BioMed Research International
Volume 2017 (2017), Article ID 8589212, 7 pages
https://doi.org/10.1155/2017/8589212

Research Article

Redox and pH Responsive Poly (Amidoamine) Dendrimer-Heparin Conjugates via Disulfide Linkages for Letrozole Delivery

Thanh Luan Nguyen,1,2 Thi Hiep Nguyen,³ Cuu Khoa Nguyen,¹ and Dai Hai Nguyen¹

¹Institute of Applied Materials Science, Vietnam Academy of Science and Technology, 01 Mac Dinh Chi, District 1, Ho Chi Minh City 70000, Vietnam
²Can Tho University, 3/2 Street, Ninh Kieu District, Can Tho City, Vietnam
³Tissue Engineering and Regenerative Medicine Group, Department of Biomedical Engineering, International University, Vietnam National University-HCMC (VNU-HCMC), Ho Chi Minh City 70000, Vietnam

Correspondence should be addressed to Dai Hai Nguyen; nguyendaihai0511@gmail.com

Received 13 October 2016; Revised 9 December 2016; Accepted 15 December 2016; Published 26 January 2017

Academic Editor: Umesh Gupta

Copyright © 2017 Thanh Luan Nguyen et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Heparin (Hep) conjugated to poly (amidoamine) dendrimer G3.5 (P) via redox-sensitive disulfide bond (P-SS-Hep) was studied. The redox and pH dual-responsive nanocarriers were prepared by a simple method that minimized many complex steps as previous studies. The functional characterization of G3.5 coated Hep was investigated by the proton nuclear magnetic resonance spectroscopy. The size and formation were characterized by the dynamic light scattering, zeta potential, and transmission electron microscopy. P-SS-Hep was spherical in shape with average diameter about 11 nm loaded with more than 20% letrozole. This drug carrier could not only eliminate toxicity to cells and improve the drugs solubility but also increase biocompatibility of the system under reductive environment of glutathione. In particular, P-SS-Hep could enhance the effectiveness of cancer therapy after removing Hep from the surface. These results demonstrated that the P-SS-Hep conjugates could be a promising candidate as redox and pH responsive nanocarriers for cancer chemotherapy.

1. Introduction

The recent review of researches has been directed to the development of smart drug delivery systems in order to resolve arduous therapeutically issues associated with low treatment efficacy and high side effects [1, 2]. From 1985, Tomalia successfully synthesized the first poly (amidoamine) (PAMAM) dendrimer [3], which has been studied in recent years as multifunctional delivery system. Through stepwise synthesis process, PAMAM dendrimers (P) expressed a highly regular branching pattern and well-defined nanoscale architecture [4–6]. Furthermore, by simple chemical reactions, PAMAM dendrimers can be easily modified thanks to surface amine and ester groups forming multifunction molecules to recognize tumor cell [7, 8] and specific drug release [9, 10].

However, due to the strong interaction of the positively charged dendrimer and the negatively charged cell membrane resulting in membrane disruption, hemolytic toxicity and cell lysis are anxious disadvantages of PAMAM dendrimer drug delivery system (DDS) [1, 11]. Besides, there are also some limitations that need to be overcome (e.g., high toxicity, unsatisfied drug loading, and undesirable drug release) [12–14]. To reduce toxicity, PAMAM dendrimers were commonly modified with many different agents (PEG, heparin, fluronic, etc.) by preventing the contact between terminal protonated amine groups with cell membranes, leading to improving their biocompatibility [15–17]. By hydrophobic interactions, surface modification of heparin (Hep) is a potential way to overcome those drawbacks. Besides its typical anticoagulant activity, Hep was based on extra- and intracellular interactions to improve the bioactivity of drug and associated with protein to develop Hep-containing systems. It is also used for anticancer activities in tumor progression and metastasis processes [2, 18, 19]. Particularly, the interactions between cationic dendrimers and anionic Hep are indirectly responsible for the inhibition or enhancement of fibril formation by dendrimers. The conjugation may lead to increase in the inner cavity space of dendrimers that contributes to the increment of drug loading capacity [18, 20, 21]. In human blood circulation and cell exterior, although the disulfide bonds are generally stable, they were cleaved in a reductive environment through dithiol-disulfide exchange reactions forming thiol end-group bearing moieties [22, 23]. The cleavage reaction occurs immediately in the short time due to the high concentration of glutathione (GSH). In the cytosol, GSH is about 10 mM and higher than in extracellular nearly 500 times. Therefore, it was faster than others that elongated degrade time in the body [24–26]. The different results in various concentrations make GSH as a potential stimulus for nanodelivery system [11, 27]. In recent years, the application of the redox-sensitive mechanism on PAMAM dendrimers (G2.0 and G4.0) carrying doxorubicin and N-acetyl cysteine was found in research of Kurtoglu et al., Song et al., Hu et al., and Phuong et al. for improving a hollow core for encapsulation of drug along with biocompatibility that produced a lot of effective dendritic carrier systems [9, 28–30].

