Contrast Media & Molecular Imaging
Volume 2019 (2019), Article ID 2641627, 9 pages
https://doi.org/10.1155/2019/2641627

Research Article

Prognostic Value of Functional Parameters of ¹⁸F-FDG-PET Images in Patients with Primary Renal/Adrenal Lymphoma

Manni Wang,¹ Hui Xu,² Liu Xiao,³ Wenpeng Song,¹ Sha Zhu,¹ and Xuelei Ma¹

¹Department of Biotherapy, State Key Laboratory of Biotherapy, Cancer Center, West China Hospital, Sichuan University, Chengdu 610041, China
²Department of Radiology, West China Hospital, Sichuan University, Chengdu 610041, China
³Department of Nuclear Medicine, West China Hospital, Sichuan University, Chengdu 610041, China

Correspondence should be addressed to Xuelei Ma; drmaxuelei@gmail.com

Received 30 December 2018; Revised 5 May 2019; Accepted 9 July 2019; Published 25 July 2019

Academic Editor: Alexander R. Haug

Copyright © 2019 Manni Wang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Objectives. The aim of this study is to explore the textural features that may identify the morphological changes in the lymphoma region and predict the prognosis of patients with primary renal lymphoma (PRL) and primary adrenal lymphoma (PAL). Methods. This retrospective study comprised nineteen non-Hodgkin’s lymphoma (NHL) patients undergoing ¹⁸F-FDG-PET/CT at West China Hospital from December 2013 to May 2017. ¹⁸F-FDG-PET images were reviewed independently by two board certificated radiologists of nuclear medicine, and the texture features were extracted from LifeX packages. The prognostic value of PET FDG-uptake parameters, patients’ baseline characteristics, and textural parameters were analyzed using Kaplan–Meier analysis. Cox regression analysis was used to identify the independent prognostic factors among the imaging and clinical features. Results. The overall survival of included patients was 18.84 ± 13.40 (mean ± SD) months. Univariate Cox analyses found that the tumor stage, GLCM (gray-level co-occurrence matrix) entropy, GLZLM_GLNU (gray-level nonuniformity), and GLZLM_ZLNU (zone length nonuniformity), values were significant predictors for OS. Among them, GLRLM_RLNU ≥216.6 demonstrated association with worse OS at multivariate analysis (HR 9.016, 95% CI 1.041–78.112, ). Conclusions. The texture analysis of ¹⁸F-FDG-PET images could potentially serve as a noninvasive strategy to predict the overall survival of patients with PRL and PAL.

1. Introduction

Renal involvement has been reported as a common situation in patients diagnosed with non-Hodgkin’s lymphoma (NHL) [1]. Primary renal lymphoma (PRL), though less common than secondary renal lymphomas [2], is an important and lethal type of extranodal lymphomas [3]. Unlike secondary renal masses which arise from invasion of an adjacent lymphomatous mass, PRL usually originates from renal parenchyma and is highly aggressive due to its rapid dissemination [4]. Currently reported symptoms include pain, anorexia, vomiting, fever, hypertension, palpable renal masses, hematuria, and acute kidney injury [4, 5]. It has been reported that the median survival of PRL is usually less than 1 year [4, 5], which may be attributed to the recurrence and neutropenia-related infection [6]. Surgical resection, chemotherapy, and consolidation radiotherapy can improve the disease-free and overall survival [7]. Likewise, primary adrenal lymphoma (PAL) is also a rare form of cancer, of which fewer than 200 cases have been reported [8], and the prognosis is generally poor [9]. Despite the rare existence of PAL and PRL, it is important to shed light on the potential factors related to their prognosis to stratify treatment among individual patients.

¹⁸F-Flourodeoxyglucose (¹⁸F-FDG) positron emission tomography (PET)/computed tomography (CT), which provides functional as well as anatomic imaging information, has long been recognized as a powerful imaging technique for the clinical evaluation and diagnosis of lymphoma [10]. However, the detection of renal lymphoma with ¹⁸F-FDG-PET remains challenging since the kidney does not carry lymphoid tissues and FDG is able to distribute into normal kidney tissues. On the contrary, limited literatures have reported the utility of ¹⁸F-FDG-PET in detecting the metabolic activity of PAL [11, 12]. The PET/CT scan has clinically been utilized to distinguish between PAL and secondary adrenal lymphomas [8] and to follow-up on treatment responses [13]. Of all the parameters of ¹⁸F-FDG-PET images, the maximum standardized uptake value (SUVmax) is one of the most commonly used indexes to predict patients’ prognosis and their therapeutic responses [14]. In addition, the metabolic tumor volume (MTV) and total lesion glycolysis (TLG) are suggested to provide more accurate prediction on the tumor burden, tumor behavior, as well as treatment response [15].

