Critical Care Research and Practice
Volume 2016 (2016), Article ID 3235765, 6 pages
http://dx.doi.org/10.1155/2016/3235765

Research Article

Antimicrobial Doses in Continuous Renal Replacement Therapy: A Comparison of Dosing Strategies

Anna P. Kempke, Abbie S. Leino, Farzad Daneshvar, John Andrew Lee, and Bruce A. Mueller

Clinical Pharmacy Department, University of Michigan College of Pharmacy, Ann Arbor, MI 48109, USA

Received 23 December 2015; Accepted 9 May 2016

Academic Editor: Robert Boots

Copyright © 2016 Anna P. Kempke et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Purpose. Drug dose recommendations are not well defined in patients undergoing continuous renal replacement therapy (CRRT) due to limited published data. Several guidelines and pharmacokinetic equations have been proposed as tools for CRRT drug dosing. Dose recommendations derived from these methods have yet to be compared or prospectively evaluated. Methods. A literature search of PubMed, Micromedex, and Embase was conducted for 40 drugs commonly used in the ICU to gather pharmacokinetic data acquired from patients with acute and chronic kidney disease as well as healthy volunteers. These data and that obtained from drug package inserts were gathered for use in three published CRRT drug dosing equations. Doses calculated for a model patient using each method were compared to doses suggested in a commonly used dosing text. Results. Full pharmacokinetic data was available for 18, 31, and 40 agents using acute kidney injury, end stage renal disease, and normal patient data, respectively. On average, calculated doses differed by 30% or more from the doses recommended by the renal dosing text for >50% of the medications. Conclusion. Wide variability in dose recommendations for patients undergoing CRRT exists when these equations are used. Alternate, validated dosing methods need to be developed for this at-risk patient population.

1. Introduction

The use of continuous renal replacement therapy (CRRT) is increasing in the management of acute kidney injury (AKI) [1]. CRRT establishes hemodynamic stability and provides excellent volume and metabolic control in critically ill patients with AKI. Like native kidneys, CRRT also removes drugs in the process of correcting fluid overload and azotemia. However, CRRT does not provide tubular secretion and reabsorption seen in a properly functioning kidney. Further, critically ill patients receiving CRRT often exhibit altered pharmacokinetic parameters that must be accounted for when dosing medications [2, 3]. Appropriate pharmacotherapy is further complicated by the many CRRT methodologies and flow rate settings used clinically.

CRRT drug dosing guidance has always been lacking for clinicians. Although early and appropriate antibiotic therapy has been linked with better patient outcomes in critically ill patients with sepsis [7], the Food and Drug Administration (FDA) does not mandate antibiotic pharmacokinetic trials in CRRT, and rarely do dosing guidelines exist in approved package inserts [8].

Due to the paucity of dosing guidance, many CRRT dosing methods have been proposed and range from guidelines to dosing equations [3, 5, 6, 9–13]. A published reference by Aronoff et al. provides a dosing guideline for patients with renal failure and includes recommendations for CRRT based on available published pharmacokinetic studies and clinical judgment [10]. The antibiotic CRRT doses in this book were developed by one of the authors (BAM) and can be viewed online at https://kdpnet.kdp.louisville.edu/drugbook/adult/. Similarly, equations utilizing drug-specific pharmacokinetic variables have been developed for drug dosing determination (see Table 1) [4–6]. Many of these equation-based methods published in the 1990s are still used by clinicians today as they allow for the calculation of doses using known CRRT parameters and published pharmacokinetic data for nearly any drug, including those never studied in the setting of CRRT. Relatively robust assumptions must be made when using these equations as it is not often clear whether the applied pharmacokinetic data are derived from critically ill patients with their often abnormal pharmacokinetic profiles or if the data applied are from patients with acute or chronic kidney failure. Depending on what parameters are chosen, different doses may be calculated, but this has not been investigated.

Table 1: Equations proposed for determining appropriate medication dose for a patient undergoing continuous renal replacement therapy (CRRT).

Author
Equation

Bugge [4]
Normal:

AKI:

CKD5:

Kroh [5]
Normal:

AKI:

CKD5:

Reetze-Bonorden [6]
AKI:

CKD5:

, dose in CRRT.

, dose in normal renal function.

, dose in anuric patient.

, nonrenal clearance in normal healthy patient.

, nonrenal clearance in anuric patient with AKI.

, nonrenal clearance in anuric patient with .

, total body clearance in normal healthy patient.

, ultrafiltration rate.

