BioMed Research International
Volume 2019 (2019), Article ID 1478634, 8 pages
https://doi.org/10.1155/2019/1478634

Research Article

Association of Synthetic House-Tree-Person Drawing Test and Depression in Cancer Patients

Guifang Yang,¹ Liping Zhao,² and Lijuan Sheng³

¹Department of Emergency Medicine, The Second Xiangya Hospital, Central South University, China
²Department of Nursing, The Second Xiangya Hospital, Central South University, China
³Department of Neurology, The Second Xiangya Hospital, Central South University, China

Correspondence should be addressed to Lijuan Sheng; shenglijuannice1006@csu.edu.cn

Received 26 April 2019; Revised 28 June 2019; Accepted 16 July 2019; Published 28 July 2019

Academic Editor: Antonella Gigantesco

Copyright © 2019 Guifang Yang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Background. Evidence regarding the relationship between synthetic house-tree-person (S-HTP) drawing test and depression in cancer patients is limited. The aim of this study was to explore the applicability and validity of S-HTP drawing test in cancer patients suffering from depression. Methods. As a population based cross-sectional study, 167 patients with cancer were enrolled in a hospital in China from December 2015 to December 2017. Self-edited general information questionnaire, self-rating depression scale (SDS), and the S-HTP drawing test were completed by all participants. Results. The average age of 167 selected participants was 52.92 ± 10.43 years old, and about 58.7% (98/167) of them were male. On SDS, depression rate was found in 34.1% (27/167) cancer patients. The logistic regression equation was established by using the depression drawing characteristics as the independent variables and the evaluation results from SDS as the dependent variable and 9 drawing characteristics employed in the regression equation (χ2 = 68.657, P < 0.001. Nagelkerke R2 = 0.466). Correlation analysis revealed a positive correlation between S-HTP drawing test and SDS for depression state of cancer patients (p < 0.01). Conclusions. There are interrater reliability and test-retest reliability between S-HTP drawing test and SDS. The S-HTP drawing test could help in screening depression in cancer patients.

1. Introduction

The increase in morbidity and mortality of cancer has made it the leading cause of death in China since 2010 [1]. Currently, half of the cancer patients can expect to survive for at least 10 years because of advances in cancer treatments [2]. Meanwhile, more researchers begin to pay attention to the mental health problems such as anxiety and depression in cancer survivors [3, 4]. A meta-analysis showed that 15% of cancer patients with nonpalliative treatment were diagnosed with major depression [5]. Depression, a state of low mood and aversion to activity, can affect a person's thoughts, behavior, tendencies, feelings, and sense of well-being [6]. In cancer settings, evidence shows that depression causes serious suffering and distress, reduces participation with medical care, and potentially prolongs the duration of stay in hospital. Depression is also a significant determinant of quality of life and survival. Yet depression is often overlooked by busy cancer professionals in palliative-care and nonpalliative-care settings [5]. In previous studies, we found that the investigation of the psychological problems of cancer patients is mostly in the form of a questionnaire, such as distress thermometer [5]. However, this method is easy to cause the resistance and noncooperation of cancer patients, which may also make them alert or defensive. When the patients are unable to express their inner emotions and thoughts in words, and the subjects are unwilling to cooperate, there will be a deviation in the use of the objective scale to test the emotional state of the subjects [7, 8]. At this time, a projective test can be used as an important supplement. In psychology, a projective test is a personality test designed to let a person respond to ambiguous stimuli, presumably revealing hidden emotions and internal conflicts projected by the person into the test [7, 8]. Projective tests can enable subjects to avoid the instinctive defensive psychology, so as to obtain their inner true thoughts and emotions [9]. The synthetic house-tree-person (S-HTP) drawing test is a very important projective test.

