Case Reports in Pediatrics
Volume 2015 (2015), Article ID 328717, 1 page
http://dx.doi.org/10.1155/2015/328717

Corrigendum

Corrigendum to “Netherton Syndrome in a Neonate with Possible Growth Hormone Deficiency and Transient Hyperaldosteronism”

Ilias Chatziioannidis,¹ Evgenia Babatseva,¹ Aikaterini Patsatsi,² Asimina Galli-Tsinopoulou,³ Constantina Sarri,⁴ Maria Lithoxopoulou,¹ George Mitsiakos,¹ Paraskevi Karagianni,¹ Christos Tsakalidis,¹ Zissis Mamuris,⁴ and Nikolaos Nikolaidis¹

¹2nd Neonatal Intensive Care Unit, G.P.N. Papageorgiou Hospital, Aristotle University Faculty of Medicine, Agias Triados 3B Street, Pefka, 57010 Thessaloniki, Greece
²2nd Dermatology Department, G.P.N. Papageorgiou Hospital, Aristotle University Faculty of Medicine, Thessaloniki, Greece
³4th Department of Pediatrics, G.P.N. Papageorgiou Hospital, Aristotle University Faculty of Medicine, Thessaloniki, Greece
⁴Laboratory of Genetics, Evolutionary & Comparative Biology, Biochemistry & Biotechnology Department, University of Thessaly, Larissa, Greece

Received 21 September 2015; Accepted 28 September 2015

Copyright © 2015 Ilias Chatziioannidis et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the paper titled “Netherton Syndrome in a Neonate with Possible Growth Hormone Deficiency and Transient Hyperaldosteronism,” [1] the first and last names of all the authors were reversed. The correct names in order (first name, last name) have been shown above.

References

C. Ilias, B. Evgenia, P. Aikaterini et al., “Netherton syndrome in a neonate with possible growth hormone deficiency and transient hyperaldosteronism,” Case Reports in Pediatrics, vol. 2015, Article ID 818961, 4 pages, 2015.