, sieving coefficient.

A prospective comparison of the published CRRT drug dosing strategies has yet to be done. It is unknown whether the guidelines and equations proposed by various authors over the years result in similar CRRT doses. The purpose of this investigation was to compare the calculated antimicrobial dose recommendations among the different methods and compare them to a published guideline coauthored by one of the authors (BAM). This comparison will not determine which dosing method results in therapeutic serum concentrations; however, it will provide better understanding of the current tools available for drug dosing in CRRT and provide direction for future research. Additionally, the influence of pharmacokinetic assumptions made (i.e., utilization of AKI, stage 5 of chronic kidney disease (CKD5), or normal patient pharmacokinetics) in calculating doses will be assessed.

2. Methods

2.1. Study Design

This study was a prospective application of currently available pharmacokinetic data to existing dosing methods in order to determine their level of agreement. Ultimately, CRRT doses derived from different formulas and the Aronoff et al. dosing guideline were compared [4–6, 10, 14]. Published works by Reetze-Bonorden et al., Bugge, and Kroh provided the dosing equations (see Table 1). Maintenance doses were calculated for each equation using published pharmacokinetic data from patients with AKI and CKD5 and using data from healthy volunteers in order to determine the influence of using data from different patient populations. Doses calculated with pharmacokinetic parameters collected from AKI, CKD5, or normal renal function patients are denoted as , , and , respectively.

2.2. Drug Selection

Selection of the antimicrobial agents studied in this trial was based on a paper describing the top 100 drugs used in the ICU at the University of Michigan Hospitals [15]. Additionally, drugs with CRRT doses supported by “human trials larger than a case study” (the highest evidence grade) in the Aronoff et al. text were also included [10].

2.3. Pharmacokinetic Variables

The necessary medication variables for each equation were obtained through an extensive literature search. Fraction of drug unbound was used for sieving coefficient as it is an accepted surrogate [16]. Effluent rate was assumed to be 2 liters per hour (33.3 mL/min)—the rate used by Aronoff et al. and a rate consistent with clinical practice. Recommended normal doses were obtained from the prescribing information assuming a patient weight of 70 kilograms. Anuric dose recommendations were also obtained from the prescribing information; however, if the drug was not recommended for use in an anuric patient, no comparisons were made. The Reetze-Bonorden et al. equation was the only one affected by the availability of anuric dose recommendation because it is a required element in the equation [6].

2.4. Search Strategy

An extensive literature search included the following: the prescribing information, PubMed, Micromedex, and Embase. Search terms contained the following: end stage renal disease, acute kidney injury, acute renal failure, drug name, pharmacokinetics, the name of the pharmacokinetic variable, CRRT type, and sieving coefficient or apparent sieving factor or saturation coefficient. References cited by papers found through this search were further explored to identify the primary literature.

2.5. Data Prioritization

Sieving coefficient, apparent sieving factor, saturation coefficient, or other variations of this constant were all accepted under the general variable “sieving coefficient” due to scarcity of available data. Sieving coefficient may vary depending on CRRT methodology; consequently, CVVH data was given first priority, followed by CVVHDF, and finally CVVHD. When possible, CRRT-related data was derived from studies published in 1990 or later to account for advancing technology (changes in filter types, machines, and settings). Date of publication did not play a role in the use of such references for properties inherent to the drug.

The assumed treatment indication for each studied antimicrobial was the one most likely to be present in the ICU setting as determined by our research team. Generally, “severe” infections were usually assumed and doses to be used in the equations were those used for severe infections. When doses were given as a range, a value that fell approximately at the middle of the range and correlated with the available dosage forms was used. If multiple sources provided discrepant values for a particular pharmacokinetic variable, all data were recorded and the average was taken to determine a single value to be used for the purpose of the dose calculations. In vivo data took priority over in vitro or animal data, and multiple-dose pharmacokinetic studies took priority over single-dose kinetics. For data collected for CKD5 or AKI pharmacokinetic parameters, the authors must have clearly documented that the patients were anuric. Additionally, all nonrenal clearance values had to be collected when the patient was not undergoing dialysis.

2.6. Data Analysis

Doses predicted by published equations were compared to those recommended in the Aronoff et al. dosing guidelines. Aronoff et al. text was the chosen comparator as it is among the most commonly used dosing texts and was coauthored by one of the authors of this study (BAM). Like the other dosing equations, Aronoff et al. equation has not been tested prospectively. Authors of this text applied available pharmacokinetic and pharmacodynamic data at time of publication and used a consensus approach of a group of experts. The percent difference between the Aronoff et al. dose and the calculated dose for each antimicrobial was determined, with an absolute difference of ≥30% considered “clinically significant.”