In this study, the redox-responsive DDS was designed by incorporating redox-sensitive disulfide linkage between hydrophilic Hep and PAMAM dendrimers (P-SS-Hep). The P-SS-Hep system was loaded with letrozole (Let) and could reduce systemic phenomenon and improve their focus on target at the same time. The drug system was investigated under physiological condition using proton nuclear magnetic resonance spectroscopy (¹H NMR), dynamic light scattering (DLS), zeta potential, and transmission electron microscopy (TEM). The cleavage potential of P-SS-Hep conjugates was evaluated in different levels of GSH under reductive environment. The expected result of P-SS-Hep loaded with Let (P-SS-Hep/Let) DDS is that the nanoparticles would have the suitable size that controlled the time load and release Let. In vitro release test was also conducted to investigate effect of Hep layer on G3.5 surface.

2. Materials and Methods

2.1. Materials

Let (C₁₇H₁₁N₅, 98%) and heparin sodium salt (Hep) were purchased from TCI (Tokyo, Japan). 1-Ethyl-3-(3-dimethylaminopropyl) carbodiimide (EDC), Cys dihydrochloride (C₄H₁₂N₂S₂·2HCl, ≥98%), L-glutathione reduced (GSH, C₁₀H₁₇N₃O₆S, ≥98%), dimethylformamide (DMF), and 4-morpholineethanesulfonic acid (MES, ≥99.5%) were purchased from Sigma-Aldrich (St. Louis, MO, USA). α-Bromotolunitrile, 1,2,4-triazole sodium, 4-fluorobenzonitrile, and tetra-n-butylammonium bromide (TBAB) were purchased from Merck (Darmstadt, Germany). PAMAM dendrimers generation 3.5 [G3.5(COOH)₆₄] was supplied by Institute of Applied Materials Science (IAMS, Vietnam). All chemicals and solvents were of highest analytical grade and used without further purification.

2.2. Synthesis of Let

Let was synthesized by utilizing α-Bromotolunitrile as described with some modifications (Figure 1). Briefly, α-Bromotolunitrile (500 mg, 2.55 mmol) was dissolved in acetone (50 mL) and then 1,2,4-triazole sodium (464 mg, 5.01 mol) and TBAB (10 mol%) were added to the solution under constant stirring. After that, the product was extracted with ethyl acetate and water to remove excess reagent. A solution of hydrochloric acid in isopropanol (1 : 1 v/v) was added dropwise to crystallize the crude product.

Figure 1: Synthetic route of Let.

Thereafter, crude product (400 mg, 93% purity, and 1.69 mmol) was dissolved in DMF (20 mL). Next, potassium ter-butoxide (2.2 eq, 3.71 mmol, and 415 mg) in DMF (5 mL) and 4-fluorobenzonitrile (1.1 eq, 1.86 mmol, and 225 mg) were added under constant stirring for 5 h. Finally, the mixture was then extracted with ethyl acetate and dried to acquire a dark brown oil residue. The residue was purified using column chromatography with ethyl acetate: hexane 10–15% to acquire Let.

