Critical Care Research and Practice
Volume 2021 (2021), Article ID 8881115, 6 pages
https://doi.org/10.1155/2021/8881115

Research Article

The Use of Dornase Alfa in the Management of COVID-19-Associated Adult Respiratory Distress Syndrome

Andrew Toma,¹ Christina Darwish,² Michele Taylor,¹ Justin Harlacher,¹ and Ribal Darwish¹

¹Palm Beach Gardens Medical Center, Palm Beach Gardens, FL, USA
²George Washington University, School of Medicine and Health Sciences, Washington, DC, USA

Correspondence should be addressed to Ribal Darwish; r.ribal@gmail.com

Received 18 August 2020; Accepted 6 February 2021; Published 26 April 2021

Academic Editor: Samuel A. Tisherman

Copyright © 2021 Andrew Toma et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Objective. Currently, management of acute respiratory distress syndrome (ARDS) in COVID-19 infection with invasive mechanical ventilation results in poor prognosis and high mortality rates. Interventions to reduce ventilatory requirements or preclude their needs should be evaluated in order to improve survival rates in critically ill patients. Formation of neutrophil extracellular traps (NETs) during the innate immune response could be a contributing factor to the pulmonary pathology. This study suggests the use of dornase alfa, a recombinant DNAse I that lyses NETs, to reduce ventilatory requirements and improve oxygenation status, as well as outcomes in critically ill patients with ARDS subsequent to confirmed or highly suspected COVID-19 infection. Design. A single-institution cohort study. Setting. Intensive care unit in a tertiary medical center. Patients. Adult patients with acute respiratory distress syndrome (ARDS) admitted to the ICU with confirmed COVID-19 infection. Intervention. Treatment with aerosolized dornase alfa. Measurements and Main Results. Of 39 patients evaluated, most patients had improvement in oxygenation measured by increase in the PaO₂/FiO₂ ratio, reduction in ventilatory support or other supportive oxygen requirements, and partial resolution of bilateral opacities visible on CXR, as well as improved outcome. Conclusions. Administration of inhalational dornase alfa via a filtered nebulizer medication system or through an adapter in a ventilator circuit should be considered in all COVID-19-positive patients with ARDS as early in the disease course as possible.

1. Introduction

As of May 31, 2020, the SARS-CoV-2 (COVID-19) pandemic has resulted in more than 6 million confirmed cases worldwide and over 369,000 deaths [1]. Among critically ill patients, hypoxemic respiratory failure from acute respiratory distress syndrome (ARDS) is the predominant finding and leading cause of death [2]. Currently, debate surrounds the pathophysiology of ARDS in these patients and how to standardize appropriate treatment [3]. Patients requiring invasive mechanical ventilation have a dismal prognosis, with one study of 2634 patients in the New York City area determining mortality rates ranging from 76.4% to 97.2%, depending on age [4]. It is therefore imperative to identify possible treatments that will preclude ventilator requirement or reduce necessary duration of its use.

One proposed contributor of pulmonary disease in COVID-19 is the presence of neutrophil extracellular traps (NETs) resulting from the initial innate immune response [5, 6]. These are web-like structures composed of chromatin which are responsible for entrapping pathogens and further propagating the immune response. With dysregulation, significant pulmonary pathology can occur from alveolar damage and epithelial cell death [7]. NETs may also contribute to the formation of viscous mucous, resulting in impaired gas exchange and facilitation of secondary infections [6]. In an apparent paradox to their role as effectors of pathogen clearance, a study of pneumonia correlated a higher concentration of NETs with prolonged treatment duration and inpatient stay [8]. NETs have also been implicated in pathogenesis of ARDS, as toxic extracellular histones are elevated in the bronchoalveolar fluid of these patients [6]. Finally, NETs may potentiate thrombosis by activating components of the clotting cascade, inactivating endogenous anticoagulants, and supporting recruitment of platelets [9]. This is especially concerning because COVID-19 has been associated with thrombotic complications including pulmonary embolism in critically ill patients [10].

