Case Reports in Orthopedics
Volume 2017 (2017), Article ID 5846368, 6 pages
https://doi.org/10.1155/2017/5846368

Case Report

Intra-Articular Osteoid Osteoma as a Cause of Anteromedial Knee Pain

Ergin Sagtas,¹ Kemal Gokkus,² and Ahmet Turan Aydin²

¹Department of Radiology, Memorial Antalya Hospital, Zafer Mah. Yildirim Beyazit Cad. No. 91, Kepez, Antalya, Turkey
²Department of Orthopedic Surgery and Trauma, Memorial Antalya Hospital, Zafer Mah. Yildirim Beyazit Cad. No. 91, Kepez, Antalya, Turkey

Correspondence should be addressed to Kemal Gokkus; kgokkus@gmail.com

Received 24 January 2017; Accepted 3 April 2017; Published 2 May 2017

Academic Editor: Kaan Erler

Copyright © 2017 Ergin Sagtas et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

A 32-year-old male patient presented to our clinic with chronic left knee pain that was ongoing for about 1.5 years. The patient visited several times our clinic and the other clinics; conservative treatment (including rest, knee brace, and ice application with NSAIDs) was recommended by various different doctors. The anamnesis, physical examination, and plain radiography were nonspecific. Early MRI findings mislead us to believe it is bone marrow edema. One and half years with noneffective treatment, the knee pain persisted. At the latest visit intra-articular osteoid osteoma was suspected and the knee MRI with CT was employed. Even though the diagnosis of intra-articular osteoid osteoma often presents a challenge for the surgeons, with a present awareness of intra-articular osteoid osteomas which lack the characteristic sclerotic lesions and nidus on plain X-rays and the aid of multislice CT, a correct diagnosis which warrants proper treatment can be achieved. The possibility of osteoid osteomas, especially in young adults with persistent knee pain with unknown reasons that show normal plain radiographs results, must not be overlooked. The treatment method of these lesions should be customized depending on the location of the lesion, experience of the surgeon, and cost of method.

1. Introduction

Osteoid osteoma, first described by Jaffe in 1935 [1], is a common bone tumor that represents about 10% of all benign bone lesions [2]. According to Rizzoli Institute records (one of the famous institutions across the world regarding the bone tumors, the institution reported the data that has been collected between 1900 and 2009), it constitutes 18% of all benign tumors [3]. It is mainly seen within long bones and has a very typical appearance on X-rays with a tiny radiolucent zone, surrounded by reactive circumferential sclerosis (nidus) [4–6]. One of the characteristic clinical manifestations of this tumor is nocturnal pain, which can be alleviated using NSAIDs [7].

Approximately 13% of osteoid osteomas arise within the joint (intra-articular). Hip joint is the most commonly affected area, followed by the ankle, elbow, wrist, and knee [2].

Intra-articular location of the osteoid osteoma obscures classical symptoms and radiologic appearance, which, thus, can cause misdiagnosis and delayed proper treatment for the condition [8].

In this report, we would like to make a contribution to the literature by sharing our experience on a case with a lesion located on anteromedial tibia plateau (within joint capsule) and a delayed diagnosis by 1.5 years.

2. Case Report

A 32-year-old male patient presented to our clinic with chronic left knee pain that lasted for about 1.5 years. The patient visited several times our clinic before conservative treatment (including rest, knee brace, and ice application with NSAIDs) was recommended by two different doctors. The pain persisted during resting period and got worse during the night. NSAIDs caused temporary and partial pain relief. No significant medical stories from the patient or his family were seen. Physical examination showed some swelling and tenderness on anteromedial side of the left knee. Meniscal tests were negative, while the left quadriceps muscle showed moderate atrophy with an intact range of motion. Left knee radiographs showed no abnormalities (Figure 1).

(a)

(b)

Figure 1: Normal findings at plain radiography.

When patient’s MRI results were assessed, initial MRI of the patient, taken 1.5 years ago, at the beginning of the complaints, showed bone marrow edema. Second MRI, which is recent, showed a nidus-like view with bone marrow edema (Figure 2).

