Case Reports in Infectious Diseases
Volume 2019 (2019), Article ID 7571606, 5 pages
https://doi.org/10.1155/2019/7571606

Case Series

Anaerobic Bacteremias in Left Ventricular Assist Devices and Advanced Heart Failure

David R. Murillo-Garcia,¹ Julian Galindo,² Natalia Pinto,² Gabriel Motoa,³ Esther Benamu,³ Carlos Franco-Paredes,3,4 Daniel B. Chastain,⁵ and Andrés F. Henao-Martínez³

¹Public Health and Infection Research Group, Faculty of Health Sciences, Universidad Tecnológica de Pereira, Pereira, Colombia
²School of Medicine, Universidad Libre, Cali, Colombia
³Division of Infectious Diseases, University of Colorado Denver, Denver, CO, USA
⁴Hospital Infantil de México, Federico Gómez, Mexico City, Mexico
⁵University of Georgia College of Pharmacy, Athens, GA, USA

Correspondence should be addressed to Andrés F. Henao-Martínez; andres.henaomartinez@cuanschutz.edu

Received 27 August 2019; Revised 27 November 2019; Accepted 3 December 2019; Published 19 December 2019

Academic Editor: Raul Colodner

Copyright © 2019 David R. Murillo-Garcia et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Left ventricular assisted devices (LVADs) have revolutionized the treatment of advanced heart failure, providing meaningful increases in survival, functional capacity, and quality of life. There are two categories of LVADs patients: (1) bridge-to-transplant and (2) destination therapy. Advanced heart failure and destination LVADs often carry a poor prognosis. The overall 1-year mortality rate remains as high as 30%. LVAD-specific infections, LVAD-related infections, and non-LVAD-related infections represent important emerging clinical problems in this setting. With an incidence ranging from 30 to 50%, these lead to high rates of hospitalization, morbidity, and mortality. Bacteremias caused by anaerobic pathogens in patients with LVAD are underreported. Herein, we describe the microbiological findings, treatment, and clinical outcome of four patients with LVADs and advanced heart failure with anaerobic bacteremias. Fusobacterium species was the most frequent etiological agent. Most patients had a relatively favorable short-term outcome with survival rates of 100% at 30 days and of 50% at 90 days. However, due to other multiple long-term complications, overall mortality remains at 50% during the first year and increases to 75% beyond the first year. Anaerobic bacteremia sources included the oral cavity from odontogenic infections and aspiration pneumonia. Anaerobic bacteremia constitutes an unfavorable mortality prognostic factor in patients with destination LVADs. We recommend implementing preventive strategies with a comprehensive dental care evaluation in patients with LVADs and advanced heart failure.

1. Introduction

Patients affected with heart failure have improved survival rates thanks to advances in its medical management [1–3]. For individuals who face a high short-term mortality risk and scarce chances of receiving a transplant, left ventricular assist devices (LVAD) have continued to be a therapeutic option [4]. LVADs can provide significant increases in survival, functional capacity, and quality of life [5–7]. Despite these improvements, the overall 1-year mortality rate in LVAD patients remains as high as 30% [8]. There is an increase in the noncardiovascular causes of mortality within this population [9]. Infections represent an important emerging clinical problem leading to decompensation of heart failure (HF) and sepsis [1, 9, 10]. Infections remain a complicating factor of LVAD therapy and HF, with reported rates ranging from 30 to 50% [11, 12]. The importance of controlling infection to optimize survival is of high priority when mechanical circulatory assist devices are used [13]. LVAD-associated infections may be acquired in the community or during hospitalization [10]. The most common infection sites consist primarily of the pulmonary, followed by the urinary tract and skin infections [10, 14]. Reported pathogens involved in cases of LVAD infections are predominantly skin organisms, such as Gram-positive cocci (44.8%) and less often by Gram-negative rods (24.1%) [15]. Among the Gram-positive cocci, the most frequently isolated pathogens are S. aureus, coagulase-negative Staphylococci, and Corynebacterium species; while P. aeruginosa and Enterobacteriaceae are the most commonly reported Gram-negative rods [16]. Although fungal infections are rare, they can occur and are mainly caused by candida [16, 17]. Anaerobic infections are not typically associated with line or cardiac device infections, and thus, these are often overlooked in patients with LVADs or advanced heart failure. The most common sources of anaerobic bacteremia in the general population are intra-abdominal abscesses and female genital tract infections. Data on their clinical presentation, severity, diagnosis, treatment, and prognosis in this setting are lacking. In the present case series, we perform a description of the microbiological findings, treatment, and clinical outcome of four anaerobic pathogen infections in patients with LVADs and advanced heart failure.