2.3. Synthesis of the P-SS-Hep

2.3.1. Preparation of P-SS

Cystamine (Cys) was conjugated to PAMAM G3.5 by using EDC as coupling reagents. First, 2 g G3.5(COOH)₆₄ was dissolved in 30 mL deionized water (deH₂O), followed by adding dropwise 600 μL EDC for 15 min. Secondly, the mixture was slowly added to 10 mL Cys solution (0.5 g, 3.3 mmol) at room temperature under constant stirring for 24 h. The solution was then dialyzed using a dialysis membrane (MWCO 6–8 kDa, Spectrum Laboratories, Inc., USA) against deH₂O for 4 days at room temperature. The deH₂O was changed 5-6 times a day and the resulting solution was then lyophilized to obtain P-SS.

2.3.2. Preparation of P-SS-Hep

P-SS-Hep was synthesized under the same condition as previously described in the preparation of P-SS (Figure 2). Initially, Hep solution containing 0.8 g Hep and 10 mL deH₂O was prepared under constant stirring. Next, 117 μL EDC was immediately added to Hep solution and the reaction was carried out for 15 min. The activated Hep solution was then added to 20 mL P-SS-Hep solution (1 g, 0.07 mmol) at room temperature under stirring for 24 h. Lastly, this solution was purified by a dialysis membrane (MWCO 6–8 kDa) against deH₂O at room temperature for 4 days. The deH₂O was changed 5-6 times per day and the solution was freeze-dried to collect P-SS-Hep.

Figure 2: Synthetic route of the P-SS-Hep.

2.4. Characterization of P-SS-Hep and P-SS-Hep/Let Complexes

The chemical structure of P-SS-Hep corresponding to the synthetic procedure was analyzed by ¹H NMR (Bruker Advance 500, Bruker Co., USA). For the purpose of investigating the presence of Cys and Hep on the surface of PAMAM G3.5, FTIR analysis (Nicolet Nexus 5700 FT-IR, Thermo Electron Corporation, Waltham, MA, USA) of PAMAM G3.5 and P-SS-Hep was carried out with KBr pellets in 400–4000 cm⁻¹ range. Sizes and morphologies of PAMAM G3.5 and P-SS-Hep were assessed by Rigaku D/Max-2550 V diffractometer with Cu, Kα radiation (λ = 0.15405 nm, 40 kV, and 40 mA) in the 2θ range from 30° to 70°. The diameters and zeta potentials of PAMAM G3.5 and P-SS-Hep were measured by a DLS (Horiba SZ-100 analyzer, Horiba Scientific Ltd., Kyoto, Japan). All samples were dissolved in 10 mM PBS (pH 7.4, 1 mg/mL), sonicated for 15 min, and measured at 37°C.

The stability of P-SS-Hep was also monitored by DLS under reductive environment. 20 mg P-SS-Hep was dissolved in 20 mL PBS (pH 7.4), followed by adding 10 mM GSH at 37°C under constant stirring. Each sample was withdrawn at predetermined time intervals (0, 15, 30, 45, and 60 min) for DLS measurement. The same procedure was repeated with 10 μm GSH to examine the effect of different concentrations of GSH on P-SS-Hep.

2.5. Drug Loading and In Vitro Release Evaluation

The model drug Let was used in drug loading and released study according to the equilibrium dialysis method [31]. Typically, 400 mg P-SS-Hep dendrimer was immersed in 10 molar times of Let solution for 24 h under constant stirring. Then, the mixed solution was dialyzed by deH₂O for removing unentrapped drug. The product was obtained as P-SS-Hep/Let and the drug concentration was quantified by ICP and HPLC. The entrapment efficiency (EE) and drug loading (DL) were calculated by the following equations:

In vitro release of Let from P-SS-Hep/Let was performed under four different conditions of buffers: (1) GSH 10 mM and pH 4.5, (2) GSH 10 μM and pH 4.5, (3) GSH 10 mM and pH 7.4, and (4) GSH 10 μM and pH 7.4. Briefly, 200 μg P-SS-Hep/Let was dissolved into 10 mL deH₂O and then dialyzed with cellulose dialysis membrane (MWCO 12–14 kDa) in couple of conditions. At certain time interval, 10 mL of each sample was taken for analysis to determine Let release by HPLC [9]. The similar concentration of free Let and dendritic solution without drug loading were dialyzed in the same condition to serve as control.