Dissolution of NETs is possible with dornase alfa, a recombinant DNAse I used primarily in the treatment of cystic fibrosis, that has previously demonstrated success in ARDS treatment [6, 11, 12]. A recent case report showed promise in its use for a patient with COVID-19, who had improved oxygenation and lung compliance with eventual extubation and discharge [5]. In this study, we report a cohort study that examined the possible role of dornase alfa as a therapeutic modality in ARDS resulting from COVID-19 infection. The goal was to observe whether this treatment led to a decrease in ventilatory requirements for patients requiring mechanical ventilation, an improvement in oxygenation status, and a resolution of pulmonary infiltrates radiographically.

2. Methods

This is a retrospective single-institution cohort study conducted from April 4, 2020, to July 4, 2020, in the intensive care unit at Palm Beach Gardens Medical Center. Approval for this study was obtained from MetroWest Medical Center Institutional Review Board (IRB# 2020-063). Patients were considered eligible if they had positive COVID-19 infection confirmed by nasopharyngeal RT-PCR and were diagnosed with ARDS. Diagnosis of ARDS required fulfilment of Berlin criteria including timing within 1 week of clinical insult or new/worsening respiratory symptoms, chest X-ray (CXR) showing bilateral opacities not fully explained by effusions, lobar/lung collapse, or nodules, and respiratory failure not fully explained by cardiac/fluid overload. Severity grading was based on the PaO₂/FiO₂ ratio: mild PaO₂/FiO₂ >200 to ≤300 mmHg with PEEP or CPAP ≥5 cmH₂O, moderate PaO₂/FiO₂ >100 to ≤200 mmHg with PEEP or CPAP ≥5 cmH₂O, and severe with PaO₂/FiO₂ <100 mmHg with PEEP ≥5 cmH₂O. The exclusion criteria were known allergy to doranase alfa, DNR status prior to initiation of treatment, and hemoptysis on presentation.

Eligible patients not requiring invasive ventilation received 2.5 mg aerosolized dornase alfa daily or twice daily via a nebulizer medication system with filter. This mechanism utilizes a reservoir and one-way valve system for medication administration to protect clinicians against secondhand aerosols (Figure 1(a)). Eligible patients requiring mechanical ventilation received 2.5 mg aerosolized dornase alfa daily or twice daily via a tee adapter with valve in conjunction with a small volume nebulizer. The tee adapter introduces the aerosol into the ventilator circuit and maintains a closed system to reduce the risk of aerosolization (Figure 1(b)). To further reduce exposure risk, for patients not admitted to negative pressure rooms, clinical staff were not permitted to enter for an hour after the nebulizer treatment.

(a)

(b)

Figure 1: Demonstration of mechanism utilized for aerosolized dornase alfa administration: (a) AirLife® Misty Max 10TM nebulizer medication system with filter and (b) AirLife® Tee adapter with valve in conjunction with a small volume nebulizer.

Outcomes of interest included changes in ventilatory requirements, oxygenation measured by comparing the arterial oxygen partial pressure (PaO₂) over the fractional inspired oxygen (FiO₂), and appearance of infiltrates on CXR before and after treatment, as well as outcome at 3 months after treatment.

3. Results

Of 39 patients included in the study, 25 (62.5%) were males, and the mean age was 63.5 years (median = 64 years). The majority (n = 37) had COVID-19 infection confirmed by RT-PCR, and the remaining had positive IgM titers (n = 2). The number of treatments of dornase alfa ranged from 3 to 43 with an average of 9.05. Prior to treatment with dornase alfa, 8 patients (20%) required intubation and mechanical ventilation, 10 required BiPap (25%), 9 required high-flow nasal cannula (23%), 11 required midflow nasal cannula (28%), and 1 (2.5%) was stable on face mask. Within the first week after initial treatment, the majority of patients (n = 24, 61.5%) had reduced respiratory support requirements (e.g., transition from BiPap to nasal cannula). By the end of the study period, of 8 patients initially requiring mechanical ventilation, 7 were successfully extubated or weaned to tracheal collar and discharged from the ICU (Table 1). In a sample of the first 10 patients included in the study, all had improved oxygenation measured by an increase in the PaO₂/FiO₂ ratio after treatment, with an average increase in the ratio by 146.02% (median: 144.5%, 37.33%–322.67%). The average improvement was higher among patients not initially requiring mechanical ventilation (184.55%) compared to those requiring it (120.34%) (Table 2).

