Computational and Mathematical Methods in Medicine
Volume 2018 (2018), Article ID 6125289, 13 pages
https://doi.org/10.1155/2018/6125289

Review Article

Computer-Aided Diagnosis of Acute Lymphoblastic Leukaemia

Sarmad Shafique and Samabia Tehsin

Department of Computer Science, Bahria University, Islamabad, Pakistan

Correspondence should be addressed to Sarmad Shafique; sarmadkashmiri05@gmail.com and Samabia Tehsin; tsamabia@yahoo.com

Received 24 August 2017; Revised 31 December 2017; Accepted 31 January 2018; Published 28 February 2018

Academic Editor: Ruisheng Wang

Copyright © 2018 Sarmad Shafique and Samabia Tehsin. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Leukaemia is a form of blood cancer which affects the white blood cells and damages the bone marrow. Usually complete blood count (CBC) and bone marrow aspiration are used to diagnose the acute lymphoblastic leukaemia. It can be a fatal disease if not diagnosed at the earlier stage. In practice, manual microscopic evaluation of stained sample slide is used for diagnosis of leukaemia. But manual diagnostic methods are time-consuming, less accurate, and prone to errors due to various human factors like stress, fatigue, and so forth. Therefore, different automated systems have been proposed to wrestle the glitches in the manual diagnostic methods. In recent past, some computer-aided leukaemia diagnosis methods are presented. These automated systems are fast, reliable, and accurate as compared to manual diagnosis methods. This paper presents review of computer-aided diagnosis systems regarding their methodologies that include enhancement, segmentation, feature extraction, classification, and accuracy.

1. Introduction

Leukaemia is a cancerous growth of abnormal white cells which damages the blood and bone marrow. This rapid production of immature white blood cells (lymphoblast) disturbs the immune system of the body and reduces the bone marrow’s ability to produce red blood cells and platelets [1]. Moreover, these abnormal leukaemia cells generally spread into the blood rapidly and can also invade other body parts like spleen, liver, kidney, lymph nodes, and brain, which may lead to other forms of cancer.

Diagnosis of leukaemia usually depends on the complete blood count (CBC) in which doctors check the complete count of white blood cells, red blood cells, and platelets. This complete blood count test may show leukaemia cells, but, in most cases, it is not enough for doctors to confirm that the patient has leukaemia. So, they have to use different methods including bone marrow aspiration [2] and microscopic examining of blood smear [3]. But all these manual methods require a lot of effort and time. Also, highly trained medical professionals are required to perform these types of examining and hence it is labor-intensive task. On the contrary, automated diagnostic systems can overthrow these problems of manual diagnosis. Furthermore, it will reduce the burden of medical professional and will provide accurate and effective results as compared to manual diagnosing.

Leukaemia is classified as either lymphocytic or myelogenous depending on which white blood cell (WBC) type is affected. If the immature cells are granulocytes and monocytes, then the leukaemia will be classified as myelogenous. If the immature cells are lymphocytes, then the leukaemia is classified as lymphocytic [4]. According to French American British (FAB) classification, acute lymphoblastic leukaemia is further categorized into 3 subtypes: L1, L2, and L3. These subtypes have different properties; for example, L1 type cells are usually small in size and are of similar shape with little cytoplasm. Their nucleus is circular and well structured. L2 type cells are different in shape and are usually larger than the L1 type cells. Their nucleus is irregular and they have variations in their cytoplasm. L3 type cells are of same shape and normal size with circular or oval shape nucleus. They have fair amount of cytoplasm which contains vacuoles. They are usually larger than L1.

Despite advancement, microscopic examination of blood smear still remains standard and hence economical method for leukaemia diagnosis. But this method of manual diagnosis depends on the operator, that is, his experience, exhaustion, personal issues, and so forth. Hence, these factors will significantly affect the outcome. So, there should be some effective and vigorous automated system for screening of leukaemia through which output results can be considerably improved without effect of operator’s intervention. Furthermore, automated systems as compared to manual diagnosis can increase the accuracy and the speed of diagnosing. This will help the doctors to treat the leukaemia in more efficient manners. These methods can also play a vital rule in rural and underprivileged areas, where medical experts are not available.

This paper presents a detailed review of computer-aided acute lymphoblastic leukaemia (ALL) diagnosis methodology. This research also analyses and compares different methods over a range of parameters. This paper is organized as follows. Section 2 describes materials and methods in the current literature including preprocessing techniques, segmentation methods, feature extraction, and classification methods. Section 3 provides the discussion and analysis of work and Section 4 concludes the research.

2. Materials and Methods

Digital histopathology has witnessed a lot of improvement in the recent years. With the new technological advancement, much effective methods have been proposed for automated microscopic image analysis. Due to this development, computer-aided detection (CAD) is becoming a reliable method for ALL detection.

CAD system for ALL detection can be divided into four phases, namely, preprocessing, segmentation, feature extraction, and classification. This section provides a detailed survey of different techniques and methods that have been proposed, developed, and used in the automatic detection of acute lymphocytic leukaemia cell.

2.1. Preprocessing

In preprocessing step, image is enhanced and its quality is improved so that it can be accurately segmented and classified. There are lot of factors that adversely affect the quality of images, that is, false background, salt or pepper noise, and low contrast. These factors may occur due to the mishandling of camera, poor lightening conditions, and so forth. Different techniques are proposed by the researcher to detect these factors and to make the blood images suitable for the segmentation [5]. Histogram equalization is a very common method that utilizes the image histogram to adjust the contrast of image. This method is suitable for enhancing dark background/foreground and low contrast blood smear images [6]. Another very common technique is linear contrast stretching in which the intensity range of an image is extended to enhance the image. It is also called normalization of image. Many researchers have used this technique to enhance the quality of microscopic blood images by increasing the contrast [7, 8]. Selective median filtering with unsharp masking technique has been presented by Patil and Raskar which removes the noise from the images but maintains the edges, which helps to better identify the leukocytes and lymphocytes during the segmentation [9]. Many studies use minimum filter, which is used to highlight the lighter object to darker shade so that they can be easily recognized during segmentation process [10]. Another filter called order statistical filter is also used for the preprocessing of microscopic blood images, which removes the exponential noise as well as salt and pepper noise [11]. Gaussian filter with standard deviation is also applied, which reduces the noise and unwanted detail from the blood image to improve the accuracy for the efficient ALL identification [12]. Advantages and disadvantages of these methods are discussed in Table 1.

Table 1: Advantages and disadvantages of different preprocessing methods.

Method
Advantages
Disadvantages

Histogram equalization
Simple technique to enhance the contrast of an image by utilizing its histogram. Useful for images having darker or brighter background and foreground.
It is only useful if the input image has low contrast; otherwise it can reduce the image quality. It cannot discriminate between noise and actual image, which can increases the contrast of noise.

Linear contrast stretching
Enhance the contrast of image by extending dynamic range of intensity values. Useful for low contrast images.
Main disadvantage of linear contrast stretching is that it is vulnerable to noise. An image having single outlier pixel can reduce the effectiveness of this operation.

Median filter
Popular nonlinear filter for removing salt and pepper noise. Useful for preserving sharp edges of image.
Only useful for images having low density noise. It cannot perform well for the images having high percentage of salt and pepper noise.

