
Yes
0.36

HR: hazard risk. 95% CI: 95% confidence interval. Progression-free survival was negatively associated with the administration of chemotherapy (), which may indicate the aggressiveness of the tumors of the patients who had chemotherapy.

Table 3: Factors affecting overall survival in the univariate and multivariate analyses.

Factor
Cut-off value
Univariate
Multivariate

value
HR
95% CI
value

MTV
83 ml
0.002
46.1
1.20–216
0.035

TLG
257 SUVml
0.03
1
0.99–1.02
0.99

Size
5 cm
0.35

Surgery
Yes
0.95

Surgery with wide margin
Yes
0.25

Chemotherapy
Yes
0.59

Radiotherapy
Yes
0.65

HR: hazard risk. 95% CI: 95% confidence interval.

3.5. Case Presentation

An example of relative discordance between and metabolic parameters is a spinal MPNST in the cervical spine in a 40-year-old man. The mass was 9 cm in size and the axial T2-weighted MRI showed mixed intense signal mass with unclear boundary in epidural and paravertebral space (Figure 5(a)). A preoperative ¹⁸F-FDG PET/CT scan was obtained and the tumor showed moderate (5.25 g/mL) (Figure 5(b)). For calculations of metabolic parameters, a volume-of-interest was drawn on the PET images (light blue area) (Figure 5(c)). A preset threshold of 2.5 of SUV of the tumor was used to define the MTV (84.3 ml) and the mean SUV of the MTV was determined ( 3.06 SUV). MTV and were used to calculate the TLG (258 SUVml). The patient underwent a partial resection of the epidural tumor by posterior approach. Subsequently, he was treated by carbon-ion radiotherapy. Five months after surgery, multiple bone (Figure 5(d)) and lung (Figure 5(e)) metastasis were detected and the patient died 9 months after surgery.

(a)

(b)

(c)

(d)

(e)

Figure 5: Representative case presentation of and metabolic parameters in large and heterogeneous cervical spinal tumor. A spinal MPNST in a 40-year-old man. (a) The mass was 9 cm in size and the axial T2-weighted MRI showed mixed intense signal mass with unclear boundary in epidural and paravertebral space. (b) A preoperative ¹⁸F-FDG PET/CT scan was obtained and the tumor showed moderate (5.25 g/mL). (c) For calculations of metabolic parameters, a volume-of-interest was drawn on the PET images (light blue area). A preset threshold of 2.5 of SUV of the tumor was used to define the MTV (84.3 mL) and the mean SUV of the MTV was determined ( 3.06 SUV). MTV and were used to calculate the TLG (258 SUVml). The patient underwent a partial resection of the epidural tumor and carbon-ion radiotherapy. Five months after surgery, multiple bone (d) and lung metastasis (e) were detected and the patient died 9 months after surgery.

4. Discussion

One of the commonly used systems to predict the prognosis of the malignant tumors is AJCC stage system. This system is based on anatomical and histologic information and proved to be a simple and reliable predictor of tumor outcomes [16]. However, the AJCC stage system is not suitable to evaluate the prognosis of PMSTs [17]. Importantly, the introduction of FDG PET has offered the possibility of noninvasive estimation of biological activity of malignant tumors and it also may help the predication of patient outcome. Conventionally, has been applied widely to predict the prognosis and treatment outcomes [6, 7].

However, reflects only the most active part of the tumor and it does not represent the overall characteristics of the tumor, particularly the tumor with heterogeneous features [14]. For instance, sarcomas commonly present with mixed high- and low-grade areas since they contained various mesenchymal elements including myxoid substance, osteoid, chondroid matrix, and necrosis [18], suggesting that would be suboptimal to assess the biological activity of sarcomas, including PMSTs. Consistent with this, a study of 238 sarcoma patients showed the lower predictive value of compared to the new algorithm for considering the heterogeneous ¹⁸F-FDG spatial distribution in sarcoma [7].