2. Case Series

2.1. Patient 1

A 28-year-old man with a past medical history of nonischemic cardiomyopathy with an ejection fraction of 10% with a HeartMate II LVAD placement since eight months, pulmonary hypertension due to chronic thromboembolic disease, obstructive sleep apnea, obesity, and substance abuse presented to the emergency department with fever (102 F°) and cough that started two days before. He was hemodynamically stable. His SpO2 was 95%. On physical examination, he had decreased breath sounds and rhonchi in the right lower field. There were no abdominal symptoms or physical exam findings concerning for intestinal perforation, and no history of intravenous drug abuse.

A chest x-ray showed a consolidative airspace opacity involving the right lobe and no pleural effusion. He was initially treated with piperacillin-tazobactam. Transthoracic echocardiogram (TTE) revealed stable findings. Blood cultures grew anaerobic Gram-negative rods speciated as Fusobacterium nucleatum. Driveline infection was not suspected, and cultures were not obtained. His antimicrobial therapy was switched to metronidazole. Computed tomography (CT) with contrast did not show evidence of LVAD-related abscess or LVAD cannula thrombus. Antimicrobial susceptibilities confirmed that the organism was sensitive to metronidazole, and the patient was discharged on day 4 of hospitalization in stable condition to complete a 14-day course. Surveillance cultures were negative, and control chest x-ray evidenced improvement of the previous right lower lobe consolidation. The source of his anaerobic bacteremia was his lower respiratory tract, which might be due to aspiration in the setting of obstructive sleep apnea, substance abuse, and obesity.

Three years later, the patient was diagnosed with necrotizing pneumonia. He rapidly developed multiorganic failure that was presumably due to an additional underlying infection of the LVAD. He was deemed a poor candidate for a heart transplant due to poor compliance with prior treatments. His family agreed for his transition to comfort care measures.

2.2. Patient 2

A 78-year-old Caucasian male with a past medical history of type 2 diabetes, hypertension, atrial fibrillation, gout, and ischemic cardiomyopathy with chronic severe systolic heart failure (ejection fraction of 30%) underwent a HeartMate XVE LVAD placement. His course was complicated by pump failure requiring LVAD exchange with a HeartMate II 2 years later and multiple episodes of driveline site infections due to Klebsiella pneumoniae. He presented with a recurrent episode of gastrointestinal (GI) bleeding, INR lability, and positive blood cultures for Bacteroides thetaiotaomicron. New driveline infection was not suspected then. He received aztreonam and metronidazole empirically. Chest CT showed a moderate left pleural effusion with atelectasis of the left lower lobe. The clinical assessment identified two potential sources for the bacteremia, including pneumonia with a parapneumonic effusion and bacterial translocation in the setting of GI bleeding. He was discharged home with readmission the same day due to GI bleeding and new positive blood cultures for Citrobacter freundii. He was started on ceftazidime and vancomycin. Repeated blood cultures showed clearance. The patient was sent home on trimethoprim/sulfamethoxazole, metronidazole, and rifampin for chronic suppression. The trimethoprim/sulfamethoxazole and rifampin were chosen to cover Enterobacteriaceae with increased biofilm penetration with rifampin. Metronidazole was covering the Bacteroides thetaiotaomicron. Seven months later, he was readmitted with acute GI bleeding, candidemia, and recurrent Citrobacter freundii bacteremia refractory to therapy. The patient continued to decline clinically, and he was eventually transitioned to comfort care.