Minimum filter
Easy to implement. Useful for removing salt noise from the images.
Can remove image detail if images are highly noisy.

Gaussian filter
Useful for removing blur and noise from the images.
If used alone can blur the edges and reduce the contrast of images.

Unsharp masking
Simple method for image sharpening. Remove blurriness from the image.
Highly sensitive to noise because of linear high pass filter.

2.2. Lymphocyte Segmentation

Segmentation is the process of segregating the image into different regions through which we can easily understand the different parts of that image and we can analyse our region of interest from the segmented image [33]. Different pixels of the segmented image can have different labels which distinguish them from each other and the pixels having the same labels can share the characteristics of the pixels. Image segmentation is the significant part of acute lymphoblastic leukaemia detection, because based on precise segmentation a classifier will be able to classify the normal and blast cells accurately [34]. Plenty of image segmentation techniques have been presented in the literature to segment out white blood cells and lymphocytes to detect blast cells. Different methods for lymphocytes segmentation have been depicted in Figure 1.

Figure 1: Lymphocyte segmentation methods.

2.2.1. K-Means Clustering

-means clustering is a semisupervised learning technique that is used when your data is not labeled. This algorithm is used to divide the image into clusters by using observations so that the objects in the same cluster are as close as possible and objects in the different cluster are different from other cluster’s objects. This method has been used in the leukaemia blood image segmentation to extract the WBCs and lymphocytes from the image [35, 36].

Assume an initial set of elements is given, and are -means at time stamp 1; then the algorithm will be processed by alternating among the following 2 steps.

1st Step: Assignment. Accurately assign each observation to the nearest mean cluster.

Mathematically it can be defined as

where each of the observations will be assigned to one .

2nd Step: Update. Now for the centroid of the observation calculate the new mean in the new cluster.

This loop will continue till there is no/minimal difference in mean between two consecutive iterations.

2.2.2. Fuzzy -Means Clustering

Fuzzy -means is the generalized form of -means clustering. Unlike -means clustering where each data point has its separate cluster, fuzzy -means allow each data point to have same cluster. Fuzzy -means is widely used in medical image segmentation because medical images have some signs of noise which is difficult for the hard clustering to tackle because in hard clusters like -means clustering we have to define final number of clusters; therefore they are sensitive to outliers [37]. On the other hand, fuzzy -means takes more time as compared to -means because of its fuzzy calculation measures. In ALL detection, this soft clustering algorithm plays a vital role because most of the leukaemia blood images have noise and sign of illumination, so fuzzy -means gives better result, which helps in better classification of the disease but may take more time than -means [26]. The basic fuzzy -means algorithm is as follows:

(1)Pick the desired number of clusters.(2)Randomly assign each data point to the cluster.(3)Repeat steps and until no more data points are left.

Fuzzy -means algorithm divides number of elements into fuzzy -clusters and a partition matrix ,  , , where every element tells to what degree element belongs to cluster with respect to some given criteria.

Mathematically it can be defined as

where

2.2.3. Watershed Segmentation

Watershed is an image segmentation method that usually starts from the initial pixel called marker and uniformly deluges all the other neighboring pixels of that marker known as catchment basin. These basins are separated by the watershed, which will partition them into different regions or pixels. It is also categorized as region based segmentation technique [38]. Watershed segmentation is used in medical image processing because most of the WBCs in microscopic images are overlapping with each other; therefore they need to be separated in order to get better classification results. The main advantage of this method over other methods is that the regions that form from the resulting boundaries are closed and connected as compared to traditional edge based techniques that produce the boundaries which are disconnected and often need postprocessing to form closed regions [39]. Although watershed segmentation is a very simple technique and is suitable for parallel processing, due to existence of local minima, it can produce oversegmentation. So, for acute lymphoblastic leukaemia detection, most of the studies have used marker controlled watershed segmentation to segment out the leukaemia cells [40], which use predefined internal and external markers. In marker controlled watershed boundaries can be predefined or they can be defined as ridges between external and internal markers. External marker in this method is manually defined according to our object of interest and internal marker is automatically obtained by the combination of different techniques like thresholding, edge detection, and morphological operations. This method will tackle the oversegmentation problem and help in segmenting the objects with closed form [41]. Mathematically it can be written as

where is the lower slope of image at pixel and is the neighboring pixel set of the pixel and is the watershed distance between and . If , the LS (lower slope) will be assigned zero. The cost from pixel to can be calculated as

2.2.4. Thresholding

Thresholding is another effective image segmentation method that is used to convert the gray scale image into binary image. By partitioning the image into background and foreground, we can easily eliminate its background to get our desired objects. If an image has high contrast, then the thresholding will be very effective for its segmentation [42]. This method works with a standard threshold value; if the intensity value of the image is less than the threshold value, then the value will be zero, that is, convert to black color, and if the value of the intensity level is greater than the threshold value, then the intensity value will be converted to white. Thus, this will generate a binary image with separated foreground and background, which will help in better understanding of the image [43]. Mathematically, it can be written as

where is the original grey scale image with th pixel value in the image. is the binary image if is a global threshold value.

In medical image segmentation, thresholding is an effective method for image segmentation. For acute lymphoblastic leukaemia detection, one of the most used thresholding techniques is Otsu’s method, which finds the optimal threshold value by the minimal variance in the class to separate the lymphocytes from the blood leukaemia image [44]. Although Otsu’s thresholding gives good results, being a global thresholding technique it can blur the local edges of blood cells, so to avoid this problem different edge-preserving filters are used to preserve sharp edges of blood cells. Another triangle oriented thresholding method has been used for lymphocytes detection by using Zack’s algorithm. This algorithm constructs a line between highest histogram value of the image and lowest histogram value through which an optimal threshold value is calculated and image is segmented based on that threshold value [45]. For acute lymphoblastic leukaemia detection, Otsu’s thresholding [16, 21] method performs better and provides 93% overall accuracy as compared to Zack’s algorithm [17, 29] that is able to achieve 92% results.

2.2.5. Region Growing

It is a region based segmentation technique that is used to select the region of interest from the image by using predefined conditions. By utilizing edge detail of an image, a condition can be defined for region of interest selection [46]. It is also called pixel based segmentation because an initial pixel is selected in the image and then its neighboring pixels that are connected with the initial pixel having the same intensity value are selected as a region of interest. However, selecting the pixels manually is not a proficient approach. But still it is widely used in the medical image segmentation for picking tumor cells from the microscopic image [47].

Region growing is basically used to divide the image into different regions. Its basic formula is as follows:

(a)(b) is a connected region, .(c) for all .(d) = TRUE for .(e) = FALSE for any adjacent region and .

(a) shows that every pixel should be the part of the same region. (b) indicates that all pixels in the region should be connected; (c) shows that all the regions must be disjoint from each other. (d) shows properties that should be true or false with respect to some criteria. (e) indicates that the regions should be different with respect to predicate .

2.2.6. Morphology

Morphology or mathematical morphology is a set theory based technique that is used to extract different components from the image for the better representation and description for the shapes and regions [48]. Morphological image processing deals with the shape of different objects in an image by using some specific image processing techniques. The basic idea behind the morphology is to slide a predefined small shape called structuring element over the image so that we can get our desired result depending on whether the structuring elements fit or miss over the image [49].