Table 1: Characteristics of the patients, severity of the ARDS, number of doranase alfa treatments, and outcome in the treatment group.

Characteristics
Number of patients (N = 39)
Outcome
Home
LTAC
Death/hospice

Average age
64

33
2
4

Male
25

22
1
2

Female
14

11
1
2

Number of dornase alfa treatments

    1–4
8

7
0
1

    5–10
23

22
0
1

    11–15
3

2
0
1

    >15
5

2
2
1

ARDS severity

    Mild
22

22
0
0

    Moderate
7

7
0
0

    Severe
10

4
2
4

Comorbidities

    HTN
16

15
0
1

    HLD
5

4
0
1

    DM
6

4
2
0

    Malignancy
2

1
1
0

    Transplant recipient
1

0
1
0

    MI/CMO
3

3
0
0

    PAF
3

2
1
0

    Obstructive or restrictive lung disease
5

3
0
2

    Pesticide exposure
1

0
0
1

    CKD
3

2
1
0

Additional treatments

    Dexamethasone
20

20
0
0

    Dexamethasone + remdesivir
15

12
0
3

    Dexamethasone + remdesivir + plasma
1

0
1
0

    Dexamethasone + plasma + remdesivir + hemolung
3

1
1
1

Table 2: Characteristics of the first 10 patients, including changes in the ventilator requirements and PaO₂/FiO₂ ratio (ventilatory and clinical features of critically ill patients with COVID-19 infection and ARDS treated with dornase alfa).

Patient I
Patient II
Patient III
Patient IV
Patient V
Patient VI
Patient VII
Patient VIII
Patient IX
Patient X

Age
72
68
48
62
68
42
48
55
79
35

Sex
M
M
F
M
F
M
M
M
M
M

Comorbidities
Renal transplant, type II DM, prior history of malignancy
—
PAF, type II DM
—
HTN
—
CAD with prior STEMI
—
Pulmonary fibrosis
CM

COVID+ by RT-PCR
Yes
Yes
Yes
Yes
Yes
Yes
No
No
Yes
No

Remdesivir use
Yes
Yes
Yes
No
No
No
No
No
No
No

Respiratory support (before)
Pressure (cmH₂O)
Volume (mL)
PCV: 28/12
PRVC
TV: 450 mL
VR: 32 bpm
PEEP: 14
PRVC
TV: 450 mL
VR: 30 bpm
PEEP: 16
HFNC
HFNC
BiPap
PRVC
TV: 450 mL
VR: 22 bpm
PEEP: 12
BiPap
PCV
22/12
PRVC
TV: 450 mL
VR: 22 bpm
PEEP: 10

Respiratory support (after)
Pressure (cmH₂O)
Volume (mL)
SIMV
TV: 500 mL
Rate: 10 bpm
PEEP: 5
PS: 10
SIMV
TV: 500 mL
Rate: 15 bpm
PEEP: 5
PS: 16
PRVC
TV: 480 mL
Rate: 30 bpm
PEEP: 10
NC
NC
NC
NC
NC
PCV: 16/8
NC

PaO₂ (mmHg)/FiO₂ (%) before
138 (69/50)
240 (120/50)
84 (100/84)
76 (61/80)
150 (60/40)
208 (104/50)
89 (80/90)
75 (100/75)
148 (89/60)
90 (90/100)