The volume-based ¹⁸F-FDG imaging markers, MTV and TLG, have theoretical advantage in terms of evaluating the total volume and activity of metabolically active tumor cells compared to . This has been confirmed by several studies showing significant prognostic properties of MTV and TLG for prediction of clinical outcome in the patients with various malignant tumors [10, 19]. However, reported data regarding the application of MTV and TLG for sarcoma patients are conflicting. One study reports the superiority of TLG to MTV as a significant predictor of progression-free survival in soft-tissue sarcomas [14]. On the contrary, Byun et al. [20] failed to demonstrate the superiority of TLG to MTV as an independent prognostic value in patients with osteosarcomas of the extremities. Remarkably, MTV with a fixed SUV threshold of 2.0, but not TLG, is identified as a predictive factor for metastasis-free survival in that cohort. Our results also postulated that, for predicting progression of PMSTs, MTV is more accurate than TLG.

The plausible explanation for the discrepancy between the results of the above-mentioned studies is that the location of the included tumors is different between the studies. We focused on the spine/spinal tumors and curative surgeries were achieved only in 5 cases (19%). On the contrary, the previous study included tumors located in the extremities that can basically be resected with wide margin [14]. Therefore, in our cases, the residual tumor burden after initial treatment would be bigger than the tumors in extremities and MTV might reflect more accurately the “real tumor burden” compared to TLG.

The present study has several limitations. First, the study was a retrospective design and enrolled only a small number of subjects by the low incidence of PMSTs. Second, the method for measuring and calculating MTV needs standardization and refinement. For example, differences in SUV measurements in different PET scanners may preclude the application of MTV in routine and reproducible clinical practice. In addition, although we set 2.5 of SUV as the margin threshold for calculating MTV in this study, it might not be the optimal threshold. Third, we applied ROC curve analysis to find the optimized cut-off for prediction of prognosis, PFS. However, this method can easily induce overcorrected results and we should be careful in interpreting the results. Together, prospective studies in a larger population are warranted to validate MTV as the robust predictive factor for clinical outcomes of patients with PMSTs.

In conclusion, MTV may be a more accurate predictor of PFS and OS in PMSTs compared to TLG or . We anticipate that MTV offers pretreatment assessment of disease activity of PMSTs and helps decision-making for guiding rational treatment options. The predictive efficacy of MTV in diverse clinical settings, such as evaluation of treatment response, should be validated in the future studies.

Conflicts of Interest

The authors declare that they have no conflicts of interest regarding the publication of this article.

Acknowledgments

This work was supported by a Grant-in-Aid for Scientific Research from the Japan Society for the Promotion of Science (#15K10499).

References

S. P. Kelley, R. U. Ashford, A. S. Rao, and R. A. Dickson, “Primary bone tumours of the spine: a 42-year survey from the Leeds Regional Bone Tumour Registry,” European Spine Journal, vol. 16, no. 3, pp. 405–409, 2007.

T. Nagai, Y. Takai, T. Akahori et al., “Novel uterine sarcoma preoperative diagnosis score predicts the need for surgery in patients presenting with a uterine mass,” SpringerPlus, vol. 3, no. 678, 2014.

Z. Szövérfi, A. Lazary, Á. Bozsódi, I. Klemencsics, P. E. Éltes, and P. P. Varga, “Primary spinal tumor mortality score (PSTMS): A novel scoring system for predicting poor survival,” Spine Journal, vol. 14, no. 11, pp. 2691–2700, 2014.

M. R. Benz, N. Tchekmedyian, F. C. Eilber, N. Federman, J. Czernin, and W. D. Tap, “Utilization of positron emission tomography in the management of patients with sarcoma,” Current Opinion in Oncology, vol. 21, no. 4, pp. 345–351, 2009.

J. F. Eary, F. O'Sullivan, Y. Powitan et al., “Sarcoma tumor FDG uptake measured by PET and patient outcome: a retrospective analysis,” European Journal of Nuclear Medicine, vol. 29, no. 9, pp. 1149–1154, 2002.

J. F. Eary, E. U. Conrad, J. O'Sullivan, D. S. Hawkins, S. M. Schuetze, and F. O'Sullivan, “Sarcoma mid-therapy [F-18] fluorodeoxyglucose positron emission tomography (FDG PET) and patient outcome,” Journal of Bone and Joint Surgery - Series A, vol. 96, no. 2, pp. 152–158, 2014.