In 1948, Buck [10] has first developed the house-tree-person drawing test that required participants to draw three subjects on three pages. In 1979, Mikami [11] developed the S-HTP drawing test, of which characteristic is the house, tree, and person which are drawn on the same sheet of paper and assessed together in relation to each other. Currently, there are many types of research using S-HTP drawing test to assess psychological functioning such as children’s resilience and vulnerability in Haitian [12] and anxiety in cancer patients [13]. However, studies on S-HTP drawing test and depression are rarely found in cancer patients. Therefore, the study of S-HTP drawing test and depression in cancer patients is a pioneering field in psychology research. This study was designed to investigate its applicability and develop a predictive value that identifies depression in cancer patients.

2. Patients and Methods

2.1. Study Design and Population

The cross-sectional study was conducted among 200 participants at the Second Xiangya Hospital of Central South University in Changsha, Hunan Province, China, from December 2015 to December 2017, who agreed to participate in the study. Thirty-three patients were excluded from the study because they failed to complete the self-rating depression scale (SDS) or S-HTP drawing test, and 167 cancer patients were finally included.

2.2. Inclusion and Exclusion Criteria

The inclusion criteria were as follows: (1) age ≥ 16 years old, (2) cancer pathology and under treatment for cancer, (3) having reading comprehension ability, and (4) consent to participate in the study. The exclusion criteria included cancer patients with severe organ dysfunction and poor physical condition who could not complete the test. Patients with a professional basis in drawing and those familiar with the rules of the drawing test were not included. In addition, patients who were under treatment for depression were excluded.

2.3. Procedures

All patients underwent detailed face-to-face clinical interviews. Self-edited general condition questionnaire, SDS, and S-HTP drawing test were used in the interview. The participants first did the S-HTP drawing test. After that, these cancer patients were allowed for 5 to 10 minutes to rest. Then, the self-edited general information questionnaire and SDS were fulfilled.

2.4. Self-Edited General Information Questionnaire

7 items including age, gender, nation, education, marital status, occupation, and income consisted of the questionnaire (Table 1).

Table 1: Demographic characteristics of cancer patients.

Items
Characteristics
Cases
Constituent ratio (%)

Age(years)
<45
40
24.0

45-60
83
49.7

>60
44
26.3

Gender
Male
98
58.7

Female
69
41.3

Nation
Han
161
96.4

minority
6
3.6

Education
Elementary or junior
98
58.7

Senior
44
26.3

College or above
25
15.0

Marital status
Married
155
92.8

Unmarried
12
7.2

Occupation
Civil servant or teacher
16
9.6

Worker
22
13.2

Farmer
71
42.5

Businessman or freelancer
24
14.4

Retired or unemployed
34
24.4

Income of the family per month (Ren Min Bi)
<1000
22
13.2

1000~1999
76
45.5

2000~2999
55
32.9

3000~3999
10
6.0

>4000
4
2.4

2.5. Self-Rating Depression Scale (SDS)

The SDS [14] is a 20-item, self-administered, short scale that evaluates affective, physiologic and psychological symptoms of depression. It includes 10 positive-scoring items and 10 reverse-scoring items that are rated from one to four. The raw score for each of the 20 items was added together to get the total score, which multiplied by a factor of 1.25 is the standard score of SDS. According to Zung's severity levels classification criteria, the SDS score greater than 53 was used by Chinese psychiatric professionals as a cutoff point for depression-related symptom severity when conducting assessments. The higher score means severe depression status. Zung's self-rating depression scale and the cutoff values have been widely used in Chinese depression studies, and the Chinese versions of these surveys have also been validated [15, 16].

2.6. The S-HTP Drawing Test Applied

In our previous published study, the whole process of S-HTP drawing test was described in detail [13]. All of the patients were supplied with an A4 sheet of paper, a 2B-pencil, a writing board, and an eraser. They were asked to draw a house, a tree, a person and anything you want on the paper. If they wished, they could change the drawing by using the eraser. There was no set time for them to complete their drawing but the test must be completed by themselves.