PaO₂ (mmHg)/FiO₂ (%) after
202 (101/50)
350 (140/40)
133 (80/60)
275 (88/32)
206 (66/32)
450 (144/32)
272 (87/32)
317 (114/36)
405 (243/60)
263 (84/32)

% increase in PaO₂/FiO₂
46.38
45.83
58.33
261.84
37.33
116.35
205.62
322.67
173.65
192.22

No. of treatments
9
16
14
4
4
3
4
4
2
7

Extubated
s/p trach
Yes
Yes
N/A
N/A
N/A
Yes
N/A
No
Yes

Discharged from ICU
Yes
Yes
Yes
Yes
Yes
Yes
Yes
Yes
No
Yes

Abbreviations: PAF: paroxysmal atrial fibrillation; DM: diabetes mellitus; CM: cardiomyopathy; CAD: coronary artery disease; STEMI: ST-elevation myocardial infarction; ICU: intensive care unit; PCV: pressure-controlled ventilation; PRVC: pressure-regulated volume control; HFNC: high-flow nasal cannula; NC: nasal cannula; SIMV: synchronized intermittent mandatory ventilation; TV: tidal volume; PEEP: positive end-expiratory pressure; PS: pressure support; VR: ventilatory rate; BPM: breaths per minute.

All patients also had improvement in bilateral opacities visible on CXR, and this is demonstrated for patients II, IV, and VII in (Figure 2).

Figure 2: Chest X-rays of patients II, IV, and VII before (A) and after (B) treatment with dornase alfa. Imaging demonstrates improved resolution of opacities including for those who had prolonged mechanical ventilation (patients II, P2A/B, and VII, P7A/B) and for those not requiring mechanical ventilation (patient IV, P4A/B).

4. Discussion

Though inhalational dornase alfa is most commonly utilized in the prevention and treatment of pulmonary complications in cystic fibrosis, our study results suggest a potential benefit to its use in ARDS caused by COVID-19. The role of NETs in pulmonary disease is well documented, and the ability of dornase alfa to mitigate the activity of this component of the innate immune response likely reduces the deleterious secondary inflammation that results from COVID-19. We developed a unique strategy to ensure safe administration of the drug to both ventilated and nonventilated patients in order to reduce aerosolization of the virus and exposure to health care workers. Our cohort study anticipates a randomized clinical trial currently underway that likewise is assessing the benefit of dornase alfa in COVID-19 disease but is not scheduled to be completed until November 2020. Since the reported adverse events of treatment, including rash and voice changes, are rare and relatively mild, we offer use of inhaled dornase alfa as a supplement to current supportive measures used to treat ARDS in select COVID-19 patients until confirmatory data are published [5].

In our study cohort, most of the patients who received doranase alfa had improvement in oxygenation and radiogragraphic resolution of the pulmonary infiltrates. Most of the patients who required mechanical ventilation had reduced ventilatory requirements or were successfully extubated by the end of the duration of the study. The majority of patients who were treated prior to need for mechanical ventilation were able to be discharged from the ICU, and none progressed to requiring mechanical ventilation. Of note, patients who had been intubated for a prolonged period prior to receiving treatment with dornase alfa had more modest improvements in respiratory status. This finding, compared to the more dramatic results in those who did not yet require invasive mechanical ventilation, suggests dornase alfa has higher efficacy when used earlier in the disease course. It is likely that once significant inflammation has resulted from the NETs, gas exchange could already be permanently impaired. In a patient in whom ARDS was secondary to COVID-19 and pesticide exposure, doranase alfa showed no efficacy.

Limitations of our study include retrospective design with a small control group (Table 3), small sample size, limited follow-up to three months, and younger average age group compared to other studies [4]. Given the small sample size, it was also not possible to adjust for other factors that may have impacted the patient’s success with treatment, including length of hospitalization, ventilation prior to initiation of dornase alfa, or underlying comorbidities.

Table 3: Characteristics of patients with ARDS and outcome of patients who were not treated with doranase alfa.