J. F. Eary, F. O'Sullivan, J. O'Sullivan, and E. U. Conrad, “Spatial heterogeneity in sarcoma 18F-FDG uptake as a predictor of patient outcome,” Journal of Nuclear Medicine, vol. 49, no. 12, pp. 1973–1979, 2008.

H. J. Im, T. S. Kim, S.-Y. Park et al., “Prediction of tumour necrosis fractions using metabolic and volumetric 18F-FDG PET/CT indices, after one course and at the completion of neoadjuvant chemotherapy,,in children and young adults with osteosarcoma,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 39, no. 1, pp. 39–49, 2012.

K. J. Biehl, F.-M. Kong, F. Dehdashti et al., “18F-FDG PET definition of gross tumor volume for radiotherapy of non-small cell lung cancer: Is a single standardized uptake value threshold approach appropriate?” Journal of Nuclear Medicine, vol. 47, no. 11, pp. 1808–1812, 2006.

S. M. Larson, Y. Erdi, T. Akhurst et al., “Tumor treatment response based on visual and quantitative changes in global tumor glycolysis using PET-FDG imaging: the visual response score and the change in total lesion glycolysis,” Clinical Positron Imaging, vol. 2, no. 3, pp. 159–171, 1999.

T. La, E. Filion, B. Turnbull et al., “Metabolic Tumor Volume Predicts for Recurrence and Death in Head and Neck Cancer,” International Journal of Radiation Oncology, Biology, Physics, vol. 72, no. 1, pp. S159–S160, 2008.

H. H. Chung, H. W. Kwon, K. W. Kang et al., “Prognostic value of preoperative metabolic tumor volume and total lesion glycolysis in patients with epithelial ovarian cancer,” Annals of Surgical Oncology, vol. 19, no. 6, pp. 1966–1972, 2012.

K. F. Andersen, H. M. Fuglo, S. H. Rasmussen, M. M. Petersen, and A. Loft, “Volume-Based F-18 FDG PET/CT imaging markers provide supplemental prognostic information to histologic grading in patients with high-grade bone or soft tissue sarcoma,” Medicine (United States), vol. 94, no. 51, Article ID e2319, 2015.

E.-S. Choi, S.-G. Ha, H.-S. Kim, J. H. Ha, J. C. Paeng, and I. Han, “Total lesion glycolysis by ¹⁸F-FDG PET/CT is a reliable predictor of prognosis in soft-tissue sarcoma,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 40, no. 12, pp. 1836–1842, 2013.

S.-P. Hong, S. E. Lee, Y.-L. Choi et al., “Prognostic value of ¹⁸F-FDG PET/CT in patients with soft tissue sarcoma: comparisons between metabolic parameters,” Skeletal Radiology, vol. 43, no. 5, pp. 641–648, 2014.

J. M. Coindre, P. Terrier, N. B. Bui et al., “Prognostic factors in adult patients with locally controlled soft tissue sarcoma: a study of 546 patients from the french federation of cancer centers sarcoma group,” Journal of Clinical Oncology, vol. 14, no. 3, pp. 869–877, 1996.

Y. Matsumoto, M. Endo, K. Harimaya, M. Hayashida, T. Doi, and Y. Iwamoto, “Malignant peripheral nerve sheath tumors presenting as spinal dumbbell tumors: clinical outcomes and characteristic imaging features,” European Spine Journal, vol. 24, no. 10, pp. 2119–2125, 2015.

R. Rakheja, W. Makis, S. Skamene et al., “Correlating metabolic activity on18F-FDG PET/CT with histopathologic characteristics of osseous and soft-tissue sarcomas: a retrospective review of 136 patients,” American Journal of Roentgenology, vol. 198, no. 6, pp. 1409–1416, 2012.

J. W. Lee, C. M. Kang, H. J. Choi et al., “Prognostic value of metabolic tumor volume and total lesion glycolysis on preoperative (1)(8)F-FDG PET/CT in patients with pancreatic cancer,” Journal of Nuclear Medicine, vol. 55, no. 6, pp. 898–904, 2014.

B. H. Byun, C.-B. Kong, J. Park et al., “Initial metabolic tumor volume measured by ¹⁸F-FDG PET/CT can predict the outcome of osteosarcoma of the extremities,” Journal of Nuclear Medicine, vol. 54, no. 10, pp. 1725–1732, 2013.