2.7. S-HTP Drawing Test Scoring System

Based on R.C. Burns' drawing test interpretation system and other relevant literature, we identified a set of drawing features related to depression [17–19]. A total of 23 drawing features of depression were identified. These items were subsequently divided into four areas of painting characteristics. (Table 2). First, overall S-HTP features included D1~D6; Second, house features included D7~D10; Third, tree features included D11~D16. Finally, person features included D17~D23. If certain characteristics were found to be present, each item was assigned 1 score, otherwise, it was 0 score. The assessment of the drawing characteristics was carried out independently by two professionally trained researchers, and if the assessment is controversial, it is decided by a third professional.

Table 2: The incidence of items used in depression assessment and drawing characteristics in depression group and in nondepression group of cancer patients.

Drawing characteristics
Cases
Depression self-evaluation results
χ² value
P value

Depression
No depression

D1
Small drawing size
Yes
46 (27.5)
27 (47.4)
19 (17.3)
17.039
<0.001

No
121 (72.5)
30 (52.6)
91 (82.7)

D2
Weak strength drawing
Yes
47 (28.1)
23 (40.4)
24 (21.8)
6.376
0.012

No
120 (71.9)
34 (59.6)
86 (78.2)

D3
Simplified drawing
Yes
96 (57.5)
44 (77.2)
52 (47.3)
13.753
<0.001

No
71 (42.5)
13 (22.8)
58 (52.7)

D4
Scribbled drawing
Yes
130 (77.8)
80 (80.8)
50 (73.5)
1.238
0.266

No
37 (22.2)
19 (19.2)
18 (26.5)

D5
Decorated drawing
Yes
107 (64.1)
30 (52.6)
77 (69.1)
4.387
0.036

No
60 (35.9)
27 (47.4)
33 (30.9)

D6
Lines jagged and not joined
Yes
86 (51.5)
23 (40.4)
63 (57.3)
4.304
0.038

No
81 (48.5)
34 (59.6)
47 (42.7)

D7
Simple house drawing
Yes
67 (40.1)
42 (42.9)
25 (36.2)
0.740
0.390

No
100 (59.9)
56 (57.1)
44 (63.8)

D8
Simple house
Yes
136 (81.4)
51 (81.0)
85 (81.7)
0.016
0.900

No
31 (18.6)
12 (19.0)
19 (18.3)

D9
Decorated house
Yes
57 (34.1)
27 (47.4)
30 (27.3)
6.744
0.009

No
110 (65.9)
30 (52.6)
80 (72.7)

D10
Very small door
Yes
18 (10.8)
14 (24.6)
4 (3.6)
17.095
<0.001

No
149 (89.2)
43 (75.4)
106 (96.4)

D11
Simple tree drawing
Yes
85 (50.9)
60 (52.6)
25 (47.2)
0.432
0.511

No
82 (49.1)
54 (47.4)
28 (52.8)

D12
Simple tree
Yes
43 (25.7)
22 (38.6)
21 (19.1)
7.472
0.006

No
124 (74.3)
35 (61.4)
89 (80.9)

D13
Decorated tree
Yes
63 (37.7)
26 (40.6)
37 (35.9)
0.372
0.542

No
104 (62.3)
38 (59.4)
66 (64.1)

D14
Dead tree
Yes
54 (32.3)
24 (42.1)
30 (27.3)
3.775
0.052

No
113 (67.7)
33 (57.9)
80 (72.7)

D15
Scribbled or carefully drawn tree-crown
Yes
69 (41.3)
42 (38.9)
27 (45.8)
0.744
0.389

No
98 (58.7)
66 (61.1)
32 (54.2)

D16
Slender tree trunk
Yes
55 (32.9)
30 (31.6)
25 (34.7)
0.183
0.669

No
112 (67.1)
65 (68.4)
47 (65.3)

D17
Simple person drawing
Yes
135 (80.8)
82 (82.0)
53 (79.1)
0.217
0.641

No
32 (19.2)
18 (18.0)
14 (20.9)

D18
Simple person
Yes
56 (33.5)
26 (31.7)
30 (35.3)
0.241
0.624

No
111 (66.5)
56 (68.3)
55 (64.7)

D19
Decorated person
Yes
53 (31.7)
36 (30.5)
17 (34.7)
0.280
0.597

No
114 (68.3)
82 (69.5)
32 (65.3)

