Cardiology Research and Practice
Volume 2019 (2019), Article ID 3849547, 2 pages
https://doi.org/10.1155/2019/3849547

Erratum

Erratum to “Comparison of Echocardiographic and Electrocardiographic Mapping for Cardiac Resynchronisation Therapy Optimisation”

Helder Pereira,1,2 Tom A. Jackson,1,3 Simon Claridge,1,3 Jonathan M. Behar,1,3 Cheng Yao,⁴ Benjamin Sieniewicz,1,3 Justin Gould,1,3 Bradley Porter,1,3 Baldeep Sidhu,1,3 Jaswinder Gill,³ Steven Niederer,¹ and Christopher A. Rinaldi³

¹Division of Imaging Sciences and Biomedical Engineering, King’s College London, London, UK
²Cardiac Rhythm Management Service, St George’s University Hospitals NHS Foundation Trust, London, UK
³Cardiovascular Department, Guy’s and St Thomas’ NHS Foundation Trust, London, UK
⁴Medtronic Ltd, London, UK

Correspondence should be addressed to Helder Pereira; helder.pereira@kcl.ac.uk

Received 18 July 2019; Accepted 29 July 2019; Published 28 August 2019

Copyright © 2019 Helder Pereira et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Comparison of Echocardiographic and Electrocardiographic Mapping for Cardiac Resynchronisation Therapy Optimisation” [1], there was an error in Figure 5, where Figures 5(a) and 5(b) were duplicated, due to a production error. The corrected figure is shown below.

(a)

(b)

Figure 5: VaT10-90 and TVaT values in each patient according to the VVD setting. LVx, intraventricular pacing interval with the left ventricle paced first by x milliseconds; RVx, intraventricular pacing interval with the right ventricle paced first by x milliseconds; SIM, intraventricular pacing interval with the right and left ventricles paced simultaneously; TVaT, total ventricular activation time; VaT10-90, ventricular activation time 10–90.

References

H. Pereira, T. A. Jackson, S. Claridge et al., “Comparison of Echocardiographic and Electrocardiographic Mapping for Cardiac Resynchronisation Therapy Optimisation,” Cardiology Research and Practice, vol. 2019, Article ID 4351693, 9 pages, 2019.