(a)

(b)

(c)

Figure 2: T2 weighted images (a and c) showed the hypointense lesion (yellow arrow) located at tibia anteromedial plateau with ill-defined bone marrow edema; (b) T1 weighted image showed the well-defined bordered hypointense lesion (yellow arrow).

CT scans showed a small radiolucent zone, surrounded by reactive circumferential sclerosis, which is typical for osteoid osteoma (Figure 3). Based on physical examination findings and radiological results, the patient was diagnosed with intra-articular osteoid osteoma, arising from anteromedial tibia plateau. A surgical intervention for the open excision of the lesion was planned.

(a)

(b)

(c)

Figure 3: Coronal (a), axial (b), and sagittal (c) CT images showed the perinidal sclerosis with centrally calcified nidus (yellow arrow) consistent with an osteoid osteoma.

Under general anesthesia, pneumatic tourniquet was applied (350 mmHg) and a medial parapatellar incision was made. After opening the joint capsule, the Hoffa were stripped in the direction of lesion (towards medial), exposing the undersurface of anterior horn of medial meniscus. Intervention area was detected after the discolored and irregular lesion surface was marked (Figure 4). Tumor tissues were excised using gouges and curettes. Following the excision, the gap caused by the excision was filled with bone wax. Submeniscal tissues and capsule were closed using 2/0 Vicryl sutures. Following deflation of the pneumatic tourniquet, subcutaneous and cutaneous layers were sutured using appropriate materials.

Figure 4: Intraoperative photo that shows surface discoloration over the lesion.

Histopathological examination of the surgically removed lesion confirmed the initial diagnosis of osteoid osteoma (Figure 5). The patient was completely pain-free following the surgery and the joint gained full range of motion and the patient reported complete recovery from the condition, confirmed by follow-up visits on the 6th and 12th month of the surgery.

(a)

(b)

Figure 5: Photomicrograph of the lesion revealing abundant osteoid formation characteristic of an osteoid osteoma [H&E, ×4 obj. (a), ×10 obj. (b)].

3. Discussion

In this article, we would like to highlight the difficulties on the diagnosis of the intra-articular osteoid osteoma. This atypical presentation with uncharacteristic radiological findings and the lack of trauma history usually directs the surgeon not to order unnecessary MRI/CT images, which causes delay on correct diagnosis.

Szendroi et al.’s [9] study compared the diagnosis periods for intra-articular osteoid osteoma and other locations. They reported that the mean diagnosis period was 22.6 months in intra-articular osteoid osteoma and 8.5 months for other locations.

Another study done by Kattapuram et al. [7] reported 3 main factors that contributed to this diagnostic challenge. First of those factors is the rarity of osteoid osteoma as a joint pain reason, as opposed to other causes. Second factor is the different manifestations of osteoid osteoma, such as joint effusion and/or response to salicylates [10–15], which can also be seen in other joint conditions which make the differential diagnosis more difficult. Third and last factor is that osteoid osteoma can cause complaints, even long before the lesion becomes apparent on radiological studies [11, 12, 16, 17]. Those three factors all contribute to the delay in diagnosis [13, 17, 18].

In addition to other authors, the low capability of producing new thick bone of the intracapsular periosteum was first underlined by Freiberger et al. [19]. Bauer et al.’s [20] case review that included 20 patients from 1972 to 1989 reported the importance of histopathological changes of the joint, affected by synovium-adjacent osteoid osteomas. They argued that the osteoid osteoma has the potential to cause lymphofollicular synovitis. In the following studies, other authors showed the arachidonic and metabolic pathways and production of prostaglandins (PGs) from the nidus, which caused synovitis in the first place [21–26].

These atypical anatomical, pathological, and physiological features of the affected intracapsular bone and adjacent synovium are all contributing factors in diagnosis delay of intra-articular osteoid osteoma. The patient can be subjected to redundant treatments such as unnecessary arthroscopies and/or arthrotomies with a delay in correct diagnosis and proper treatment [27].

As plain radiographs usually show no abnormalities in the joint, they have little value on the diagnosis. However, they are still required for elimination of other possible conditions and should be the first in line for diagnostic investigation in a normal diagnostic algorithm.