D20
Poker face
Yes
135 (80.8)
57 (85.1)
78 (78.0)
1.296
0.255

No
32 (19.2)
10 (14.9)
22 (22.0)

D21
Complete or partial loss of facial features
Yes
95 (56.9)
39 (68.4)
56 (50.9)
4.695
0.030

No
72 (43.1)
18 (31.6)
54 (49.1)

D22
Complete or partial loss of limbs
Yes
46 (27.5)
22 (28.2)
24 (27.0)
0.106
0.745

No
121 (72.5)
56 (71.8)
65 (73.0)

D23
Head drew very carefully
Yes
60 (35.9)
25 (43.9)
35 (31.8)
2.365
0.124

No
107 (64.1)
32 (56.1)
75 (68.2)

2.8. Reliability and Validity Evaluation

The intertester reliability and test-retest reliability were used to evaluate the reliability of S-HTP test drawing features in this research. Intertester reliability and test-retest reliability are expressed by the Kappa coefficient and correlation coefficient r, respectively. The value of the Kappa coefficient ranged from 0.752 to 1.000, and r of 20 patients retested was 0.710 to 0.857, which means the results of the drawing features were stable and reliable. In order to represent the S-HTP drawing test validity, the criterion validity was used in this study. The data of depression from cancer patients identified by S-HTP drawing test and SDS scale was used to perform the correlation analysis. The result of SDS scale was regarded as the “gold standard” in this study, and the validity coefficient was regarded as the correlation coefficient.

2.9. Statistical Analysis

The data were analyzed with SPSS version 19 for Windows (SPSS Inc., Chicago, IL, USA). Single-sample Kolmogorov-Smirnov test was used to test whether the continuous variables are normally distributed. The mean ± SD (standard deviation) was used to represent the continuous variables which conform to the normal distribution, and the median (interquartile range [IQR]) was used to represent the nonnormal variables. Two independent samples Student’s t-test were used to compare the mean of two continuous variables which conform to normal distribution. Mann-Whitney U test and Kruskal-Wallis test were used to compare the mean values of 2 groups, 3 groups or more groups of nonnormal distribution variables. The frequencies of categorical variables were compared using Pearson χ2 or Fisher’s exact test, when appropriate. The role of S-HTP drawing characteristics in predicting depression was examined with the logistic regression equation. A value of P less than 5% is of statistical significance.

3. Results

3.1. General Characteristics of Cancer Patients

Initially, a total of 200 patients were enrolled in the study, and 33 cases of them were excluded due to missing questionnaires or drawings. Finally, 167 patients with cancer were included in the study, and the effective rate was 83.5%. Among the 167 cancer patients, 98 patients were male, accounting for 58.7%, and 69 were female, accounting for 41.3%. Their age ranged from 16 to 72 years, with an average age of (52.92 ± 10.43) years. The general characteristics of all patients are shown in Table 1.

3.2. The Incidence of Depression among Cancer Patients

The score of SDS ranged from 25.00 to 80.00, with an average of (42.88 ± 10.43) in this study. Compared to the norm standard score [20] (The SDS norm standard is the result of Wang's evaluation of 1340 normal Chinese people, where the standard score is (41.85 ± 10.57)), the difference was statistically significant (t=8.708, P<0.001). Fifty-seven people achieved a diagnostic score of depression of over 53 points and 110 patients did not. The incidence rate of depression among these cancer patients was 34.1% and nondepression was 65.9%.

3.3. The Incidence of Various Items Used in Depression Assessment in Drawing Characteristics and Univariate Analysis

The incidence of the relevant evaluation items is shown in Table 2 according to the drawing characteristics of the cancer patients. Among the items, those with a higher incidence of depression status were D8, D17, D20, D4, and D5. Considering the number of S-HTP drawing features (depression dimensions) and the number of subjects in this study, we performed a univariate analysis based on statistical theory. Chi-square test was performed on all 23 items in the depression and nondepression groups. The results showed that there were 11 different characteristics in the depression group compared with the nondepression group. In the logistic regression analysis, to capture all important factors and avoid the relationship between some independent variables and dependent variables being masked due to confounding factors, the characteristics with a P value of less than 0.15 were used as independent variables. The details of these drawing features are shown in Table 2.

