Case Reports in Otolaryngology
Volume 2019 (2019), Article ID 3852428, 1 page
https://doi.org/10.1155/2019/3852428

Corrigendum

Corrigendum to “A Lip Lump: An Unexpected Histological Diagnosis of a Lip Schwannoma”

Thomas Haigh,¹ Raad John Glore,¹ David Gouldesbrough,¹ and Winson Wong²

¹Bradford Teaching Hospitals NHS Foundation Trust, Bradford BD9 6RJ, UK
²Bradford Teaching Hospitals NHS Foundation Trust, University of Leeds, Leeds, UK

Correspondence should be addressed to Thomas Haigh; t_haigh@hotmail.co.uk

Received 3 July 2019; Accepted 9 July 2019; Published 21 July 2019

Copyright © 2019 Thomas Haigh et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “A Lip Lump: An Unexpected Histological Diagnosis of a Lip Schwannoma” [1], the name of the second author was given incorrectly as John Raad Glore. The author’s name should have been written as Raad John Glore. The revised authors’ list is shown above.

References

T. Haigh, J. R. Glore, D. Gouldesbrough, and W. Wong, “A lip lump: an unexpected histological diagnosis of a lip schwannoma,” Case Reports in Otolaryngology, vol. 2017, Article ID 3107362, 2 pages, 2017.