Characteristics
Number of patients (N = 6)
Outcome
Home
LTAC
Death/hospice

Average age
65

1
1
4

Male
4

0
1
3

Female
2

1
0
1

Comorbidities

    Hypothyroidism
1

1
0
0

    CKD
3

0
1
2

    HIV
1

0
0
1

    CAD
1

0
0
1

Treatments

    Dexamethasone
3

1
1
1

    Solu-Medrol IV
1

0
0
1

    Dexamethasone + remdesivir
0

0
0
0

    Dexamethasone + plasma
1

0
0
1

    Dexamethasone + plasma + hemolung
1

0
0
1

5. Conclusion

We present a cohort study showing efficacy and safety of a novel administration method of inhalational dornase alfa to both spontaneously breathing and mechanically ventilated patients with ARDS due to COVID-19 infection using a one-way valve and viral filter. Our data show improved outcome and safety of utilization of doranase alfa in the treatment of ARDS. Future randomized controlled trials will be needed to confirm the generalizability of these results to the broader population of COVID-19-infected patients.

Data Availability

The data used to support this study are available from the corresponding author upon request.

Disclosure

This study was conducted at PBMC.

Conflicts of Interest

The authors have no conflicts of interest to disclose.

References

COVID-19 Dashboard by the Center for Systems Science and Engineering (CSSE) at Johns Hopkins University (JHU).

C. Wu, X. Chen, Y. Cai et al., “Risk factors associated with acute respiratory distress syndrome and death in patients with coronavirus disease 2019 pneumonia in Wuhan, China,” JAMA Internal Medicine, vol. 180, no. 7, pp. 934–1010, 2020.

X. Li and X. Ma, “Acute respiratory failure in COVID-19: is it “typical” ARDS?” Critical Care, vol. 24, no. 1, p. 198, 2020.

S. Richardson, J. S. Hirsch, M. Narasimhan et al., “Presenting characteristics, comorbidities, and outcomes among 5700 patients hospitalized with COVID-19 in the New York city area,” JAMA, vol. 323, no. 20, pp. 2052–2058, 2020.

A. P. Earhart, Z. M. Holliday, H. V. Hofmann, and A. G. Schrum, “Consideration of dornase alfa for the treatment of severe COVID-19 acute respiratory distress syndrome,” New Microbes and New Infections, vol. 35, Article ID 100689, 2020.

B. J. Barnes, J. M. Adrover, A. Baxter-Stoltzfus et al., “Targeting potential drivers of COVID-19: neutrophil extracellular traps,” Journal of Experimental Medicine, vol. 217, no. 6, pp. 1–7, 2020.

V. Papayannopoulos, “Neutrophil extracellular traps in immunity and disease,” Nature Reviews Immunology, vol. 18, no. 2, pp. 134–147, 2018.

F. Ebrahimi, S. Giaglis, S. Hahn et al., “Markers of neutrophil extracellular traps predict adverse outcome in community-acquired pneumonia: secondary analysis of a randomised controlled trial,” European Respiratory Journal, vol. 51, no. 4, Article ID 1701389, 2018.

B. Engelmann and S. Massberg, “Thrombosis as an intravascular effector of innate immunity,” Nature Reviews Immunology, vol. 13, no. 1, pp. 34–45, 2013.

F. A. Klok, M. J. H. A. Kruip, N. J. M. van der Meer et al., “Incidence of thrombotic complications in critically ill ICU patients with COVID-19,” Thrombosis Research, vol. 191, pp. 145–147, 2020.

M. W. Konstan, J. S. Wagener, D. J. Pasta et al., “Clinical use of dornase alfa is associated with a slower rate of FEV1 decline in cystic fibrosis,” Pediatric Pulmonology, vol. 46, no. 6, pp. 545–553, 2011.

C. Morris and B. Mullan, “Use of dornase alfa in the management of ARDS,” Anaesthesia, vol. 59, pp. 1242–1255, 2004.