BioMed Research International
Volume 2018 (2018), Article ID 8318136, 1 page
https://doi.org/10.1155/2018/8318136

Corrigendum

Corrigendum to “Effects of rhBMP-2 Loaded Titanium Reinforced Collagen Membranes on Horizontal Bone Augmentation in Dogs”

Ki-Sun Lee,¹ Yu-Sung Jeon,² Sang-Wan Shin,¹ and Jeong-Yol Lee¹

¹Department of Prosthodontics, Korea University Guro Hospital, Seoul, Republic of Korea
²Graduate School of Clinical Dentistry, Korea University, Seoul, Republic of Korea

Correspondence should be addressed to Jeong-Yol Lee; wddc@korea.ac.kr

Received 17 February 2018; Accepted 28 February 2018; Published 20 March 2018

Copyright © 2018 Ki-Sun Lee et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Effects of rhBMP-2 Loaded Titanium Reinforced Collagen Membranes on Horizontal Bone Augmentation in Dogs” [1], the Authors’ Contributions section was missing and should be added as follows:

Authors’ Contributions

Ki-Sun Lee and Yu-Sung Jeon contributed equally to this work.

References

K. Lee, Y. Jeon, S. Shin, and J. Lee, “Effects of rhBMP-2 loaded titanium reinforced collagen membranes on horizontal bone augmentation in dogs,” BioMed Research International, vol. 2017, Article ID 7141296, 8 pages, 2017.