Another valuable investigation technique for classic extra-articular located osteoid osteomas is scintigraphy which shows the characteristic double density sign [28]. However, if the lesion is intra-articular, this sign is usually absent and lesion activity is limited within the joint due to associated synovitis, osteoporosis, and hyperemia [2]. Bone scintigraphy can be used to eliminate other possible lesions located on proximal femur that is associated with knee pain [29, 30].

MRI images can also be misleading for the surgeon, as the detection of synovitis or bone marrow edema during the early stages of the disease might lead the surgeon to misdiagnose the condition as arthritis or stress fracture of the bone. As in our case, nidus appearance usually develops at the late stages of the disease and is not evident on MRI until that time. Krause et al.’s [31] case report emphasized the stage-dependent MRI appearance by detailing the delay in nidus formation.

As opposed to our case, in the cases where the patient had a trauma or bruising history, the surgeons usually tend to suspect other causes such as meniscal tears, chondral lesions, and collateral ligament tears or bone bruising. In those situations, the surgeon is likely to order X-rays and MRI for diagnosis. Bone marrow edema view during early stages of the osteoid osteoma might lead the surgeon to misdiagnose the condition as a bone bruise or a stress fracture, therefore delaying the correct diagnosis, as in our case.

CT remains the method of choice for investigating intra-articular osteoid osteomas [2]. As in other bone lesions, CT is the main examination tool used for determining the lesion (nidus) and preoperative planning of the intervention. CT scans proved it to be a valuable tool for revealing small nidus, especially if those lesions are in the bones with complex anatomy such as spine or hip [32]. Pikoulas et al. [33] underlined the importance of slice thickness taken for the suspected nidus and recommended a thickness of at least 1 mm.

Recently, the new imagining methods such as SPECT/CT have gained popularity. SPECT/CT can be very useful especially in those cases when the osteoid osteoma is intra-articular and the X-ray and MRI are not informative. Sharma et al. [34] evaluated the data of 31 patients who had undergone diphosphonate (MDP) bone scintigraphy (BS) with SPECT/CT for clinically and/or radiologically suspected osteoid osteoma, retrospectively. In this study they compared the sensitivity, specificity, and accuracy of SPECT/CT, CT alone, and bone scintigraphy. They concluded that BS with SPECT/CT shows excellent diagnostic accuracy for osteoid osteoma and can be used as a one-stop imaging modality for the same. They also concluded that BS with SPECT/CT is superior to planar BS and CT alone for the diagnosis of suspected osteoid osteoma [34].

Latter Squier et al. [35] used 99mTc-methylene diphosphonate single-photon emission computed tomography/computed tomography for the imaging of suspected osteoid osteoma in the cervical spine. They demonstrated focal increased radiopharmaceutical activity in the right C2 lamina, which was associated with an osteolytic lesion with a central irregular sclerotic nidus. Surgical pathology confirmed an osteoid osteoma. They emphasized the value of this diagnostic tool on imaging osteoid osteoma which was located in cervical lamina.

Farid et al. [36] published an article in Clinical Nuclear Medicine Journal in which they emphasized the fusion of SPECT and CT could improve the specificity of abnormal scintigraphic findings. Unfortunately, in our hospital till to now we do not have this diagnostic tool. So we could not use this diagnostic advantage in our case.

Even though there were several reports on intra-articular osteoid osteomas in the distal femur [33], patella [37], and lateral tibia plateau [38, 39], case reports on anteromedial tibia plateau located lesions are quite few. Our literature scan revealed that only one study done by Harun et al. [40] reported a case of intra-articular osteoid osteoma of anteromedial tibia plateau that was treated by open surgery. Lesion location and surgery techniques used were like our case.

Despite the fact that CT-guided thermoablation is getting more and more popular for treating osteoid osteoma, it has several prerequisites such as assistance from a radiologist and the fact that the procedure has to be performed in either a CT room or an operating theatre equipped with a CT scanner. RF ablation might also cause cartilage degeneration when used for resecting subchondral osteoid osteomas [41, 42]. Therefore, we preferred open excision technique, as the lesion was located on the anteromedial edge of the tibia plateau that was inaccessible by arthroscopy.

