BioMed Research International
Volume 2017 (2017), Article ID 8234878, 1 page
https://doi.org/10.1155/2017/8234878

Retraction

Retracted: Study of Effect of Salvianolic Acid B on Motor Function Recovery in Rats with Spinal Cord Injury

BioMed Research International

Received 2 August 2017; Accepted 2 August 2017; Published 24 September 2017

Copyright © 2017 BioMed Research International. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

BioMed Research International has retracted the article titled “Study of Effect of Salvianolic Acid B on Motor Function Recovery in Rats with Spinal Cord Injury” [1]. The article was found to contain a substantial amount of material from the following published article: “Xiao-bin Bi, Yu-bin Deng, Dan-hui Gan and Ya-zhu Wang, (2008), Salvianolic acid B promotes survival of transplanted mesenchymal stem cells in spinal cord-injured rats. Acta Pharmacologica Sinica, 29: 169–176. doi: 10.1111/j.1745 7254.2008.00710.x.” Additionally, Figure in this article [1] is the same as Figure in the 2008 article, but it shows signs of manipulation.

References

C. Xun, Y. Hu, M. Lu, S. Wang, and D. Lv, “Study of effect of salvianolic acid B on motor function recovery in rats with spinal cord injury,” BioMed Research International, vol. 2014, Article ID 931850, 6 pages, 2014.