Case Reports in Anesthesiology

Volume 2014 (2014), Article ID 872310, 1 page

http://dx.doi.org/10.1155/2014/872310

Erratum

Erratum to “A Minimal-Invasive Metabolic Test Detects Malignant Hyperthermia Susceptibility in a Patient after Sevoflurane-Induced Metabolic Crisis”

Frank Schuster,¹ Stephan Johannsen,¹ Norbert Roewer,¹ and Martin Anetseder²

¹Department of Anaesthesia and Critical Care, University of Wuerzburg, Oberduerrbacher Street 6, 97080 Wuerzburg, Germany

²Department of Anaesthesia, Landshut-Achdorf Hospital, Achdorfer Weg 3, 84036 Landshut, Germany

Received 9 March 2014; Accepted 26 March 2014; Published 31 March 2014

Copyright © 2014 Frank Schuster et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The authors regret that one coauthor was missing in the following article: “A minimal-invasive metabolic test detects malignant hyperthermia susceptibility in a patient after sevoflurane-induced metabolic crisis.”

The correct list of the authors and their affiliations are as shown above.