BioMed Research International
Volume 2021 (2021), Article ID 9758361, 1 page
https://doi.org/10.1155/2021/9758361

Corrigendum

Corrigendum to “Construction of Protein-related Risk Score Model in Bladder Urothelial Carcinoma”

Qizhan Luo1,2 and Xiaobo Zhang¹

¹Xiangya International Medical Center, Department of Geriatrics, Xiangya Hospital, Central South University, Changsha, China
²Department of Urology, RWTH Aachen University, Pauwelsstrasse 30, 52074 Aachen, Germany

Correspondence should be addressed to Xiaobo Zhang; 549651566@qq.com

Received 23 May 2021; Accepted 23 May 2021; Published 7 June 2021

Copyright © 2021 Qizhan Luo and Xiaobo Zhang. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Construction of Protein-related Risk Score Model in Bladder Urothelial Carcinoma” [1], the Acknowledgments section should read as follows:

Acknowledgments

We would like to acknowledge the supportive technique by the Xiangya International Medical Center, Department of Geriatrics, Xiangya Hospital, Central South University, and Guangjun, and the China Scholarship Council and Xiaobo Zhang. Also, the authors acknowledge Dr. Jun Guang from Sukebiota for assisting with data analysis, gene selection, and the construction and for verification of the risk model.

References

Q. Luo and X. Zhang, “Construction of protein-related risk score model in bladder urothelial carcinoma,” BioMed Research International, vol. 2020, Article ID 7147824, 13 pages, 2020.