There are two basic morphological operators, which are erosion and dilation . Let be a binary image and let be a structuring element. Then the erosion and dilation of the binary image with the structuring element can be defined as

Erosion is basically used to shrink the foreground objects and smooth their boundaries. Dilation expands the foreground objects and smoothens their boundaries and fills the small holes and gaps. There are two more morphological operations called opening and closing .

The opening of an image by the structuring element is an erosion followed by dilation.

Closing of an image by structuring element can be defined as dilation followed by erosion.

Top-hat transform is another morphological operation that is divided into two types called white top-hat transform and black top-hat transform. These operators are used to extract small image details and element information from the given image.

Black-hat transform is the difference between image and its closing, which is defined as

White-hat transform is defined as the difference between an image and its opening, which is defined as follows:

In medical image segmentation, morphology plays an important role. In ALL detection, many researchers have used morphological operation for the segmentation of leukaemia cells. It efficiently enhances the cells by filling small holes and gaps, smoothening their boundaries, and removing the salt or pepper noise from the nucleus. It is usually used with watershed transform to segment out the blast cells and to identify the connected cells for the separation of blast cells [50].

2.3. Features Extraction

In digital image processing and machine learning, features are the information we retrieve from the computational problem, which helps us to efficiently solve the task. Features can be some specific structure of the image like its shape, points, texture, edges, and so forth. [51]. Features extraction is the interpretation of this information to reduce the dimension of image in such a way that is more informative and less redundant. This technique is very effective when the algorithm has a large set of data and that data can be also redundant; then the data is minimized to reduce set of features that carry the most of information of the image and is easy to compute by the algorithm. The selection of subset of these relevant features is called features selection [52]. These features will contain the most relevant information and this subset is used instead of complete feature set. By minimizing the information into reduced set of features, a classifier will give better result by interpreting fewer amounts of data with more relevant information.

For acute lymphoblastic leukaemia detection, features extraction plays vital role because blast cells may have lot of information including different characteristics of their nucleus and cytoplasm [53]. Different features have been extracted in the recent study. These features can be divided into two broad categories, morphological features and texture features, as shown in Figure 2.

Figure 2: Features extraction techniques.

2.3.1. Morphological Features

In medical image processing, morphological features are very effective to analyse the information of the blood cell. In acute lymphoblastic leukaemia, blast cell has unique shape based features because every type of cell has unique area, perimeter, and circular rounding. So, by extracting morphological features from the blood cells we can efficiently perform classification of these cells [54].

(1) Shape Features. Shape based features play very important role for the acute leukaemia cell detection. Different shape based features like area, perimeter, circulatory, solidity, eccentricity, and so forth have been extracted to classify the blast cells of leukaemia [55].

(2) Bending Energy. Bending energy is also an essential feature that helps in efficient detection of acute lymphoblastic leukaemia. This parameter is used to detect the curvature of blast’s cell boundary which can help in ALL classification [56].

(3) Roundness Ratio. Roundness ratio is also an important feature that is widely used in leukaemia detection. Because of increased variance in the circular shape of blast cells, roundness ratio is an efficient feature for the better classification of leukaemia cell and its subtypes. Also, it helps in counting of WBCs which is also an important factor for the leukaemia occurrence [57].

(4) Chain Code. Chain code features are widely used in acute lymphoblastic leukaemia detection. These features separate the boundaries of nucleus and cytoplasm of blast cell which will help us to trace out the nucleus and cytoplasm [58].

2.3.2. Texture and Intensity Features

In medical image processing, texture is an important characteristic for the identification of blast cells. By analysing texture of an image, we can easily pick our region of interest and it also describes the spatial intensity distribution and specific colors in that ROI. For leukaemia detection, important information including texture and intensity has been extracted from blood smear images, which can help in better classification of blast cells for leukaemia detection and blast cell identification.

(1) GLCM (Grey Level Cooccurrence Matrix). GLCM is a statistical method used for the examining of texture in which spatial relationship between the pixels is considered. For leukaemia detection, GLCM is very useful to utilize the texture of the input blood smear image and extract features based on the texture and intensity of blast cells [59].

(2) Histogram. Histogram features including entropy, energy, mean, standard deviation, skewness, and kurtosis are extracted from the blood smear image to get enough relevant information. These types of features are also called 1st-order statistical features that are calculated by utilizing original pixels and excluding neighbour pixels [18].

(3) Gabor Texture Extraction. Gabor texture extraction method proposed by Dennis Gabor is very useful to extract relevant information of a blood smear image by analysing its texture. Gabor features can be extracted after applying Gabor filter [60].

(4) Color Intensity Features. Color features are very useful for fetching relevant information from blood cell nucleus. So, mean color values from different color models like RGB, HSV, HIS, and so forth are extracted as a feature and input to the classifier for better classification of blast cells [61].

(5) Fractal Dimension Features. Fractal dimension is widely used in medical image processing to measure different quantitative information. To identify whether a leukaemia cell is blast or normal, the roughness of its nucleus is being measured over spatial distribution by using fractal geometry [62].

(6) Entropy. By performing nucleus texture measurement, we can extract the entropy as a feature vector that is used to measure the randomness of the nucleus from the blood smear image. Different entropy measurements are used for the acute lymphoblastic leukaemia cell detection [63].

(7) Hausdorff Dimension. It is also an essential feature for microscopic blood image analysis, which is used with fractal dimension to extract relevant information by measuring roughness of nucleus [64].

(8) Local Binary Pattern. Local Binary Pattern is a texture classification technique that is used to extract texture features of an image. Because of fast computational speed of LBP, it is highly recommended for leukaemia detection, where speed is an important factor [65, 66]. Also, it provides significant information about the illumination changes, which also helps in detection of blasted leukaemia cells. In [67], Discriminative Robust Local Binary Pattern is proposed for features extraction, which provides very encouraging results.

2.3.3. Features Selection

Features selection is a technique used in pattern recognition and computer vision, which helps in selecting those important features that are more relevant to the problem and are not redundant. This will allow the algorithm to select a subset of features, which will increase the efficiency and accuracy and will reduce the computational cost due to reduced input [68]. Therefore, feature selection will compare all the initial features that are extracted from the microscopic blood smear images and select the most relevant features. For acute lymphoblastic leukaemia detection, different feature selection techniques are used. In [69], PCA (Principal Component Analysis) technique is used to reduce the features to avoid any redundancy. Genetic Algorithm is also used to select important features [70, 71]. PPCA (Probabilistic Principal Component Analysis) technique also gives better performance for features reduction [13].

2.4. Classification Methods for ALL Detection

Computer-aided diagnosing is an effective method to accurately diagnose acute lymphoblastic leukaemia. Computer-aided method can be fully automated or semiautomated depending on the approach you are using. ALL (acute lymphoblastic leukaemia) is a pattern classification problem that is diagnosed by extracted features of microscopic blood smear images. Classification is a supervised learning technique that uses training data to train its model and test data to check performance of that model [72]. Different pattern classifiers are used for diagnosis of ALL, which are summarized in Figure 3.

Figure 3: Classification methods for ALL.

2.4.1. SVM (Support Vector Machine)

Support vector machine is one of extensively used algorithms for leukaemia detection. This algorithm is used to output and optimize hyperplane that classifies the given data based on their features [21, 73]. The main reason behind the selection of SVM for leukaemia detection is that it is a binary classifier that can efficiently classify between normal and blast cells. However, a custom approach has been used for classifying its subtypes like L1, L2, and L3 [74].

