BioMed Research International
Volume 2022 (2022), Article ID 3227957, 13 pages
https://doi.org/10.1155/2022/3227957

Research Article

Diagnostic Value of Serum Chitinase-3-Like Protein 1 for Liver Fibrosis: A Meta-analysis

Xiaoting Huang,¹ Jialing Zhuang,² Yongqiang Yang,² Jiaxin Jian,² Wen Ai,¹ Chunyong Liu,³ Wenzhi Tang,² Changyu Jiang,¹ Yongshen He,¹ Lesheng Huang,² and Se Peng²

¹Medical Research Center, Huazhong University of Science and Technology Union Shenzhen Hospital, Shenzhen 518051, China
²Department of Laboratory Medicine, Guangdong Provincial Hospital of Chinese Medicine, Zhuhai 519015, China
³Department of Basic Medicine, Zhaoqing Medical College, Zhaoqing 526020, China

Correspondence should be addressed to Se Peng; psjyjy2021@163.com

Received 31 August 2021; Revised 8 December 2021; Accepted 3 January 2022; Published 20 March 2022

Academic Editor: Jin Shui Pan

Copyright © 2022 Xiaoting Huang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Background. Serum chitinase-3-like protein 1 (CHI3L1) is a promising marker for diagnosing liver fibrosis. This meta-analysis was carried out to assess the diagnostic performance of serum CHI3L1 for the estimation of liver fibrosis. Methods. Systematic searches were performed on PubMed, Embase, Web of Science, Scopus, the Cochrane Library, Google Scholar, Sinomed, the China National Knowledge Infrastructure (CNKI), the Chinese Medical Journal Database, and the Wanfang databases for available studies. The primary studies were screened strictly according to inclusion and exclusion criteria, and sensitivity, specificity, and other measures of accuracy of serum CHI3L1 for evaluating liver fibrosis were pooled with 95% confidence intervals. was calculated to assess heterogeneity, and sources of heterogeneity were explored by subgroup analysis. Deeks’ test was used to assess for publication bias, and likelihood ratio was used to determine posttest probability. Results. Our research integrated 11 articles, accounting for 1897 patients older than 18 years old. The pooled sensitivity and specificity for significant fibrosis, advanced fibrosis, and cirrhosis were 0.79 and 0.82 with an area under the receiver operating characteristic curve (AUC) of 0.85, 0.81 and 0.83 with an AUC of 0.91, and 0.72 and 0.74 with an AUC of 0.85, respectively. Random-effects models were used to assess for significant heterogeneity, and subgroup analysis showed that age and aetiology of included patients were likely sources of heterogeneity. No potential publication bias was found for serum CHI3L1 in the diagnosis of significant fibrosis, advanced fibrosis, or cirrhosis, and posttest probability was moderate. Conclusion. Measurement of serum CHI3L1 is a feasible diagnostic tool for liver fibrosis.

1. Introduction

Liver fibrosis is a severe health problem globally, with significant morbidity and mortality, and its incidence is on the increase in both adults and children [1–5]. Steatohepatitis, drug-induced and immune liver disease, chronic liver infection, schistosomiasis, and alcohol abuse all result in liver fibrosis. Among them, chronic infection with hepatitis virus is the major known risk factor for liver fibrosis [6–11]. Clinically, hepatic fibrosis can process to cirrhosis or liver cancer, which can be life-threatening [12–16]. Fortunately, accumulating evidence suggests that liver fibrosis is reversible if treated in the early stage. However, there is no effective and specific medicine for the treatment of liver fibrosis in clinical practice; therefore, timely and comprehensive diagnosis has been critical to reduce its progression.

As the gold standard of liver fibrosis diagnosis, liver biopsy is a markedly matured testing technology. However, its high costs, invasive examination, risk of complications, and sampling error restrict its clinical application [15, 17–19]. Transient elastography (TE) has excellent diagnostic accuracy for liver fibrosis, but TE is proven to be accurate for the diagnosis of severe fibrosis and cirrhosis only [20–22]. Other noninvasive markers have been applied widely to evaluate fibrosis, but many of them are found to be nonspecific. Therefore, finding a clinical diagnostic indicator that is noninvasive, safe, inexpensive, specific, and convenient has crucial clinical significance for diagnosing and monitoring liver fibrosis.

Serum chitinase-3-like protein 1 (CHI3L1, YKL-40 protein, breast regression protein-39, or human cartilage glycoprotein-39) is a member of the mammalian chitinase family that is highly liver-specific and involved in inflammation, cell proliferation, and differentiation [23–26]. Studies have indicated that serum CHI3L1 level in patients with liver fibrosis is significantly higher than in healthy controls, and that high levels of CHI3L1 correlate with the severity of fibrosis [23, 25], suggesting that CHI3L1 plays an important role in liver fibrosis. The clinical diagnosis of liver fibrosis has been found that the sensitivity of CHI3L1 as an indicator of liver fibrosis was 27% higher than indicators type III procollagen, type IV collagen, laminin, and hyaluronidase and 22% higher than FibroScan [25]. In addition, serum CHI3L1 has good correlation with TE and better consistency with liver pathology [20, 21]. Serum CHI3L1 has already been recommended at international professional conferences as a noninvasive diagnostic technology for liver fibrosis and has been included in the “Guidelines on the Management of Hepatic Encephalopathy in Cirrhosis” of the Chinese Medical Association (2018) and the “Guidelines on the Prevention and Treatment in Chronic Hepatitis B” of the Chinese Medical Association (2019) [27, 28].

In recent years, researchers have conducted meta-analyses of the diagnostic value of serum CHI3L1 for assessing various diseases, including coronary artery disease, rectal cancer, psoriasis, and diabetic nephropathy in patients with type 2 diabetes mellitus [24, 29–35]. In addition, two published meta-analyses have investigated the use of serum CHI3L1 combined with hyaluronic acid and FIBROSpect II (FS-II) for discriminating fibrosis stages in chronic hepatitis C [36, 37]. An article published in 2018 reported a meta-analytic study of the diagnostic value of YKL-40 (CHI3L1) for liver fibrosis, with the same objective as the present study. However, their findings showed that the diagnostic value of serum CHI3L1 for significant and advanced fibrosis was limited by low sensitivity and specificity. In addition, analyses of heterogeneity, publication bias, and posttest probability were lacking [38]. In this regard, it is worth conducting an updated and more comprehensive meta-analysis to identify the value of serum CHI3L1 level in the assessment of liver fibrosis.

2. Methods

The protocol for this meta-analysis was registered on PROSPERO (CRD42021247959). We followed reporting guidance from the Preferred Reporting Items for Systematic Reviews and Meta-Analyses (PRISMA) statement for this study [39, 40].