2.3. Patient 3

A 47-year-old man with a past medical history of nonischemic cardiomyopathy with an ejection fraction of 10–15% and prior history of ethanol abuse presented to the emergency department with seizures and cardiogenic shock with features of acute renal failure, coagulopathy, shock liver, and pulmonary edema and required venoarterial extracorporeal membrane oxygenation. As he was not a candidate for heart transplantation, an HeartMate II LVAD was placed. As part of the workup at our institution, the patient had surveillance blood cultures before LVAD placement. Five days later, 1 out of 2 blood culture bottles became positive for Fusobacterium nucleatum. The patient was initially treated with piperacillin/tazobactam, and then switched to metronidazole two days later when the susceptibilities became available (resistant to piperacillin). We did not have initial concerns for a LVAD infection, and cultures were not obtained. CXR showed extensive airspace opacities, right greater than left. The source was presumed to be GI transient translocation vs. aspiration pneumonia. After completing 14 days of treatment, blood cultures were cleared, and a TTE showed no vegetations. The patient was discharged home. Two weeks later, he was readmitted with an elevated lactate dehydrogenase (LDH) and had urgent LVAD replacement for presumed LVAD thrombosis. Intraoperative cultures were positive for Rhizopus spp., and a CT scan showed possible postsurgical changes vs. an abscess around the area of the LVAD. Possible source of the mold was likely an undetectable fungemia with lungs as the most common port of entry. Universal fungal prophylaxis is not usually performed in this setting. The patient was started on indefinite therapy with posaconazole and received six weeks of vancomycin. A week later, the patient was readmitted with cardiogenic shock, lactic acidosis, and hypoglycemia. The patient developed LVAD thrombosis. He then developed a series of hemorrhagic complications, including epistaxis and subdural hematoma, leading to pulseless electrical activity arrest and LVAD compromise. The family declined more aggressive management, and the patient was transitioned to comfort care.

2.4. Patient 4

A 65-year-old man with severe ischemic cardiomyopathy status after placement of an LVAD, type 2 diabetes, tobacco dependence, and chronic methicillin-sensitive Staphylococcus aureus (MSSA) LVAD infection on chronic suppressive therapy with cephalexin presented with acute onset of fever and driveline site discharge. Blood cultures grew Parvimonas micra, with repeat positive culture six days later, suspicious for LVAD infection. Driveline site culture grew Corynebacterium spp. of unclear significance since this bacteria is a common skin colonizer. He had poor dentition on physical exam. CXR revealed a small/moderate right pleural effusion with mild right basilar atelectasis. TTE showed new multiple small echodensities visible in the short axis view of the aorta of unclear etiology. The primary source was thought to be his poor dentition complicated with a presumed LVAD infection. He received a six-week course of therapy with PO metronidazole with plans of transition to amoxicillin-clavulanate or doxycycline for chronic suppression of his previous infections. Thirty days after his initial bacteremia, he was still alive but readmitted with rising LDH and hematuria concerning for LVAD thrombosis, with no signs of recurrent infection.