2.4.2. KNN (-Nearest Neighbor)

-nearest neighbor is a widely used classification and regression technique that uses the nonparametric and lazy learning method to classify different data. In -nearest neighbour algorithm, classification is done by the voting from the nearest neighbours. Based on this voting, objects will be assigned to their relevant classes. For acute lymphoblastic leukaemia cell classification, -NN classifier is used to get better classification result for the normal and blast cells [75].

2.4.3. Random Forest

Random forest is an efficient classification technique that uses ensemble learning method to classify an object from the input vector. It contains different combinations of trees which perform voting for the selection of the class and then selection will be based on the class having maximum vote [76]. Although random forest depends on random numbers due to which it may give different results every time, still this classifier is preferred by the researcher because it corrects the problem of overfitting. For acute lymphoblastic leukaemia detection, random forest has been found to be stronger classifier for the detection of normal and infected blood cells [77].

2.4.4. ANFIS (Adaptive Neurofuzzy Inference System)

Adaptive neurofuzzy inference system is another good classifier that is widely used for the medical image classification. This is a very powerful method because it is the combination of artificial neural network and fuzzy logic. Although its design complexity is more than other classifiers like random forest, ANFIS is an end-to-end classifier as compared to random forest performs classification using given features, so if features are not strong enough random forest cannot performs classification accurately. Therefore ANFIS helps in better classification and early diagnosis of many diseases [78]. Recent study shows that ANFIS has been used for the classification of blast cell in leukaemia patients by microscopic blood image analysis, where it gives appropriate results [79].

2.4.5. Naive Bayes

Naive Bayes is an efficient classifier that is used to categorize the data by applying Bayes’ theorem. In this classifier, values of features are assumed to be independent of other feature values [80]. Naive Bayes has multiple names like simple Bayes and independent Bayes. For acute lymphoblastic leukaemia detection, Naive Bayes has been utilized in the recent study, where it is used to efficiently classify the normal and blast cell from the microscopic blood images [81].

2.4.6. Multilayer Perceptron (MLP)

Multilayer perceptron is an artificial neural network model that contains multiple layers of node and each layer is connected to its next node. In MLP, each input node represents input data and all other nodes are neuron that gives output by using activation function. It is widely used in large-scale problems because of its simple design and powerful computational capability. Recent study shows that MLP has been utilized for the acute lymphoblastic leukaemia detection, where it uses scaled conjugate gradient back propagation (SCG) for training blood images and on basis of this trained model performs classification to classify normal and cancerous cells [61].

2.4.7. Probabilistic Neural Network (PNN)

Probabilistic neural network is a widely used classifier. In PNN classifier, Parzen window as well as a nonparametric function is used to approximate probability distribution function of each class, through which probability of input data can be estimated and by applying Bayes rule each class with highest probability will be assigned to the input data [82]. For acute lymphoblastic leukaemia detection, probabilistic neural network has been used for the efficient classification of normal and blast cells [83].

3. Analysis and Discussion

We have presented a basic overview of image analysis and machine learning techniques that are used for the acute lymphoblastic leukaemia detection and classification of normal and blast cells. We have briefly discussed all the methods and techniques that have been used in previous research to check how they were implemented and what are their pros and cons as compared to the manual diagnosing methods available for leukaemia detection. These computer-aided methods are found to be more efficient, reliable, accurate, and less time-consuming as compared to the manual diagnosing methods that were less efficient and more time-consuming.

Table 2 shows a systematic comparison of various ALL diagnostic methods. Every method has used its own technique to diagnose acute lymphoblastic leukaemia. Different preprocessing, segmentation, features extraction, and classification techniques with their performance have been shown in Table 2.

Table 2: Comparison of different acute lymphoblastic leukaemia detection methods.

Authors, year
Method
Dataset
Preprocessing
Segmentation
Features extraction
Classification
Performance%

Mishra et al., 2017
Gray level cooccurrence matrix and random forest based acute lymphoblastic leukaemia detection [13]
Public ALL-IDB 1 (108 images)
Histogram equalization, Weiner filtering
Sobel, Perwitt, Marker based watershed segmentation
GLCM (gray level cooccurrence matrix), PPCA (Probabilistic Principal Component Analysis)
RF (random forest)
Accuracy 96.29%

Karthikeyan and Poornima, 2017
Microscopic image segmentation using fuzzy -means for leukaemia diagnosis [14]
Google (19 images)
Histogram equalization, Median filter
-means clustering, fuzzy -means clustering algorithm
Gabor texture extraction method
SVM (support vector machine)
Accuracy 90%

Rawat et al., 2017
Classification of acute lymphoblastic leukaemia using hybrid hierarchical classifiers [15]
Public ALL-IDB 2 (260 images)
Histogram equalization, Order statistic filter
Global thresholding, morphological opening
Geometrical features, chromatic features, statistical texture features
Hybrid hierarchical classifiers kNN, PNN, SVM, SSVM, and ANFIS
Accuracy 99.2%

Joshi et al., 2013
White blood cells segmentation and classification to detect acute leukaemia [16]
Public ALL-IDB 1 (108 images)
Contrast Stretching and Histogram equalization
Otsu’s threshold method
Shape features (area, perimeter, and circularity)
KNN (-nearest neighbor)
Accuracy 93%

Putzu and Ruberto, 2013
White blood cells identification and classification from leukaemia blood image [17]
Public ALL-IDB 1 (108 images)
Histogram equalization
Triangle threshold method using Zack algorithm
Shape based features (area, perimeter, etc.), GLCM features
SVM (support vector machine)
Accuracy 92%

Li et al., 2016
Segmentation of white blood cell from acute lymphoblastic leukaemia images using dual-threshold method [18]
Public ALL-IDB (130 images)
Global Contrast Stretching
Dual-threshold segmentation
Binarization, morphological erosion, median filtering (postprocessing)
Not mentioned
Accuracy 98%

Amin et al., 2015
Recognition of acute lymphoblastic leukaemia cells in microscopic images using -means clustering and support vector machine classifier [19]
Isfahan Al-Zahra and Omid Hospital pathology laboratories (146 ALL images and 166 lymphocytes images)
Histogram equalization
-means clustering
Shape based features (area, perimeter, solidity, and eccentricity), histogram-based features (mean, standard deviation skewness, entropy, etc.)
SVM (support vector machine)
Accuracy 95.6%

Savita Dumyan, 2017
An enhanced technique for lymphoblastic cancer detection using artificial neural network [20]
Blood sample images (36 images)
Histogram equalization
Image binarization, canny edge detection technique
Shape based features, texture features, statistical features, moment invariants
Artificial neural network (ANN)
Accuracy 97.8%

Chatap and Shibu, 2014
Analysis of blood samples for counting leukaemia cells using support vector machine and nearest neighbour [21]
Public ALL-IDB 1 (108 images) and ALL-IDB 2 (260 images)
Histogram Equalization, Contrast Stretching
Otsu’s threshold method
Shape based features (area, perimeter, and circularity)
-nearest neighbor (KNN)
Accuracy 93%

