BioMed Research International
Volume 2018 (2018), Article ID 6432637, 7 pages
https://doi.org/10.1155/2018/6432637

Research Article

Do Different LED Colours Influence Sand Fly Collection by Light Trap in the Mediterranean?

Gabriella Gaglio, Ettore Napoli, Francesca Arfuso, Jessica Maria Abbate, Salvatore Giannetto, and Emanuele Brianti

Dipartimento di Scienze Veterinarie, University of Messina, Messina, Italy

Correspondence should be addressed to Gabriella Gaglio; ggaglio@unime.it

Received 19 April 2018; Accepted 4 June 2018; Published 27 June 2018

Academic Editor: Stephen Munga

Copyright © 2018 Gabriella Gaglio et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Light traps represent the most used attractive system to collect and monitor phlebotomine sand flies. Recent studies have suggested that light traps can be easily upgraded by the use of light-emitting diode (LED) with positive effects on trap design, weight, and battery life. However, scant data on the effect of different LED colours on the attractiveness to phlebotomine sand fly species are available in literature. In this study, the capture performances of light traps equipped with different LED colours on phlebotomine sand fly species indigenous in the Mediterranean area were evaluated. Phlebotomine sand fly collections were performed using a classical light trap (CLT), equipped with a traditional incandescent lamp, and five Laika 4.0 light traps supplied, each with LED of different colours and wavelengths: (i) white; (ii) red; (iii) green; (iv) blue; (v) UV. Light traps were set for three consecutive nights fortnightly from May to October 2017 and climate data recorded using a meteorological station. A total of 411 phlebotomine sand flies (191 males and 220 females), belonging to three different species, namely, Phlebotomus perniciosus (n= 298, 141 males and 157 females), Sergentomyia minuta (n=110, 48 males and 62 females), and Phlebotomus neglectus (n=3, 2 males and 1 females) were collected. Abundance of capture was influenced by colours of LED and time. The highest number of phlebotomine sand flies was captured on June (P<0.01) and by UV LED (P<0.01). As regard to species, P. perniciosus was mainly captured by UV LED on June (P<0.01). No effect of time (P>0.05) or LED colour (P>0.05) was recorded for S. minuta and P. neglectus. According to the results of the present study light trap equipped with UV LED can represent an effective tool for the capture of sand fly species in the Mediterranean area.

1. Introduction

Phlebotomine sand flies (Diptera: Psychodidae) are small nocturnal insects that act as vectors of various infectious and parasitic agents including canine and human Leishmaniosis. These insects play a crucial role in the epidemiology of relevant diseases being some of great veterinary and medical importance; their monitor and control are, therefore, of pivotal importance.

The system for trapping phlebotomine sand flies can be categorized into attractive (e.g., light traps and CO₂) or passive (e.g., sticky traps) traps, and the different methods may influence the capture outcomes including specific attraction to sand fly species in a given area [1]. Although phlebotomine sand flies are nocturnal/crepuscular insects and their flight activity increases in relation to the decrease of the daily light intensity [2], they are contemporarily attracted by artificial light; thus, light traps are largely employed for the collection of these insects. Interestingly, insects are attracted by light of different colours and intensity relating to their retina structure and to the presence of photoreceptors. Honeybees, for instance, have three photoreceptors (i.e., ultraviolet, blue, and green); in butterfly the retinas have six or more photoreceptor classes [3]. It has been demonstrated that the eyes of the adult sand fly Lutzomyia longipalpis reacted maximally to light in the ultraviolet region (at 340 nm) with a secondary peak in the blue-green-yellow region at 520-546 nm [4].

