BioMed Research International
Volume 2019 (2019), Article ID 9852782, 7 pages
https://doi.org/10.1155/2019/9852782

Research Article

Evaluation of Red Cell Distribution Width to Lymphocyte Ratio as Potential Biomarker for Detection of Colorectal Cancer

Jiahao Huang,1,2 Yang Zhao,³ Lin Liao,⁴ Shun Liu,⁵ Shaolong Lu,⁶ Changtao Wu,² Chuanyi Wei,¹ Shaoqiang Xu,⁷ Huage Zhong,¹ Junjie Liu,⁸ Yun Guo,² Sen Zhang,² Feng Gao,² and Weizhong Tang¹

¹Department of Gastrointestinal Surgery, Guangxi Clinical Research Center for Colorectal Cancer, Affiliated Tumor Hospital, Guangxi Medical University, Nanning, Guangxi, China
²Department of Colorectal and Anal Surgery, The First Affiliated Hospital, Guangxi Medical University, Nanning, Guangxi, China
³Department of Radiology, Affiliated Cancer Hospital, Guangxi Medical University, Nanning, Guangxi, China
⁴Department of Clinical Laboratory, The First Affiliated Hospital, Guangxi Medical University, Nanning, Guangxi, China
⁵Department of Epidemiology, School of Public Health, Guangxi Medical University, Nanning, Guangxi, China
⁶Department of Hepatobiliary Surgery, Affiliated Cancer Hospital, Guangxi Medical University, Nanning, Guangxi, China
⁷Department of General Surgery, Red Cross Hospital of Yulin City, Yulin, Guangxi, China
⁸Department of Ultrasound, Affiliated Tumor Hospital, Guangxi Medical University, Nanning, Guangxi, China

Correspondence should be addressed to Weizhong Tang; tangweizhong@gxmu.edu.cn

Received 19 March 2019; Accepted 13 May 2019; Published 31 July 2019

Academic Editor: Toshimi Chiba

Copyright © 2019 Jiahao Huang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Background and Aim. Colorectal cancer (CRC) is the third most lethal cancer globally. This study sought to determine the feasibility of using red cell distribution width-to-lymphocyte ratio (RLR) as a tool to facilitate CRC detection. Methods. Seventy-eight healthy controls, 162 patients diagnosed with CRC, and 94 patients with colorectal polyps (CP) from June 2017 to October 2018 were retrospectively reviewed. Clinical data were obtained to analyze preoperative RLR level, and receiver operating characteristic (ROC) curve analysis was performed to estimate the potential role of RLR as a CRC biomarker. Results. RLR was higher in patients with CRC than in healthy participants (P < 0.05). ROC analysis indicated that combined detection of RLR and CEA appears to be a more effective marker to distinguish among controls, CP, and CRC patients, yielding 56% sensitivity and 90% specificity. RLR levels were significantly greater in those who had more advanced TNM stages (P < 0.05) and patients with distant metastasis stages (P < 0.05). Conclusions. RLR might serve as a potential biomarker for CRC diagnosis.

1. Introduction

Colorectal cancer (CRC) is among the most frequently detected types of cancer and is third most deadly cancer with worldwide [1]. In 2014 in China alone, there were 370,000 new cases and 180,000 deaths attributable to CRC [2]. Screening efforts can help to prevent deaths associated with CRC. Despite the fact that stool-based tests, colonoscopy, and carcinoembryonic antigen (CEA) tests or a combination assay of CEA and carbohydrate antigen 19-9 (CA19-9) are recommended, they often fail to detect early disease. Therefore, it is urgent to identify new, accurate, and sensitive indicators that can detect CRC and predict its prognosis.

Red blood cell distribution width (RDW) reflects RBC size heterogeneity. It is routinely calculated on complete blood count analyzers. For several decades, RDW was used in clinical settings only to test for anemia or related maladies. Recently, however, many studies have revealed that RDW may be used to predict the severity of inflammatory bowel disease (IBD) irrespective of anemia [3, 4]. CRC has long been known to be linked with a chronic inflammatory state, and this can be present even when tumor development is in the initial stage. Therefore, the clinical significance of RDW in CRC diagnosis and prognosis has attracted much attention [5, 6]. RDW-to-lymphocyte ratio (RLR), a combination of the two parameters, is an easily-acquired parameter using blood routine tests. We believe that no study to date has studied the diagnostic role of RLR in patients with CRC; RLR might be more powerful than one parameter alone for diagnosis of CRC.