Amin et al., 2015
Recognition of acute lymphoblastic leukaemia cells in microscopic images using -means clustering and support vector machine classifier [22]
Isfahan Al-Zahra and Omid Hospital pathology laboratories (312 images)
Histogram Equalization, Linear Contrast Stretching
-means clustering
Geometric or shape based (area, perimeter, convex, and solidity), first- and second-order statistical features
SVM (support vector machine)
Accuracy 97% (blast and normal), 95.6% (subtypes classification)

Patel and Mishra, 2015
Automated leukaemia detection using microscopic images [23]
Not mentioned
Median Filtering, Wiener Filtering
-means clustering
Color features, geometric, texture, and statistical features
SVM (support vector machine)
Accuracy 93.57%

MoradiAmin et al., 2016
Computer aided detection and classification of acute lymphoblastic leukaemia cell subtypes based on microscopic image analysis [24]
Isfahan Al-Zahra and Omid Hospital pathology laboratories (312 images)
Histogram equalization
Fuzzy -means, watershed algorithm
Geometric or shape based (area, perimeter, convex, and solidity), first- and second-order statistical features
SVM (support vector machine)
Accuracy 97.52%

Mohapatra and Patra, 2010
Automated cell nucleus segmentation and acute leukaemia detection in blood microscopic images [25]
University of Virginia, Ispat General Hospital, Rourkela, Odisha (108 images)
Selective median filtering, Unsharp Masking
-means clustering, nearest neighbor
Fractal dimension, shape features including contour signature and texture, color features
SVM (support vector machine)
Accuracy 95%

Mohapatra et al., 2011
Fuzzy based blood image segmentation for automated leukaemia detection [26]
University of Virginia, Ispat General Hospital, Rourkela, Odisha (108 images)
Selective median filtering, Unsharp Masking
Gustafson Kessel clustering, nearest neighbor
Fractal dimension, shape features including contour signature and texture, color features
SVM (support vector machine)
Accuracy 93%

Mohapatra et al., 2014
An ensemble classifier system for early diagnosis of acute lymphoblastic leukaemia in blood microscopic images [27]
Ispat General Hospital, Rourkela, Odisha (150 images)
Contrast enhancement, Selective median filtering
Shadowed -means (SCM) clustering
Fractal dimension, shape features including contour signature and texture, color features
Ensemble method (Naive Bayesian, -nearest neighbor, multilayer perceptron, radial basis functional neural network, support vector machines)
Accuracy 94.73%

Samadzadehaghdam et al., 2015
Enhanced recognition of acute lymphoblastic leukaemia cells in microscopic images based on feature reduction using principle component analysis [28]
Isfahan Al-Zahra and Omid Hospital pathology laboratories (21 Images)
Histogram equalization
Fuzzy -means, watershed algorithm
Geometric or shape based (area, perimeter, convex, and solidity), statistical features
SVM (support vector machine)
Accuracy 96.33%

Putzua et al., 2017
Leucocyte classification for leukaemia detection using image processing techniques [29]
Public ALL-IDB 1 (108 images) and ALL-IDB 2 (260 images)
Histogram equalization and contrast stretching
Zack algorithm
Shape features, color features, texture features
SVM (support vector machine)
Accuracy 92%

Sadeghian et al., 2009
A framework for white blood cell segmentation in microscopic blood images using digital image processing [30]
L2 type ALL blood images (20 images)
Gaussian filter, Standard deviation
Canny edge detection technique, Zack algorithm
Not mentioned
Not mentioned
Accuracy 92% (nucleus segmentation), 78% (cytoplasm segmentation)

Mohapatra and Patra, 2010
Automated leukaemia detection using Hausdorff dimension in blood microscopic images [31]
University of Virginia, Ispat General Hospital, Rourkela, Odisha (108 images)
Selective median filtering, Unsharp masking
-means clustering
Hausdorff dimension, shape features, color features
SVM (support vector machine)
Accuracy 95%

Mohapatra et al., 2010
Image analysis of blood microscopic images for acute leukaemia detection [32]
University of Virginia, Ispat General Hospital, Rourkela, Odisha (108 images)
Selective median filtering, Unsharp masking
Fuzzy -means clustering, nearest neighbor
Fractal features (Hausdorff dimension), shape features, contour signature, color, texture features
SVM (support vector machine)
Accuracy 95%

Karthikeyan and Poornima [14] used histogram equalization and median filtering for preprocessing of ALL images and then fuzzy -means was used to segment out the white blood cells and after extracting features using Gabor texture extraction method support vector machine was used for classification of blasted cells. They were able to achieve 90% accuracy by using above method. Putzu and Ruberto [17] had improved their accuracy to 92% by using triangle threshold with improved features. They had extracted shape, color, and texture features using GLCM. After that, SVM was used for classification of blast and normal cells. Mohapatra et al. [27] achieved an accuracy of 94.73% by using their proposed methodology. They used contrast enhancement and selective median filtering for noise removal and contrast adjustment, which helps in better segmentation of leukaemia images. Shadowed -means clustering was used for the segmentation of lymphocytes which clustered the lymphocytes into 3 regions including their background, cytoplasm, and nucleus. After that, different features including fractal dimension, shape based features, color features, and texture features were extracted from the segmented lymphocytes. Then a powerful ensemble classifier (Naive Bayesian, -nearest neighbor, multilayer perceptron, radial basis functional neural network, and support vector machines) was used to classify normal and blast cells. Mishra et al. [13] used histogram equalization and Weiner filtering to enhance contrast and noise adjustment. Improved watershed segmentation with Sobel and Prewitt operators was used to achieve better segmentation. After extracting GLCM based texture features, they used random forest classifier rather than SVM, which improved the accuracy to 96.29% as compared to other methods. Savita Dumyan [20] increased their accuracy to 97.8% by using canny edge detection that is efficient and reliable as compared to other edge detection techniques because of its low error rate. After extracting features, powerful ANN (artificial neural network) classifier was trained to classify normal and blast cells. Li et al. [18] proposed novel segmentation technique for white blood cells, where dual-threshold method was used for segmentation, in which optimal threshold value was determined by using golden section search. After that, postprocessing was carried out, in which morphological operation and median filtering were used to enhance the segmentation results. By using this method, they were able to achieve accuracy of 98%. Rawat et al. [15] were able to achieve higher accuracy of 99% as compared to all previous methods by using powerful hybrid hierarchical classifiers. Histogram equalization and order statistic filter were used for contrast adjustment and noise removal. Global thresholding followed by morphological opening was used for segmentation of lymphocytes. After that different features were extracted and reduced by using PCA (Principal Component Analysis). Then 2-method classification technique was used, in which five classifiers were arranged in hierarchal order to detect normal and blast cells; then subtypes of acute lymphoblastic leukaemia, that is, L1, L2, and L3, were also classified by using this method.

After analysing the previous methods, we come to the point that there is still research room available to improve the accuracy of leukaemia detection. ALL detection and diagnosis are very sensitive issues and are related to the health and life of humans. Accuracy of such diagnosis process should be flawless for complete replacement of human operators by these computer-based diagnoses but this is a very challenging task because these blood cells are highly overlapping as shown in Figure 4, which makes them difficult to separate.

Figure 4: Overlapping cells.