Recently, a novel technique has been proposed to help predict the clinical outcome and treatment response of various types of tumor [16, 17]. The texture analysis, based on the theory that images containing a complex visual pattern, allows the mathematic detection of the subtle spatial arrangement of the gray level among image pixels [18, 19]. Tumor uptake of ¹⁸F-FDG varies due to the necrosis, cell proliferation, microvessel density, and hypoxia within tumors [20–22]. There has been considerable interest in examining the correlation of textural features and ¹⁸F-FDG-PET parameters of PET images with survival outcomes [23–28]. Given the ability of texture analysis to detect subtle pathologic changes in an ¹⁸F-FDG-PET image, we herein compared the texture features of PET images of 19 patients with PNL or PAL. The aim of this study was to explore textural features that may potentially identify the morphological changes of lymphoma regions and predict prognosis of PNL and PAL, which to the best of our knowledge, is the first of its kind.

2. Methods

2.1. Patients

This retrospective study was approved by the institutional ethics committee of West China Hospital, Sichuan University, and no written informed consent was required. Patients with pathologically confirmed PRL or PAL who underwent ¹⁸F-FDG-PET/CT scans at West China Hospital between December 2013 and May 2017 were enrolled in this study. Patients were considered eligible based on the following criteria: (1) pathologically confirmed primary renal lymphoma or primary adrenal lymphoma via either biopsy or surgery; (2) the primary tumor with visible abnormal ¹⁸F-FDG uptake; and (3) ¹⁸FDG-PET/CT scans performed to characterize a kidney lesion or adrenal gland lesion. Patients were excluded if follow-ups were less than 12 months due to other causes of death. All patients were followed for at least 12 months according to our institutional protocol. Local recurrence and distant metastasis were confirmed with imaging techniques and, if possible, histopathologic examination by either biopsy or surgical excision. Overall survival (OS) was defined as the period between the date of diagnosis and death. Patients who did not experience recurrence or metastasis at the end of follow-ups were recorded as censored.

2.2. Imaging Protocols

Whole-body PET/CT examinations were performed before the beginning of any treatment, using a combined Gemini GXL PET/CT scanner with a 16-slice CT component (Philips Medical System, Cleveland, Ohio, USA). Original images were retrieved from the picture archiving and communication system (PACS). We uniformly used 5.0 mm slice CT images, and image processing was mainly in cross sections. All patients were instructed to fast for 6 hours (no oral or intravenous fluids containing sugar or dextrose) before examinations. Immediately before ¹⁸F-FDG injection, the blood glucose level was measured and PET/CT scans would be rescheduled if it was higher than 150 mg/dl. Image acquisition started at 60 ± 5 minutes after intravenous injection of ¹⁸F-FDG (3.7 MBq/kg). Emission data were acquired for 2 minutes per bed position. CT from the head to the feet was performed before PET which covered an identical area with CT. Image registration and fusion of PET and CT scans were carried out with Syntegra software, Philips Corp., Amsterdam. The autorandom correction and autoscatter correction were applied, and the corrected images were reconstructed with 2 2  2 mm³ voxels using line of response (LOR), without postreconstruction filtering.

2.3. Image Analysis

The focal ¹⁸F-FDG uptake at the primary tumor was reviewed independently by two board certificated radiologists specialized in nuclear medicine, blinded to the patient history. Any disagreement was resolved by a third nuclear medicine radiologist. To exclude adjacent physiological ¹⁸F-FDG-avid structures and ensure that VOI (volume of interest) was restricted to the baseline tumor, the VOI was manually drawn with consensus by three nuclear medicine-certified radiologists together. To avoid the interference of the lower image matrix resolution, the images were excluded if VOI did not reach the minimum number of 64 voxels. The SUVmax and SUVmean were defined as the maximum and mean radioactivity concentration of images enclosed by the VOI divided by the whole-body concentration of the injected radioactivity. SUVmax, SUVmean, and MTV values were then measured automatically using commercial software (Advantage Windows Workstation; GE Healthcare, Milwaukee, WI). TLG was calculated as SUVmean  MTV.

2.4. Textual Analysis

The texture analysis was performed inside the VOI retrieved from PET images. Features of the primary tumor were extracted using the LifeX package (http://www.lifexsoft.org) [29]. Given that not all of the texture parameters were helpful for the differential diagnosis [30, 31], tumor uptake heterogeneity was analyzed only with robust heterogeneity parameters according to previous reports [25, 32]. A set of 37 texture indices included (1) five histogram indices: HISTO_Skewness, HISTO_Kurtosis, HISTO_Entropy_log10, HISTO_Entropy_log12, and HISTO_Energy; (2) seven gray-level co-occurrence matrix (GLCM) features: GLCM_Homogeneity, GLCM_Energy, GLCM_Contrast, GLCM_Correlation, GLCM_Entropy_log10, GLCM_Entropy_log2, and GLCM_Dissimilarity; (3) eleven gray-level run-length matrix (GLRLM) features: GLRLM_SRE, GLRLM_LRE, GLRLM_LGRE, GLRLM_HGRE, GLRLM_SRLGE, GLRLM_SRHGE, GLRLM_LRLGE, GLRLM_LRHGE, GLRLM_GLNU, GLRLM_RLNU, and GLRLM_RP; (4) three gray-level gradient matrix (NGLDM) features: NGLDM_Coarseness, NGLDM_Contrast, and NGLDM_Busyness; (5) and eleven gray-level run-length matrix (GLZLM) features: GLZLM_SZE, GLZLM_LZE, GLZLM_LGZE, GLZLM_HGZE, GLZLM_SZLGE, GLZLM_SZHGE, GLZLM_LZLGE, GLZLM_LZHGE, GLZLM_GLNU, GLZLM_ZLNU, and GLZLM_ZP. The FDG uptake intensity data was rescaled using 64 discrete values to reduce the image noise.