2.1. Search Strategy

A systematic search was conducted in PubMed, Embase, Web of Science, Scopus, Cochrane Library, Google Scholar, Sinomed, the China National Knowledge Infrastructure (CNKI), the Chinese Medical Journal Database, and the Wanfang databases for relevant articles published between Jan 1, 2000, and Oct 31, 2021. In addition, we searched grey literature by reviewing the references of primary studies and related review articles from major conferences manually. We used the medical subject headings (MeSH) terms in PubMed using the search keywords “Chitinase-3-like protein 1”, “CHI3L1”, “YLK-40 protein”, “Cartilage Glycoprotein 39”, “GP-39 Protein”, “hepatic fibrosis”, “liver cirrhosis”, “liver fibrosis”, “diagnosis”, “sensitivity and specificity”, “predictive value of tests”, and “accuracy” combined together using OR and/or AND for a standard search. The strategy was modified according to each specific database, including Embase, Web of Science, Scopus, the Cochrane Library, Google Scholar, and Sinomed, to obtain the most relevant results. For the CNKI, the Chinese Medical Journal Database, and the Wanfang databases, the key words were combined with free words for searching. The titles and abstracts were read independently by two investigators (XT Huang and JL Zhuang), who selected literature for a second round of screening. The second screening was based on the full texts, to determine whether the retrieved articles were suitable for inclusion in the study. The detailed search strategies are showed in Supplementary Table 1.

2.2. Inclusion and Exclusion Criteria

There were no restrictions on language in the selection and determination of original research. The articles included in this study had the following characteristics: (1) study patients were adults (over 18 years); (2) patients with liver fibrosis from various causes were accepted (e.g., hepatitis B virus (HBV), hepatitis C virus (HCV), nonalcoholic fatty liver disease, autoimmune hepatitis, and any other cause); (3) histopathologic analysis was used as the reference standard; (4) studies provided sufficient information to calculate the sensitivity and specificity data on CHI3L1 directly and indirectly. The exclusion criteria were as follows: (1) any article that was a duplication, animal experiment, single case report, meta-analysis, or review article; (2) articles without adequate data; (3) articles lacking pathological gold standard confirmation results. The flow chart of study selection is shown in Figure 1.

Figure 1: PRISMA flow chart of the study selection process for eligible studies.

2.3. Definition of Liver Fibrosis

A fibrosis scoring system was devised that was similar to the METAVIR scoring system and included five stages: stage fibrosis, stage in any localization but without septa, stage septa, stage septa, and stage [41]. Commonly, significant fibrosis, advanced fibrosis, and cirrhosis are defined as stages F2–F4, F3–F4, and F4 by METAVIR and the Batts–Ludwig scoring system; S2–S4, S3–S4, and S4 by the Scheuer scoring system; and staged as F3–F6, F4–F6, and F5–F6 by the Ishak scoring system, respectively [11, 42–45]. With similar histological definitions for liver fibrosis in our study, significant fibrosis was accepted as a ≥F2 METAVIR score, a ≥ S2 Scheuer score, or a ≥ F3 Ishak score; advanced fibrosis as a ≥ F3 METAVIR score, a ≥ S3 Scheuer score, or a ≥ F4 Ishak score; cirrhosis as a METAVIR score of F4, an F4 Scheuer score, or an Ishak score of F6.

2.4. Data Extraction and Quality Assessment

All included studies were extracted and summarized by XT Huang and JL Zhuang independently. Each investigator recorded the sensitivity, specificity, positive predictive value (PPV), negative predictive value (NPV), and receiver operating characteristic (ROC) curve values from the included studies. Data on author, publication year, sample size for different stages of liver fibrosis, assay method, gold standard, average age, sex, aetiology, and cut-off points for serum CHI3L1 from each report were also extracted. Any discrepancies were resolved by referral to a third investigator (CY Liu).

We evaluated the quality of the 11 articles that were finally selected using the QUADAS-2 tool, which has four domains: patient selection, index test, reference standard, and flow and timing. We tailored the guidelines for scoring each item on the checklist to our review. Finally, all items were categorized as low, unclear, or high risk of bias.

2.5. Data Analysis

We evaluated the quality of the selected studies using Review Manager (version 5.2). We used Meta-Disc (version 1.4.0) and STATA (version 14.0) to conduct the statistical analyses. values < 0.05 were considered statistically significant.

We tabulated true-positive, false-negative, false-positive, and true-negative from included studies. The summary of diagnostic accuracy was computed for each study: sensitivity (true-positive), specificity (1-false-positive), positive likelihood ratio (PLR), negative likelihood ratio (NLR), diagnostic odds ratio (DOR), and the area under the ROC (AUROC) curve, with 95% confidence interval (CI) calculated for each analysis.

2.6. Assessment of Heterogeneity and Publication Bias

Spearman’s correlation coefficient was calculated to evaluate the threshold effect firstly. With threshold effect excluded, the heterogeneity between studies was assessed with an inconsistency index ( statistic). greater than 50% was selected as a marker for substantial heterogeneity, for which the random-effects model can be chosen and employed. Potential sources of heterogeneity were explored by subgroup analyses. Subgroup analysis for stage F1 was not performed because the F1 sample size was too small. Hence, only the results of stages F2–F4 are shown. Subgroup analyses were performed according to mean age (under 40 years vs. over 40 years), aetiology (HBV vs. other), and scoring system (METAVIR vs. other).

For evaluation of publication bias, we employed a linear regression analysis of funnel plot asymmetry, using a Deeks’ plot. Finally, we used pooled likelihood ratios to determine the posttest probability, using STATA 14.0.

3. Results

3.1. Search Results

Our initial literature search identified 191 publications through the comprehensive electronic search, and eight additional (grey) literature items were screened manually from the references of the included studies and other articles from major conferences. We first removed 19 duplicate studies, 88 articles were excluded after reviewing the titles and abstracts of all the articles, and then, 80 articles were excluded by reviewing the full texts carefully. Eventually, 11 studies with a total of 1897 patients were considered eligible for inclusion in the analysis. The 11 studies had been performed in the United States, France, Japan, and China. The main features of each included study are presented in Table 1 and Supplementary Table 2. Supplementary Table 2 provides the detailed characteristics such as cut-off and AUROC of all the stages of the liver fibrosis for each included studies.

Table 1: Characteristics of the included studies ().