It is also analysed that classification of ALL subtypes is somewhat ignored in the literature. Most researchers have neglected the identification of subtypes of acute lymphoblastic leukaemia because of their interclass similarity and intraclass variability. These subtypes are difficult to classify but play vital role in precise diagnosis of disease and are very crucial for the medical treatment of the disease. Different subtypes of acute lymphoblastic leukaemia are shown in Figure 5. According to FAB classification, we have the following:

(i)L1: these blast cells are homogenous and small with very scanty cytoplasm and do not contain vacuoles. Their nucleus is regular and round(ii)L2: they are heterogeneous and large in size with irregular nucleus. Cytoplasm may contain vacuoles(iii)L3: these blast cells are homogenous and their size is moderate. Their nucleus is round and regular and cytoplasm has notable vacuoles.

(a)

(b)

(c)

(d)

Figure 5: Subtypes of ALL according to FAB. (a) A noncancerous cell, (b) L1 type ALL, (c) L2 type ALL, and (d) L3 type ALL.

4. Conclusion and Future Prospects

In this paper, we have provided the brief detail about ALL. We also highlighted different methods for diagnosis of acute lymphoblastic leukaemia (ALL) which have been proposed by different researchers. ALL is a fatal disease that needs to be diagnosed earlier for proper treatment. So, we have compared different methods for the early detection of leukaemia. Techniques for different stages of the diagnostic methods are summarized, analysed, and compared in this research. Although a lot of research work has been done for ALL detection, there is tremendous amount of work needed to make its detection flawless, accurate, cost-effective, and more efficient. Also, after comparing the previous work, we come to the point that there are very few works done for the classification of its subtypes, which have opened more room for researchers to work on subtypes of leukaemia, which will help the pathologist to do effective treatment of leukaemia patient.

Conflicts of Interest

The authors declare that there are no conflicts of interest regarding the contents of this article.

References

The American Society of Hematology Website, http://www.hematology.org/, 2017.

CureSearch for Children’s Cancer Research, https://curesearch.org, 2017.

American Cancer Society Website, https://www.cancer.org, 2017.

L. Butcher, “Profiles in Oncology Social Media,” Oncology Times, vol. 37, no. 10, pp. 69-70, 2015.

B. Chitradevi and P. Srimathi, “An overview on image processing techniques,” International Journal of Innovative Research in Computer, vol. 2, no. 11, pp. 6466–6472, 2014.

Q. Wang, L. Chen, and D. Shen, “Fast histogram equalization for medical image enhancement,” in Proceedings of the 30th Annual International Conference of the IEEE Engineering in Medicine and Biology Society, pp. 2217–2220, 2008.

M. Muralidharan, P. Shobana, S. A. Chakravarthi, and A. B. Subramanian, “Detection of abnormalities in leukemia images using contrast enhancement,” International Journal of Innovative Research in Computer and Communication Engineering, vol. 1, no. 2, 2013.

N. H. A. Halim, M. Y. Mashor, A. S. Abdul Nasir, N. R. Mokhtar, and H. Rosline, “Nucleus segmentation technique for acute leukemia,” in Proceedings of the 2011 IEEE 7th International Colloquium on Signal Processing and Its Applications, CSPA 2011, pp. 192–197, Malaysia, March 2011.

T. G. Patil and V. Raskar, “Automated leukemia detection using shape feature extraction,” International Journal of Computer Engineering and Applications, vol. 9, no. 2, p. 3, 2015.

M. M. D. Joshi, P. A. H. Karode, and P. S. R. Suralkar, “Detection of acute leukemia using white blood cells segmentation based on blood samples,” International Journal of Electronics and Communication Engineering & Technology (IJECET), vol. 4, no. 3, pp. 148–153, 2013.

L. M. Al-Hayali, D. M. Morsy, and M. M. Abdul-Razak, “Microscopic image processi-ng of automated detection and classifi-cation for human cancer,” International Journal of Scientific & Technology Research, vol. 5, no. 9, pp. 231–236, 2016.

G. Singh, P. Swarnalatha, B. K. Tripathy, and S. Kakani, “Convex hull based WBC computation for leukemia detection,” International Journal of Advanced Research in Electrical, Electronics and Instrumentation Engineering, vol. 2, no. 5, pp. 1843–1847, 2013.

S. Mishra, B. Majhi, P. K. Sa, and L. Sharma, “Gray level co-occurrence matrix and random forest based acute lymphoblastic leukemia detection,” Biomedical Signal Processing and Control, vol. 33, pp. 272–280, 2017.

D. R. Karthikeyan and N. Poornima, “Micros-copic image segmentation using Fuzzy C means for leukemia diagnosis,” International Journal of Advanced Research in Science, Engineering and Technology, vol. 4, no. 1, 2017.

J. Rawat, A. Singh, H. S. Bhadauria, J. Virmani, and J. S. Devgun, “Classification of acute lymphoblastic leukaemia using hybrid hierarchical classifiers,” Multimedia Tools and Applications, vol. 76, no. 18, pp. 19057–19085, 2017.

M. M. D. Joshi, P. A. H. Karode, and P. S. R. Suralkar, “White blood cells segmentation and classification to detect acute leukemia,” International Journal of Emerging Trends & Technology in Computer Science (IJETTCS), vol. 2, no. 3, 2013.

L. Putzu and C. D. Ruberto, “White blood cells identification and counting from microscopic blood images,” in Proceedings of the IWBBIO, p. 363, 2013.

Y. Li, R. Zhu, L. Mi, Y. Cao, and D. Yao, “Segmentation of White Blood Cell from Acute Lymphoblastic Leukemia Images Using Dual-Threshold Method,” Computational and Mathematical Methods in Medicine, vol. 2016, 12 pages, 2016.

M. M. Amin, S. Kermani, A. Talebi, and M. G. Oghli, “Recognition of acute lymph-oblastic leukemia cells in micro-scopic images using k-means clustering and support vector machine classifier,” Journal of Medical Signals and Sensors, pp. 49–58, 2015.

A. G. Savita Dumyan, “An enhanced technique for lymphoblastic cancer detection using artificial neural network,” International Journal of Advanced Research in Computer Science and Electronics Engineering (IJARCSEE), vol. 6, no. 4, p. 38, 2017.

N. Chatap and S. Shibu, “Analysis of blood samples for counting leukemia cells using Support vector machine and nearest neighbour,” IOSR Journal of Computer Engineering, vol. 16, no. 5, pp. 79–87, 2014.

M. M. Amin, S. Kermani, A. Talebi, and M. G. Oghli, “Automatic recognition of acute lymphoblastic leukemia cells in microscopic images using k-means clustering and multiclass support vector machine classifier,” Journal of Medical Signals and Sensors, vol. 5, no. 1, pp. 49–57, 2015.

N. Patel and A. Mishra, “Automated Leukaemia Detection Using Microscopic Images,” in Proceedings of the 2nd International Symposium on Computer Vision and the Internet, VisionNet 2015, pp. 635–642, India, August 2015.

M. MoradiAmin, A. Memari, N. Samadzadehaghdam, S. Kermani, and A. Talebi, “Computer aided detection and classification of acute lymphoblastic leukemia cell subtypes based on microscopic image analysis,” Microscopy Research and Technique, vol. 79, no. 10, pp. 908–916, 2016.

S. Mohapatra and D. Patra, “Automated cell nucleus segmentation and acute leukemia detection in blood microscopic images,” in Proceedings of the International Conference on Systems in Medicine and Biology, ICSMB 2010, pp. 49–54, India, December 2010.