2.5. Statistical Analysis

The receiver-operating-characteristic (ROC) analyses were performed, and the area under the ROC curves (AUCs) was calculated to identify the optimal cutoff values for each texture parameter. All patients were then dichotomized into high- and low-value groups using cutoff values calculated with the Youden index [33]. Survival curves were drawn with the Kaplan–Meier method, and the log-rank test was performed to testify the significance of difference between each pair of survival curves. Cox regression models were used to calculate hazard ratios (HRs) and to determine the effects of clinicopathological characteristics and selected texture parameters on OS. We first performed univariate analyses on a series of variables, followed by multivariate analyses on selected variables with significant association in the univariate analysis. The value <0.05 was considered as statistically significant, and all values presented were two-sided. All statistical analyses were performed using IBM SPSS Statistics for Windows (version 19.0, IBM Corp. Armonk, NY).

3. Results

3.1. Baseline Characteristics

Nineteen patients, 12 males and 7 females, were included in this study. The median age was 52.16 ± 15.06 years. Nine of them were alive at the end of follow-ups (December, 2017). The overall survival was 18.84 ± 13.40 (mean ± SD) months. All 19 patients had visible tumors on ¹⁸F-FDG-PET at the time of diagnosis. The ¹⁸F-FDG-SUVmax values ranged from 1.50 to 24.28, and the ¹⁸F-FDG-SUV mean ranged from 1.0 to 25.6. The ¹⁸F-FDG-MTV ranged from 1.0 to 869.2 cm³, and the corresponding ¹⁸F-FDG-TLG ranged from 3.6 to 7840.2 cm³.

A total number of 9 (47.4%) non-Hodgkin’s lymphomas developed in the kidney. 8 (42.1%) occurred in the adrenal gland, and 2 (10.5%) cases involved both organs. Based on the Ann Arbor staging system, 10.5% of patients were classified as stage I, while stage II, III, and IV patients accounted for 5.3%, 26.3%, and 57.9%, respectively. Furthermore, according to the origin of tumor cells, 13 (68.4%) lymphomas were classified as B-cell lymphoma, 5 (26.3%) as NK-cell lymphoma, and only 1 (5.3%) case as T-cell lymphoma (Table 1).

Table 1: Baseline characteristics of patients (n = 19).

Characteristics
No. of patients (%)

Age (year)
<50
8 (42.1)

≥50
11 (57.9)

Mean ± SD
52.16 ± 15.06

Sex
Male
12 (63.2)

Female
7 (36.8)

Tumor location
Kidney
9 (47.4)

Adrenal gland
8 (42.1)

Kidney + adrenal gland
2 (10.5)

Ann Arbor stage
I
2 (10.5)

II
1 (5.3)

III
5 (26.3)

IV
11 (57.9)

Subtype
B-cell lymphoma
13 (68.4)

T-cell lymphoma
1 (5.3)

NK-cell lymphoma
5 (26.3)

3.2. ROC Analyses and Cutoff Values for Parameters

The receiver-operating curve (ROC) was used to identify the optimal cutoff value of a parameter. The parameter was more likely to accurately identify a positive instance (worse prognosis) when the AUC value was high (). The ten texture parameters with the highest AUC values were considered potentially discriminative and, together with four ¹⁸F-FDG-PET parameters, were included in further analyses. By analyzing the specificity and sensitivity of each parameter, we took the optimal cutoff values of SUVmax, SUVmean, MTV, and TLG as 7.37, 7.00, 88.80, and 13.05, respectively. The AUC values of ¹⁸F-FDG-PET parameters for predicting overall survival were 0.578 () for SUVmax, 0.589 () for SUVmean, and 0.722 () for MTV, and 0.733 () for TLG. The ability of each image-based parameter to predict OS at the optimal threshold is summarized in Table 2.

Table 2: Area under ROC curves (AUCs) and optimal thresholds of ¹⁸F-FDG-PET and texture parameters to predict OS.