Light trap methods have recently been improved by the use of light-emitting diode (LED) [5–8]. LED light traps have some advantages compared to traditional light trap models including the low electric consumption resulting in a longer battery life and in a longest lifetime of the lamp. The LED technology allows easily customizing the colour and the intensity of the light. Some authors showed that LED of different colours could have different power of attraction demonstrating, for instance, that Phlebotomus papatasi is more attracted by red LED [9], while Nyssomyia whitmani and Lutzomyia longipalpis seem to be more attracted by blue and green LED, respectively [10]. However, no data on the effect of different LED colours on other Phlebotomus species present in Mediterranean area are available in the literature. Therefore, the aim of the present study is to evaluate the capture performances of light traps equipped with different LED colours to phlebotomine sand fly species endemic in the Mediterranean area.

2. Materials and Methods

2.1. Study Area and Collection Procedures

The study was conducted from May to October 2017, which corresponds to the sand fly season in the study area [11], in the municipality of Messina, an area highly endemic for canine leishmaniosis where the presence of competent sand fly species has been previously reported [11, 12]. The traps were placed in a suburban area nearby the horse stables of the Department of Veterinary Sciences of the University of Messina (38°13′59′′N; 15°32′48.99′′E; 263 m a.s.l.).

Sand fly collection was performed using both a classical light trap (named CLT), equipped with a traditional incandescent lamp (12V, 8W) and five Laika 4.0 light traps supplied, each with LED of different colours and wavelengths: (i) white/455 nm; (ii) red/620 nm; (iii) green/530 nm; (iv) blue/470 nm; (v) UV/395 nm. The six traps were set opposite to a stonewall at 50 cm above the ground [11] and at about 3 meters apart from each other (Figures 1(a) and 1(b)). Both CLT and LED traps were placed for three consecutive days twice a month (six days per month), from May to October 2017. Traps were switched-on before sunset (18:00) and left working for 13 hours (up to 7:00 a.m.). Net-bags of traps were collected and replaced after each day of collection. Temperature (°C), relative humidity (RH%), and wind intensity (WI) were recorded using a meteorological station placed in the same area of traps.

(a)

(b)

Figure 1: Classical light trap (CLT) and five Laika traps equipped with red, green, white, UV, and blue LEDs placed in the study area. (a) Diurnal vision; (b) nocturnal vision.

2.2. Sand Fly Identification

Phlebotomine sand flies collected were initially separated from other insects, differentiated by sex and stored in vials containing 70% ethanol. For species identification, the external genitalia of males and the head and posterior last tergites of females were dissected, cleared, and slide-mounted as described elsewhere [8]. Identification was performed using morphological keys [13].

2.3. Data Analysis

Due to the limited number of phlebotomine sand flies collected in each sampling session, the data were merged according to the month of capture. Two-way analysis of variance (ANOVA) was applied in order to evaluate the effect of time (i.e., month) and traps (i.e., CLT or LED traps) on abundance and sand fly species. When significant differences were found, Bonferroni’s post hoc comparison was applied.

For the best represented species, Pearson’s chi-square analysis was applied to evaluate statistically significant difference in the number of male and female specimens.

Statistical significant values were set for values < 0.05. The statistical analyses were performed using the STATISTICA software package (STATISTICA 7 for Windows, Stat Software Inc., Tulsa, Oklahoma).

3. Results

A total of thirty-six sampling days were carried out throughout the study, but no phlebotomine sand flies were captured in the first four (May) and in the last six capture days (October). The number of captured phlebotomine sand flies along with environmental parameters recorded during the sampling days are summarized in Table 1. Overall, 411 specimens, belonging to three different species, namely, Phlebotomus perniciosus (n= 298, 141 males and 157 females), Sergentomyia minuta (n=110, 48 males and 62 females), and Phlebotomus neglectus (n=3, 2 males and 1 females) were collected (Table 2). A statistically significant effect of time (month) and trap model found that the highest number of specimens was collected in the month of June and by blue LED, UV LED, and CLT (Figure 2). Similarly, in regard to species, P. perniciosus was mainly captured in June (P<0.01) and by UV LED (Figure 3); no differences in the number of male and female specimens of P. perniciosus captured by the three more efficient traps (i.e., blue LED, UV LED, and CLT traps) were observed (Figure 4). Neither effect of sampling period nor of trap model was found on the number of S. minuta and P. neglectus captured during the study.