In the present study, we assessed RLR levels in CRC patients and in individuals with colorectal polyp (CP) as well as in normal controls. The diagnostic value of RLR in CRC was explored in detail.

2. Materials and Methods

2.1. Patient Characteristics

We retrospectively analyzed the medical data from patients newly diagnosed with CRC at the first affiliated Hospital of Guangxi Medical University (Nanning, China) from June 2017 to October 2018. Patients with CP and healthy individuals both served as age-matched control groups. Individuals were excluded from the study if they had hematological disorders, kidney disease, acute/chronic infections, coronary artery disease, hypertension, diabetes mellitus, and medical treatment with anticoagulant, if they had undergone transfusions in the previous 3 months, if they had received neoadjuvant therapy, or if they had other cancers. Those who had adenocarcinomas confirmed histologically were enrolled in the CRC study group. The institutional medical ethics review board of the first affiliated Hospital of Guangxi Medical University approved this study, and all patients gave written informed consent.

2.2. RLR, CEA, and CA19-9 Measurements

We extracted laboratory data of all subjects on admission, including hematological parameters as well as measured levels of tumor markers. RDW and absolute lymphocyte counts (L) were determined using a Coulter LH780 Hematology Analyzer (Beckman Coulter Inc., Fullerton, CA, USA). The RLR level was calculated using the following ratio: RDW%/lymphocyte count. Serum CEA and CA19-9 were measured on a Cobas e601 Analyzer (Roche Diagnostics, Mannheim, Germany) based on manufacturer’s instructions. The normal CEA cutoff level was 5 ng/mL, and for CA19-9 it was 37 U/mL.

2.3. Statistical Analysis

SPSS software (SPSS 25.0, Chicago, Illinois, USA) or GraphPad Prism version 7.0 (La Jolla, CA 92037 USA) was employed for all analyses. Continuous variables were expressed as means ± standard error of mean (SEM). Receiver operating characteristic (ROC) curves were employed to assess the diagnostic values and ideal cut-offs were determined using the Youden index [7]. The diagnostic accuracy was determined by area under the curve (AUC), and Delong’s test was performed to compare the AUCs across different models [8]. Student’s t-tests and one-way ANOVAs with Student-Newman-Keuls post hoc tests were used to compare data in this study as appropriate, with P < 0.05 considered statistically significant (two-tailed).

3. Results

3.1. RLR Levels in CRC Patients

We enrolled a total of 162 CRC patients, 92 CP patients, and 78 healthy participants from June 2017 to October 2018. Demographic characteristics, RDW, lymphocyte count, and RLR level are shown in Table 1. Age and gender were comparable between groups. Our data demonstrated that the level of RDW in CRC patients was significantly higher than those of CP patients and healthy participants (P < 0.05). More importantly, RLR levels were significantly higher in CRC patients than in healthy participants, while no significant differences were found between CRC patients and CP patients (Figure 1, P < 0.05).

Table 1: Comparisons of laboratory parameters among the patients of colorectal cancer, colorectal polyp, and healthy controls.

Parameter
Colorectal cancer
Colorectal polyp
Healthy controls

N = 162
N = 92
N = 78

Age, years
53.99 ± 11.44
52.67 ± 12.06
52.9 ± 7.41

Gender (M/F)
97/65
58/34
51/27

WBC, ×10⁹/L
6.76 ± 1.68
6.25 ± 1.5
6.42 ± 1.6

Hb, g/L
119.62 ± 23.81
134.1 ± 16.09
146.25 ± 15.05

CEA, U/mL
13.9 ± 38.73
2.11 ± 1.66
1.32 ± 1.12

CA19-9,U/mL
203.97 ± 1270.05
8.79 ± 5.94
14.63 ± 9.76

Red cell distribution width (RDW), %
0.15 ± 0.03
0.14 ± 0.01
0.14 ± 0.01

Lymphocytes, ×10⁹/L
1.97 ± 0.57
1.98 ± 0.61
2.03 ± 0.57

RDW to lymphocyte ratio (RLR)
8.21 ± 3.45
7.59 ± 2.88
7.2 ± 2.05

P<0.05 between CRC and CP.

