BioMed Research International
Volume 2018 (2018), Article ID 1541709, 1 page
https://doi.org/10.1155/2018/1541709

Corrigendum

Corrigendum to “ECG Markers of Hemodynamic Improvement in Patients with Pulmonary Hypertension”

Marcin Waligóra, Anna Tyrka, Piotr Podolec, and Grzegorz Kopeć

Department of Cardiac and Vascular Diseases, Jagiellonian University Medical College, John Paul II Hospital in Krakow, Pradnicka 80, Kraków, Poland

Correspondence should be addressed to Grzegorz Kopeć; grzegorzkrakow1@gmail.com

Received 28 June 2018; Accepted 24 July 2018; Published 12 August 2018

Copyright © 2018 Marcin Waligóra et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “ECG Markers of Hemodynamic Improvement in Patients with Pulmonary Hypertension” [1], there was an error in the key of Figure 2, which should be corrected as follows:

Figure 2: Electrocardiographic predictors of hemodynamic improvement. (AUC: 0.75, 95% CI: 0.63–0.84, ), (AUC: 0.73, 95% CI: 0.63–0.82, ) and (AUC: 0.67, 95% CI: 0.56–0.77, ).

References

M. Waligóra, A. Tyrka, P. Podolec, and G. Kopeć, “ECG markers of hemodynamic improvement in patients with pulmonary hypertension,” BioMed Research International, vol. 2018, Article ID 4606053, 10 pages, 2018.