First author
Year
Country
Reference method
Test method
Male, (%)
Average age, y
Scoring system
Aetiology

Huang[46]
2015
China
Liver biopsy
ELISA
NA
24.5
Scheuer
HBV

Kumagai [47]
2016
Japan
Liver biopsy
ELISA
59 (44.0)
65.8
METAVIR
Mixed

Mehta[26]
2008
America
Liver biopsy
ELISA
46 (62.0)
52.0
Ishak
HCV

Mo [48]
2020
China
Liver biopsy
ELISA
257 (55.8)
40.9
Scheuer
Mixed

Pan [49]
2021
China
Liver biopsy
Fluorescence immunochromatography
26 (76.5)
48.5
Scheuer
Mixed

Saitou[50]
2005
Japan
Liver biopsy
ELISA
62 (56.9)
51.4
METAVIR
HCV

Tran [51]
2000
France
Liver biopsy
ELISA
106 (72.6)
49.2
NA
Mixed

Wu [52]
2020
China
Liver biopsy
ELISA
90 (67.2)
39.0
METAVIR
HBV

Xiao [53]
2011
China
Liver biopsy
ELISA
80 (44.4)
39.8
HAI
HBV

Yang [54]
2019
China
Liver biopsy
ELISA
86 (50.0)
39.0
METAVIR
HBV

Yu [55]
2017
China
Liver biopsy
ELISA
172 (76.1)
52.2
NA
Mixed

ELISA: enzyme-linked immunoassay; HBV: hepatitis B virus; HCV: hepatitis C virus; NA: not available; HAI: histological activity index.

3.2. Characteristics of Each Stage of Liver Fibrosis

Two articles reported on diagnosing mild fibrosis () using serum CHI3L1 with a total of 519 patients, with mean ages greater than 40 years. Six articles reported on diagnosing significant fibrosis () using serum CHI3L1 with a total of 1193 patients, with mean ages between 24.5 and 52.0 years. Diagnosing advanced fibrosis () by serum CHI3L1 level was described in four papers, with a total of 1020 patients of mean ages between 24.5 and 65.8 years. Six articles reported on diagnosing cirrhosis () using serum CHI3L1, with a total of 907 patients of mean ages from 39.0 to 52.2 years.

3.3. Quality Evaluation

To minimize the risk of bias, the QUADAS-2 tool was used to assess the quality of the included studies. This tool comprises four domains; each domain is assessed in terms of risk of bias, and the first three domains are also assessed in terms of concerns about applicability [56–59]. Overall, no study fulfilled all the criteria, many of them were assessed as of high quality (Figures 2(a) and 2(b)). Specifically, eight studies (73%) met at least 50% of all the items [26, 47–49, 51–54], and two studies met six items (86%) especially [49, 53]. However, the remaining three studies were considered of low quality, as whether enrolled patients were sampled consecutively was unclear, and the included patients, conduct of the study, and interpretation did not match the review questions exactly [46, 50, 55].

(a)

(b)

Figure 2: Quality assessment of the individual studies: (a) overall quality assessment of the included studies; (b) quality assessment of the individual studies.

3.4. Pooled Diagnostic Accuracy

The summary ROC (SROC) curve can be considered as the average value for sensitivity for a test over all possible specificity values, presenting a global summary of test performance [22, 59]. Usually, at least three records are needed to estimate the summary AUROC curve values, and a forest plot cannot be established unless there are more than four sets of data. In consideration of the established statistical regulations, our study analyzed the diagnostic values of fibrosis stages with significant fibrosis (), advanced fibrosis (), and cirrhosis (F4).

A random-effects model was used to determine the diagnostic accuracy of serum CHI3L1 for diagnosing stages of liver fibrosis, because heterogeneity ( values for sensitivity, specificity, PLR, NLR, and DOR) for fibrosis stages F2, F3, and F4 was greater than 50%. The main results for each stage follow.

3.4.1. Detecting Significant Fibrosis ()

The pooled sensitivity and specificity for significant fibrosis () were 0.79 (95% to 0.82) and 0.82 (95% to 0.85) with an AUC of 0.85; the PLR and NLR were 3.65 (95% to 6.66) and 0.29 (95% to 0.44), and the DOR was 12.98 (95% to 29.32, ).

3.4.2. Detecting Advanced Fibrosis ()

The pooled sensitivity and specificity for advanced fibrosis () were 0.81 (95% to 0.84) and 0.83 (95% to 0.86) with an AUC of 0.91; the PLR and NLR were 5.25 (95% to 9.37) and 0.19 (95% to 0.41), and the DOR was 28.38 (95% to 109.91, ).

3.4.3. Detecting Cirrhosis ()

The pooled sensitivity and specificity for cirrhosis () were 0.72 (95% to 0.77) and 0.74 (95% to 0.78) with an AUC of 0.85; the PLR and NLR were 3.32 (95% to 4.85) and 0.29 (95% to 0.53), and the DOR was 13.41 (95% to 28.11, ). Figures 3(a)–3(i) show the pooled sensitivity, specificity, and SROC curve of three stages of fibrosis in liver fibrosis patients.

(a)

(b)

(c)

(d)

(e)

(f)

(g)

(h)

(i)

Figure 3: (a, b) Diagnostic accuracy of CHI3L1 for significant fibrosis (); (c) SROC curve of CHI3L1 for detecting significant fibrosis; (d, e) diagnostic accuracy of CHI3L1 for advanced fibrosis (); (f) SROC curve of CHI3L1 for detecting advanced fibrosis; (g, h) diagnostic accuracy of CHI3L1 for cirrhosis (F4); (i) SROC curve of CHI3L1 for detecting cirrhosis.

3.5. Heterogeneity Analysis and Subgroup Analysis

In our study, the Spearman’s correlation coefficients were –0.714, –0.80, and 0.314 for stages F2, F3, and F4, respectively, with values greater than 0.05, suggesting that the threshold effect caused no heterogeneity. Heterogeneity was evaluated by the statistic, with values exceeding 25%, 50%, and 75% representing low, moderate, and high heterogeneity, respectively [60, 61]. This meta-analysis, the values for sensitivity, specificity, PLR, NLR, and DOR for fibrosis stages F2, F3, and F4 were over 50%, suggesting that high heterogeneity was presented.

In view of the significant heterogeneity, we conducted a subgroup analysis to investigate the potential sources of heterogeneity by age, aetiology, and scoring system factors. This was not conducted for stage F2 because only two studies included this stage. The detailed subgroup analysis results are listed in Table 2. As presented in Table 2, for stages F2, F3, and F4, the results of mean age group are same as the aetiology group. For instance, in the subgroup of advanced fibrosis (), two studies that included patients under 40 years showed a pooled sensitivity and specificity of 0.93 (0.89–0.96) and 0.90 (0.85–0.94) in identifying advanced liver fibrosis in patients with HBV. In addition, two studies that utilized a non-METAVIR scoring system had a pooled sensitivity of 0.83 (0.78–0.87) and specificity of 0.81 (0.77–0.85), which was better than the METAVIR scoring system. Moreover, in the subgroups of mean age and aetiology, the heterogeneity between studies was very low (), but this did not appear in the scoring system group.

Table 2: Subgroup analysis of serum CHI3L1 in diagnosing stages of liver fibrosis.