P<0.05 between CRC and healthy controls.

P<0.05 between CP and healthy controls.

(a)

(b)

(c)

Figure 1: The levels of RDW (a), L (b), and RLR (c) were determined by hematology analyzer in CRC patients (N = 162), CP patients (N = 92), and healthy controls (N = 78). Data are presented as means ± SEM. P < 0.05.

3.2. Assessment of RLR as a CRC Diagnostic Biomarker

We assessed the potential for RLR to serve as a diagnostic CRC biomarker as compared to CEA and CA19-9. An ROC curve was generated to estimate the diagnostic ability of RLR for the diagnosis of CRC patients or controls. CRC patients had significantly higher CEA levels than did CP patients and healthy volunteers; however, this phenomenon was not observed with CA19-9. Furthermore, the ROC area under the curve (AUC) for CA19-9 suggested it might not be a useful marker for CRC clinical diagnosis (P > 0.05).

ROC analysis suggested that 8.21 was the optimal RLR cutoff (AUC: 0.571, sensitivity: 41%, specificity: 72%; Figure 2(a)), and 5 was the CEA cutoff (AUC: 0.779, sensitivity: 37%, specificity: 97%). However, diagnostic performance did not improve when RLR was compared with CEA (Figure 2(b), P > 0.05). Therefore, RLR in conjunction with CEA was further analyzed for combined detection. As shown in Table 2, the AUC of the combined detection of RLR and CEA was not significantly greater than the combination of CEA and CA19-9. Importantly, when RLR and CEA were combined, sensitivity and specificity were 56% and 90%, respectively.

Table 2: Diagnostic value of RLR, CEA, and CA199 alone and combined biomarkers for distinguishing CRC patients from colorectal polyp patients and healthy participants.

Variables
AUC
Cut off
Sensitivity
Specificity
95% confidence interval

upper limit
lower limit

RDW to lymphocyte ratio (RLR)
0.571
8.21
41%
72%
0.730
0.828

CEA
0.779
5.00
37%
97%
0.493
0.619

CA19-9
0.556
37.00
16%
99%
0.509
0.632

CEA + CA19-9
0.779

61%
86%
0.729
0.829

CEA + RLR
0.782

56%
90%
0.734
0.831

CA19-9+RLR
0.607

30%
93%
0.545
0.668

(a)

(b)

Figure 2: Receiver operating characteristics (ROC) curve analysis of the diagnostic performance of RLR in comparison to CEA and CA19-9. (a) ROC curves of RLR, CEA, and CA19-9 alone for discriminating CRC patients. (b) ROC curves of CEA + RLR, CA19-9 + RLR, and CEA + CA19-9 for discriminating CRC patients.

These findings suggest that combined detection of RLR and CEA performed better than detection of CEA alone for identifying CRC patients, with higher sensitivity. In addition, diagnostic specificity was greater when RLR and CEA were combined for CRC detection than with CEA plus CA19-9.

3.3. The Relationship between RLR and CRC Stage and Metastasis

As shown in Table 3, RLR levels were substantially increased in CRC patients with more advanced TNM staging (P < 0.05). Further analysis revealed that RLR was linked to distant metastasis stage (P < 0.05). Nevertheless, we detected no significant difference between RLR level and location, primary tumor stages, lymph node stages, differentiation, and tumor size. Taken together, these data suggest that RLR correlated with clinicopathological characteristics in individuals who have CRC.

Table 3: Relationship between RLR and pathological characteristics in CRC patients.

Variables
N
RLR
P value

Gender

    Male
97
8.06 ± 3.00
0.489

    Female
65
8.40 ± 4.05

Location

    Right-sided colon cancer
33
9.01 ± 3.31
0.138

    Left-sided colorectal cancer
129
8.01 ± 3.47

TNM stage

    I+II
75
7.57 ± 3.45
0.028

    III+IV
87
8.76 ± 3.38

pT stage

    T1
4
6.94 ± 2.22
0.314

    T2
28
8.74 ± 4.89

    T3
60
8.63 ± 3.21

    T4
70
7.71 ± 2.97

pN stage

    N0
79
7.79 ± 3.72
0.131

    N1+N2
83
8.61 ± 3.14

pM stage

    M0
147
8.04 ± 3.38
0.048

    M1
15
9.88 ± 3.83

Differentiation

    Poor
18
9.19 ± 4.58
0.278

    Moderate
121
7.96 ± 2.77

    Well
23
8.73 ± 5.28

Tumor size (cm)