Parameters
AUC
95% confidence intervals
value
Optimal cutoff value

¹⁸F-FDG-PET

SUVmax
0.578
0.308–0.847
0.568
7.37

SUVmean
0.589
0.318–0.86
0.514
7.00

MTV
0.722
0.487–0.957
0.102
88.80

TLG
0.733
0.506–0.961
0.086
13.05

Texture analysis

GLCM_Correlation
0.867
0.703–1.000
0.007
0.66

GLRLM_HGRE
0.794
0.576–1.000
0.030
171.95

GLRLM_SRHGE
0.778
0.553–1.000
0.041
163.20

GLRLM_LRHGE
0.800
0.585–1.000
0.027
215.80

GLRLM_RLNU
0.878
0.719–1.000
0.006
216.60

GLZLM_HGZE
0.778
0.555–1.000
0.041
205.05

GLZLM_GLNU
0.844
0.661–1.000
0.011
2.90

GLZLM_ZLNU
0.856
0.685–1.000
0.009
9.75

HISTO_Entropy
0.800
0.582–1.000
0.027
12.60

GLCM_Entropy
0.867
0.695–1.000
0.007
71.14

As for the ten texture parameters enrolled in this study, all exhibited statistical significance in prognosis prediction (). The AUC values were 0.800 for HISTO_Entropy, 0.867 for GLCM_Entropy, 0.867 for GLCM_Correlation, 0.794 for GLRLM_HGRE (high gray-level run emphasis), 0.778 for GLRLM_SRHGE (short-run high gray-level emphasis), 0.800 for GLRLM_LRLGE (long-run high gray-level emphasis), 0.878 for GLRLM_RLNU (run-length nonuniformity), 0.778 for GLZLM_HGZE, (high gray-level zone emphasis), 0.844 for GLZLM_GLNU (gray-level nonuniformity), and 0.856 for GLZLM_ZLNU (zone length nonuniformity). The corresponding optimal cutoff values are presented in Table 2. For further analyses, patients were then dichotomized into two categories: less than and no less than the cutoff values.

3.3. Survival Prediction

The median OS for all patients was 15 (range, 9–25) months. At the end of the follow-up, nine patients eventually died and ten patients were alive. The Cox regression analyses, performed to assess the impact of each parameter on survival outcomes, are presented in Table 3. The clinicopathological characteristics including age, gender, location, stage, and tumor cell origin were all enrolled in the univariate analysis, while only the Ann Arbor stage revealed a significant association with OS. Patients of stage IV renal/adrenal lymphoma displayed worse survival outcome compared with those of stage I–III (HR 11.150, 95% CI 1.220–101.924, ). The Kaplan–Meier survival curves for the overall survival stratified by the tumor stage, GLCM_Entropy, GLZLM_GLNU, and GLRLM_RLNU are shown in Figure 1.

Table 3: Univariate and multivariate Cox regression analyses of factors associated with OS.

Variables
Median OS (month)
Univariate analysis
Multivariate analysis

HR (95% CI)

HR (95% CI)

Age (year)
<50
20.63

0.745

≥50
17.55

Gender
Male
17.00

0.347

Female
22.00

Location
Kidney
14.00

0.432

Adrenal gland
17.50

Kidney + adrenal gland
20.00

Ann Arbor stage
I∼III
27.44
11.150 (1.220–101.924)
0.033

IV
11.10

Subtype/origin
B cell
21.62

0.244

T cell
2.00

NK cell
15.00

¹⁸F-FDG-PET parameters

SUVmax
<7.37
25.20

0.264

≥7.37
16.57

SUVmean
<7.00
23.25

0.575

≥7.00
15.64

MTV
<88.80
21.13
5.044 (0.983–25.882)
0.052

≥88.80
10.25

TLG
<13.05
31.00

0.065

≥13.05
15.60

Texture features

GLCM_Correlation
<0.695
22.38
5.089 (0.911–28.421)
0.064

≥0.695
11.17

GLRLM_HGRE
<171.95
28.13

0.076

≥171.95
12.09

GLRLM_SRHGE
<163.2
28.13

0.076

≥163.2
12.09

GLRLM_LRHGE
<215.8
28.13

0.076

≥215.8
12.09

GLRLM_RLNU
<216.6
25.00
9.016 (1.041–78.112)
0.046
9.016 (1.041–78.112)
0.046

≥216.6
10.38

GLZLM_HGZE
<205.05
28.13

0.076

≥205.05
12.09

GLZLM_GLNU
<2.9
30.43
9.366 (1.096–80.051)
0.041

≥2.9
12.08

GLZLM_ZLNU
<9.75
28.13

0.076

≥9.75
12.09

HISTO_Entropy
<12.6
28.13

0.076

≥12.6
12.09

GLCM_Entropy
<71.14
27.22
5.639 (1.051–30.244)
0.044

≥71.14
11.30

∗p < 0.05.

(a)

(b)

(c)

(d)

Figure 1: Kaplan–Meier survival curves of the overall survival of patients with PAL and PNL. Stages: (a) GLCM_Entropy, (b) GLZLM_GLNU, and (c) GLRLM_RLNU. (d) The significant differences are demonstrated in each parameter.

The four ¹⁸F-FDG-PET parameters, SUVmax, SUVmean, MTV, and TLG, were also enrolled in the univariate Cox analysis. Although a longer mean OS was observed in the low MTV group compared with the high MTV group (21.13 vs. 10.25 months), the difference failed to demonstrate a statistical significance (). The univariate analysis suggested the association between texture parameters and OS of patients with PAL and PRL. High values of GLRLM_RLNU were significantly correlated with poorer OS (25.00 vs. 10.38 months, ). Moreover, compared with that of the high GLZLM_GLNU group, the OS was markedly improved in patients with low GLZLM_GLNU (30.43 months vs. 12.08 months, ). The low GLCM_Entropy value served as another potential predictor for favorable prognosis (27.22 months vs. 11.30 months, ).