Subgroup
Significant fibrosis ()
Advanced fibrosis ()
Cirrhosis ()

Sensitivity (95% CI)
Specificity (95% CI)
AUC
Sensitivity (95% CI)
Specificity (95% CI)
AUC
Sensitivity (95% CI)
Specificity (95% CI)
AUC

82.5%
80.8%
—
93.1%
73.5%
—
89.5%
84.4%
—

Age

Under 40
0.83 (0.78-0.87)
0.84 (0.79-0.88)
0.92
0.93 (0.89-0.96)
0.90 (0.85-0.94)
0.50
0.86 (0.78-0.92)
0.66 (0.60-0.72)
0.85

90.3%
0%
—
0%
0%
—
80.1%
32.9%
—

Over 40
0.75 (0.70-0.79)
0.80 (0.75-0.84)
0.82
0.70 (0.64-0.83)
0.79 (0.75-0.84)
0.50
0.68 (0.62-0.73)
0.82 (0.77-0.87)
0.50

0%
91.3%
—
0%
0%
—
89.5%
77.9%
—

Aetiology

HBV
0.83 (0.78-0.87)
0.84 (0.79-0.88)
0.92
0.93 (0.89-0.96)
0.90 (0.85-0.94)
0.50
0.86 (0.78-0.92)
0.66 (0.60-0.72)
0.85

90.3%
0
—
0%
0%
—
80.1%
32.9%
—

Other
0.75 (0.70-0.79)
0.80 (0.75-0.84)
0.82
0.70 (0.64-0.83)
0.79 (0.75-0.84)
0.50
0.68 (0.62-0.73)
0.82 (0.77-0.87)
0.50

0
91.3%
—
0%
0%
—
89.5%
77.9%
—

Scoring system

METAVIR
0.80 (0.76-0.83)
0.81 (0.77-0.85)
0.88
0.76 (0.68-0.83)
0.88 (0.82-0.92)
0.50
0.87 (0.73-0.95)
0.72 (0.65-0.77)
0.83

89.6%
92.0%
—
86.8%
76.6%
—
81.2%
46.8%
—

Other
0.76 (0.69-0.82)
0.83 (0.77-0.87)
0.91
0.83 (0.78-0.87)
0.81 (0.77-0.85)
0.50
0.70 (0.65-0.75)
0.76 (0.71-0.81)
0.50

75.5%
0%
—
96.9%
66.7%
—
91.7%
89.6%
—

In this regard, for all the stages of fibrosis, age and aetiology could be considered as sources of heterogeneity, which influenced the reported diagnostic accuracy of the test.

3.6. Publication Bias

A linear regression test of funnel plot asymmetry can be performed with more than two sets of data, and if publication bias is present, the plot can appear asymmetric [10, 62]. We identified publication bias by using Deeks’ funnel plot asymmetry regression test with STATA, with value of <0.05 considered the criterion for statistical significance. Here, Deeks’ regression test showed no asymmetrical distribution in the funnel plots, indicating insufficient evidence of publication bias for articles on use of serum CHI3L1 in diagnosing significant fibrosis, advanced fibrosis, and cirrhosis, with values of 1.00, 0.60, and 0.66, respectively (Figures 4(a)–4(c)).

(a)

(b)

(c)

Figure 4: Linear regression test of funnel plot asymmetry for publications: (a) significant fibrosis (); (b) advanced fibrosis (); (c) cirrhosis ().

3.7. Post-test Probability

Post-test probability is relevant to clinicians, and we therefore used likelihood ratios to determine posttest probability for the positive and negative index test results [63, 64]. In our study, a Fagan nomogram (Figures 5(a)–5(c)) revealed a prior probability of 20% and posttest probability of 49% when the result of serum CHI3L1 was positive for a significant fibrosis diagnosis and 6% when the results were negative. Similarly, the posttest probabilities were 59% and 47% when serum CHI3L1 was positive for advanced fibrosis and cirrhosis diagnosis, respectively, and 4% and 6% when the results were negative for advanced fibrosis and cirrhosis diagnosis.

(a)

(b)

(c)

Figure 5: Fagan nomogram of serum CHI3L1 for diagnosis of liver fibrosis: (a) significant fibrosis; (b) advanced fibrosis; (c) cirrhosis.

4. Discussion

An early diagnosis is critical in liver fibrosis. In this meta-analysis, we addressed the diagnostic value of serum CHI3L1 as a promising and strong noninvasive marker of predicting hepatic fibrosis.

Until now, a series of clinical diagnostic techniques such as liver biopsy, B-mode ultrasonography, TE, and conventional serum markers (type III procollagen, type IV collagen, laminin, and hyaluronidase) have been devised for liver fibrosis diagnosis and assessment [65, 66]. However, these methods have disadvantages that include invasiveness, high cost burden, and a lack of specificity. Therefore, in accordance with modern concepts of safety, affordability, and convenience, finding a satisfactory screening method is necessary. Serum CHI3L1 has been identified as a potential marker of liver fibrosis in recent years, with several studies demonstrating that CHI3L1 serves as the upstream signalling molecule regulating liver fibrosis [67]. This indicates the potential of using CHI3L1 to make an early diagnosis of liver fibrosis.

A prior meta-analysis that included nine articles published before 2018 evaluated the diagnostic value of serum YKL-40 (CHI3L1) for liver fibrosis stage. However, Zhang and colleagues [68] concluded that its diagnostic value for significant and advanced fibrosis was limited. They included patients undergoing kidney transplant in their study, and the specificity for significant fibrosis was as low as 0.53, which was poorer than the results of specificity in our study [69]. Actually, serum CHI3L1 concentration is closely related to kidney function, so including kidney transplant patients included in their analysis will lead to biased findings. In addition, they did not perform publication bias, sensitivity, and posttest analyses. In this study, we performed an updated and more comprehensive meta-analysis to get a better view of the diagnostic value of CHI3L1 in liver fibrosis.

To avoid selection bias in our study, we conducted a thorough literature review of the performance of CHI3L1 in liver fibrosis diagnosis in worldwide databases. A manual search of the African Index Medicus (MIX, https://iifphc.org/acadp_listings/african-index-medicus/) was also conducted but failed to obtain relevant studies. Related references of the initially screened articles and previous systematic reviews were searched manually for grey literature. As a result, 11 studies were reserved for our meta-analysis. By reading the full texts of the included studies, we were able to identify how the different stages of liver fibrosis were reported using the Scheur, METAVIR, Ishak, and HAI systems. Since the histological definitions of liver fibrosis were similar [7, 70–73], we unified the stages of liver fibrosis to mild fibrosis (), significant fibrosis (), advanced fibrosis (), and cirrhosis (F4). However, only two studies discussed mild fibrosis (), which made pooled analysis in this group impossible. As these two studies fulfilled the inclusion criteria, we listed their main data in Table 1 and evaluated their quality. The QUADAS-2 tool was used to evaluate the quality of all the included studies. On the basis of our strict inclusion criteria, many studies were of very high quality, with 9 papers of the 11 meeting at least 50% of the items.