3. Discussion

To the best of our knowledge, this report is the first to describe the clinical features of anaerobic bacteremia in patients with LVADs and severe heart failure. At admission, half of patients presented with septic shock. We found Fusobacterium species as the most frequent etiological agent (2 out of 4 cases). The most common identifiable source was of pulmonary origin in the setting of aspiration pneumonitis/pneumonia. Other possible relevant sources included dental cavities and transient GI translocation (Table 1). Driveline and LVAD-related infections were commonly present either at presentation or as a complication. All patients were initially treated with a broad-spectrum penicillin or cephalosporin and subsequently de-escalated to metronidazole. Three patients had proven recurrent bacteremia with other organisms. Chronic suppressive antibiotics were used in LVAD-related infections. Most patients had a relatively favorable short-term outcome with survival rates of 100% at 30 days and of 50% at 90 days. However, due to other multiple long-term complications, 1-year mortality stayed at 50% and increased to 75% beyond the first year following the initial episode of anaerobic bacteremia. Causes of death included other infectious etiologies highlighting the high mortality prognostic factor of the anaerobic bacteremia. The 30-day and 1-year mortality rates correlate with findings previously described in the literature [1, 14, 18]. Most patients had destination LVADs, a reflection of the patients’ comorbidities and inability to undergo heart transplant. We hypothesize that the proportion of anaerobic bacteremia of all bacterial infections among LVADs recipients is a minority. This case series is the first clinical description of this type of infection for this patient population.

Table 1: Relevant clinical features of patients with anerobic bacteremias.

Clinical feature
Patient 1
Patient 2
Patient 3
Patient 4

Sex
Male
Male
Male
Male

Age
28
78
47
65

Comorbidities
pHTN, OSA, IDA, obesity
Dilated cardiomyopathy, HTN, Afib, T2DM, gout
Nonischemic cardiomyopathy
T2DM, current smoking

LVAD present
Yes
Yes
Yes
Yes

Driveline cultures
No
Yes (previously)
Yes (during second admission)
Yes

LVAD-related infection
No
Yes (history of)
Yes (as a complication)
Yes

Risk factors
Drug abuse, former smoker
Liable INR, several GI bleeding
Anticoagulation
Poor dentition LVAD infection

Isolated bacteria
Fusobacterium nucleatum
Bacteroides thetaiotaomicron/Citrobacter Freundii
Fusobacterium nucleatum
Parvimonas micra

Source
Lung (PNA)
PNA vs. transient GI translocation
PNA
Mouth

Outcome
Improvement
Severe septic shock
Cardiogenic shock and coagulopathy
LVAD thrombosis

Treatment
MTZ
MTZ
MTZ
MTZ

Recurrent bacteremia
No
Yes
Yes
Yes

GI bleeding
No
Yes
No
No

Mortality

30 days
No
No
No
No

90 days
No
No
Yes
No

1 year
No
Yes
Yes
N/A

Deceased
Yes
Yes
Yes
No

Cause of death
Septic shock due to S. aureus bacteremia
Septic shock due to Citrobacter freundii
LVAD thrombosis, Rhizopus pocket infection, and hemorrhagic stroke
N/A

Afib: atrial fibrillation, GI: gastrointestinal, HTN: hypertension, IDA: iron deficiency anemia, LVAD: left ventricular assisted device; MTZ: metronidazole, OSA: obstructive sleep apnea, pHTN: pulmonary hypertension, PNA: pneumonia, T2DM: type 2 diabetes mellitus.

Advanced forms of heart failure have a poor prognosis, which is aggravated by the presence of comorbidities [18]. Improvements in the treatment of cardiovascular disease have been associated with a progressive increase in the prevalence of heart failure, which has led to the rise in deaths due to noncardiovascular pathologies in LVAD recipients [10, 18]. In this context, infections represent a significant emerging clinical problem, with increased mortality rates [10, 19].

LVAD infections are a common cause of morbidity with an estimated 1-year mortality rate of 20%. Moreover, in patients who develop an infection, mortality is 5.6 times higher [12, 20, 21]. Infections are also one of the leading causes of readmission in these patients [22]. LVAD-related infections are also associated with an increased risk for pump thrombosis, stroke, bleeding, prolonged hospitalizations, need for LVAD exchange, and failure to transplant.