3. Results and Discussion

3.1. Characterization of Let

With high accuracy and impurities, the forming of Let was analyzed by ¹H NMR that showed four distinguished singlets in Figure 3. The typical peak at 4.86 ppm H(c) was assigned to the presence of -CH₂-C₂N₃H₂- group. In addition, the appearance of the peaks at 9.61 ppm H(d) showed the tertiary proton of Let. Importantly, two strong peaks that appeared at 6.74 ppm H(b) and 7.31 H(a) ppm were attributed to the proofing effect of aromatic protons from -C₆H₄-CH₂- group. The presence of all these resonance signals confirmed that the Let was successfully prepared as the pure product with high purity.

Figure 3: ¹H NMR spectrum of Let.

3.2. Characterization of P-SS-Hep

The physicochemical properties of P-SS-Hep conjugates were characterized by ¹H NMR, TEM, DLS, and zeta potential. As shown in Figure 4, the existence of chemical bonds between P-SS and Hep was performed by ¹H NMR.

Figure 4: ¹H NMR spectra of PAMAM 3.5, P-SS, and P-SS-Hep.

The peaks assigned for PAMAM G3.5 at δH = 2.393–2.419 ppm, 2.475–2.501 ppm, 2.570–2.634 ppm, 2.780–2.846 ppm, 3.268–3.369 ppm, and 3.631–3.689 ppm were detectable. In comparison with P-SS spectrum, the significant change of O-CH₃ at 3.71 ppm referred to the successful hydrolysis process of this group out of compound. Additionally, two new signals that appeared at 3.630 ppm and 3.440–3.467 ppm were attributable to the linkage between CH₂ and S in Cys.

In ¹H NMR spectrum of P-SS-Hep, besides the presence of typical peaks of PAMAM 3.5 and Cys, there were two proton hemiacetal signals at 5.353 ppm and 5.183 ppm. The signals at 3.988–4.290 ppm, 3.562–3.694 ppm, and 3.081–3.504 ppm were assigned to proton in hexane ring. The presence of Hep in the compound was attributed at the distinctive peak at 1.998 ppm. The presence of all these resonance signals demonstrated that P-SS-Hep was successfully synthesized.

In addition, the morphologies and pore channel structures of the prepared particles were determined by TEM, as shown in Figure 5. G3.5 was well dispersed and P-SS nanoparticles were generally spherical-shaped in the size of range from 10 to 11 nm supporting the absorption across biological barriers, improving the capability of passive targeting through the enhanced permeability and retention (EPR) effect, and avoiding toxicity to healthy tissues and cells. This size was also consistent with DLS result and Hu et al.’s research [29] about PAMAM G4.0-PEG. The size of conjugates was around  nm due to the larger size of G4.0 compared with G3.5 and longer chain of PEG compared with Hep in this study.

(a)

(b)

Figure 5: TEM images of G3.5 (a) and P-SS-Hep (b).

The nanoparticles with diameter of more than 10 nm could be formed due to crosslinking formation inside P-SS-Hep. There is a significant size increment of P-SS-Hep as compared with the PAMAM dendrimer G3.5 (about 5 nm). According to previous reports, the nanoparticles are ranging from 8 nm to 20 nm in size preferred to accumulate in effect surroundings caused by EPR effect. Furthermore, this size could prolong circulation half-life of drug because of avoidance of the recognition of stimulation immune system. These phenomena could interpret that polymers were successfully conjugated to the surface of P-SS.

3.3. Stability of P-SS-Hep under Reductive Environment

The redox sensitivity of P-SS-Hep was confirmed by the particle size and zeta potential under different GSH concentrations. As shown in Table 1, the zeta potential of G3.5 after being hydrolyzed with carboxylate surface groups was −15.5 mV while the zeta potential after being modified with Cys obtained positive results was +10.4 mV due to the formation of amino chloride. Neither large negative result like G3.5 nor positive value as Cys, P-SS-Hep has zeta result approximately −3.5 mV. This is explained that although most of carboxylate groups were reacted with Cys, the existence of groups of Hep still has the ability to maintain the negative value reducing the risk of toxicity to cells.

Table 1: DLS and zeta potential results of G3.5, P-SS, and P-SS-Hep.