The multivariate analysis was accordingly performed to identify any independent prognostic factors for PAL and PRL. Potential factors enrolled in the multivariate analysis included the tumor stage, GLRLM_RLNU, GLZLM_GLNU, and GLCM_Entropy values. Among them, the GLRLM_RLNU ≥216.6 showed a significant association with patients’ survival outcome in multivariate analysis (HR 9.016, 95% CI 1.041–78.112, ). However, none of the other texture parameters appeared to be independent predictors for the prognosis of the patients with primary renal/adrenal lymphoma. The representative ¹⁸F-FDG-PET/CT images of patients with relatively long overall survival are shown in Figure 2.

(a)

(b)

(c)

Figure 2: ¹⁸F-FDG-PET/CT images of a 63-year-old male patient with non-Hodgkin’s lymphoma on the left adrenal gland. He was alive at the end of our follow-ups with no disease progression. The green lines represent the borders of the VOI. The GLRLM_RLNU value of his PET images was 55.8 (lower than our cutoff value 216.6)

4. Discussion

The prognosis prediction before treatment can be of great value to modulate treatment strategies and therefore optimize therapeutic results. The aim of this study was to explore textural features that may potentially identify the morphological changes of the lymphoma region and predict prognosis of PNL and PAL. To the best of our knowledge, this is the first study to examine the correlation of baseline ¹⁸F-FDG-PET image-based parameters including the uptake indices (SUVmax, SUVmean, MTV, and TLG) and 37 texture parameters with the survival outcomes of PRL and PAL.

The results from our study suggest a potential association between the PET image-derived parameters with OS in patients with renal and adrenal NHL. The tumor stage, GLRLM_RLNU, GLZLM_GLNU, and GLCM_Entropy values, were shown as significant predictors for OS at the univariate analysis. After adjusting for the above variables, the high level of GLRLM_RLNU was shown to be independently associated with poor survival. These results suggested that PET texture analysis could potentially be utilized as an independent indicator for the prognosis of patients with PRL and PRL. In terms of survival prediction, image-derived texture features outperformed ¹⁸F-FDG-uptake indices and common clinical predictors including Ann Arbor staging. Our findings are in line with a recent study that revealed no significant interaction between pretreatment FDG-uptake values and the survival of patients with HL and aggressive NHL [34]. On the contrary, one study reported that MTV, but not other uptake parameters, was an independent prognostic factor for patients with esophageal cancer [35]. In our study, although the MTV lacks statistical significance for the correlation with OS (), other parameters including SUVmax, SUVmean, and TLG demonstrated higher values. In another study, MTV was not an independent factor for prognosis in patients with esophageal cancer [36]. All these differences may be attributed to the different study populations.

Previous studies reporting PRL and PAL cases have demonstrated the rare existence of PRL and PAL [5, 7, 13]. Due to the absence of lymphatic tissues in the kidney, PRL has long been questioned about its existence. Several theories on the origin of PRL have been proposed. One possible mechanism appears to involve the chronic inflammation of the kidney promoting the invasion of lymphoid cells, followed by the oncogenic transformation of those cells in situ. Another potential mechanism focuses on that lymphatic channels surrounding the renal capsule from which renal lymphomas originate and infiltrate the renal parenchyma [37]. Currently, the Ann Arbor method [38], first introduced in 1971 and revised in 1989 to incorporate the “Cotswolds modifications,” is the most widely accepted staging system for both Hodgkin lymphoma and non-Hodgkin lymphoma [39, 40]. It divides Hodgkin lymphoma (HL) patients into four stages with subclassifications of A or B based on the presence of disease-related symptoms such as fevers to greater than 101°F (38.3°C), weight loss, and night sweats [41]. Considering the low survival rate of PRL and PAL patients [5, 42], prediction of prognosis could be of great significance to optimize the clinical management of PRL patients.

Although the texture analysis has recently been identified as a noninvasive approach that simultaneously provides information at the image acquisition, very limited studies have highlighted its role in lymphoma using radiological images such as PET, CT (computed tomography), and MRI (magnetic resonance imaging). Textural features of pretreatment FDG-PET images are able to predict cancer recurrence and patient survival [43–45]. On the contrary, PET image-derived parameters such as SUVmax are also commonly utilized in radiomic studies [46]. Patients’ clinicopathological characteristics should be concomitantly analyzed, given that they might also have an influence in image variables and textural features [47]. Numerous efforts have been undertaken in molecular imaging with ¹⁸F-FDG-PET which helps stratify diagnosis, staging, and response assessment in lymphoma patients [48, 49]. It is suggested that a baseline pretreatment scan should be undertaken to allow meaningful comparison before and after treatment [50, 51]. Clinically, the ¹⁸F-FDG-PET is not only used in predicting treatment outcome of patients with solid tumors but also widely used in FDG-avid lymphoma with indications depending on specific diagnosis and presentation. On some occasions such as organ involvement, the ¹⁸F-FDG-PET/CT displays superior accuracy to the CT scan alone, where PET/CT showed sensitivity of 88% and specificity of 100% versus sensitivity of 50% and specificity of 90% with contrast-enhanced CT alone [52].