Sensitivity shows the ability of a test to correctly identify those with the infection or disease, and specificity is the opposite. The SROC curve can be considered as the average sensitivity of a test over all possible values of specificity, presenting a synthetic summary of test performance [74, 75]. In the prediction of serum CHI3L1 for liver fibrosis in this study, we found that the summary sensitivity and specificity of advanced fibrosis () were higher than the significant fibrosis () and cirrhosis (F4). Interestingly, the AUC value for advanced fibrosis was greater than 0.90, validating that the serum CHI3L1 has the greatest diagnostic ability to predict the advanced fibrosis in clinical. In addition, the pooled diagnostic values were significantly greater than those for the indicators APRI index and FIB-4 index reported by Jiang et al. [68]. The findings of PLR and NLR for all stages show the great discriminant ability in liver fibrosis diagnosis. Correspondingly, we observed the good performance of CHI3L1 in diagnosing liver fibrosis through the ideal results of pooled DOR values in our work. Overall, there was a positive correlation between serum CHI3L1 and hepatic fibrosis. The results in our study showed that when patients with advanced fibrosis (F3) were compared to those with significant fibrosis (F2) and cirrhosis (F4), serum CHI3L1 had the highest diagnostic accuracy for F3 at an early age. All the results imply that serum CHI3L1 offered the best diagnostic performance in the diagnosis of advanced fibrosis. These observations are similar to those of Das et al., Rath et al., and Zhou et al. [6, 71, 72].

Threshold effect is commonly explored by calculating Spearman’s correlation coefficient. No threshold effect was found in our study. However, results from the test indicated significant heterogeneity ( was greater than 50% for stages F1, F2, and F3), meaning that a random-effects model was selected for the analysis. A meta-regression analysis is an ideal way to identify the heterogeneity sources where heterogeneity is high; however, groups of more than 10 studies with complete data are required [59]. The included studies for each stage for liver fibrosis in this study were less than 10, so we instead chose subgroup analysis to find the underlying causes of the heterogeneity. According to the calculation, results were similar for mean age group and aetiology group. We approached this interesting finding by searching for papers on the relationship between HBV infection and age. Collective evidence suggested that age is a key factor in determining the risk of chronic infection such as chronic hepatitis B (CHB), with older persons especially at risk for progressive disease such as liver fibrosis [69]. Yan and colleagues [9] showed that liver fibrosis occurs in more than 30% of CHB patients. These studies suggest that CHB is closely related to liver fibrosis, and liver disease aetiology is associated with age. Therefore, we guessed that aetiology and age may account for the sources of heterogeneity.

In our study, bias in the publication of literature was not detected, with values for significant fibrosis, advanced fibrosis, and cirrhosis greater than 0.05. In addition, the symmetrical distribution of the funnel plots with the values suggested that the heterogeneity did not result from publication bias [77].

Posttest probability and likelihood ratio were used to assess the accuracy of diagnosis prevalence for the method we tested, for patients with a positive or negative test. In our report, the likelihood ratio and posttest probabilities were moderate for significant fibrosis, advanced fibrosis, and cirrhosis.

Our study had certain limitations. First, the sample sizes in some of the studies were small. We considered papers with patient samples of less than 100 carefully and still included them if they strictly fulfilled the inclusion criteria. Second, meta-regression analysis to explore heterogeneity was not possible because of the limited number of articles, so we conducted a subgroup analysis instead. Third, most of the included articles were from Europe and Asia, especially China, which may limit the generalizability of our results. However, although liver disease has become a significant health problem worldwide, China has the world’s largest burden of liver disease, with statistics for 2017 showing that the absolute number of HBV-infected people in China is around 70 million. Most of included articles in our study were reports of studies performed in China, which is consistent with the geographical distribution of the disease [1, 10, 76, 77]. This observation underlines also the lack of related data from other regions, such as North America and Africa. Finally, we acknowledge that the topic in this paper has some limitations on novelty and innovation. Many studies have been exploring the diagnostic value of serum CHI3L1 for liver fibrosis, but we noticed that the diagnostic value of CHI3L1 is controversial. Our report showed that the CHI3L1 is a feasible indicator for liver fibrosis diagnosis, especially for the advanced fibrosis. The result is different from the prior meta-analysis, which showing the diagnostic value of CHI3L1 for significant and advanced fibrosis is limited. More importantly, this study is of great significance in clinical application. High-quality studies with larger sample sizes are required on the diagnostic value of CHI3L1 in liver fibrosis, with multiregional cooperation.

Despite these limitations, our study provides evidence on the particular advantages of serum CHI3L1 over other indicators [69, 70, 72, 73], and the association between serum CHI3L1 and liver fibrosis diagnosis was a worthy topic for meta-analysis.

Serum CHI3L1 appears to be an excellent indicator in the diagnosis of the liver fibrosis. Of course, measurement of serum CHI3L1 cannot completely replace liver biopsy, and some patients will still need invasive examination to confirm diagnosis, making the continued development of noninvasive diagnostic methods for liver fibrosis even more necessary. To guide clinical interventions accurately, further high-quality studies on the diagnosis of liver fibrosis, with larger sample sizes, are needed.

5. Conclusions

In summary, measurement of serum CHI3L1 is emerging as a powerful tool for detecting liver fibrosis, especially in advanced fibrosis. Use of this biomarker has many advantages, including noninvasiveness, expeditiousness, and accuracy. Following recommendations from international professional conferences, wide use of serum CHI3L as a marker of liver fibrosis is expected. However, given the limitations mentioned in our meta-analysis, serum CHI3L1 cannot completely replace the “gold standard” of liver biopsy in the diagnosis of liver fibrosis, and further larger-scale research with multiregional cooperation is needed to confirm the practicality and validity of serum CHI3L1 as a liver fibrosis marker.

Data Availability

No data were used to support this study.

Conflicts of Interest

The authors declare no conflict of interest associated with this article.

Authors’ Contributions

Xiaoting Huang and Jialing Zhuang contributed equally to this work as co-first authors. Xiaoting Huang, Jialing Zhuang, and Se Peng conceived and designed the experiments. Xiaoting Huang, Jialing Zhuang, and Chunyong Liu analyzed the studies and extracted the data available. All members participated in the writing and discussing the manuscript. Xiaoting Huang, Jialing Zhuang, Se Peng, Jiaxin Jian, and Lesheng Huang for the final approval of the manuscript.

Acknowledgments

This work was supported by a grant from the Medical Science and Technology Research Fund project of Guangdong Province (A2021102).