Samples
Size (nm)
Zeta potential (mV)

G3.5
5.7 ± 0.223
−15.5 ± 0.758

P-SS
7.8 ± 0.436
+10.4 ± 0.281

P-SS-Hep
10.7 ± 0.499
−3.5 ± 0.104

The differences in concentration of GSH between the intracellular tissue and plasma lead to the selective objects during drug releasing process. The effect of GSH on the cleavage of Hep is shown in Figure 6. In condition of 10 mM GSH, there is a significant reduction in size, from 11 nm to 7 nm after 40 minutes. This is because the S-S linkage was cut and the surface group of Hep was released in this condition. Meanwhile zeta potential increased from −3.51 mV to +0.5 mV that explained the S-S linkages were cleaved in 10 mM GSH. These results clearly demonstrated that, in the condition of 10 mM GSH, P-SS-Hep has high ability to break down S-S linkage in reductive environment that showed the distinct selection of P-SS-Hep during intracellular drug release.

(a)

(b)

Figure 6: The particle sizes (square) and zeta potential changes (circle) of G3.5 and P-SS-Hep at 10 mM (a) and 10 μM (b).

3.4. Drug Loading Efficiency and In Vitro Release Profiles

The entrapment efficiency determining the drug delivery of Let and P-SS-Hep was modified. The entrapment efficiency and drug loading capacity of Let in P-SS-Hep were reached 26.21% and 6.15%, respectively. These results showed the reasonable efficiency that carriers can protect inside of drugs and prevented leaking out of the Let when they were introduced in P-SS-Hep.

As shown in Figure 7, the release profile of the encapsulated drug molecules was investigated at 37°C under different conditions of redox and pH. Free Let was totally released during 3 h only. In the presence of 10 μM and 10 mM GSH, the release of Let from the nanoparticle was remarkably different. In the condition pH 7.4, the release efficiency was quite low and the deflection was not clear in both 10 mM and 10 μM. Differently, the deviation of release efficiency between 10 mM and 10 μM was nearly 12% in the pH 4.5 condition due to the influence of GSH on S-S linkage.

Figure 7: The in vitro release profiles of free Let (cycle), Let from P-SS-Hep/Let in pH 4.5 containing 10 mM GSH (lozenge), in pH 4.5 containing 10 μM GSH (triangle), in pH 7.4 containing 10 mM GSH (square), and in pH 7.4 containing 10 μM GSH (white cycle), respectively.

The pH 4.5 showed the high potential to control drug release rate to cancer cells that took a longer time for Let to diffuse through the nanoparticles into the aqueous medium. At high concentration of GSH and pH, the outer Hep was detached from the conjugates upon the reductive cleavage of disulfide bonds, eliminating the steric hindrance of Let diffusion from the core to the release medium. The disulfide linkers are significantly important to improve selectivity of delivery system.

4. Conclusion

The redox and pH responsive P-SS-Hep conjugates containing disulfide linkers were successfully prepared and investigated by the simple and effective method. Herein, the disulfide bond has the high potential in not only reinforcing the durability during blood circulation but also enabling redox-sensitive release in the intracellular region. In cancer cells, the disulfide linkage could be effectively cleaved by antioxidant agents, resulting in the entrapped guest molecules releasing. The size of P-SS-Hep that could be controlled around 11 nm was indeed a higher effective drug loading carrier and significant potential drug release ability. Besides, the presence of Hep improves solubility and ability to pass through the membrane of the delivery system. The preliminary results show the potential of pH and redox-responsive nanocarriers in chemotherapy.

Competing Interests

The authors declare that they have no competing interests.

Acknowledgments

This research was funded by the National Program of Medicinal Chemistry Industry, Ministry of Industry and Trade, under Grant no. CNHD.ĐT.051/14-16.

References

D. H. Nguyen, J. S. Lee, J. H. Choi, K. M. Park, Y. Lee, and K. D. Park, “Hierarchical self-assembly of magnetic nanoclusters for theranostics: tunable size, enhanced magnetic resonance imagability, and controlled and targeted drug delivery,” Acta Biomaterialia, vol. 35, pp. 109–117, 2016.

N.-A. N. Tong, T. H. Nguyen, D. H. Nguyen, C. K. Nguyen, and N. Q. Tran, “Preparation of the cationic dendrimer-based hydrogels for controlled heparin release,” Journal of Macromolecular Science, Part A: Pure and Applied Chemistry, vol. 52, no. 10, pp. 830–837, 2015.

