Disease Markers
Volume 2016 (2016), Article ID 8653290, 1 page
http://dx.doi.org/10.1155/2016/8653290

Corrigendum

Corrigendum to “Chaperonin-Containing t-Complex Protein-1 Subunit β as a Possible Biomarker for the Phase of Glomerular Hyperfiltration of Diabetic Nephropathy”

Chung-Ze Wu,1,2 Li-Chien Chang,³ Yuh-Feng Lin,1,4 Yi-Jen Hung,⁵ Dee Pei,⁶ and Jin-Shuen Chen⁷

¹Graduate Institute of Clinical Medicine, College of Medicine, Taipei Medical University, Taipei, Taiwan
²Division of Endocrinology and Metabolism, Department of Internal Medicine, Shuang Ho Hospital, Taipei Medical University, Taipei, Taiwan
³School of Pharmacy, National Defense Medical Center, Taipei, Taiwan
⁴Division of Nephrology, Department of Internal Medicine, Shuang Ho Hospital, Taipei Medical University, Taipei, Taiwan
⁵Division of Endocrinology and Metabolism, Department of Internal Medicine, Tri-Service General Hospital, National Defense Medical Center, Taipei, Taiwan
⁶Division of Endocrinology and Metabolism, Department of Internal Medicine, Cardinal Tien Hospital, Medical School, Catholic Fu Jen University, Xindian, Taiwan
⁷Division of Nephrology, Department of Internal Medicine, Tri-Service General Hospital, National Defense Medical Center, No. 325, Section 2, Cheng-Kung Road, Neihu, Taipei 114, Taiwan

Received 3 February 2016; Accepted 18 February 2016

Copyright © 2016 Chung-Ze Wu et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the paper “Chaperonin-Containing t-Complex Protein-1 Subunit β as a Possible Biomarker for the Phase of Glomerular Hyperfiltration of Diabetic Nephropathy” [1] by C.-Z. Wu, L.-C. Chang, Y.-F. Lin, Y.-J. Hung, D. Pei, and J.-S. Chen, affiliation number 7 was incorrectly presented as “Division of Nephrology, Department of Internal Medicine, Tri-Service General Hospital, No. 325, Section , Cheng-Kung Road, Neihu, Taipei 114, Taiwan” and is corrected as above.

References

C.-Z. Wu, L.-C. Chang, Y.-F. Lin, Y.-J. Hung, D. Pei, and J.-S. Chen, “Chaperonin-containing t-complex protein-1 subunit β as a possible biomarker for the phase of glomerular hyperfiltration of diabetic nephropathy,” Disease Markers, vol. 2015, Article ID 548101, 7 pages, 2015.