The major limitation of our study is the relatively small sample size. The primary adrenal/renal lymphoma is rare and less commonly seen than the secondary adrenal/renal lymphoma, which results in the limited number of patients we and other studies could reach [34]. Another limitation is that this study only included NHL patients, while the mixed nature of different lymphoma subtypes (HL and UHL) could possibly influence the results. However, a previous study suggested that there was no significant difference in CT texture analysis indices between HL and NHL. It is therefore interesting to explore whether the differences exist in PET images. Future studies with larger sample size are warranted to evaluate the prognostic value of PET image-texture analysis in more lymphoma types.

5. Conclusions

Despite the rarity of their existence, it is intriguing to speculate the prognostic factors of the PRL and PAL. Our findings demonstrate that the radiomic parameters derived from baseline PET images, such as GLRLM_RLNU, GLZLM_GLNU, and GLCM_Entropy, were predictive of overall survival in patients. Therefore, the texture analysis of ¹⁸F-FDG-PET images could potentially serve as a noninvasive strategy to predict the overall survival of patients with PRL and PAL. Further studies with a larger sample size are warranted to validate this predictive model.

Data Availability

The data used to support the findings of this study are available from the corresponding author upon request.

Ethical Approval

All procedures performed in this study involving human participants were in accordance with the ethical standards of the institutional and/or national research committee and with the 1964 Helsinki declaration and its later amendments or comparable ethical standards. In this retrospective study, the institutional review board approved this retrospective study.

Conflicts of Interest

The authors declare that there are no conflicts of interest.

References

A. Ladha and G. Haider, “Primary renal lymphoma,” Journal of the College of Physicians and Surgeons—Pakistan: JCPSP, vol. 18, no. 9, pp. 584-585, 2008.

J. N. Eble, G. Sauter, J. I. Epstein, and I. A. Sesterhenn, “World health organization classifcation of tumours,” in Pathology and Genetics of Tumours of the Urinary System and Male Genital Organs, pp. 85-86, IARC Press, Lyon, France, 2004.

A. B. Porcaro, A. D’Amico, G. Novella et al., “Primary lymphoma of the kidney: report of a case and update of the literature,” Archivio Italiano di Urologia, Andrologia: Organo Ufficiale [di] Societa Italiana di Ecografia Urologica e Nefrologica, vol. 74, no. 1, pp. 44–47, 2002.

S. H. Okuno, J. D. Hoyer, K. Ristow, and T. E. Witzig, “Primary renal non-Hodgkin’s lymphoma. an unusual extranodal site,” Cancer, vol. 75, no. 9, pp. 2258–2261, 1995.

L. B. Kandel, D. L. McCullough, L. H. Harrison, R. D. Woodruff, E. T. Ahl Jr., and H. A. Munitz, “Primary renal lymphoma. does it exist?” Cancer, vol. 60, no. 3, pp. 386–391, 1987.

C. M. Rissman, L. M. Dagrosa, J. R. Pettus, J. L. Dillon, and E. F. Sverrisson, “Primary renal lymphoma: an unusual finding following radical nephrectomy,” Clinical Nephrology—Case Studies, vol. 5, pp. 1–4, 2017.

A. Cupisti, R. Riccioni, G. Carulli et al., “Bilateral primary renal lymphoma treated by surgery and chemotherapy,” Nephrology Dialysis Transplantation, vol. 19, no. 6, pp. 1629–1633, 2004.

A. Rashidi and S. I. Fisher, “Primary adrenal lymphoma: a systematic review,” Annals of Hematology, vol. 92, no. 12, pp. 1583–1593, 2013.

A. Ozimek, J. Diebold, R. Linke, J. Heyn, K. K. Hallfeldt, and T. Mussack, “Bilateral primary adrenal non-Hodgkin’s lymphoma—a case report and review of the literature,” European Journal of Medical Research, vol. 13, no. 5, pp. 221–228, 2008.

M. E. Juweid, S. Stroobants, O. S. Hoekstra et al., “Use of positron emission tomography for response assessment of lymphoma: consensus of the imaging subcommittee of international harmonization project in lymphoma,” Journal of Clinical Oncology, vol. 25, no. 5, pp. 571–578, 2007.

R. Kumar, Y. Xiu, A. Mavi, G. El-Haddad, H. Zhuang, and A. Alavi, “FDG-PET imaging in primary bilateral adrenal lymphoma: a case report and review of the literature,” Clinical Nuclear Medicine, vol. 30, no. 4, pp. 222–230, 2005.

H.-B. Wu, Q.-S. Wang, M.-F. Wang et al., “Utility of 18F-FDG PET/CT for staging NK/T-cell lymphomas,” Nuclear Medicine Communications, vol. 31, no. 3, pp. 195–200, 2010.

R. Kasaliwal, M. Goroshi, K. Khadilkar et al., “Primary adrenal lymphoma: a single-center experience,” Endocrine Practice, vol. 21, no. 7, pp. 719–724, 2015.