D. A. Tomalia, H. Baker, J. Dewald et al., “A new class of polymers: starburst-dendritic macromolecules,” Polymer Journal, vol. 17, no. 1, pp. 117–132, 1985.

D. A. Tomalia, “Birth of a new macromolecular architecture: dendrimers as quantized building blocks for nanoscale synthetic organic chemistry,” Aldrichimica Acta, vol. 37, no. 2, pp. 39–57, 2004.

S. Svenson, “Dendrimers as versatile platform in drug delivery applications,” European Journal of Pharmaceutics and Biopharmaceutics, vol. 71, no. 3, pp. 445–462, 2009.

S. Svenson and D. A. Tomalia, “Dendrimers in biomedical applications—reflections on the field,” Advanced Drug Delivery Reviews, vol. 64, pp. 102–115, 2012.

D. Chandrasekar, R. Sistla, F. J. Ahmad, R. K. Khar, and P. V. Diwan, “The development of folate-PAMAM dendrimer conjugates for targeted delivery of anti-arthritic drugs and their pharmacokinetics and biodistribution in arthritic rats,” Biomaterials, vol. 28, no. 3, pp. 504–512, 2007.

Y. Li, H. He, X. Jia, W.-L. Lu, J. Lou, and Y. Wei, “A dual-targeting nanocarrier based on poly(amidoamine) dendrimers conjugated with transferrin and tamoxifen for treating brain gliomas,” Biomaterials, vol. 33, no. 15, pp. 3899–3908, 2012.

Y. E. Kurtoglu, R. S. Navath, B. Wang, S. Kannan, R. Romero, and R. M. Kannan, “Poly(amidoamine) dendrimer-drug conjugates with disulfide linkages for intracellular drug delivery,” Biomaterials, vol. 30, no. 11, pp. 2112–2121, 2009.

P. Kolhe, J. Khandare, O. Pillai, S. Kannan, M. Lieh-Lai, and R. M. Kannan, “Preparation, cellular transport, and activity of polyamidoamine-based dendritic nanodevices with a high drug payload,” Biomaterials, vol. 27, no. 4, pp. 660–669, 2006.

D. H. Nguyen, J. H. Choi, Y. K. Joung, and K. D. Park, “Disulfide-crosslinked heparin-pluronic nanogels as a redox-sensitive nanocarrier for intracellular protein delivery,” Journal of Bioactive and Compatible Polymers, vol. 26, no. 3, pp. 287–300, 2011.

R. Qi, Y. Gao, Y. Tang et al., “PEG-conjugated PAMAM dendrimers mediate efficient intramuscular gene expression,” The AAPS Journal, vol. 11, no. 3, pp. 395–405, 2009.

M.-H. Han, J. Chen, J. Wang, S.-L. Chen, and X.-T. Wang, “Blood compatibility of polyamidoamine dendrimers and erythrocyte protection,” Journal of Biomedical Nanotechnology, vol. 6, no. 1, pp. 82–92, 2010.

N. T. Phuong, V. A. Ho, D. H. Nguyen et al., “Enzyme-mediated fabrication of an oxidized chitosan hydrogel as a tissue sealant,” Journal of Bioactive and Compatible Polymers: Biomedical Applications, vol. 30, no. 4, pp. 412–423, 2015.

S. Bai and F. Ahsan, “Synthesis and evaluation of pegylated dendrimeric nanocarrier for pulmonary delivery of low molecular weight heparin,” Pharmaceutical Research, vol. 26, no. 3, pp. 539–548, 2009.

S. M. Bromfield, P. Posocco, M. Fermeglia, S. Pricl, J. Rodríguez-López, and D. K. Smith, “A simple new competition assay for heparin binding in serum applied to multivalent PAMAM dendrimers,” Chemical Communications, vol. 49, no. 42, pp. 4830–4832, 2013.

T. H. Dung, L. T. Do, and H. Yoo, “PAMAM dendrimer generation 5-pluronic F127 nanofilm as a matrix for local metronidazole release,” Journal of Biomedical Nanotechnology, vol. 9, no. 7, pp. 1286–1292, 2013.