    <5
83
7.83 ± 3.17
0.152

    ⩾5
79
8.61 ± 3.71

4. Discussion

CRC is major cause of death, with a 50% 5-year survival and 10-year survival > 20% [9–12]. Moreover, CRC is usually asymptomatic until late in its course, resulting in a quarter of patients initially presenting with metastases in the lungs or liver [13]. CRC can develop from precancerous polyps over an average of 10+ years [14, 15]. Histopathology can distinguish between polyps that are adenomas and those that are hyperplastic. Importantly, several lines of evidence suggested that both adenomas and some subtypes of hyperplastic polyps were precursor lesions for CRC origin [16, 17]. Colonoscopy is an effective means of preventing CRC via early detection and removal of problematic lesions; however, it is expensive and is associated with risks of perforation as well as risks associated with sedation and aspiration. Therefore, noninvasive, accurate, and sensitive diagnostic strategies are essential when there is a suspicion of CRC.

Some studies suggest that prolonged inflammation in the intestine is related to CRC, and this is likely to influence CRC initiation and development [18]. Previous work suggested that the Glasgow prognostic score, neutrophil-to-lymphocyte ratio, platelet-to-lymphocyte ratio, and lymphocyte-to-monocyte ratio are parameters related to inflammation that might be associated with CRC-specific survival [19]. High values of RDW imply greater variation in the distribution of RBC volume in circulation. Earlier reports suggested that elevated RDW values were linked to more advanced stages of CRC. Moreover, RDW was found to be relevant to metastasis of CRC [6]. Lymphocytes serve essential roles in the production of cytokines and the cytotoxic killing of cells, thereby preventing tumor growth/metastasis [20, 21]. Therefore, RLR, the combination of these two parameters may reflect a balance between tumor inflammation and antitumor immunity.

We assessed the RLR levels of 162 CRC patients and found these levels were higher in CRC patients than in healthy volunteers. To our knowledge, we are the first to report that RLR can effectively differentiate CRC patients from CP patients and healthy participants. We also assessed how well RLR performed as a diagnostic marker of CRC using ROC analysis and found that RLR plays a vital role in the diagnosis of CRC, with a 8.21 cut-off value, 41% sensitivity, and 72% specificity. Previously, levels of CA19-9 and CEA were commonly used as tumor markers useful for determining CRC staging [22]. These two markers are relatively insensitive, however, limiting their use when screening for CRC. It has been widely recognized that marker combinations have better diagnostic performance than do individual markers. Nevertheless, our data do not support use of CA19-9 when screening for or monitoring CRC patients. Therefore, the combined detection of RLR and CEA can achieve better diagnostic performance than can CEA in conjunction with CA19-9 for identifying CRC patients, with improved specificity.

The underlying mechanisms pertaining to the relevance of RLR in the context of CRC remain to be determined. Recent work suggests that higher RLR levels correspond to increased RDW numbers and/or lower lymphocyte levels. It is known that the pathogenesis of CRC is closely related to ongoing inflammation. Because inflammation positively correlates with RDW [23–25], ongoing intratumoral inflammation results in an elevation of RDW. Alternatively, patients with CRC are prone to hemorrhaging, and this impairs iron storage, resulting in variations in RBC size and increased RDW.

Lymphocytes are important components of white blood cells, playing crucial roles by driving antitumor immunity and tumor cell apoptosis, thereby improving CRC patient survival [26, 27]. A decreased number of lymphocytes could impede antitumor immune responses and further facilitate tumor metastatic potential [26]. Evidence from several studies also suggested that low-tumor-infiltrating lymphocytes are significantly associated with poor survival in CRC [28, 29]. A metric that assessed both RDW and lymphocytes (such as RLR) has the potential for widespread clinical use as it can simultaneously reflect both of these processes.

