Cardiology Research and Practice
Volume 2021 (2021), Article ID 5137403, 1 page
https://doi.org/10.1155/2021/5137403

Corrigendum

Corrigendum to “Comparison of the CAMI-NSTEMI and GRACE Risk Model for Predicting In-Hospital Mortality in Chinese Non-ST-Segment Elevation Myocardial Infarction Patients”

Peng Wang,1,2 Hongliang Cong,² Ying Zhang,² and Yujie Liu²

¹Tianjin Medical University, Tianjin, China
²Department of Cardiology, Tianjin Chest Hospital, Tianjin, China

Correspondence should be addressed to Hongliang Cong; chlwenzhang@126.com

Received 29 October 2020; Accepted 29 October 2020; Published 13 February 2021

Copyright © 2021 Peng Wang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Comparison of the CAMI-NSTEMI and GRACE Risk Model for Predicting In-Hospital Mortality in Chinese Non-ST-Segment Elevation Myocardial Infarction Patients” [1], the authors Hongliang Cong, Ying Zhang, and Yujie Liu were affiliated to the “Tianjin Medical University, Tianjin, China” which is incorrect. The correct affiliation for the authors Hongliang Cong, Ying Zhang, and Yujie Liu is “Department of Cardiology, Tianjin Chest Hospital, Tianjin, China.” The correct affiliations are also shown above.

References

P. Wang, H. Cong, Y. Zhang, and Y. Liu, “Comparison of the CAMI-NSTEMI and GRACE risk model for predicting in-hospital mortality in Chinese non-ST-segment elevation myocardial infarction patients,” Cardiology Research and Practice, vol. 2020, Article ID 2469281, 6 pages, 2020.