BioMed Research International
Volume 2019 (2019), Article ID 7821495, 1 page
https://doi.org/10.1155/2019/7821495

Retraction

Retracted: Label-Free Quantitative Mass Spectrometry Reveals a Panel of Differentially Expressed Proteins in Colorectal Cancer

BioMed Research International

Received 21 November 2018; Accepted 21 November 2018; Published 29 January 2019

Copyright © 2019 BioMed Research International. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

BioMed Research International has retracted the article titled “Label-Free Quantitative Mass Spectrometry Reveals a Panel of Differentially Expressed Proteins in Colorectal Cancer” [1]. As noted on PubPeer, Figures (a) and (b) show signs of figure duplication in the Western Blots, where the ERP29 row, lanes 1-6, in Figure (a) is the same as the TMP3 row, lanes 2-7 in Figure (b), though the former is stretched horizontally.

We were unable to contact the authors. The Editorial Board recommended retracting the article.

References

N.-J. Fan, J.-L. Gao, Y. Liu, W. Song, Z.-Y. Zhang, and C.-F. Gao, “Label-Free Quantitative Mass Spectrometry Reveals a Panel of Differentially Expressed Proteins in Colorectal Cancer,” BioMed Research International, vol. 2015, Article ID 365068, 13 pages, 2015.