Furthermore, we primarily focused on the association between RLR and clinicopathological characteristics of CRC patients. We found that RLR was most frequently elevated in advanced TNM stages and in CRC patients with distant metastases. Therefore, according to our data, greater RLR may indicate more robust inflammatory responses in response to more aggressive tumors and higher tumor burdens. Given the importance of TNM stage and distant metastasis in predicting CRC patient outcomes, our finding suggests that RLR might function as a prognostic CRC biomarker.

We acknowledge that there are several limitations of the present study. This was a retrospective single-center study. Second, lacking follow-up data made it challenging to fully appreciate the relevance of RLR in evaluating the overall survival in CRC patients.

In conclusion, the present study suggests that RLR might serve as a potential biomarker for CRC, predicting its progression. In clinical practice, combined detection of RLR and CEA should be evaluated as possible effective markers for CRC diagnosis, despite the fact that additional studies are needed to validate our findings.

Data Availability

The data used to support the findings of this study are included within the article.

Conflicts of Interest

The authors declare that they have no conflicts of interest.

Authors’ Contributions

Jiahao Huang and Yang Zhao contributed equally to this work.

Acknowledgments

The study was supported by The National Nature Science Foundation of China (No. 81560454) and Guangxi Scientific Research and Technology Development Project (No. Guike AB18126033).

References

F. Bray, J. Ferlay, I. Soerjomataram, R. L. Siegel, L. A. Torre, and A. Jemal, “Global cancer statistics 2018: GLOBOCAN estimates of incidence and mortality worldwide for 36 cancers in 185 countries,” CA: A Cancer Journal for Clinicians, vol. 68, no. 6, pp. 394–424, 2018.

W. Q. Chen, K. X. Sun, R. S. Zheng et al., “Cancer incidence and mortality in China, 2014,” Chinese Journal of Cancer Research, vol. 30, no. 1, pp. 1–12, 2018.

D. Hu, J. Ren, G. Wang et al., “Value of red cell distribution width for assessing disease activity in crohn's disease,” The American Journal of the Medical Sciences, vol. 349, no. 1, pp. 42–45, 2015.

A. Yeşil, E. Şenateş, İ. V. Bayoğlu, E. D. Erdem, R. Demirtunç, and A. O. K. Övünç, “Red cell distribution width: a novel marker of activity in inflammatory bowel disease,” Gut and Liver, vol. 5, no. 4, pp. 460–467, 2011.

Y. Song, Z. Huang, Y. Kang et al., “Clinical usefulness and prognostic value of red cell distribution width in colorectal cancer,” BioMed Research International, vol. 2018, Article ID 9858943, 7 pages, 2018.

D. Yang, W. Quan, J. Wu et al., “The value of red blood cell distribution width in diagnosis of patients with colorectal cancer,” Clinica Chimica Acta, vol. 479, pp. 98–102, 2018.

E. F. Schisterman, N. J. Perkins, A. Liu, and H. Bondell, “Optimal cut-point and its corresponding Youden index to discriminate individuals using pooled blood samples,” Epidemiology, vol. 16, no. 1, pp. 73–81, 2005.

E. R. DeLong, D. M. DeLong, and D. L. Clarke-Pearson, “Comparing the areas under two or more correlated receiver operating characteristic curves: a nonparametric approach,” Biometrics, vol. 44, no. 3, pp. 837–845, 1988.

M. G. House, H. Ito, M. Gönen et al., “Survival after hepatic resection for metastatic colorectal cancer: trends in outcomes for 1,600 patients during two decades at a single institution,” Journal of the American College of Surgeons, vol. 210, no. 5, pp. 744–752, 2010.

M. Nikfarjam, S. Shereef, E. T. Kimchi et al., “Survival outcomes of patients with colorectal liver metastases following hepatic resection or ablation in the era of effective chemotherapy,” Annals of Surgical Oncology, vol. 16, no. 7, pp. 1860–1867, 2009.

C. Pulitanó, F. Castillo, L. Aldrighetti et al., “What defines 'cure' after liver resection for colorectal metastases? results after 10 years of follow-up,” HPB, vol. 12, no. 4, pp. 244–249, 2010.

J. S. Tomlinson, W. R. Jarnagin, R. P. DeMatteo et al., “Actual 10-year survival after resection of colorectal liver metastases defines cure,” Journal of Clinical Oncology, vol. 25, no. 29, pp. 4575–4580, 2007.