S. Mohapatra, S. S. Samanta, D. Patra, and S. Satpathi, “Fuzzy based blood image segmentation for automated leukemia detection,” in Proceedings of the 2011 International Conference on Devices and Communications, ICDeCom 2011, India, February 2011.

S. Mohapatra, D. Patra, and S. Satpath, “An ensemble classfier system for early diagnosis of acute lymphoblastic leukemia in blood microscopic images,” Neural Computing and Applications, pp. 1887–1904, 2014.

N. Samadzadehaghdam, S. Kermani, A. Talebi, and M. MoradiAmi, “Enhanced recognition of acute lymphoblastic leukemia cells in microscopic images based on feature reduction using principle component analysis,” Frontiers in Biomedical Technologies, vol. 2, no. 3, pp. 128–136, 2015.

L. Putzua, G. Caoccib, and C. D. Rubertoa, “Leucocyte classification for leukemia detection using image processing techniques,” Artificial Intelligence in Medicine, vol. 78, pp. 1–72, 2017.

F. Sadeghian, Z. Seman, A. R. Ramli, B. H. Abdul Kahar, and M.-I. Saripan, “A framework for white blood cell segmentation in microscopic blood images using digital image processing,” Biological Procedures Online, vol. 11, no. 1, pp. 196–206, 2009.

S. Mohapatra and D. Patra, “Automated leukemia detection using hausdorff dimension in blood microscopic images,” in Proceedings of the International Conference on IEEE Robotics and Communication Technologies (INTERACT '10), pp. 64–68, Chennai, India, December 2010.

S. Mohapatra, D. Patra, and S. Satpathi, “Image analysis of blood microscopic images for acute leukemia detection,” in Proceedings of the 2010 International Conference on Industrial Electronics, Control and Robotics, IECR 2010, pp. 215–219, India, December 2010.

L. B. Dorini, R. Minetto, and N. J. Leite, “White blood cell segmentation using morphological operators and scale-space analysis,” in Proceedings of the 20th Brazilian Symposium on Computer Graphics and Image Processing (SIBGRAPI '07), pp. 294–301, Minas Gerais, Brazil, October 2007.

J. Duan and L. Yu, “A WBC segmentation methord based on HSI color space,” in Proceedings of the 2011 4th IEEE International Conference on Broadband Network and Multimedia Technology, IC-BNMT 2011, pp. 629–632, China, October 2011.

A. Gautam and H. S. Bhadauria, “White blood nucleus extraction using K-Mean clustering and mathematical morphing,” in Proceedings of the 5th International Conference on Confluence 2014 - The Next Generation Information Technology Summit, pp. 549–554, India, September 2014.

S. Mohapatra, D. Patra, and S. Satpathy, “Automated leukemia detection in blood microscopic images using statistical texture analysis,” in Proceedings of the International Conference on Communication, Computing and Security, ICCCS 2011, pp. 184–187, India, February 2011.

S. Ghosh and S. K. Dubey, “Comparative analysis of k-means and fuzzy c-means algorithms,” International Journal of Advanced Computer Science and Applications, vol. 4, no. 4, pp. 35–39, 2013.

R. Bhattacharjee and L. M. Saini, “Detection of Acute Lymphoblastic Leukemia using watershed transformation technique,” in Proceedings of the International Conference on Signal Processing, Computing and Control, ISPCC 2015, pp. 383–386, India, September 2015.

K. K. Ramesh and N. Amoda, “Image segmentation and detection using watershed transform and region based image retrieval,” International Journal of Emerging Trends & Technology in Computer Science (IJETTCS), vol. 2, no. 2, pp. 89–94, 2013.

J. M. Sharif, M. F. Miswan, M. A. Ngadi, M. S. H. Salam, and M. M. B. A. Jamil, “Red blood cell segmentation using masking and watershed algorithm: A preliminary study,” in Proceedings of the 2012 International Conference on Biomedical Engineering, ICoBE 2012, pp. 258–262, Malaysia, February 2012.

A. Verma, A. Kaur, and D. Ssiet, “The marker-based watershed segmentation- a review,” International Journal of Engineering and Innovative Technology (IJEIT), vol. 3, no. 3, pp. 171–174, 2013.

A. Salihah, A. Nasir, N. Mustafa, and M. N. N. Fazli, “Application of thresholding technique in determining ratio of blood cells for Leukemia detection,” in Proceedings of the International Conference on Man-Machine Systems (ICoMMS), Penang, Malaysia, 2009.

R. Adollah, M. Y. Mashor, H. Rosline, and N. H. Harun, “Multilevel thresholding as a simple segmentation technique in acute leukemia images,” Journal of Medical Imaging and Health Informatics, vol. 2, no. 3, pp. 285–288, 2012.

M. Madhukar, S. Agaian, and A. T. Chronopoulos, “New decision support tool for acute lymphoblastic leukemia classification,” in Proceedings of the Image Processing: Algorithms and Systems X; and Parallel Processing for Imaging Applications II, USA, January 2012.

P. Lorenzo and C. D. Ruberto, “Classification from leukemic blood image,” in Proceedings of the IWBBIO International Work-Conference on Bioinformatics and Biomedical Engineering, pp. 99–106, 2013.

A. N. Aimi Salihah, M. Y. Mashor, N. H. Harun, A. A. Abdullah, and H. Rosline, “Improving colour image segmentation on acute myelogenous leukaemia images using contrast enhancement techniques,” in Proceedings of the 2010 IEEE EMBS Conference on Biomedical Engineering and Sciences, IECBES 2010, pp. 246–251, Malaysia, December 2010.

A. Mehnert and P. Jackway, “An improved seeded region growing algorithm,” Pattern Recognition Letters, vol. 18, no. 10, pp. 1065–1071, 1997.

H. N. Lim, M. Y. Mashor, N. Z. Supardi, and R. Hassan, “Color and morphological based techniques on white blood cells segmentation,” in Proceedings of the 2nd International Conference on Biomedical Engineering, ICoBE 2015, Malaysia, March 2015.

M. Trupti, A. Kulkarni-Joshi, and P. D. S. Bhosale, “A fast segmentation scheme for acute lymphoblastic leukemia detection,” International Journal of Advanced Research in Electrical, Electronics and Instrumentation Engineering, vol. 3, no. 2, pp. 7253–7258, 2014.

N. H. A. Halim, M. Y. Mashor, and R. Hassan, “Automatic blasts counting for acute leukemia based on blood,” International Journal of Research and Reviews in Computer Science (IJRRCS), vol. 2, no. 4, 2011.

M. Veluchamy, K. Perumal, and T. Ponuchamy, “Feature extraction and classification of blood cells using artificial neural network,” American Journal of Applied Sciences, vol. 9, no. 5, pp. 615–619, 2012.

O. Sarrafzadeh, H. Rabbani, A. Talebi, and H. U. Banaem, “Selection of the best features for leukocytes classification in blood smear microscopic images,” in Proceedings of the Medical Imaging 2014: Digital Pathology, USA, February 2014.

S. Mishra, B. Majhi, P. K. Sa, and F. Siddiqui, “GLRLM based feature extraction for acute lymphoblastic leukemia(all) detection,” in Proceedings of the 5th International Conference on Advanced Computing, Networking, and Informatics-(ICACNI), National Institute of Technology, Goa, India, 2017.