3.4. Logistic Regression Analysis

In this study, 11 depressive drawing features (two categorical variables, selected by univariate analysis) were used as independent variables, and the results of the SDS (setting the depression group to 1 and the depression-free group to 0) were used as the dependent variable, then, a logistic regression model was established ( = 0.10, = 0.15). To explore the relationship between the characteristics of S-HTP drawing test and depression in cancer patients, a total of 9 drawing features were included in the equation. The total test results of the model coefficients revealed that χ2=68.657, P < 0.001, indicating that the established logistic regression equation model was statistically significant. Based on the regression coefficients shown in Table 3, a regression equation for the characteristics of the S-HTP drawing test on depression in cancer patients was established. Subsequently, the Nagelkerke R2 coefficient test was performed on the established regression equation. The regression equation established was as follows: Logit(P)= -2.997+1.345D1+0.919D2+2.044D3-0.888D5-0.944D6+1.439D9+2.106D10+0.679D14+1.148D23. The Nagelkerke R² value was determined to be 0.466, showing good fitness. These results indicate that the equation established in this study have a good level of interpretation, and the S-HTP drawing features were suitable for the assessment of depression in cancer patients.

Table 3: Logistic regression analysis examining the role of S-HTP drawing characteristics in predicting depression.

Included painting characteristics
b
Sb
Waldχ²
P
OR
95%OR

Lower
Upper

D1
1.345
0.495
7.393
0.007
3.839
1.456
10.125

D2
0.919
0.492
3.482
0.062
2.506
0.955
6.579

D3
2.044
0.515
15.723
<0.001
7.719
2.811
21.198

D5
-0.888
0.486
3.341
0.068
0.411
0.159
1.066

D6
-0.944
0.450
4.407
0.036
0.389
0.161
0.939

D9
1.439
0.481
8.960
0.003
4.215
1.643
10.810

D10
2.106
0.790
7.110
0.008
8.218
1.747
38.647

D14
0.679
0.439
2.389
0.122
1.972
0.834
4.666

D23
1.148
0.490
5.493
0.019
3.151
1.207
8.229

Constant
-2.997
0.689
18.890
<0.001
0.050

3.5. The Results of S-HTP Drawing Test for Depression in Cancer Patients and Its Validity

In 57 depression patients with cancer who were diagnosed by the SDS scale, the logistic regression equation was employed to predict depression. The results showed that 32 patients with cancer had depression, and the correct rate was 56.1% (32/57). At the same time, the logistic regression equation was performed in 110 cancer patients without depression, and the finding demonstrated that 98 cancer patients did not have depression, with a correct rate of 89.1% (98/110). The total correct rate was 77.8% (130/167), Table 4. A correlation analysis was performed between the results of the S-HTP drawing test and SDS scale in order to verify the validity of the S-HTP drawing test for depression in cancer patients. The test results of the correlation coefficient of two detection methods =0.49, r>0.40, indicated good consistency between S-HTP drawing test results and SDS results. Further consistency check was performed, χ²=[( -n/2)²n]/[(a+b)(c+d)(a+c)(b+d)]=[( -167/2)² ×/(57×110×44×123)=37.29. χ²>6.63, P<0.01 (=6.63). We found that the results of the S-HTP drawing test for depression in cancer patients were positively correlated and consistent with those of the SDS scale.

Table 4: Comparison of the incidence of depression in cancer patients by SDS and S-HTP.

SDS
S-HTP test
Total

Depression
No depression

Depression
32
25
57

No depression
12
98
110

Total
44
123
167

3.6. Univariate Analysis of SDS Scores in Different Subgroups

Univariate analysis of SDS scores in different subgroups was performed as the depression levels vary with a wide range of other factors such as types of cancer, metastasis, pain degree, comorbidity disease and stage of the tumor. The results showed that SDS scores were higher in cancer metastasis group (p < 0.05), and there were no differences in SDS scores in other subgroup analyses (p > 0.05) (Table 5).