In conclusion, here we presented an osteoid osteoma case that arises within knee joint which was successfully treated by open excision. Even though the diagnosis of intra-articular osteoid osteoma often presents a challenge for the surgeons, with a present awareness of intra-articular osteoid osteomas which lack the characteristic sclerotic lesions and nidus on plain radiography and the aid of multislice CT, a correct diagnosis which warrants proper treatment can be achieved. The possibility of osteoid osteomas, especially in young adults with persistent knee pain with unknown reasons that show normal plain radiograph results, must not be overlooked. The treatment method of these lesions should be customized depending on the location of the lesion, experience of the surgeon, and cost of method.

Abbreviations

CT: | Computed tomography
IAOO: | Intra-articular osteoid osteoma
RF: | Radiofrequency
MRI: | Magnetic Resonance
NSAID: | Nonsteroidal anti-inflammatory drugs
PGs: | Prostaglandin(s).

Ethical Approval

Antalya Memorial Hospital Ethical committee approved this study.

Consent

The written informed consent was obtained from the patient. The patient has consented to using the photography (that was taken intraoperatively) and radiologic images in a scientific paper.

Conflicts of Interest

The authors declare that there are no conflicts of interest regarding the publication of this paper.

Authors’ Contributions

Ahmet Turan Aydin and Kemal Gokkus contributed to the performing of surgeries of the case and collected the data. Ergin Sagtas and Kemal Gokkus contributed to the literature scan and establishing the discussion part together. Ergin Sagtas and Kemal Gokkus have been involved in drafting the manuscript or revising it critically for important intellectual content. Ahmet Turan Aydin came up with the main idea for the study. All authors read and approved the final manuscript.

Acknowledgments

The authors would like to thank Antalya Memorial Hospital Chief of Medicine Dr. Omer Ozozan for providing the necessary settings for the study. They would like to thank Taylan Alpaslan for English language editing. They would like to thank their mentor Professor Ahmet Turan Aydin for his exceptional mind and ideas regarding this study.

References

H. L. Jaffe, “Osteoid Osteoma, a benign osteoblastic tumor composed of osteoid and atypical bone,” Archieves of Surgery, vol. 31, pp. 708–723, 1935.

S. D. Allen and A. Saifuddin, “Imaging of intra-articular osteoid osteoma,” Clinical Radiology, vol. 58, no. 11, pp. 845–852, 2003.

http://tumorarchive.ior.it/node/28.

S. Sierre, S. Innocenti, J. Lipsich, L. Lanfranchi, H. Questa, and S. Moguillansky, “Percutaneous treatment of osteoid osteoma by CT-guided drilling resection in pediatric patients,” Pediatric Radiology, vol. 36, no. 2, pp. 115–118, 2006.

M. H. Klein and S. Shankman, “Osteoid osteoma: radiologic and pathologic correlation,” Skeletal Radiology, vol. 21, no. 1, pp. 23–31, 1992.

M. Campanacci, “Bone and soft tissue tumors,” in Piccin Nuoava Libraria, Padova, Enneking WF, Ed., pp. 391–414, Springer, Wien, 2nd edition, 1999.

S. V. Kattapuram, D. C. Kushner, W. C. Phillips, and D. I. Rosenthal, “Osteoid osteoma: an unusual cause of articular pain,” Radiology, vol. 147, no. 2, pp. 383–387, 1983.

A. Kornberg, M. Stangl, J. Scheele, and C. Hammer, “Chronic persistent knee pain after repeated diagnostic arthroscopy: osteoid osteoma, a primarily overlooked diagnosis in a young woman,” Archives of Orthopaedic And Trauma Surgery, vol. 121, no. 5, pp. 291–293, 2001.

M. Szendroi, K. Köllo, I. Antal, J. Lakatos, and G. Szoke, “Intraarticular osteoid osteoma: clinical features, imaging results, and comparison with extra articular localization,” The Journal of Rheumatology, vol. 31, no. 5, pp. 957–964, May 2004.

M. S. Sherman, “Osteoid osteoma; review of the literature and report of 30 cases,” The Journal of Bone and Joint Surgery. American Volume, vol. 29, no. 4, pp. 918–930, 1947.