P. C. Simmonds, J. N. Primrose, J. L. Colquitt, O. J. Garden, G. J. Poston, and M. Rees, “Surgical resection of hepatic metastases from colorectal cancer: a systematic review of published studies,” British Journal of Cancer, vol. 94, no. 7, pp. 982–999, 2006.

K. M. Kuntz, I. Lansdorp-Vogelaar, C. M. Rutter et al., “A systematic comparison of microsimulation models of colorectal cancer: the role of assumptions about adenoma progression,” Medical Decision Making, vol. 31, no. 4, pp. 530–539, 2011.

W. B. Strum, “Colorectal adenomas,” The New England Journal of Medicine, vol. 375, no. 4, pp. 389-390, 2016.

M. Bettington, N. Walker, A. Clouston, I. Brown, B. Leggett, and V. Whitehall, “The serrated pathway to colorectal carcinoma: current concepts and challenges,” Histopathology, vol. 62, no. 3, pp. 367–386, 2013.

D. J. Weisenberger, K. D. Siegmund, M. Campan et al., “CpG island methylator phenotype underlies sporadic microsatellite instability and is tightly associated with BRAF mutation in colorectal cancer,” Nature Genetics, vol. 38, no. 7, pp. 787–793, 2006.

T. Jess, M. Frisch, and J. Simonsen, “Trends in overall and cause-specific mortality among patients with inflammatory bowel disease from 1982 to 2010,” Clinical Gastroenterology and Hepatology, vol. 11, no. 1, pp. 43–48, 2013.

S. Rossi, M. Basso, A. Strippoli et al., “Are Markers of Systemic Inflammation Good Prognostic Indicators in Colorectal Cancer?” Clinical Colorectal Cancer, vol. 16, no. 4, pp. 264–274, 2017.

L. Ferradini, S. Miescher, M. Stoeck et al., “Cytotoxic potential despite impaired activation pathways in T lymphocytes infiltrating nasopharyngeal carcinoma,” International Journal of Cancer, vol. 47, no. 3, pp. 362–370, 1991.

M. L. Tsiatas, R. Gyftaki, C. Liacos et al., “Study of T lymphocytes infiltrating peritoneal metastases in advanced ovarian cancer: associations with vascular endothelial growth factor levels and prognosis in patients receiving platinum-based chemotherapy,” International Journal of Gynecological Cancer, vol. 19, no. 8, pp. 1329–1334, 2009.

R. A. Booth, “Minimally invasive biomarkers for detection and staging of colorectal cancer,” Cancer Letters, vol. 249, no. 1, pp. 87–96, 2007.

D. de Gonzalo-Calvo, B. de Luxán-Delgado, S. Rodríguez-González et al., “Interleukin 6, soluble tumor necrosis factor receptor I and red blood cell distribution width as biological markers of functional dependence in an elderly population: a translational approach,” Cytokine, vol. 58, no. 2, pp. 193–198, 2012.

M. Dogan, U. Kucuk, and O. Uz, “Red blood cell distribution width is worthwhile when interpreted with other inflammatory markers,” Journal of Geriatric Cardiology, vol. 12, no. 4, pp. 457-458, 2015.

G. Ephrem, “Red blood cell distribution width should indeed be assessed with other inflammatory markers in daily clinical practice,” Cardiology, vol. 124, no. 1, p. 61, 2013.

G. P. Dunn, L. J. Old, and R. D. Schreiber, “The immunobiology of cancer immunosurveillance and immunoediting,” Immunity and Immunoediting, vol. 21, no. 2, pp. 137–148, 2004.

S. A. Rosenberg, “Progress in human tumour immunology and immunotherapy,” Nature, vol. 411, no. 6835, pp. 380–384, 2001.

D. M. Frey, R. A. Droeser, C. T. Viehl et al., “High frequency of tumor-infiltrating FOXP3(+) regulatory T cells predicts improved survival in mismatch repair-proficient colorectal cancer patients,” International Journal of Cancer, vol. 126, no. 11, pp. 2635–2643, 2010.

W.-S. Lee, S. Park, W. Y. Lee, S. H. Yun, and H.-K. Chun, “Clinical impact of tumor-infiltrating lymphocytes for survival in stage II colon cancer,” Cancer, vol. 116, no. 22, pp. 5188–5199, 2010.