Table 1: Number of phlebotomine sand flies captured in the study along with environmental parameters recorded during the trapping days. Environmental parameters are provided as means of values recorded during each trapping day (i.e., from 6 p.m. to 7 a.m.).

Month
Sampling day
Sand fly number
Temperature (°C)
Relative Humidity ()
Wind Intensity (km/h)

May
15
0
23
46
23

16
0
24
64
18

17
0
22
58
20

24
0
23
63
24

25
15
21
57
17

26
13
25
49
12

June
13
41
24
57
21

14
29
25
49
28

15
46
24
61
26

27
61
28
55
10

28
12
29
50
13

30
24
28
63
14

July
11
10
31
45
17

12
10
33
36
19

13
15
30
60
26

25
3
25
73
25

26
7
25
67
19

27
4
27
54
22

August
1
7
33
30
19

2
6
33
28
21

3
3
34
27
27

29
9
25
87
17

30
39
23
84
11

31
12
24
74
10

September
11
14
24
73
19

12
8
22
84
20

13
2
27
50
18

25
8
22
62
15

26
10
22
64
9

27
3
21
82
9

October
9
0
17
88
8

10
0
19
96
10

11
0
26
68
13

16
0
20
57
9

17
0
20
65
9

18
0
21
61
18

Table 2: Number and percentages of phlebotomine sand fly species captured by each trap model in the study.

Traps
Species
Study period

May 
n/total (%)
June 
n/total (%)
July 
n/total (%)
August 
n/total (%)
September 
n/total (%)

blue LED
Phlebotomus perniciosus
1/5 (20)
20/30 (66.7)
3/11 (27.3)
9/18 (50)
4/6 (66.7)

Sergentomyia minuta
4/5 (80)
10/30 (33.3)
8/11 (72.7)
9/18 (50)
2/6 (33.3)

Phlebotomus neglectus
0/5 (0)
0/30 (0)
0/11 (0)
0/18 (0)
0/6 (0)

UV LED
Phlebotomus perniciosus
10/11 (90.9)
104/116 (89.7)
8/9 (97.1)
14/18 (77.8)
6/10 (60)

Sergentomyia minuta
1/11 (9.1)
12/116 (10.3)
1/9 (2.9)
4/18 (22.2)
4/10 (40)

Phlebotomus neglectus
0/11 (0)
0/116 (0)
0/9 (0)
0/18 (0)
0/10 (0)

white LED
Phlebotomus perniciosus
2/2 (100)
9/15 (60)
0/4 (0)
9/12 (75)
1/1 (100)

Sergentomyia minuta
0/2 (0)
5/15 (33.3)
4/4 (100)
3/12 (25)
0/1 (0)

Phlebotomus neglectus
0/2 (0)
1/15 (6.7)
0/4 (0)
0/12 (0)
0/1 (0)

green LED
Phlebotomus perniciosus
1/3 (33.3)
2/4 (50)
3/10 (30)
0/5 (0)
4/5 (80)

Sergentomyia minuta
2/3 (66.7)
2/4 (50)
7/10 (70)
5/5 (100)
0/5 (0)

Phlebotomus neglectus
0/3 (0)
0/4 (0)
0/10 (0)
0/5 (0)
1/5 (20)

red LED
Phlebotomus perniciosus
1/2 (50)
10/14 (71.4)
0/6 (0)
0/5 (0)
2/5 (40)

Sergentomyia minuta
1/2 (50)
4/14 (28.6)
6/6 (100)
5/5 (100)
2/5 (40)

Phlebotomus neglectus
0/2 (0)
0/14 (0)
0/6 (0)
0/5 (0)
1/5 (20)

CLT
Phlebotomus perniciosus
5/5 (100)
33/34 (97.1)
5/9 (55.6)
15/18 (83.3)
17/18 (97.1)

Sergentomyia minuta
0/5 (0)
1/34 (2.9)
4/9 (44.4)
3/18 (16.7)
1/18 (2.9)

Phlebotomus neglectus
0/5 (0)
0/34 (0)
0/9 (0)
0/18 (0)
0/18 (0)

Legend: blue LED, UV LED, white LED, green LED, red LED= Laika traps equipped with blue, UV, white, green and red LEDs respectively; CLT = Classical light trap equipped with incandescent lamp.