J. P. O'Hara 3rd, C. Tegtmeyer, D. E. Sweet, and F. C. McCue, “Angiography in the diagnosis of osteoid-osteoma of the hand,” The Journal of Bone and Joint Surgery. American Volume, vol. 57, no. 2, pp. 163–166, 1975.

“Case records of the Massachusetts General Hospital. Case 36-1961.,” New England Journal of Medicine, vol. 264, pp. 1053–1057, 1961.

P. E. Giustra and Freiberger R. H., “Freiberger RH.Severe growth disturbance with osteoid osteoma. A report of two cases involving the femoral neck,” Radiology, vol. 96, no. 2, pp. 285–288, 1970.

M. S. Sherman, “Osteoid osteoma associated with changes in adjacent joint; report of two cases,” The Journal of Bone and Joint Surgery. American Volume, vol. 29, no. 2, pp. 483–490, 1947.

J. S. Golding, “The natural history of osteoid osteoma; with a report of twenty cases,” The Journal of Bone and Joint Surgery. British Volume, vol. 36B, no. 2, pp. 218–229, 1954.

M. B. Dockerty, R. K. Ghormley, and A. E. Jackson, “Osteoid osteoma; a clinicopathologic study of 20 cases,” Annals of Surgery, vol. 133, no. 1, pp. 77–89, 1951.

H. A. Keim and Reina E. G., “Reina EG.Osteoid-osteoma as a cause of scoliosis,” The Journal of Bone and Joint Surgery. American Volume, vol. 57, no. 2, pp. 159–163, 1975.

A. Norman and H. D. Dorfman, “Osteoid osteoma inducing pronounced overgrowth and deformity of bone,” Clinical Orthopaedics and Related Research, vol. 110, pp. 233–238, 1975.

R. H. Freiberger, B. S. Loitman, M. Helpern, and T. C. Thompson, “Osteoid osteoma; a report on 80 cases,” The American Journal of Roentgenology Radium Therapy and Nuclear Medicine, vol. 82, no. 2, pp. 194–205, 1959.

T. W. Bauer, R. J. Zehr, G. H. Belhobek, and K. E. Marks, “Juxta-articular osteoid osteoma,” The American Journal of Surgical Pathology, vol. 15, no. 4, pp. 381–387, 1991.

Y. Kawaguchi, C. Sato, T. Hasegawa, S. Oka, H. Kuwahara, and H. Norimatsu, “Intraarticular osteoid osteoma associated with synovitis: a possible role of cyclooxygenase-2 expression by osteoblasts in the nidus,” Modern Pathology, vol. 13, no. 10, pp. 1086–1091, 2000.

J. T. Markley and M. Dunn, “Prostaglandins, a mechanism for pain mediation in osteoid osteoma,” Orthopaedic Transactions, vol. 6, article 72, 1982.

F. Greco, F. Tamburrelli, and G. Ciabattoni, “Prostaglandins in osteoid osteoma,” International Orthopaedics, vol. 15, no. 1, pp. 35–37, 1991.

F. Greco, F. Tamburrelli, and G. Ciabattoni, “Intra-articular osteoid osteoma,” Italian Journal of Orthopaedics and Traumatology, vol. 18, no. 1, pp. 63–69, 1992.

G. Ciabattoni, F. Tamburrelli, and F. Greco, “Increased prostacyclin biosynthesis in patients with osteoid osteoma,” Eicosanoids, vol. 4, article 165, 1991.

T. Hasegawa, T. Hirose, R. Sakamoto, K. Seki, T. Ikata, and K. Hizawa, “Mechanism of pain in osteoid osteomas: an immunohistochemical study,” Histopathology, vol. 22, no. 5, pp. 487–491, 1993.

A. D. Georgoulis, C. D. Papageorgiou, U. G. Moebius, J. Rossis, A. Papadonikolakis, and P. N. Soucacos, “The diagnostic dilemma created by osteoid osteoma that presents as knee pain,” Arthroscopy, vol. 18, no. 1, pp. 32–37, 2002.