2.7. Statistical Analyses

Each dose was converted into mg/day to allow direct comparisons between methodologies. For each dosing equation, the number of drug doses within ±30% of the Aronoff et al. dose and outside of this range was assessed using the Chi squared test. Chi squared tests also were used to determine whether the assumed pharmacokinetic parameters (AKI versus CKD5 versus normal) affected the number of drug doses within ±30% of the Aronoff et al. dose. Descriptive statistics were used to evaluate the dose differences between the equations and the Aronoff doses.

3. Results

Forty antimicrobials were included in this assessment. Full AKI pharmacokinetic data was available for 18 drugs, CKD5 pharmacokinetic data was available for 31 drugs, and normal pharmacokinetic data was available for all 40 agents (see Appendix, in Supplementary Material available online at http://dx.doi.org/10.1155/2016/3235765). Doses were calculated and the agreement or disagreement with the doses recommended by Aronoff et al. was determined (see Table 2).

Table 2: Antimicrobial dose recommendations for a theoretical 70 kg patient receiving CRRT at an effluent rate of 33.3 mL/min. Doses recommended in Aronoff et al. guidelines and calculated with the Bugge [4], Kroh [5], and Reetze-Bonorden [6] equations utilizing CKD5, AKI, or normal patient data are shown below. Normal text indicates a dose ≥30% less than the Aronoff dose, bold text indicates a dose ±30% of the Aronoff dose, and italicized text indicates a dose ≥30% greater than the Aronoff dose. The number of doses below, within, or above this range is reported in the final row. An asterisk () denotes insufficient published pharmacokinetic data to allow dose calculation.

Drug name
Aronoff (mg/day)
Bugge (mg/day)
Kroh (mg/day)
Reetze-Bonorden (mg/day)

CKD5
AKI
Normal
CKD5
AKI
Normal
CKD5
AKI

Acyclovir
525
314
319
399
121
129
249
686
656

Amikacin
525
365

392
348

389
1,605

Amoxicillin
500
681

730
454

527
833

Amphotericin B
350
138
269
317
36
232
304
390
356

Ampicillin
8,000
3,348

3,790
1,832

2,495
3,574

Aztreonam
2,000
3,213

3,458
3,183

3,550
3,495

Cefazolin
4,000
1,152

1,077
613

500
1,333

Cefepime
4,000
2,295
2,765
2,332
1,778
2,483
1,833
1,998
1,080

Cefotaxime
2,000
2,399

2,977
1,501

2,367
2,046

Cefotetan
2,000
1,533

1,279
1,200

820
1,500

Cefoxitin
6,000
1,739

2,358
362

1,290
3,258

Ceftaroline
800

605

508

Ceftazidime
4,000
1,490
1,991
1,680
1,176
1,927
1,461
1,243
488

Ceftriaxone
2,000
826
1,102
1,131
635
1,049
1,093
1,947
1,742

Cefuroxime
2,000
1,696
1,645
1,827
1,377
1,300
1,573
3,481
4,439

Ciprofloxacin
400
608

697
358

492
459

Clindamycin
1,800

2,002

1,932

Daptomycin
280
222
261
234
318
376
335
539
434

Doripenem
750
613
675
835
302
395
635
889
751

Ertapenem
1,000

762
691

877
770

681

Fluconazole
400

244
213

797
750

480

Foscavir
2,100
2,595

2,437
1,950

1,713

Ganciclovir
88
103
108
136
39
47
88
171
71

Gentamicin
120
105
113
105
126
138
126
196
141

Imipenem
2,000
1,175
1,370
1,548
685
977
1,245
881
718

Levofloxacin
250
367
412
437
276
343
381
393
354

Linezolid
1,200
919
817
855
1,006
853
910
1,549
1,634

Meropenem
3,000
1,198
1,645
1,483
642
1,312
1,069
3,222
2,031

Moxifloxacin
400
336
476
342
358
568
368
472
443

Nafcillin
6,000

4,799

4,232

Oseltamivir
150

60
50

23
9

47

Piperacillin
12,000
8,112
7,891
8,743
6,211
5,879
7,156
11,902
12,240

Rifampin
600

479

438

Sulbactam
1,000
1,855

1,887
1,142

1,190
1,456

Tazobactam
1,500

894
933

641
699

1,877

Telavancin
500
495

383
840

672
750

Tigecycline
100
87

89
82

86
102

Tobramycin
120
99
127
90
142
185
129
368
115

Trimethoprim
700

602

574

Vancomycin
1,000
786
1,184
896
623
1,220
788
434
196

Below/within/above ±30% range
12/14/5
12/9/1
12/21/7
17/12/2
13/4/5
14/22/4
7/11/12
7/11/4