Figure 2: Total number of phlebotomine sand flies captured by classical light trap (CLT) and five Laika traps equipped with red, green, white UV, and blue LEDs.

Figure 3: Total number of Phlebotomus perniciosus captured by classical light trap (CLT) and blue and UV Laika traps.

Figure 4: Number of males and females of Phlebotomus perniciosus captured by classical light trap (CLT) and blue and UV Laika trap along with results of Pearson’s chi-square test.

4. Discussions

The advent of LED technology has substantially improved light trap performances. Despite the fact that previous surveys have demonstrated how light trap using LED technologies can be valid alternative to classical models, the attractiveness of different colours LED has not been explored in deep, so far. The present study investigated the capture performances of light trap equipped with LED of different colour and wavelength on sand fly species endemic in the Mediterranean area. According to the herein results, it may be speculated that light trap equipped with UV LED of 395 nm has a higher attractiveness compared to other coloured LED traps. This is particularly evident for the species P. perniciosus which is one of the main vectors of leishmaniosis by L. infantum to both humans and dogs [14].

The species captured in the present survey are the same reported in other previous investigations performed in the same area [11, 12, 15], where P. perniciosus and S. minuta were the most abundant species. Though the well-known role of P. perniciosus is being competent vector of L. infantum, that of S. minuta is still unclear and needs further investigations. Recently, [16] reported the first molecular detection of L. infantum in S. minuta in southern Portugal and the first isolation of human blood as meal source in an engorged female of S. minuta. These findings opened a debate on the potential role of this species in the transmission of leishmaniosis and its involvement in the epidemiology deserves further researches including, but not limited to, protozoan isolation from engorged specimens as well as experimental transmission.

The limited presence of P. neglectus here observed is consistent with previous reports in southern Italy [11, 17] and justified by the higher abundance of this species in northern Italian regions which are featured by cooler climate [18, 19].

The attractiveness of different light technologies and colours could bias the estimation of sand fly population in a specific area. In fact, as demonstrated by a study that compared the attractiveness of different LED colours, Phlebotomus papatasi was attracted four times more by red LED compared to blue and green and twice with respect to incandescent lamp [9]. A study performed in Brazil demonstrated that Hoover Pugedo light traps equipped with green or blue LED or incandescent lamps showed the same attractiveness power for Nyssomyia whitmani and Lutzomyia longipalpis [10]. In another study, the CDC and Disney traps were, respectively, more efficient in the capture of Lutzomyia ovallesi and Lutzomyia olmeca olmeca compared to LED light trap [20]. In a previous study conducted by our group [8] the attractiveness of a Laika trap equipped with both white and UV LED was compared to CLT, no significant differences in the trapping performance of the two traps were recorded in that study. Here, the Laika model equipped with UV LED showed the best capture performances in general and to P. perniciosus in particular. These findings suggest that the eyes of P. perniciosus react maximally to light in the ultraviolet region as already observed for Lutzomyia longipalpis [4]. However, spectral sensitivities using electroretinograms need to be determined in order to clarify whether the greater attractiveness of the UV LED for this species is linked to a higher sensitivity of the eyes to wavelength of the ultraviolet region (395 nm) or to the low brightness emitted by this LED colour.

