BioMed Research International
Volume 2021 (2021), Article ID 9875940, 1 page
https://doi.org/10.1155/2021/9875940

Corrigendum

Corrigendum to “Artificial Liver Support System Improves Short-Term Outcomes of Patients with HBV-Associated Acute-on-Chronic Liver Failure: A Propensity Score Analysis”

Lan-Lan Xiao, Xiao-Wei Xu, Kai-Zhou Huang, Ya-Lei Zhao, Ling-Jian Zhang, and Lan-Juan Li

State Key Laboratory for Diagnosis and Treatment of Infectious Diseases, Nationwide Clinical Research Center for Infectious Diseases, Collaborative Innovation Center for Diagnosis and Treatment of Infectious Diseases, The First Affiliated Hospital, College of Medicine, Zhejiang University, Hangzhou, China

Correspondence should be addressed to Lan-Juan Li; ljli@zju.edu.cn

Received 1 June 2021; Accepted 1 June 2021; Published 17 June 2021

Copyright © 2021 Lan-Lan Xiao et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Artificial Liver Support System Improves Short-Term Outcomes of Patients with HBV-Associated Acute-on-Chronic Liver Failure: A Propensity Score Analysis” [1], some information was omitted in the Acknowledgments section, which should be corrected as follows:

The authors would like to thank Jian-Rong Huang, Shao-Jie Xin, Zhong-Ping Duan, Yu-Ming Wang, Qing Xie, Zhi-Liang Gao, Jian-He Gan, Tao Han, Shu-Mei Lin, Chen Pan, Li Zhuang, and Yong-Ping Chen for patient data collection. This work was supported by the Science & Technology Key Program of Zhejiang China (#2017C03051).

References

L.-L. Xiao, X.-W. Xu, K.-Z. Huang, Y.-L. Zhao, L.-J. Zhang, and L.-J. Li, “Artificial Liver Support System Improves Short-Term Outcomes of Patients with HBV-Associated Acute-on-Chronic Liver Failure: A Propensity Score Analysis,” BioMed Research International, vol. 2019, Article ID 3757149, 8 pages, 2019.