H. Kato and M. Nakajima, “The efficacy of FDG-PET for the management of esophageal cancer: review article,” Annals of Thoracic and Cardiovascular Surgery, vol. 18, no. 5, pp. 412–419, 2012.

M. Hatt, D. Visvikis, O. Pradier, and C. Cheze-le Rest, “Baseline 18F-FDG PET image-derived parameters for therapy response prediction in oesophageal cancer,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 38, no. 9, pp. 1595–1606, 2011.

S. H. Hyun, H. S. Kim, S. H. Choi et al., “Intratumoral heterogeneity of 18F-FDG uptake predicts survival in patients with pancreatic ductal adenocarcinoma,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 43, no. 8, pp. 1461–1468, 2016.

N.-M. Cheng, Y.-H. Dean Fang, J. Tung-Chieh Chang et al., “Textural features of pretreatment 18F-FDG PET/CT images: prognostic significance in patients with advanced T-stage oropharyngeal squamous cell carcinoma,” Journal of Nuclear Medicine, vol. 54, no. 10, pp. 1703–1709, 2013.

X. Tang, “Texture information in run-length matrices,” IEEE Transactions on Image Processing, vol. 7, no. 11, pp. 1602–1609, 1998.

K. Buch, A. Fujita, B. Li, Y. Kawashima, M. M. Qureshi, and O. Sakai, “Using texture analysis to determine human papillomavirus status of oropharyngeal squamous cell carcinomas on CT,” American Journal of Neuroradiology, vol. 36, no. 7, pp. 1343–1348, 2015.

A. Pugachev, S. Ruan, S. Carlin et al., “Dependence of FDG uptake on tumor microenvironment,” International Journal of Radiation Oncology∗Biology∗Physics, vol. 62, no. 2, pp. 545–553, 2005.

A. van Baardwijk, G. Bosmans, R. J. van Suylen et al., “Correlation of intra-tumour heterogeneity on 18F-FDG PET with pathologic features in non-small cell lung cancer: a feasibility study,” Radiotherapy and Oncology, vol. 87, no. 1, pp. 55–58, 2008.

F. H. P. van Velden, P. Cheebsumon, M. Yaqub et al., “Evaluation of a cumulative SUV-volume histogram method for parameterizing heterogeneous intratumoural FDG uptake in non-small cell lung cancer PET studies,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 38, no. 9, pp. 1636–1647, 2011.

F. Tixier, C. C. Le Rest, M. Hatt et al., “Intratumor heterogeneity characterized by textural features on baseline 18F-FDG PET images predicts response to concomitant radiochemotherapy in esophageal cancer,” Journal of Nuclear Medicine, vol. 52, no. 3, pp. 369–378, 2011.

S. Tan, S. Kligerman, W. Chen et al., “Spatial-temporal [18F]FDG-PET features for predicting pathologic response of esophageal cancer to neoadjuvant chemoradiation therapy,” International Journal of Radiation Oncology∗Biology∗Physics, vol. 85, no. 5, pp. 1375–1382, 2013.

M. Hatt, F. Tixier, C. Cheze Le Rest, O. Pradier, and D. Visvikis, “Robustness of intratumour 18F-FDG PET uptake heterogeneity quantification for therapy response prediction in oesophageal carcinoma,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 40, no. 11, pp. 1662–1671, 2013.

S. S. F. Yip, T. P. Coroller, N. N. Sanford et al., “Use of registration-based contour propagation in texture analysis for esophageal cancer pathologic response prediction,” Physics in Medicine and Biology, vol. 61, no. 2, pp. 906–922, 2016.

G. Doumou, M. Siddique, C. Tsoumpas, V. Goh, and G. J. Cook, “The precision of textural analysis in 18F-FDG-PET scans of oesophageal cancer,” European Radiology, vol. 25, no. 9, pp. 2805–2812, 2015.

M. Hatt, M. Majdoub, M. Vallieres et al., “18F-FDG PET uptake characterization through texture analysis: investigating the complementary nature of heterogeneity and functional tumor volume in a multi-cancer site patient cohort,” Journal of Nuclear Medicine, vol. 56, no. 1, pp. 38–44, 2015.

F. Orlhac, C. Nioche, and I. Buvat, Technical Appendix—Local Image Features Extraction—LIFEx, IMIV, CEA, Inserm, CNRS, Univ. Paris-Sud, Université Paris Saclay, CEA-SHFJ, Orsay, France, 2016.

U. Bashir, M. M. Siddique, E. McLean, V. Goh, and G. J. Cook, “Imaging heterogeneity in lung cancer: techniques, applications, and challenges,” American Journal of Roentgenology, vol. 207, no. 3, pp. 534–543, 2016.

R. Boellaard, R. Delgado-Bolton, W. J. G. Oyen et al., “FDG PET/CT: EANM procedure guidelines for tumour imaging: version 2.0,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 42, no. 2, pp. 328–354, 2015.

F. Tixier, M. Hatt, C. C. Le Rest, A. Le Pogam, L. Corcos, and D. Visvikis, “Reproducibility of tumor uptake heterogeneity characterization through textural feature analysis in 18F-FDG PET,” Journal of Nuclear Medicine, vol. 53, no. 5, pp. 693–700, 2012.