In addition to trapping methods, sand fly abundance and richness may be influenced considerably by other variables including animals’ presence and environmental and climate variables [21]. In particular, the environmental factors have been used to predict and elucidate the distribution of diseases transmitted by vectors [22]. The climatic factors including temperature, humidity, wind, and rainfall could influence the distribution of vectors including sand fly species [22, 23]. A previous study conducted in the same area recorded two peaks of sand fly collection on August and September [11], in the present study instead only one peak was observed in the month of June. Moreover, phlebotomine sand flies were captured earlier in the here survey compared to the aforementioned study in which the first positive trapping session was observed in late June. In regard to this difference, it is interesting to notice that the summer season in which the present study was conducted was featured by very hot temperature especially in July (28.6 ± 3.2°C) and August (28.8 ± 5.0) and high humidity in September (69.3 ± 13.1%) and October (72.5 ± 15.6%) caused by intense rains. These particular climatic conditions may explain the decline in the number of sand flies during the hottest months and their complete absence in October.

In conclusion, this study showed how light trap equipped with UV LED of 395 nm has superior performances to other LED traps equipped with blue or green or white or red lamps for the capture of sand flies including important Leishmania vector species such as P. perniciosus. By virtue of their performances and technology, UV LED trap may represent a highly efficient alternative to CLT for the capture and monitoring of the sand fly species endemic in the Mediterranean.

Data Availability

Data supporting the findings of this study is included within the article.

Conflicts of Interest

The authors declare that they have no conflicts of interest.

Authors’ Contributions

Ettore Napoli and Francesca Arfuso contributed equally to this paper.

Acknowledgments

The authors thank Eng. Leonardo Spacone of Laika® Lab for providing the traps and the meteorological station used in this study.

References

B. Alexander, “Sampling method for phlebotomine sandflies,” Medical and Veterinary Entomology, vol. 14, pp. 109–122, 2000.

B. N. Chaniotis, M. A. Correa, R. B. Tesh, and K. M. Johnson, “Daily and seasonal man-biting activity of phlebotomine sandflies in Panama,” Journal of Medical Entomology, vol. 8, no. 4, pp. 415–420, 1971.

K. Arikawa, “The eyes and vision of butterflies,” The Journal of Physiology, vol. 595, no. 16, pp. 5457–5464, 2017.

H. E. Mellor, J. G. C. Hamilton, and M. Anderson, “Spectral sensitivity in the eyes of male and female Lutzomyia longipalpis sandflies,” Medical and Veterinary Entomology, vol. 10, no. 4, pp. 371–374, 1996.

L. W. Cohnstaedt, J. I. Gillen, and L. E. Munstermann, “Light-emitting diode technology improves insect trapping,” Journal of the American Mosquito Control Association, vol. 24, no. 2, pp. 331–334, 2008.

R. S. Mann, P. E. Kaufman, and J. F. Butler, “Lutzomyia spp. (Diptera: Psychodidae) response to olfactory attractant- and light emitting diode-modified mosquito magnet X (MM-X) traps,” Journal of Medical Entomology, vol. 46, no. 5, pp. 1052–1061, 2009.

G. C. Müller, J. A. Hogsette, D. L. Kline, J. C. Beier, E. E. Revay, and R.-D. Xue, “Response of the sand fly Phlebotomus papatasi to visual, physical and chemical attraction features in the field,” Acta Tropica, vol. 141, pp. 32–36, 2015.

G. Gaglio, E. Napoli, L. Falsone, S. Giannetto, and E. Brianti, “Field evaluation of a new light trap for phlebotomine sand flies,” Acta Tropica, vol. 174, pp. 114–117, 2017.

D. F. Hoel, J. F. Butler, E. Y. Fawaz, N. Watany, S. S. El-Hossary, and J. Villinski, “Response of phlebotomine sand flies to light-emitting diode-modified light traps in southern Egypt,” Journal of Vector Ecology, vol. 32, no. 2, pp. 302–307, 2007.

F. S. Silva, J. M. Brito, B. M. Costa-Neta, and S. E. P. D. Lobo, “Evaluation of light-emitting diodes as attractant for sandflies (Diptera: Psychodidae: Phlebotominae) in northeastern Brazil,” Memórias do Instituto Oswaldo Cruz, vol. 110, no. 6, pp. 801–803, 2015.