Supplementary Materials

Supplementary 1. Supplementary Table 1: search strategy for all databases.

Supplementary 2. Supplementary Table 2: characteristics of the included studies.

References

W. Cao, H. Chen, Y. Yu, N. Li, and W. Q. Chen, “Changing profiles of cancer burden worldwide and in China: a secondary analysis of the global cancer statistics 2020,” Chinese Medical Journal, vol. 134, no. 7, pp. 783–791, 2021.

J. Xiao, F. Wang, N. K. Wong et al., “Global liver disease burdens and research trends: analysis from a Chinese perspective,” Journal of Hepatology, vol. 71, no. 1, pp. 212–221, 2019.

P. Ginès, I. Graupera, F. Lammert et al., “Screening for liver fibrosis in the general population: a call for action,” The Lancet Gastroenterology & Hepatology, vol. 1, pp. 256–260, 2016.

W. H. Organization, Guidelines for the Prevention, Care and Treatment of Fibrosis with Chronic Hepatitis B Infection, 2015.

M. H. Ismail and M. Pinzani, “Reversal of liver fibrosis,” The Saudi Journal of Gastroenterology, vol. 15, no. 1, pp. 72–79, 2008.

A. Das, A. Kamrul-Hasan, M. R. Kabir, S. Das, and M. A. Mahtab, “Evaluation of Chitinase 3-like 1 (CHI3L1) as a noninvasive biomarker of hepatic fibrosis in patients with hepatitis B virus-related compensated chronic liver disease,” J Family Med Prim Care, vol. 10, no. 4, pp. 1694–1698, 2021.

K. Yao, J. Wang, L. Wang et al., “Association of anti-HBc and liver inflammation in HBeAg-negative chronic hepatitis B virus-infected patients with normal ALT and detectable HBV DNA,” Journal of Medical Virology, vol. 94, no. 2, pp. 659–666, 2021.

X. Jin, B. Fu, Z. Wu et al., “Serum chitinase-3-like protein 1 is a biomarker of liver fibrosis in patients with chronic hepatitis B in China,” Hepatobiliary & Pancreatic Diseases International, vol. 19, no. 4, pp. 384–389, 2020.

L. Yan, Y. Deng, J. Zhou, H. Zhao, and G. Wang, “Serum YKL-40 as a biomarker for liver fibrosis in chronic hepatitis B patients with normal and mildly elevated ALT,” Infection, vol. 46, no. 3, pp. 385–393, 2018.

N. A. Terrault, A. S. F. Lok, B. J. McMahon et al., “Update on prevention, diagnosis, and treatment of chronic hepatitis B: AASLD 2018 hepatitis B guidance,” Hepatology, vol. 67, no. 4, pp. 1560–1599, 2018.

K. Ishak, A. Baptista, L. Bianchi et al., “Histological grading and staging of chronic hepatitis,” Journal of Hepatology, vol. 22, pp. 696–699, 1995.

M. E. Zoubek, C. Trautwein, and P. Strnad, “Reversal of liver fibrosis: from fiction to reality,” Best Practice & Research Clinical Gastroenterology, vol. 31, no. 2, pp. 129–141, 2017.

T. Poynard, Y. Ngo, H. Perazzo et al., “Prognostic value of liver fibrosis biomarkers: a meta-analysis,” Gastroenterology & hepatology, vol. 7, no. 7, pp. 445–454, 2011.

S. Tsukada, C. J. Parsons, and R. A. Rippe, “Mechanisms of liver fibrosis,” Clinical Chimica Acta, vol. 364, no. 1-2, pp. 33–60, 2006.

The FANTOM Consortium, R. Andersson, C. Gebhard et al., “An atlas of active enhancers across human cell types and tissues,” Nature, vol. 507, no. 7493, pp. 455–461, 2014.

T. Poynard, P. Mathurin, C. L. Lai et al., “A comparison of fibrosis progression in chronic liver diseases,” Journal of Hepatology, vol. 38, no. 3, pp. 257–265, 2003.

A. Suzuki, P. Angulo, J. Lymp et al., “Hyaluronic acid, an accurate serum marker for severe hepatic fibrosis in patients with non-alcoholic fatty liver disease,” Liver International, vol. 25, no. 4, pp. 779–786, 2005.

A. Schweitzer, J. Horn, R. T. Mikolajczyk et al., “Estimations of worldwide prevalence of chronic hepatitis B virus infection: a systematic review of data published between 1965 and 2013,” The Lancet, vol. 386, no. 10003, pp. 1546–1555, 2015.

J. A. Talwalkar, D. M. Kurtz, S. J. Schoenleber et al., “Ultrasound-based transient elastography for the detection of hepatic fibrosis: systematic review and meta-analysis,” Clinical Gastroenterology and Hepatology, vol. 5, no. 10, pp. 1214–1220, 2007.

M. Friedrich–Rust, M. F. Ong, S. Martens et al., “Performance of transient elastography for the staging of liver fibrosis: a meta-analysis,” Gastroenterology, vol. 134, no. 4, pp. 960–974.e8, 2008.

E. Nguyen-Khac, M. Thiele, C. Voican et al., “Non-invasive diagnosis of liver fibrosis in patients with alcohol-related liver disease by transient elastography: an individual patient data meta-analysis,” The Lancet Gastroenterology & Hepatology, vol. 3, no. 9, pp. 614–625, 2018.

T. Zhao, Z. Su, Y. Li, X. Zhang, and Q. You, “Chitinase-3 like-protein-1 function and its role in diseases,” Signal Transduction and Targeted Therapy, vol. 5, no. 1, p. 201, 2020.

M. Higashiyama, K. Tomita, N. Sugihara et al., “Chitinase 3-like 1 deficiency ameliorates liver fibrosis by promoting hepatic macrophage apoptosis,” Hepatology Research, vol. 49, no. 11, pp. 1316–1328, 2019.

S. Wang, M. Hu, Y. Qian et al., “CHI3L1 in the pathophysiology and diagnosis of liver diseases,” Biomedicine & Pharmacotherapy, vol. 131, article 110680, 2020.

M. Berres, S. Papen, K. Pauels et al., “A functional variation in CHI3L1 is associated with severity of liver fibrosis and YKL-40 serum levels in chronic hepatitis C infection,” Journal of Hepatology, vol. 50, no. 2, pp. 370–376, 2009.

P. Mehta, R. Ploutz-Snyder, J. Nandi, S. R. Rawlins, and R. A. Levine, “Diagnostic accuracy of serum hyaluronic acid, FIBROSpect II, and YKL-40 for discriminating fibrosis stages in chronic hepatitis C,” The American Journal of Gastroenterology, vol. 103, no. 4, pp. 928–936, 2008.