Table 5: Univariate analysis of SDS scores in different subgroups.

Items
Cases
Score ()
Test-value
P value

Type of Cancer

    leukemia
2
51.25±0.00
H=14.680
0.198

    bladder cancer
1
46.25

    nasopharyngeal carcinoma
27
49.54±10.74

    lung cancer
85
48.12±10.35

    cervical cancer
15
55.17±11.81

    colorectal cancer
13
47.79±7.94

    lymphoma
6
40.63±5.63

    ovarian cancer
2
48.50±0.00

    breast cancer
3
61.25±17.32

    esophageal cancer
6
42.50±7.75

    gastric cancer
4
53.75±10.10

    malignant thymoma
3
47.50±6.50

Metastasis

    yes
54
51.23±9.59
t=2.032
0.044

    no
113
47.75±10.67

Pain degree

    none
88
47.98±9.96
F=0.734
0.533

    mild
55
49.30±10.54

    moderate
20
50.69±12.29

    serious
4
53.75±10.10

Comorbidity disease

    yes
42
47.35±12.11
t′= -0.988
0.327

    no
125
49.39±9.80

Tumor stage

    I
5
54.00±9.41
F=1.771
0.137

    II
10
54.25±15.37

    III
45
47.97±10.23

    IV
53
50.17±9.33

    undetermined
54
46.90±10.36

4. Discussion

Depression refers to a painful experience when an individual feels sad, distressed or discouraged. Its characteristic symptoms include the disappearance of pleasure, helplessness, despair, self-guilt and suicidal tendencies [21]. Depression has become the most common negative emotion in cancer patients [22]. The average SDS standard score of cancer patients was 48.88±10.43 points, which was significantly different from that of the norm (t=8.708, P<0.001). Among them, 57 (34.1%) met the diagnostic criteria of depression. There was a significant difference in the score of SDS between cancer patients with or without metastasis (t = 2.032, P=0.044). The metastasis means the severity of the disease, which has a significant impact on the depression state in cancer patients.

Most human thoughts and mental activities can be visualized. For example, the presence of physical objects can significantly enhance memory. Therefore, mental problems, such as depression can be better identified and resolved by analyzing drawings [13]. S-HTP drawing test provides an important source of clinical information. They have been a valuable part of test batteries for clinicians and psychologists over the years, seen as revealing important aspects of an individual's personality in a drawing [13]. They provide an understanding of, and insight into, the individual through creative expression of raw emotion. S-HTP drawing test has routinely uncovered unconscious determinants of self-expression that possibly could not be manifested in direct communication [23]. It is believed that verbal communication is more subject to conscious manipulation than graphics projection. In many cases, drawings have revealed the individual's emotional, depression, anxiety, and even schizophrenia. Therefore, drawing can serve as an avenue for such individuals to express themselves.

The five items with a high incidence of depression assessment items were D8, D17, D20, D4, and D5, suggesting that low mental motivation, pessimistic about real life and melancholy are prevalent in cancer patients. This study found that the correlation coefficient between the result of S-HTP drawing test and SDS was 0.49, and the consistency hypothesis test showed that S-HTP drawing test was positively correlated with SDS. These results showed that S-HTP drawing test was feasible and effective in evaluating depression in patients with cancer. This can also be proved by the logistic regression equation established to screen depression. The nine painting features included in the regression equation were D1, D2, D3, D5, D6, D9, D10, D14, and D23. The detail explanation and psychological meaning of these items are shown in Table 6. It is noteworthy that many drawing evaluation items used in this study were not included in the regression equation. The main reason may be that the characteristics of this drawing were low frequency or difficulty in comprehension. Even though these S-HTP drawing test items may be related to depression, their predictability is less significant compared to the drawing characteristics items that correlate with the logistic regression equation.