C. A. Helms, R. S. Hattner, and J. B. Vogler, “Osteoid osteoma: radionuclide diagnosis,” Radiology, vol. 151, no. 3, pp. 779–784, 1984.

J. S. Torg, T. Loughran, H. Pavlov et al., “Osteoid osteoma: distant, periarticular, and subarticular lesions as a cause of knee pain,” Sports Medicine, vol. 2, no. 4, pp. 296–304, 1985.

F. Franceschi, A. Marinozzi, G. Rizzello, R. Papalia, M. Rojas, and V. Denaro, “Computed tomography-guided and arthroscopically controlled en bloc retrograde resection of a juxta-articular osteoid osteoma of the tibial plateau,” Arthroscopy, vol. 21, no. 3, pp. 351–359, 2005.

M. Krause, R. Oheim, N. M. Meenen, K.-H. Frosch, and M. Amling, “Intra-articular osteoid osteoma in the proximal tibia and its imaging characteristics,” Knee, vol. 23, no. 5, pp. 915–919, 2016.

J. L. Gamba, S. Martinez, J. Apple, J. M. Harrelson, and J. A. Nunley, “Computed tomography of axial skeletal osteoid osteomas,” AJR. American Journal of Roentgenology, vol. 142, no. 4, pp. 769–772, 1984.

C. Pikoulas, G. Mantzikopoulos, L. Thanos, D. Passomenos, C. Dalamarinis, and K. Glampedaki-Dagianta, “Unusually located osteoid osteomas,” European Journal of Radiology, vol. 20, no. 2, pp. 120–125, 1995.

P. Sharma, A. Mukherjee, S. Karunanithi et al., “99mTc-methylene diphosphonate SPECT/CT as the one-stop imaging modality for the diagnosis of osteoid osteoma,” Nuclear Medicine Communications, vol. 35, no. 8, pp. 876–883, 2014.

S. B. Squier, J. I. Lewis, J. M. Accurso, and M. K. Jain, “⁹⁹mTc-methylene diphosphonate single-photon emission computed tomography/computed tomography improves the diagnostic accuracy of osteoid osteoma,” Indian Journal of Nuclear Medicine, vol. 31, no. 4, pp. 298–300, 2016.

K. Farid, G. El-Deeb, and N. Caillat Vigneron, “SPECT-CT improves scintigraphic accuracy of osteoid osteoma diagnosis,” Clinical Nuclear Medicine, vol. 35, no. 3, pp. 170–171, 2010.

J. M. Corbett, A. H. Wilde, L. J. McCormack, and C. M. Evarts, “Intra-articular osteoid osteoma; a diagnostic problem,” Clinical Orthopaedics And Related Research, vol. 98, pp. 225–230, 1974.

F. Franceschi, A. Marinozzi, R. Papalia, U. G. Longo, G. Gualdi, and E. Denaro, “Intra- and juxta-articular osteoid osteoma: a diagnostic challenge: misdiagnosis and successful treatment: a report of four cases.,” Archives of Orthopaedic And Trauma Surgery, vol. 126, no. 10, pp. 660–667, 2006.

Y. Eggel, N. Theumann, and F. Lüthi, “Intra-articular osteoid osteoma of the knee: clinical and therapeutical particularities,” Joint Bone Spine, vol. 74, no. 4, pp. 379–381, 2007.

M. Harun, Y. Hayrettin, M. Serhat et al., “A typical location of an osteoid osteoma with atypical anterior knee pain,” International Journal of Surgery Case Reports, vol. 5, no. 11, pp. 873–876, 2014.

M. Furukawa, U. Anazawa, K. Horiuchi et al., “erratum: arthroscopic removal of intra-articular osteoid osteoma in the knee: case report and review of the literature,” Journal of Orthopaedic Science, vol. 16, no. 3, pp. 321–325, 2011.

N. Adachi, S. Shimose, A. Nakamae, A. Okuhara, G. Kamei, and M. Ochi, “Intra-articular osteoid osteoma of the lateral tibial plateau treated with arthroscopically assisted removal and retrograde osteochondral grafting,” Knee, vol. 21, no. 1, pp. 343–348, 2014.