Disease Markers
Volume 2020 (2020), Article ID 8042705, 11 pages
https://doi.org/10.1155/2020/8042705

Research Article

Molecular Markers for Detecting Schistosoma Species by Loop-Mediated Isothermal Amplification

Pedro Fernández-Soto,¹ Catalina Avendaño,² Anna Sala-Vizcaíno,¹ Beatriz Crego-Vicente,¹ Begoña Febrer-Sendra,¹ Juan García-Bernalt Diego,¹ Ana Oleaga,³ Julio López-Abán,¹ Belén Vicente,¹ Manuel A. Patarroyo,4,5 and Antonio Muro¹

¹Infectious and Tropical Diseases Research Group (e-INTRO), Biomedical Research Institute of Salamanca, Research Centre for Tropical Diseases at the University of Salamanca (IBSAL-CIETUS), Faculty of Pharmacy, University of Salamanca, 37007 Salamanca, Spain
²Animal Science Faculty, Universidad de Ciencias Aplicadas y Ambientales (U.D.C.A), 111166 Bogotá, Colombia
³Parasitología Animal, Instituto de Recursos Naturales y Agrobiología de Salamanca (IRNASA, CSIC), Cordel de Merinas, 40-52, 37008 Salamanca, Spain
⁴Fundación Instituto de Inmunología de Colombia (FIDIC), 111321, Colombia
⁵School of Medicine and Health Sciences, Universidad del Rosario, 112111 Bogotá, Colombia

Correspondence should be addressed to Manuel A. Patarroyo; mapatarr.fidic@gmail.com and Antonio Muro; ama@usal.es

Received 23 October 2019; Revised 20 June 2020; Accepted 1 July 2020; Published 24 July 2020

Academic Editor: Lucio Castellano

Copyright © 2020 Pedro Fernández-Soto et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Schistosomiasis is considered a neglected parasitic disease. Around 280,000 people die from it annually, and more than 779 million people are at risk of getting infected. The schistosome species which infect human beings are Schistosoma mansoni, Schistosoma haematobium, Schistosoma intercalatum, Schistosoma japonicum, Schistosoma guineensis, and Schistosoma mekongi. This disease is also of veterinary significance; the most important species being Schistosoma bovis since it causes the disease in around 160 million livestock in Africa and Asia. This work was aimed at designing and developing a genus-specific loop-mediated isothermal amplification (LAMP) method for detecting the most important schistosome species affecting humans and for the species-specific detection of S. bovis. Bioinformatics tools were used for primer design, and the LAMP method was standardised for detecting the ITS-1 region from S. intercalatum, S. haematobium, S. mansoni, S. japonicum, and S. bovis DNA (generic test) and the NADH 1 gene for specifically detecting S. bovis (at different DNA concentrations). Detection limits achieved were 1 pg DNA for S. mansoni, 0.1 pg for S. haematobium, 1 pg for S. intercalatum, and 10 pg for S. bovis. No amplification for S. japonicum DNA was obtained. The LAMP designed for the amplification of S. bovis NADH-1 worked specifically for this species, and no other DNA from other schistosome species included in the study was amplified. Two highly sensitive LAMP methods for detecting different Schistosoma species important for human and veterinary health were standardised. These methods could be very useful for the diagnosis and surveillance of schistosome infections.

1. Introduction

Schistosomiasis is a parasitic disease caused by several species of trematode worms of the genus Schistosoma. It is one of the 20 tropical diseases on the World Health Organization’s (WHO) list of Neglected Tropical Diseases (NTDs) [1]. The disease affects at least 240 million people worldwide and more than 779 million are at risk of contracting it [2]. The infection is endemic in 78 countries, mainly in tropical and subtropical areas, although it predominates in Sub-Saharan Africa where more than 80% of the cases occur, leading to around 280,000 deaths annually. The Global Burden of Disease study attributed 1.43 million disability-adjusted life years (DALYs) to it in 2017 [2–5].

Of the 23 Schistosoma species described to date, S. mansoni, S. haematobium, and S. japonicum are the main human species [6, 7]. Nevertheless, schistosomes also represent a health problem for animals, including ruminants, rodents, and primates. The species causing animal schistosomiasis are mainly Schistosoma bovis, S. japonicum, S. mekongi, S. mattheei, S. curassoni, S. margrebowiei, S. leiperi, S. indicum, and S. spindale. S. bovis is one of the most important ones parasitizing cattle and causing significant economic losses, affecting around 160 million animals in Africa and Asia [8, 9].

