BioMed Research International
Volume 2019 (2019), Article ID 4728705, 1 page
https://doi.org/10.1155/2019/4728705

Corrigendum

Corrigendum to “A Novel Neutrosophic Method for Automatic Seed Point Selection in Thyroid Nodule Images”

S. O. Haji and R. Z. Yousif

Department of Physics, College of Science, Salahaddin University, Erbil, Iraq

Correspondence should be addressed to S. O. Haji; salih_omer@yahoo.com

Received 24 July 2019; Accepted 25 July 2019; Published 4 August 2019

Copyright © 2019 S. O. Haji and R. Z. Yousif. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “A Novel Neutrosophic Method for Automatic Seed Point Selection in Thyroid Nodule Images” [1] there was an error in the authors’ affiliation. The corrected affiliation is shown above.

References

S. O. Haji and R. Z. Yousif, “A novel neutrosophic method for automatic seed point selection in thyroid nodule images,” BioMed Research International, vol. 2019, Article ID 7632308, 14 pages, 2019.