G. Gaglio, E. Brianti, E. Napoli et al., “Effect of night time-intervals, height of traps and lunar phases on sand fly collection in a highly endemic area for canine leishmaniasis,” Acta Tropica, vol. 133, no. 1, pp. 73–77, 2014.

E. Brianti, G. Gaglio, E. Napoli et al., “Efficacy of a slow-release imidacloprid (10%)/flumethrin (4.5%) collar for the prevention of canine leishmaniosis,” Parasites & Vectors, vol. 7, no. 1, article 327, 2014.

F. Dantas-Torres, V. D. Tarallo, and D. Otranto, “Morphological keys for the identification of Italian phlebotomine sand flies (Diptera: Psychodidae: Phlebotominae),” Parasites & Vectors, vol. 7, no. 1, article 479, 2014.

M. Maroli, M. D. Feliciangeli, L. Bichaud, R. N. Charrel, and L. Gradoni, “Phlebotomine sand flies and the spreading of leishmaniases and other diseases of public health concern,” Medical and Veterinary Entomology, vol. 27, no. 2, pp. 123–147, 2013.

O. Lisi, V. D'Urso, V. Vaccalluzzo et al., “Persistence of phlebotomine Leishmania vectors in urban sites of Catania (Sicily, Italy),” Parasites & Vectors, vol. 7, no. 1, article 560, 2014.

S. Pereira, D. Pita-Pereira, T. Araujo-Pereira et al., “First molecular detection of Leishmania infantum in Sergentomyia minuta (Diptera, Psychodidae) in Alentejo, southern Portugal,” Acta Tropica, vol. 174, pp. 45–48, 2017.

F. Dantas-Torres, V. D. Tarallo, M. S. Latrofa, A. Falchi, R. P. Lia, and D. Otranto, “Ecology of phlebotomine sand flies and Leishmania infantum infection in a rural area of southern Italy,” Acta Tropica, vol. 137, pp. 67–73, 2014.

M. Signorini, M. Drigo, F. Marcer et al., “Comparative field study to evaluate the performance of three different traps for collecting sand flies in northeastern Italy,” Journal of Vector Ecology, vol. 38, no. 2, pp. 374–378, 2013.

M. Maroli, L. Rossi, R. Baldelli et al., “The northward spread of leishmaniasis in Italy: evidence from retrospective and ongoing studies on the canine reservoir and phlebotomine vectors,” Tropical Medicine & International Health, vol. 13, no. 2, pp. 256–264, 2008.

J. J. Rodríguez-Rojas, W. Arque-Chunga, I. Fernández-Salas, and E. A. Rebollar-Téllez, “Comparative field evaluation of different traps for collecting adult phlebotomine sand flies (Diptera: Psychodidae) in an endemic area of cutaneous leishmaniasis in Quintana Roo, Mexico,” Journal of the American Mosquito Control Association, vol. 32, no. 2, pp. 103–116, 2016.

J. Ghrab, A. Rhim, D. Bach-Hamba et al., “Phlebotominae (Diptera: Psychodidae) of human leishmaniosis sites in Tunisia,” Parasite, vol. 13, no. 1, pp. 23–33, 2006.

A. Y. M. Abdullah, A. Dewan, M. R. I. Shogib, M. M. Rahman, and M. F. Hossain, “Environmental factors associated with the distribution of visceral leishmaniasis in endemic areas of Bangladesh: modeling the ecological niche,” Tropical Medicine and Health, vol. 45, no. 1, article 13, 2017.

L. Chamaillé, A. Tran, A. Meunier, G. Bourdoiseau, P. Ready, and J.-P. Dedet, “Environmental risk mapping of canine leishmaniasis in France,” Parasites & Vectors, vol. 3, no. 1, article 31, 2010.