BioMed Research International
Volume 2019 (2019), Article ID 9637490, 1 page
https://doi.org/10.1155/2019/9637490

Corrigendum

Corrigendum to “Old and New NICE Guidelines for the Evaluation of New Onset Stable Chest Pain: A Real World Perspective”

Nazario Carrabba,¹ Angela Migliorini,¹ Silvia Pradella,² Manlio Acquafresca,² Marco Guglielmo,³ Andrea Baggiano,³ Giuseppe Muscogiuri,³ and Renato Valenti¹

¹Cardiovascular and Thoracic Department of Careggi Hospital, Florence, Italy
²Radiologic Department of Careggi Hospital, Florence, Italy
³Centro Cardiologico Monzino, IRCCS, Milan, Italy

Correspondence should be addressed to Nazario Carrabba; carrabban@aou-careggi.toscana.it

Received 16 December 2018; Accepted 18 December 2018; Published 7 March 2019

Copyright © 2019 Nazario Carrabba et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Old and New NICE Guidelines for the Evaluation of New Onset Stable Chest Pain: A Real World Perspective” [1], the last name of the seventh author was given incorrectly as Moscogiuri. The author's name should have been written as Muscogiuri. The revised authors' list is shown above.

References

N. Carrabba, A. Migliorini, S. Pradella et al., “Old and new NICE guidelines for the evaluation of new onset stable chest pain: a real world perspective,” BioMed Research International, vol. 2018, Article ID 3762305, 7 pages, 2018.