Table 6: Explanation and psychological meaning of major S-HTP drawing features.

Drawing features
Explanation
Psychological meaning

D8 Simple house
No other description on the house except for the basic features of walls, doors, and windows
Avoidance and pessimistic psychology, and depression

D17 Simple person drawing
Absence of particular detail
Avoidance and pessimistic psychology, and depression

D20 Poker face
No expression on the face
Avoidance and pessimistic psychology, and depression

D4 Scribbled drawing
The painting was scribbled
Poor emotional control and inner distress

D5 Decorated drawing
Other embellishments to the drawing besides house, tree, and person, such as sun, flowers, lawns, animals, etc
Experienced lonely and depression, eager for social support, care and accompany

D1 Small drawing size
The size of the drawing is less than 1/3 compared with the whole paper area
Inferiority complex and self-inhibition, a tendency to regression, and an absence of mental drive

D2 Weak strength drawing
The strength of lines is weak
Lack of mental motivation and self-confidence, bad mood, the inner energy is missing and the ability of self-control is weak

D3 Simplified drawing
Use of a single line or outline in the drawing
Avoidance psychology

D6 Lines jagged and not joined
Lines jagged and more than two breaks on one line
Innermost feelings are very fragile

D9 Decorated house
The house is decorated, as in addition to the house, but also painted sidewalks, etc
Depressed and lonely, and hope to get more social support, attention, and accompany

D10 Very small door
The door is less than 1/4 of the wall
Introverted and withdrawn

D14 Dead tree
No tree-crown or no leaves on the branches
Low psychological energy level

D23 Head drawn very carefully
Emphasizes hairstyle, hair ornament and hat on head
Inner fantasy

The occurrence of depression in cancer patients could be attributed to the diagnosis of cancer itself, the heavy economic burden of treatment and poor therapeutic effect. Depression often results in severe consequences if it is not detected early and managed effectively in cancer patients. Therefore, it is necessary to monitor the occurrence of depression in cancer patients and to establish valid evaluation methods. The S-HTP drawing test can effectively reveal the inner emotion of cancer patients because it can be performed with less psychological defense as opposed to using the questionnaire alone. In addition, the S-HTP drawing test is a novel concept which can be an effective way of communication for researchers and patients who are unwilling or unable to express their feelings verbally. The S-HTP drawing test will have more application prospects with the further standardization and improvement of modern technology in the future.

There are some limitations in this study. First, the study cannot find causal explanations because of its cross-sectional characteristic. Second, this study used the Zung’s self-rating scale to screen for depression in cancer patients with reference to the Chinese National Normative Scores. However, the results of the SDS, drawn from self-rating scales, lack comparability to some extent with the clinical diagnostic criteria for depression disorders found in the International Classification of Diseases 10 (ICD10) and Diagnostic and Statistical Manual of Mental Disorders IV (DSM-IV). Third, the different capacity of the S-HTP drawing test to identify more the nondepressed patients than depressed even if there is an interrater and test-retest reliability between S-HTP drawing test and SDS. The clinician should clearly know the capacity of the test to distinguish patients to be pharmacologically treated or not. In addition, we did not perform cognitive function assessment on the subjects before starting this study. If the patient has cognitive impairment, it may affect the outcome. But we only included the patients who had reading comprehension ability. Finally, it is unclear whether studies on other nationalities will yield similar findings for the reason that these findings are based on Chinese patients.

5. Conclusion

S-HTP drawing test and SDS have interrater reliability and test-retest reliability. Our findings indicate that the S-HTP drawing test could help in screening depression in cancer patients.

Data Availability

The data used to support the findings of this study are available from the corresponding author upon request.

Conflicts of Interest

The authors declare that they have no conflicts of interest.

Acknowledgments

This work was supported by the Clinical Nursing Research Fund Project of the Second Xiangya Hospital (2018-YHL-50).

References

Y. Zhang, T. Zheng, and W. Zhang, “Report of cancer incidence and mortality in China, 2012,” Advances in Modern Oncology Research, vol. 4, pp. 1–7, 2018.