Of the agents available for dose calculations utilizing the Bugge equation, 55% of (dose difference ranged from −100% to 85%, median −22.4%), 59% of   (dose difference ranged from −100% to 65%, median −30.9%), and 48% of (dose difference ranged from −73% to 89%, median −21.4%) fell outside of ±30% of the doses recommended by Aronoff et al. Of the agents available for dose calculations utilizing the Kroh equation, 61% of (dose difference ranged from −94% to 68%, median −33.7%), 82% of (dose difference ranged from −85% to 99%, median −36.5%), and 45% of (dose difference ranged from −94% to 88%, median −21.3%) fell outside of ±30% of the dose recommended by Aronoff et al. Of the agents available for dose calculations utilizing the Reetze-Bonorden equation, 63% of (dose difference ranged from −69% to 207%, median 16.4%) and 50% of (dose difference ranged from −88% to 122%, median 0.9%) fell outside of ±30% of the dose recommended by Aronoff et al.

A Chi squared analysis was also performed to determine if the doses being in range (±30% of Aronoff et al. dose) or out of range were affected by whether CKD5, AKI, or normal data was used in the equations. For Bugge and Reetze-Bonorden equations, there was no relationship between a dose being in range or out of range and which patient pharmacokinetic data is used ( and 0.34 for Bugge and Reetze-Bonorden, resp.). For the Kroh equation, there was a relationship between a dose being in or out of range and which patient population data was used (); doses using normal volunteer-derived data were more likely to be within ±30% of the Aronoff doses.

4. Discussion

This is the first study to provide direct comparisons of the proposed dosing methodologies for a standardized patient with AKI undergoing CRRT. This study showed that calculated doses differed by 30% or more from the doses recommended by Aronoff et al., a popular dosing guideline, for over half of the antimicrobials examined. The equations frequently recommended lower doses than the dose suggested by Aronoff et al. [10]. Overall, the disparities in doses with different methods were demonstrated to be large and if applied clinically could greatly impact a patient’s treatment. While the optimal dose of any of these antimicrobials is unknown, the fact that the equation-derived doses are so different from each other and from the Aronoff doses suggests that all of these sources are likely “recommending” subtherapeutic and supratherapeutic doses in many instances (Table 2).

For any of the equations, what patient populations are used as the source of the pharmacokinetic data elements made a large difference on calculated doses. For the Bugge equation, compared to or resulted in more doses within ±30% of that of Aronoff et al. (52% of in range, 45% of in range, and 41% of in range). The same result was seen with the Kroh equation (55% of in range, 39% of in range, and 18% of in range). Reetze-Bonorden found the best correlation with Aronoff et al. when utilizing AKI data (37% of in range and 50% of in range). The clinical implications of these findings are intriguing. It was unexpected that using pharmacokinetic data from normal subjects would result in more doses that were within 30% of Aronoff et al. doses compared to using AKI data, yet that was our finding with the Bugge and Kroh equations. Given that neither nor led to particularly impressive agreement with Aronoff et al. doses, it is likely that the bottom line is not that use of pharmacokinetic data from patients with normal renal function is preferable to using AKI data. Rather, none of these equations performed particularly well, and perhaps therefore their use should be abandoned in favor of other individualized approaches like therapeutic drug monitoring.

Infection is the leading cause of death in AKI despite the fact that the majority of critically ill patients who receive CRRT also receive antibiotics [7]. Early, adequate antibiotic therapy has been demonstrated to be paramount to optimizing chances of survival and reducing the spread of microbial resistance [17, 18]. A recent study demonstrated the current CRRT dosing recommendations for pipercillin/tazobactam, cefepime, and ceftazidime are not sufficient to achieve pharmacokinetic and pharmacodynamic targets. Specifically, two grams twice daily of intravenous cefepime given during CRRT with ultrafiltrate rates of 2 L/h did not attain the pharmacodynamic goal (serum concentrations four times the minimum inhibitor concentration for 60–70% of the dosing interval) [19]. The cefepime dose recommendations calculated in our analysis were even lower, ranging from 1 to 3 grams daily. The Aronoff et al. text recommends one to two grams every 12 hours, which also would not meet the treatment goals. Based on the present analysis, it is probable that the current published equation-based recommendations result in underdosing of not only cefepime but many other antibiotics, as many of the calculated doses were considerably below Aronoff et al. recommendations [10].