C. M. A. C. Hepatology and G. Q. Wang, “Guidelines on the precention and treatment in chronic hepatitis B,” Chinese Journal of Clinical Infectious Diseases, vol. 35, no. 12, pp. 2648–2669, 2019.

C. M. A. C. Hepatology, “Guidelines on the management of hepatic encephalopathy in cirrhosis,” Journal of Clinical Hepatology, vol. 34, no. 10, pp. 2076–2089, 2018.

M. Fuksiewicz, B. Kotowicz, A. Rutkowski, J. Achinger-Kawecka, M. Wagrodzki, and M. M. Kowalska, “The assessment of clinical usage and prognostic value of YKL-40 serum levels in patients with rectal cancer without distant metastasis,” Technology in Cancer Research & Treatment, vol. 17, 2018.

Y. Kong, S. Zhang, X. Su, D. Peng, and Y. Su, “Serum levels of YKL-40 are increased in patients with psoriasis: a meta-analysis,” Postgraduate Medicine, vol. 131, no. 6, pp. 405–412, 2019.

A. D. Kjaergaard, J. S. Johansen, S. E. Bojesen, and B. G. Nordestgaard, “Role of inflammatory marker YKL-40 in the diagnosis, prognosis and cause of cardiovascular and liver diseases,” Critical Reviews in Clinical Laboratory Sciences, vol. 53, no. 6, pp. 396–408, 2016.

D. B. Holmgaard, L. H. Mygind, I. L. Titlestad et al., “Plasma YKL-40 and all-cause mortality in patients with chronic obstructive pulmonary disease,” BMC Pulmonary Medicine, vol. 13, no. 1, p. 77, 2013.

C. Song, H. D. Bin-Li, H.-Y. Diao et al., “Diagnostic value of serum YKL-40 level for coronary artery disease: a meta-analysis,” Journal of Clinical Laboratory Analysis, vol. 30, no. 1, pp. 23–31, 2016.

G. V. Kapoula, P. I. Kontou, and P. G. Bagos, “Diagnostic performance of biomarkers urinary KIM-1 and YKL-40 for early diabetic nephropathy, in patients with type 2 diabetes: a systematic review and meta-analysis,” Diagnostics, vol. 10, no. 11, p. 909, 2020.

J. Tsuruha, K. Masuko-Hongo, T. Kato, M. Sakata, and K. Nishioka, “Autoimmunity against YKL-39, a human cartilage derived protein, in patients with osteoarthritis,” Journal of Rheumatology, vol. 29, no. 7, p. 1459, 2002.

P. Uysal, S. Durmus, V. Sozer et al., “YKL-40, soluble IL-2 receptor, angiotensin converting enzyme and C-reactive protein: comparison of markers of sarcoidosis activity,” Biomolecules, vol. 8, no. 3, p. 84, 2018.

J. Ying, Y. Yunqing, W. Yan, and L. Ling, “Fibroscan, APRI and their combination in the diagnosis of liver fibrosis induced by chronic hepatitis B (F≥2): a meta-analysis,” Journal of Modern Medicine & Health, vol. 34, no. 19, pp. 2953–2958, 2018.

Y. Zhang, F. Yang, and C. Yuanyuan, “Diagnostic value of serum YKL-40 for liver fibrosis stage: a meta—analysis,” Journal of Clinical Hepatology, vol. 34, no. 9, 2018.

D. Moher, A. Liberati, J. Tetzlaff et al., “Preferred reporting items for systematic reviews and meta-analyses: the PRISMA statement,” Open Medicine, vol. 2, no. 3, pp. 123–130, 2009.

J. Salameh, P. M. Bossuyt, T. A. McGrath et al., “Preferred reporting items for systematic review and meta-analysis of diagnostic test accuracy studies (PRISMA-DTA): explanation, elaboration, and checklist,” BMJ, vol. 370, p. m2632, 2020.

C. Daniel, “METAVIR Score Uses and Results,” Verywell Health, pp. 1–9, 2021.

M. Cengiz and S. Ozenirler, “Comparative diagnostic accuracy of red cell distribution width-to-platelet ratio versus noninvasive fibrosis scores for the diagnosis of liver fibrosis in biopsy-proven nonalcoholic fatty liver disease,” European Journal of Gastroenterology & Hepatology, vol. 27, no. 11, pp. 1293–1299, 2015.

M. Y. Kim, M. Y. Cho, S. K. Baik et al., “Histological subclassification of cirrhosis using the Laennec fibrosis scoring system correlates with clinical stage and grade of portal hypertension,” Journal of Hepatology, vol. 55, no. 5, pp. 1004–1009, 2011.

A. D. Oxman and G. H. Guyatt, “The science of reviewing research,” Annals New York Academy of Sciences, vol. 703, 1 Doing More Go, pp. 125–134, 1993.

P. J. Scheuer, R. A. Standish, and A. P. Dhillon, “Scoring of chronic hepatitis,” Clinics in Liver Disease, vol. 6, no. 2, p. 335, 2002.

H. Huang, T. Wu, J. Mao et al., “CHI3L1 is a liver-enriched, noninvasive biomarker that can be used to stage and diagnose substantial hepatic fibrosis,” OMICS: A Journal of Integrative Biology, vol. 19, no. 6, pp. 339–345, 2015.

E. Kumagai, Y. Mano, S. Yoshio et al., “Serum YKL-40 as a marker of liver fibrosis in patients with non-alcoholic fatty liver disease,” Scientific Reports, vol. 6, no. 1, 2016.

H. Mo, C. Zhuo, X. Lu et al., “Clinical values of chitinase 3 like protein 1 in the diagnosis of liver fibrosis in patients with chronic liver dieases,” Laboratory Medicine and Clinic, vol. 17, no. 7, pp. 914–917, 2020.

J. Pan, “Performance evaluation of fluorescence immunochromatography for quantitative detection of CHI3L1 and its application in diagnosis of liver fibrosis,” China Medical Device Information, vol. 27, no. 1, pp. 25–27, 2021.

Y. Saitou, K. Shiraki, Y. Yamanaka et al., “Noninvasive estimation of liver fibrosis and response to interferon therapy by a serum fibrogenesis marker, YKL-40, in patients with HCV-associated liver disease,” World Journal of Gastroenterology, vol. 11, no. 4, pp. 476–481, 2005.

A. Tran, S. Benzaken, M. C. Saint-Paul et al., “Chondrex (YKL-40), a potential new serum fibrosis marker in patients with alcoholic liver disease,” European Journal of Gastroenterology & Hepatology, vol. 12, no. 9, pp. 989–993, 2000.

Z. Wu, Clinical Value of Chitinase-3-like Protein 1 Level in Noninvasive Detecting Liver Fibrosis in Patients with Chronic Hepatitis B Virus Infection, Master's degree, 2020.