T. A. Kulkarni and D. S. Bhosale, “A robust morphological analysis of normal and abnormal leukemic cells populations in acute lymphoblastic leukemia,” International Journal of Electrical, Electronics and Data Communication, vol. 2, no. 8, 2014.

T. G. Patil and V. Raskar, “Automated leukemia detection using shape feature extraction,” International Journal Of Computer Engineering & Applications, vol. 9, no. 2, 2015.

M. S. Subhan and M. P. Kaur, “Significant analysis of leukemic cells extraction and detection using knn and hough transform algorithm,” International Journal of Computer Science Trends and Technology (IJCST), vol. 3, no. 1, 2015.

T. Hazra, M. Kumar, and D. S. S. Tripathy, “Automatic leukemia detection using image processing technique,” International Journal of Latest Technology in Engineering, Management &amp; Applied Science (IJLTEMAS), vol. 6, no. 4, pp. 42–45, 2017.

F. Scotti, “Automatic morphological analysis for acute leukemia identification in peripheral blood microscope images,” in Proceedings of the IEEE International Conference on Computational Intelligence for Measurement Systems and Applications (CIMSA '05), pp. 96–101, Messian, Italy, July 2005.

V. Venmathi, K. N. Shobana, A. Kumar, and D. Gajeshwaran, “Leukemia detection using image processing,” Digital Image Processing, vol. 9, no. 6, pp. 119–123, 2017.

P. Sarkar, M. Ghosh, and C. Chakraborty, “Texture-based leukocyte image retrieval using color normalization and quaternion fourier transform based segmentation,” Journal of Network and Innovative Computing, vol. 1, pp. 74–86, 2013.

A. S. Abdul Nasir, M. Y. Mashor, and H. Rosline, “Detection of acute leukaemia cells using variety of features and neural networks,” in Proceedings of the 5th Kuala Lumpur International Conference on Biomedical Engineering, BIOMED 2011, Held in Conjunction with the 8th Asian Pacific Conference on Medical and Biological Engineering, APCMBE 2011, pp. 40–46, Malaysia, June 2011.

A. Jacob and F. A. Mundackal, “Automated screening system for acute leukemia detection and type classification,” International Journal of Advanced Research in Electrical, Electronics and Instrumentation Engineering, vol. 5, no. 4, pp. 995–1004, 2016.

M. P. T. G. V. B. Raskar, “A robust segmentation method for acute lymphobl-astic leukemia detection,” International Journal of Advanced Research in Computer Science and Software Engineering, vol. 5, no. 1, 2015.

A. A. Regina, “Detection of leukemia with blood microscopic images,” Journal of Innovative Research in Computer and Communication Engineering, vol. 3, no. 3, 2015.

V. Singhal and P. Singh, “Local Binary Pattern for automatic detection of Acute Lymphoblastic Leukemia,” in Proceedings of the 2014 20th National Conference on Communications, NCC 2014, India, March 2014.

A. Bharathivanan and T. N. R. Shankar, “Local binary pattern texture based method for segmentation of leukemia in blood microscopic images,” in Proceedings of the 2nd International Conference on Innovations in Information Embedded and Communication Systems ICIIECS’15, 2015.

T. P. Nimi and T. V. Divya, “Discriminative robust LBP for leukemia detection,” International Journal for Innovative Research in Science & Technology, vol. 3, no. 4, pp. 192–196, 2016.

V. Singhal and P. Singh, “Correlation based feature selection for diagnosis of acute lymphoblastic leukemia,” in Proceedings of the 3rd ACM International Symposium on Women in Computing and Informatics (WCI '15), pp. 5–9, Kochi, India, August 2015.

J. Li and G. Weng, “PCA for leukemia classification,” Applied Mechanics and Materials, vol. 43, pp. 744–747, 2011.

R. J. A. Cabrera, C. A. P. Legaspi, E. J. G. Papa, R. D. Samonte, and D. D. Acula, “HeMatic: An automated leukemia detector with separation of overlapping blood cells through Image Processing and Genetic Algorithm,” in Proceedings of the 2017 IEEE International Conference on Applied System Innovation, ICASI 2017, pp. 985–987, Japan, May 2017.

D.-C. Huang, K.-D. Hung, and Y.-K. Chan, “An adaptive leukocyte nucleus segmentation using genetic algorithm,” in Proceedings of the 20th IEEE International Symposium on Intelligent Signal Processing and Communications Systems, ISPACS 2012, pp. 559–563, Taiwan, November 2012.

J. Rawat, A. Singh, H. S. Bhadauria, and J. Virmani, “Computer Aided Diagnostic System for Detection of Leukemia Using Microscopic Images,” in Proceedings of the 4th International Conference on Eco-friendly Computing and Communication Systems, ICECCS 2015, pp. 748–756, December 2015.

H. P. Jagadev, “Detection and classification of leukemia using image segmentation and SVM Classifier,” International Journal for Research in Technological Studies, vol. 4, no. 4, 2017.

J. Laosai and K. Chamnongthai, “Acute leukemia classification by using SVM and K-Means clustering,” in Proceedings of the 2014 International Electrical Engineering Congress, iEECON 2014, Thailand, March 2014.

P. M. Gumble and S. V. Rode, “Analysis & classification of acute lymphoblastic leukemia using KNN algorithm,” International Journal on Recent and Innovation Trends in Computing and Communication, vol. 5, no. 2, pp. 94–98, 2017.

C. Reta, L. Altamirano, J. A. Gonzalez et al., “Segmentation and classification of bone marrow cells images using contextual information for medical diagnosis of acute leukemias,” PLoS ONE, vol. 10, no. 6, Article ID e0130805, 2015.

M. Saraswat and K. V. Arya, “Feature selection and classification of leukocytes using random forest,” Medical & Biological Engineering & Computing, vol. 52, no. 12, pp. 1041–1052, 2014.

P. Shanthi, R. Priya, and Priyanka B., “Analysis of blood samples using ANFIS classification,” International Research Journal of Engineering and Technology (IRJET), vol. 4, no. 3, pp. 1460-1461, 2017.

M. S. Hosseini and M. Zekri, “Review of medical image classification using the adaptive neuro-fuzzy inference system,” Journal of Medical Signals and Sensors, vol. 2, no. 1, pp. 49–60, 2012.

S. Selvaraj and B. Kanakaraj, “Naïve bayesian classifier for acute lymphocytic leukemia detection,” ARPN Journal of Engineering and Applied Sciences, vol. 10, no. 6, pp. 6888–6892, 2015.

J. Prinyakupt and C. Pluempitiwiriyawej, “Segmentation of white blood cells and comparison of cell morphology by linear and naïve Bayes classifiers,” Biomedical Engineering Online, vol. 14, no. 1, article 63, 2015.

A. A. Nasir, M. Y. Mashor, and R. Hassan, “Classification of acute leukaemia cells using multilayer perceptron and simplified fuzzy ARTMAP neural networks,” International Arab Journal of Information Technolog, vol. 10, no. 4, 2013.

N. H. A. Halim, M. Y. Mashor, A. S. A. Nasir, and R. Hassan, “Performance Comparison between Multilayer Perceptron and Fuzzy ARTMAP Networks for Acute Leukemia Detection,” vol. 2, 2011.