This study has several limitations. Scarcity of pharmacokinetic data in the literature was one inherent limitation to the study and can be attributed to both the inclusion of recently approved medications which had limited available data and poor reporting of pharmacokinetic data in published studies [20]. A limitation of using any of these calculations is that they utilize reported pharmacokinetic data from a very limited number of subjects (especially when the AKI or CKD5 data are used). Making broad dosing recommendations from relatively sparse data is a potential source of error. Additionally, assumptions were made about patient size and specific CRRT flow rates and methodologies. For the purposes of calculations, the effluent rate was held constant based on the standard rates used in the Aronoff et al. text, and consequently the results reported here are only reflective of doses required with that specific CRRT effluent rate. The results may differ considerably with the use of a different effluent rate assumption and can be a future area to explore. Finally, all equation-based dosing results were compared to Aronoff et al. to aid in the comparisons between them, but there is no way to tell which dose was “the best” or would result in therapeutic concentrations.

Overall, the comparison of dosing recommendations from primarily theoretical equations to a dosing reference based on both theoretical and clinical knowledge allows insight into the existing discrepancies between different drug dosing methodologies. The disparities uncovered do not provide determination of the preferred method or the clinically correct dose but instead call to question the current utility of all CRRT drug dosing tools, particularly the methods that rely on reporting of pharmacokinetic variables in the literature. A study by Li et al. reported that an ideal dataset of parameters necessary for determining doses in CRRT are rarely included in studies, and even basic pharmacokinetic parameters such as volume of distribution and clearance are omitted in up to 20% of studies [20]. The need for diligent monitoring of medications used in CRRT patients as well as the use of sound clinical judgment when dosing is reinforced by the results of the study, and the importance of further research in the special population of individuals with AKI on CRRT is also evident. Ideally, the best solution to adjusting drug doses will be an individualized approach based on therapeutic drug monitoring and an understanding of the patient’s CRRT regimen and its impact on achieving pharmacodynamic targets. However, of the drugs listed in Table 2, only vancomycin and the aminoglycosides can be routinely measured in most countries. Strategies to reach antibiotic pharmacodynamic targets more reliably have been published [21, 22] and include strategies using higher loading doses, weight-based dosing techniques, and continuous or prolonged infusions of beta-lactam antibiotics. Monte Carlo simulation of CRRT and various antibiotic doses to determine likelihood of pharmacodynamic target attainment [23] also is a promising technique to develop effective antibiotic dosing until doses are established in clinical trials. The present study indicates that CRRT antibiotic dosing based on knowledge of patient-specific pharmacokinetics and pharmacodynamic principles is preferable [21–23] to a reliance on mathematical equations.

Disclosure

Drs. Anna P. Kempke, Abbie S. Leino, Farzad Daneshvar, and John Andrew Lee were students at the University of Michigan College of Pharmacy at the time of this project.

Competing Interests

The authors report no conflict of interests.

References

S. Uchino, J. A. Kellum, R. Bellomo et al., “Acute renal failure in critically ill patients: a multinational, multicenter study,” The Journal of the American Medical Association, vol. 294, no. 7, pp. 813–818, 2005.

M. D. Churchwell and B. A. Mueller, “Drug dosing during continuous renal replacement therapy,” Seminars in Dialysis, vol. 22, no. 2, pp. 185–188, 2009.

M. Schetz, P. Ferdinande, G. Van den Berghe, C. Verwaest, and P. Lauwers, “Pharmacokinetics of continuous renal replacement therapy,” Intensive Care Medicine, vol. 21, no. 7, pp. 612–620, 1995.

J. F. Bugge, “Pharmacokinetics and drug dosing adjustments during continuous venovenous hemofiltration or hemodiafiltration in critically ill patients,” Acta Anaesthesiologica Scandinavica, vol. 45, no. 8, pp. 929–934, 2001.

U. F. Kroh, “Drug administration in critically ill patients with acute renal failure,” New Horizons, vol. 3, no. 4, pp. 748–759, 1995.

