BioMed Research International
Volume 2020 (2020), Article ID 5014928, 1 page
https://doi.org/10.1155/2020/5014928

Retraction

Retracted: The Effect of Synthetic Osteoconductive Bone Graft Material for Augmentation of Internally Fixed Unstable Trochanteric Fractures

BioMed Research International

Received 7 August 2020; Accepted 12 August 2020; Published 30 August 2020

Copyright © 2020 BioMed Research International. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

BioMed Research International has retracted the article titled “The Effect of Synthetic Osteoconductive Bone Graft Material for Augmentation of Internally Fixed Unstable Trochanteric Fractures” [1] due to concerns with the study design raised by the authors. The authors explained that the study was not a randomized trial as described in the article, but a retrospective observational study in which patient assignment to the CaP and control groups was not randomized.

References

J. Park, J. M. Shin, D. K. Lee, S.-S. Lee, S. H. Paik, and B. H. Lee, “The Effect of Synthetic Osteoconductive Bone Graft Material for Augmentation of Internally Fixed Unstable Trochanteric Fractures,” BioMed Research International, vol. 2019, Article ID 5879089, 8 pages, 2019.