W. J. Youden, “Index for rating diagnostic tests,” Cancer, vol. 3, no. 1, pp. 32–35, 1950.

B. Ganeshan, K. A. Miles, S. Babikir et al., “CT-based texture analysis potentially provides prognostic information complementary to interim FDG-PET for patients with Hodgkin’s and aggressive non-Hodgkin’s lymphomas,” European Radiology, vol. 27, no. 3, pp. 1012–1020, 2017.

S. H. Hyun, J. Y. Choi, Y. M. Shim et al., “Prognostic value of metabolic tumor volume measured by 18F-fluorodeoxyglucose positron emission tomography in patients with esophageal carcinoma,” Annals of Surgical Oncology, vol. 17, no. 1, pp. 115–122, 2010.

M. Nakajo, M. Jinguji, Y. Nakabeppu et al., “Texture analysis of 18F-FDG PET/CT to predict tumour response and prognosis of patients with esophageal cancer treated by chemoradiotherapy,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 44, no. 2, pp. 206–214, 2017.

A. M. Becker, D. C. Bowers, L. R. Margraf, J. Emmons, and M. Baum, “Primary renal lymphoma presenting with hypertension,” Pediatric Blood & Cancer, vol. 48, no. 7, pp. 711–713, 2007.

S. A. Rosenberg, “Validity of the Ann Arbor staging classification for the non-Hodgkin’s lymphomas,” Cancer Treatment Reports, vol. 61, no. 6, pp. 1023–1027, 1977.

W. Townsend and D. Linch, “Hodgkin’s lymphoma in adults,” The Lancet, vol. 380, no. 9844, pp. 836–847, 2012.

M. J. Matasar and A. D. Zelenetz, “Overview of lymphoma diagnosis and management,” Radiologic Clinics of North America, vol. 46, no. 2, pp. 175–198, 2008.

B. D. Cheson, R. I. Fisher, S. F. Barrington et al., “Recommendations for initial evaluation, staging, and response assessment of Hodgkin and non-Hodgkin lymphoma: the Lugano classification,” Journal of Clinical Oncology, vol. 32, no. 27, pp. 3059–3067, 2014.

K. Kacem, S. Zriba, R. B. Lakhal, W. Bouteraa, L. Aissaoui, and R. B. Amor, “Primary adrenal lymphoma,” Turkish Journal of Hematology, vol. 31, no. 2, pp. 188–191, 2014.

D.-H. Kim, J.-H. Jung, S. H. Son et al., “Prognostic significance of intratumoral metabolic heterogeneity on 18F-FDG PET/CT in pathological N0 non-small cell lung cancer,” Clinical Nuclear Medicine, vol. 40, no. 9, pp. 708–714, 2015.

F. Tixier, M. Hatt, C. Valla et al., “Visual versus quantitative assessment of intratumor 18F-FDG PET uptake heterogeneity: prognostic value in non-small cell lung cancer,” Journal of Nuclear Medicine, vol. 55, no. 8, pp. 1235–1241, 2014.

I. Apostolova, J. Rogasch, R. Buchert et al., “Quantitative assessment of the asphericity of pretherapeutic FDG uptake as an independent predictor of outcome in NSCLC,” BMC Cancer, vol. 14, no. 1, p. 896, 2014.

H. J. Aerts, E. R. Velazquez, R. T. Leijenaar et al., “Decoding tumour phenotype by noninvasive imaging using a quantitative radiomics approach,” Nature Communications, vol. 5, no. 1, p. 4006, 2014.

R. T. H. M. Larue, G. Defraene, D. De Ruysscher, P. Lambin, and W. van Elmpt, “Quantitative radiomics studies for tissue characterization: a review of technology and methodological procedures,” British Journal of Radiology, vol. 90, no. 1070, Article ID 20, 2017.

S. F. Barrington, N. G. Mikhaeel, L. Kostakoglu et al., “Role of imaging in the staging and response assessment of lymphoma: consensus of the international conference on malignant lymphomas imaging working group,” Journal of Clinical Oncology, vol. 32, no. 27, pp. 3048–3058, 2014.

L. Kostakoglu and B. D. Cheson, “Current role of FDG PET/CT in lymphoma,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 41, no. 5, pp. 1004–1027, 2014.

H. Quarles van Ufford, O. Hoekstra, M. de Haas et al., “On the added value of baseline FDG-PET in malignant lymphoma,” Molecular Imaging and Biology, vol. 12, no. 2, pp. 225–232, 2010.

M. Meignan, E. Itti, S. Bardet et al., “Development and application of a real-time on-line blinded independent central review of interim PET scans to determine treatment allocation in lymphoma trials,” Journal of Clinical Oncology, vol. 27, no. 16, pp. 2739–2741, 2009.

N. G. Schaefer, T. F. Hany, C. Taverna et al., “Non-Hodgkin lymphoma and hodgkin disease: coregistered FDG PET and CT at staging and restaging—do we need contrast-enhanced CT?” Radiology, vol. 232, no. 3, pp. 823–829, 2004.