P. Reetze-Bonorden, J. Bohler, and E. Keller, “Drug dosage in patients during continuous renal replacement therapy. Pharmacokinetic and therapeutic considerations,” Clinical Pharmacokinetics, vol. 24, no. 5, pp. 362–379, 1993.

R. Zaragoza, A. Artero, J. J. Camarena, S. Sancho, R. González, and J. M. Nogueira, “The influence of inadequate empirical antimicrobial treatment on patients with bloodstream infections in an intensive care unit,” Clinical Microbiology and Infection, vol. 9, no. 5, pp. 412–418, 2003.

B. A. Mueller and W. E. Smoyer, “Challenges in developing evidence-based drug dosing guidelines for adults and children receiving renal replacement therapy,” Clinical Pharmacology and Therapeutics, vol. 86, no. 5, pp. 479–482, 2009.

G. Choi, C. D. Gomersall, Q. Tian, G. M. Joynt, A. M. M. Y. Li, and J. Lipman, “Principles of antibacterial dosing in continuous renal replacement therapy,” Blood Purification, vol. 30, no. 3, pp. 195–212, 2010.

G. R. Aronoff, W. M. Bennett, J. S. Berns et al., Drug Prescribing in Renal Failure: Dosing Guidelines for Adults and Children, American College of Physicians, Philadelphia, Pa, USA, 5th edition, 2007.

F. Keller, J. Böhler, D. Czock, D. Zellner, and A. K. H. Mertz, “Individualized drug dosage in patients treated with continuous hemofiltration,” Kidney International, Supplement, vol. 56, no. 72, pp. S29–S31, 1999.

J. Böhler, J. Donauer, and F. Keller, “Pharmacokinetic principles during continuous renal replacement therapy: drugs and dosage,” Kidney International. Supplement, no. 72, pp. S24–S28, 1999.

R. L. Trotman, J. C. Williamson, D. M. Shoemaker, and W. L. Salzer, “Antibiotic dosing in critically ill adult patients receiving continuous renal replacement therapy,” Clinical Infectious Diseases, vol. 41, no. 8, pp. 1159–1166, 2005.

J. F. Bugge, “Influence of renal replacement therapy on pharmacokinetics in critically ill patients,” Best Practice and Research: Clinical Anaesthesiology, vol. 18, no. 1, pp. 175–187, 2004.

S. S. Taber and B. A. Mueller, “Drug-associated renal dysfunction,” Critical Care Clinics, vol. 22, no. 2, pp. 357–374, 2006.

T. A. Golper, “Drug removal during continuous hemofiltration or hemodialysis,” Contributions to nephrology, vol. 93, pp. 110–116, 1991.

J. Garnacho-Montero, C. Ortiz-Leyba, I. Herrera-Melero et al., “Mortality and morbidity attributable to inadequate empirical antimicrobial therapy in patients admitted to the ICU with sepsis: A Matched Cohort Study,” Journal of Antimicrobial Chemotherapy, vol. 61, no. 2, pp. 436–441, 2008.

E. H. Ibrahim, G. Sherman, S. Ward, V. J. Fraser, and M. H. Kollef, “The influence of inadequate antimicrobial treatment of bloodstream infections on patient outcomes in the ICU setting,” Chest, vol. 118, no. 1, pp. 146–155, 2000.

L. Seyler, F. Cotton, F. S. Taccone et al., “Recommended β-lactam regimens are inadequate in septic patients treated with continuous renal replacement therapy,” Critical Care, vol. 15, no. 3, article R137, 2011.

A. M. M. Y. Li, C. D. Gomersall, G. Choi, Q. Tian, G. M. Joynt, and J. Lipman, “A systematic review of antibiotic dosing regimens for septic patients receiving continuous renal replacement therapy: do current studies supply sufficient data?” Journal of Antimicrobial Chemotherapy, vol. 64, no. 5, pp. 929–937, 2009.

S. J. Lewis and B. A. Mueller, “Antibiotic dosing in critically ill patients receiving CRRT: underdosing is overprevalent,” Seminars in Dialysis, vol. 27, no. 5, pp. 441–445, 2014.

S. J. Lewis and B. A. Mueller, “Dosing in patients with acute kidney injury: ‘enough but not too much’,” Journal of Intensive Care Medicine, vol. 31, no. 3, pp. 164–176, 2016.

S. J. Lewis, M. B. Kays, and B. A. Mueller, “Use of monte carlo simulations to determine optimal carbapenem dosing in critically Ill patients receiving prolonged intermittent renal replacement therapy,” The Journal of Clinical Pharmacology, 2016.