Pneumonia and sepsis are the most common infectious complications present in patients with advanced heart failure and LVAD recipients [1, 10, 12, 18]. Driveline site infections follow in third place, occurring in approximately 19% of LVAD recipients within one year after implantation [12]. Management of bacteremia in this setting is challenging. Without an identifiable source, LVAD infections should always be suspected. Clinical assessment should pursue a driveline exit site examination looking for evidence of erythema, warmth, and purulent drainage and workup consistent with blood cultures, chest radiography, and transesophageal echocardiography. As we described in our case series, pneumonia, aspiration pneumonitis, and associated dental infections are the most common sources of anaerobic bacteremia and a significant cause of morbidity in patients with LVADs and advanced heart failure. Transient GI translocation due to the low output-associated mucosal ischemia may be a less common source to consider. Continuous-Flow LVAD support causes a distinct form of intestinal angiodysplasia which presumably is responsible for GI bleeding and translocation of intestinal bacteria [4, 23]. LVADs infection can also predispose or complicate any bacteremia including those caused by anaerobes. However, the limited number of patients in our series precludes any establishment of strong causal associations.

Bacteremia treatment will always depend on the source of the infection. In LVAD nonrelated bacteremias, clinicians should direct the courses and type of antibiotics based on the main source of infection (pneumonia, skin and soft tissue infections, etc.). Management of LVAD-related bacteremias and infections is complex and depend on several factors: type of LVAD and heart transplant candidacy, infection extension, endocarditis, mediastinitis, or isolated driveline infections, and presence of metastatic foci, type of bacteria, and complications. They usually require 6-week courses followed by chronic suppressive antibiotics. Suppressive antibiotics are given to decrease the risk of relapses in LVAD-related infections since bacteria can persist in the devices’ biofilms.

Infection and sepsis contribute significantly to mortality in LVAD recipients [1, 10, 12, 20, 21]. Our results suggest that anaerobic bacteremia can be considered as an adverse prognostic factor of mortality in patients with destination LVADs. Infections with anaerobic bacteria originating from the oropharyngeal flora can complicate with bacteremia or aspiration pneumonia. Thus, we recommend implementing preventive strategies with a comprehensive dental care evaluation in patients with LVADs and advanced heart failure.

Conflicts of Interest

The authors declare that they have no conflicts of interest.

References

A. M. Walker, M. Drozd, M. Hall et al., “Prevalence and predictors of sepsis death in patients with chronic heart failure and reduced left ventricular ejection fraction,” Journal of the American Heart Association, vol. 7, no. 20, Article ID e009684, 2018.

D. Mozaffarian, E. J. Benjamin, A. S. Go et al., “Heart disease and stroke statistics-2016 update a report from the American Heart Association,” Circulation, vol. 133, no. 4, pp. e38–e48, 2016.

R. M. Cubbon, C. P. Gale, L. C. Kearney et al., “Changing characteristics and mode of death associated with chronic heart failure caused by left ventricular systolic dysfunction: a study across therapeutic eras,” Circulation: Heart Failure, vol. 4, no. 4, pp. 396–403, 2011.

S. P. Pinney, A. C. Anyanwu, A. Lala, J. J. Teuteberg, N. Uriel, and M. R. Mehra, “Left ventricular assist devices for lifelong support,” Journal of the American College of Cardiology, vol. 69, no. 23, pp. 2845–2861, 2017.

E. A. Rose, A. C. Gelijns, A. J. Moskowitz et al., “Long-term use of a left ventricular assist device for end-stage heart failure,” New England Journal of Medicine, vol. 345, no. 20, pp. 1435–1443, 2001.

L. W. Miller, F. D. Pagani, S. D. Russell et al., “Use of a continuous-flow device in patients awaiting heart transplantation,” New England Journal of Medicine, vol. 357, no. 9, pp. 885–896, 2007.

J. G. Rogers, J. Butler, S. L. Lansman et al., “Chronic mechanical circulatory support for inotrope-dependent heart failure patients who are not transplant candidates: results of the INTrEPID trial,” Journal of the American College of Cardiology, vol. 50, no. 8, pp. 741–747, 2007.

