Computational and Mathematical Methods in Medicine
Volume 2016 (2016), Article ID 6943797, 1 page
http://dx.doi.org/10.1155/2016/6943797

Corrigendum

Corrigendum to “Solution of Radiative Transfer Equation with a Continuous and Stochastic Varying Refractive Index by Legendre Transform Method”

R. Baazaoui¹ and M. Gantri²

¹Department of Mathematics, Faculty of Sciences of Tunis, Tunis El-Manar University, 1060 Tunis, Tunisia
²Unit of Thermal Radiation, Department of Physics, Faculty of Sciences of Tunis, Tunis El-Manar University, 1060 Tunis, Tunisia

Received 15 November 2015; Accepted 8 August 2016

Copyright © 2016 R. Baazaoui and M. Gantri. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Through this corrigendum the authors declare that a version of this article entitled “Solution of Radiative Transfer Equation with a Continuous and Stochastic Varying Refractive Index by Legendre Transform Method” [1] that was published elsewhere has been retracted [2]. One of the authors of that article was missing from this article. The correct list of the authors and their affiliations are as shown above.

References

M. Gantri, “Solution of radiative transfer equation with a continuous and stochastic varying refractive index by Legendre transform method,” Computational and Mathematical Methods in Medicine, vol. 2014, Article ID 814929, 7 pages, 2014.

“Retraction notice,” Applied Mathematical Sciences, vol. 9, no. 108, p. 5399, 2015, Hikari Ltd., Ruse, Bulgaria, http://www.m-hikari.com/ams/ams-2015/ams-105-108-2015/noteAMS105-108-2015.pdf