X. Xiao, T. Hassanein, L. Qun-Fang, W. Liu, Y. H. Zheng, and J. Chen, “YKL-40 expression in human hepatocellular carcinoma: a potential biomarker?” Hepatobiliary & Pancreatic Diseases International, vol. 10, no. 6, pp. 605–610, 2011.

Q. Yang, X. Lu, and Z. Wang, “The evaluation value of YKL-40 and PCPE-1 on the degree of liver fibrosis in patients with chronic hepatitis B,” Chinese Heoatology, vol. 20, no. 3, pp. 309–312, 2019.

Y. Ruimiao, “Diagnostic value of YKL-40 and correlation with licer function and licer fibrosis indexs in patientswith liver cirrhosis,” Medical Journal of National Defending Forces in Northwest China, vol. 38, no. 9, pp. 579–582, 2017.

L. Manea, S. Gilbody, and D. McMillan, “A diagnostic meta-analysis of the Patient Health Questionnaire-9 (PHQ-9) algorithm scoring method as a screen for depression,” General Hospital Psychiatry, vol. 37, no. 1, pp. 67–75, 2015.

P. Lambert, S. A. Q. Miguens, C. Solda et al., “Reference values for pulp oxygen saturation as a diagnostic tool in endodontics: a systematic review and meta-analysis,” Restorative Dentistry & Endodontics, vol. 45, no. 4, 2020.

D. Douma-den Hamer, M. H. Blanker, M. A. Edens et al., “Ultrasound for distal forearm fracture: a systematic review and diagnostic meta-analysis,” PLoS One, vol. 11, no. 5, article e155659, 2016.

G. Xiao, S. Zhu, X. Xiao et al., “Comparison of laboratory tests, ultrasound, or magnetic resonance elastography to detect fibrosis in patients with nonalcoholic fatty liver disease: a meta-analysis,” Hepatology, vol. 66, no. 5, pp. 1486–1501, 2017.

T. B. Huedo-Medina, J. Sánchez-Meca, F. Marín-Martínez et al., “Assessing heterogeneity in meta-analysis: Q statistic or I² index?” Psychological Methods, vol. 11, no. 2, pp. 193–206, 2006.

J. H. Badhiwala, F. Nassiri, W. Alhazzani et al., “Endovascular thrombectomy for acute ischemic stroke,” JAMA, vol. 314, no. 17, p. 1832, 2015.

S. Schlesinger, S. R. Sonntag, W. Lieb, and R. Maas, “Asymmetric and symmetric dimethylarginine as risk markers for total mortality and cardiovascular outcomes: a systematic review and meta-analysis of prospective studies,” PLoS One, vol. 11, no. 11, article e165811, 2016.

D. Langan, J. P. T. Higgins, W. Gregory, and A. J. Sutton, “Graphical augmentations to the funnel plot assess the impact of additional evidence on a meta-analysis,” Journal of Clinical Epidemiology, vol. 65, no. 5, pp. 511–519, 2012.

A. H. Kristoffersen, E. Ajzner, and J. M. Bauça, “Pre- and post-test probabilities of venous thromboembolism and diagnostic accuracy of D-dimer, estimated by European clinicians working in emergency departments,” Thrombosis Research, vol. 19, pp. 1010–1016, 2017.

S. Mushtaq, E. Ghani, K. Azam et al., “Comparison of chitinase-3-like protein 1, aspartate aminotransferase-to-platelet ratio index, and fibrosis-4 index with shear-wave elastography,” European Journal of Gastroenterology & Hepatology, vol. 31, no. 3, pp. 357–362, 2019.

H. H. Hung, C. Su, C. Lai et al., “Fibrosis and AST to platelet ratio index predict post-operative prognosis for solitary small hepatitis B-related hepatocellular carcinoma,” Hepatology International, vol. 4, no. 4, pp. 691–699, 2010.

A. D. Recklies, C. White, and H. Ling, “The chitinase 3-like protein human cartilage glycoprotein 39 (HC-gp39) stimulates proliferation of human connective-tissue cells and activates both extracellular signal-regulated kinase and protein kinase B-mediated signalling pathways,” Biochemical Journal, vol. 365, pp. 119–126, 2002.

Z. Jiang, S. Wang, J. Jin et al., “The clinical significance of serum chitinase 3-like 1 in hepatitis B–related chronic liver diseases,” Journal of Clinical Laboratory Analysis, vol. 34, no. 5, article e23200, 2020.

L. L. Schiavon, R. J. Carvalho-Filho, J. L. Narciso-Schiavon et al., “YKL-40 and hyaluronic acid (HA) as noninvasive markers of liver fibrosis in kidney transplant patients with HCV chronic infection,” Scandinavian Journal of Gastroenterology, vol. 45, no. 5, pp. 615–622, 2010.

A. Bhardwaj, C. S. Hollenbeak, N. Pooran et al., “A meta-analysis of the diagnostic accuracy of esophageal capsule endoscopy for Barrett’s esophagus in patients with gastroesophageal reflux disease,” American Journal of Gastroenterology, vol. 104, no. 6, pp. 1533–1539, 2009.

Z. Yumiao and Z. Jinbao, “The clinical diagnostic value of chitinase protein in liver and other types of diseases,” Labeled Immunoassays and Clinical Medicine, vol. 27, no. 11, pp. 2016–2020, 2020.

T. Rath, M. Roderfeld, C. Güler et al., “YKL-40 and transient elastography, a powerful team to assess hepatic fibrosis,” Scandinavian Journal of Gastroenterology, vol. 46, no. 11, pp. 1369–1380, 2011.

A. Hazem, M. B. Elamin, G. Malaga et al., “The accuracy of diagnostic tests for GH deficiency in adults: a systematic review and meta-analysis,” European Journal of Endocrinology, vol. 165, no. 6, pp. 841–849, 2011.

J. N. Mandrekar, “Receiver operating characteristic curve in diagnostic test assessment,” Journal of Thoracic Oncology, vol. 5, no. 9, pp. 1315-1316, 2010.

Y. Yuan, X. Chen, S. Liu, and K. W. Shen, “Accuracy of MRI in prediction of pathologic complete remission in breast cancer after preoperative therapy: a meta-analysis,” American Journal of Roentgenology (1976), vol. 195, no. 1, pp. 260–268, 2010.

L. A. Adams, M. Bulsara, E. Rossi et al., “Hepascore: an accurate validated predictor of liver fibrosis in chronic hepatitis C infection,” Clinical Chemistry, vol. 51, no. 10, pp. 1867–1873, 2005.

S. Zani, M. Riani, and A. Corbellini, “Robust bivariate boxplots and multiple outlier detection,” Computational Statistics & Data Analysis, vol. 28, no. 3, pp. 257–270, 1998.