S. Setoguchi, L. W. Stevenson, and S. Schneeweiss, “Repeated hospitalizations predict mortality in the community population with heart failure,” American Heart Journal, vol. 154, no. 2, pp. 260–266, 2007.

D. S. Lee, P. Gona, I. Albano et al., “A systematic assessment of causes of death after heart failure onset in the community: impact of age at death, time period, and left ventricular systolic dysfunction,” Circulation: Heart Failure, vol. 4, no. 1, pp. 36–43, 2011.

E. T. Mesquita, “Infections in heart failure-impact on mortality,” Arquivos Brasileiros de Cardiologia, vol. 110, pp. 371-372, 2018.

L. M. Baddour, M. A. Bettmann, A. F. Bolger et al., “Nonvalvular cardiovascular device-related infections,” Circulation, vol. 108, no. 16, pp. 2015–2031, 2003.

J. K. Kirklin, D. C. Naftel, F. D. Pagani et al., “Seventh INTERMACS annual report: 15,000 patients and counting,” The Journal of Heart and Lung Transplantation, vol. 34, no. 12, pp. 1495–1504, 2015.

W. L. Holman, J. L. Skinner, K. B. Waites, R. L. Benza, D. C. McGiffin, and J. K. Kirklin, “Infection during circulatory support with ventricular assist devices,” The Annals of Thoracic Surgery, vol. 68, no. 2, pp. 711–716, 1999.

G. A. Dagher, K. Hajjar, C. Khoury et al., “Outcomes of patients with systolic heart failure presenting with sepsis to the emergency department of a tertiary hospital: a retrospective chart review study from Lebanon,” BMJ Open, vol. 8, no. 7, Article ID e022185, 2018.

J. J. C. Nienaber, S. Kusne, T. Riaz et al., “Clinical manifestations and management of left ventricular assist device-associated infections,” Clinical Infectious Diseases, vol. 57, no. 10, pp. 1438–1448, 2013.

J. Nienaber, M. P. Wilhelm, and M. R. Sohail, “Current concepts in the diagnosis and management of left ventricular assist device infections,” Expert Review of Anti-infective Therapy, vol. 11, no. 2, pp. 201–210, 2013.

J. A. Goldstein and M. J. Kern, “Percutaneous mechanical support for the failing right heart,” Cardiology Clinics, vol. 30, no. 2, pp. 303–310, 2012.

F. Pons, J. Lupón, A. Urrutia et al., “Mortality and cause of death in patients with heart failure: findings at a specialist multidisciplinary heart failure unit,” Revista Española de Cardiología (English Edition), vol. 63, no. 3, pp. 303–314, 2010.

J. N. Cardoso, C. H. Del Carlo, M. T. D. Oliveira Junior, M. E. Ochiai, R. Kalil Filho, and A. C. P. Barretto, “Infection in patients with decompensated heart failure: in-hospital mortality and outcome,” Arquivos Brasileiros de Cardiologia, vol. 110, pp. 364–370, 2018.

R. John, K. D. Aaronson, W. E. Pae et al., “Drive-line infections and sepsis in patients receiving the HVAD system as a left ventricular assist device,” The Journal of Heart and Lung Transplantation, vol. 33, no. 10, pp. 1066–1073, 2014.

R. J. Gordon, A. D. Weinberg, F. D. Pagani et al., “Prospective, multicenter study of ventricular assist device infections,” Circulation, vol. 127, no. 6, pp. 691–702, 2013.

I. D. Gregoric, P. Poredos, and M. K. Jezovnik, “Medical complications in patients with LVAD devices,” European Society of Cardiology, vol. 14, 2017.

J. Kang, S. Hennessy-Strahs, P. Kwiatkowski et al., “Continuous-flow LVAD support causes a distinct form of intestinal angiodysplasia,” Circulation Research, vol. 121, no. 8, pp. 963–969, 2017.