A. Pitman, S. Suleman, N. Hyde, and A. Hodgkiss, “Depression and anxiety in patients with cancer,” BMJ, vol. 361, Article ID k1415, 2018.

G. E. Bates, J. L. Mostel, and M. Hesdorffer, “Cancer-related anxiety,” JAMA Oncology, vol. 3, no. 7, p. 1007, 2017.

R. R. Pokorney and G. E. Bates, “Cancer-related depression,” JAMA Oncology, vol. 3, no. 5, p. 715, 2017.

A. J. Mitchell, M. Chan, H. Bhatti et al., “Prevalence of depression, anxiety, and adjustment disorder in oncological, haematological, and palliative-care settings: a meta-analysis of 94 interview-based studies,” The Lancet Oncology, vol. 12, no. 2, pp. 160–174, 2011.

G. S. Malhi and J. J. Mann, “Depression,” The Lancet, vol. 392, no. 10161, pp. 2299–2312, 2018.

M. Leibowitz, Interpreting Projective Drawings: A Self-Psychological Approach, Routledge, 2013.

M. Stanzani Maserati, C. Matacena, L. Sambati et al., “The tree-drawing test (koch's baum test): a useful aid to diagnose cognitive impairment,” Behavioural Neurology, vol. 2015, Article ID 534681, 6 pages, 2015.

G. J. Meyer and J. E. Kurtz, “Advancing personality assessment terminology: Time to retire" objective" and" projective" as personality test descriptors,” Journal of Personality Assessment, vol. 87, no. 3, pp. 223–225, 2006.

J. N. Buck, “The H‐T‐P technique. A qualitative and quantitative scoring manual,” Journal of Clinical Psychology, vol. 4, pp. 317–396, 1948.

N. Mikami, The S-HTP Technique: The Clinical and Developmental Approach in Synthetic-H-T-P Test, Seishinshobo, Tokyo, Japan, 1995.

G. Roysircar, K. F. Colvin, A. G. Afolayan, A. Thompson, and T. W. Robertson, “Haitian children’s resilience and vulnerability assessed with house–tree–person (HTP) drawings.,” Traumatology, vol. 23, no. 1, pp. 68–81, 2017.

L. Sheng, G. Yang, Q. Pan et al., “Synthetic house-tree-person drawing test: a new method for screening anxiety in cancer patients,” Journal of Oncology, vol. 2019, 2019.

W. W. Zung, “A self-rating depression scale,” Archives of General Psychiatry, vol. 12, pp. 63–70, 1965.

I. McDowell, Measuring Health: A Guide to Rating Scales and Questionnaires, Oxford University Press, USA, 2006.

W. Yin, L. Pang, X. Cao et al., “Factors associated with depression and anxiety among patients attending community-based methadone maintenance treatment in China,” Addiction, vol. 110, no. 1, pp. 51–60, 2015.

R. C. Burns, Kinetic House-Tree-Person Drawings: KHTP: An Interpretative Manual, Routledge, 2014.

J. H. Di Leo, Interpreting Children's Drawings, Routledge, 2013.

G. D. Oster and P. G. Crone, Using Drawings in Assessment and Therapy: A Guide for Mental Health Professionals, Routledge, 2004.

C. F. Wang, Z. H. Cai, and Q. Xu, “Self-rating Depression Scale-SDS for the assessment of 1,340 normal people,” Chinese Journal of Neuropsychiatric Diseases, vol. 12, pp. 267-268, 1985.

C. F. Reynolds and V. Patel, “Screening for depression: the global mental health context,” World Psychiatry, vol. 16, no. 3, pp. 316-317, 2017.

G. Rodin, “Effective treatment for depression in patients with cancer,” The Lancet, vol. 384, no. 9948, pp. 1076–1078, 2014.

D. Kato and M. Suzuki, “Developing a scale to measure total impression of synthetic house-tree-person drawings,” Social Behavior and Personality, vol. 44, no. 1, pp. 19–28, 2016.