D. H. Nguyen, Y. K. Joung, J. H. Choi, H. T. Moon, and K. D. Park, “Targeting ligand-functionalized and redox-sensitive heparin-Pluronic nanogels for intracellular protein delivery,” Biomedical Materials, vol. 6, no. 5, Article ID 055004, 2011.

D. H. Nguyen, J. S. Lee, J. H. Choi et al., “Heparin nanogel-containing liposomes for intracellular RNase delivery,” Macromolecular Research, vol. 23, no. 8, pp. 765–769, 2015.

D. H. Nguyen, N. Q. Tran, and C. K. Nguyen, “Tetronic-grafted chitosan hydrogel as an injectable and biocompatible scaffold for biomedical applications,” Journal of Biomaterials Science, Polymer Edition, vol. 24, no. 14, pp. 1636–1648, 2013.

D. H. Phuc, N. T. Hiep, and D. N. P. Chau, “Fabrication of hyaluronan-poly(vinylphosphonic acid)-chitosan hydrogel for wound healing application,” International Journal of Polymer Science, vol. 2016, Article ID 6723716, 6 pages, 2016.

H. Koo, G.-W. Jin, H. Kang et al., “A new biodegradable crosslinked polyethylene oxide sulfide (PEOS) hydrogel for controlled drug release,” International Journal of Pharmaceutics, vol. 374, no. 1-2, pp. 58–65, 2009.

T. D. van, N. Q. Tran, D. H. Nguyen, C. K. Nguyen, D. L. Tran, and P. T. Nguyen, “Injectable hydrogel composite based gelatin-PEG and biphasic calcium phosphate nanoparticles for bone regeneration,” Journal of Electronic Materials, vol. 45, no. 5, pp. 2415–2422, 2016.

Y. Kakizawa, A. Harada, and K. Kataoka, “Glutathione-sensitive stabilization of block copolymer micelles composed of antisense DNA and thiolated poly(ethylene glycol)-block-poly(L-lysine): a potential carrier for systemic delivery of antisense DNA,” Biomacromolecules, vol. 2, no. 2, pp. 491–497, 2001.

D. H. Nguyen, J. S. Lee, J. W. Bae et al., “Targeted doxorubicin nanotherapy strongly suppressing growth of multidrug resistant tumor in mice,” International Journal of Pharmaceutics, vol. 495, no. 1, pp. 329–335, 2015.

T. T. Nguyen Thi, T. V. Tran, N. Q. Tran, C. K. Nguyen, and D. H. Nguyen, “Hierarchical self-assembly of heparin-PEG end-capped porous silica as a redox sensitive nanocarrier for doxorubicin delivery,” Materials Science and Engineering C, vol. 70, part 2, pp. 947–954, 2017.

D. H. Nguyen, J. W. Bae, J. H. Choi, J. S. Lee, and K. D. Park, “Bioreducible cross-linked Pluronic micelles: pH-triggered release of doxorubicin and folate-mediated cellular uptake,” Journal of Bioactive and Compatible Polymers, vol. 28, no. 4, pp. 341–354, 2013.

N. Song, W. Liu, Q. Tu, R. Liu, Y. Zhang, and J. Wang, “Preparation and in vitro properties of redox-responsive polymeric nanoparticles for paclitaxel delivery,” Colloids and Surfaces B: Biointerfaces, vol. 87, no. 2, pp. 454–463, 2011.

W. Hu, L. Qiu, L. Cheng et al., “Redox and pH dual responsive poly(amidoamine) dendrimer-poly(ethylene glycol) conjugates for intracellular delivery of doxorubicin,” Acta Biomaterialia, vol. 36, pp. 241–253, 2016.

L. Phuong, Y. Lee, J. Bae, D. H. Nguyen, and K. D. Park, “Tissue adhesive gelatin hydrogels formed in situ via dual enzymatic crosslinking,” in Proceedings of the Annual Meeting- Society for Biomaterials in Conjunction with the International Biomaterials Symposium, 2014.

S. J. Kang, C. Durairaj, U. B. Kompella, J. M. O'Brien, and H. E. Grossniklaus, “Subconjunctival nanoparticle carboplatin in the treatment of murine retinoblastoma,” Archives of Ophthalmology, vol. 127, no. 8, pp. 1043–1047, 2009.