Schistosomes have a complex life cycle requiring an aquatic snail as intermediate host and a vertebrate as definitive host [10]. Schistosomiasis is acquired by direct contact with fresh water contaminated by parasite larvae (called cercariae), which have been emitted into an aquatic environment by the aquatic snails, actively penetrating the skin of a susceptible host [11]. Paired couples of adult schistosome worms live in a definitive host’s mesenteric or perivascular veins where they reproduce and lay their eggs. The eggs are released into the environment through urine (S. haematobium) or faeces (the rest of the species) or can be retained in host tissues where they induce an inflammatory response [7].

Both S. mansoni and S. haematobium are found in Africa and the Middle East, whereas S. mansoni is the only species found in South America. S. japonicum occurs in Asia, especially in the Philippines and China; S. mekongi in the Mekong river basin, and S. guineensis and S. intercalatum in West and Central Africa [7]. S. bovis can be found throughout the African continent, south-western Asia (Israel, Iran, Iraq, Syria, and Turkey), Mediterranean islands (Corsica, Sardinia, and Sicily), and the Iberian peninsula [12].

Schistosomiasis can be treated if an accurate diagnosis is made and a prompt treatment with praziquantel (PZQ) is administered. Using appropriate and sensitive diagnostic techniques is thus essential for identifying infected individuals [13]. Parasitological diagnosis is specific, cheap, and simply performed. However, in laboratories with limited resources, it is not very sensitive, especially when infection intensity is low, as occurs in areas with low prevalence and/or in individuals having been recently infected or having low parasite load. Furthermore, this can only be done after egg production and elimination has begun, approximately two months after infection [11]. Immunodiagnostic tests have been shown to have high sensitivity in cases where parasitological techniques have provided false negative results [13]. However, they have problems related to obtaining antigens and false positive results since it is difficult to differentiate between active and/or past infections or reinfections and there can also be problems regarding specificity with other helminths or even between different species from the genus Schistosoma. Furthermore, such tests are not useful during the disease’s acute phase, since antibodies targeting the parasite would not yet have appeared [11, 13]. On the other hand, immunodiagnostic tests based on detecting the circulating cathodic antigen (CCA) or circulating anodic antigen (CAA) in either urine or blood have the advantage of not requiring a trained personnel for their interpretation or specialised equipment, being more sensitive and specific than egg detection in faeces by microscopy, although they could give false positive results. It is worth highlighting that such techniques detect adult forms and not eggs, so xenomonitoring combining either CAA or CCA with molecular biology techniques is thus recommended for verification and maintaining elimination [14].

Molecular diagnosis is particularly useful regarding infections with low parasitaemia [15, 16]. PCR and its variants have been of great use, and some authors have proposed such techniques as the gold standard for diagnosing schistosomiasis [17]. However, they are expensive and require a specialised personnel and equipment, meaning that they are not useful for diagnosis in field conditions and their use is limited to just a few reference laboratories [18].

Several molecular techniques based on isothermal methods exist, such us nucleic acid sequence-based amplification (NASBA, also known as transcription-mediated amplification, TMA), signal-mediated amplification of ribonucleic acid (RNA) technology (SMART), helicase-dependent amplification (HDA), recombinase polymerase amplification (RPA), rolling circle amplification (RCA), multiple displacement amplification (MDA), loop-mediated isothermal amplification (LAMP), and strand displacement amplification (SDA); such techniques might provide an alternative tool regarding other more complex molecular methods [19]. The development and application of new methods meeting the characteristics for the ideal diagnosis of schistosomiasis should include high sensitivity and specificity, ease of use and interpretation, being able to use different sample types, rapidity, low cost, and being able to be applied in disease-endemic areas having scarce economic resources [20]. This work describes designing and developing a LAMP method for detecting species-specific S. bovis and a genus-specific LAMP method for detecting the most important schistosome species affecting humans.

2. Materials and Methods

2.1. Selecting Targets for LAMP Amplification of Schistosoma bovis and Genus Schistosoma

When this study started, the S. bovis genome had not been yet completely sequenced and there was limited sequence information in databases. Thus, a thorough search in the GenBank database (https://www.ncbi.nlm.nih.gov/genbank/) was carried out to locate all possible available DNA sequences. An alignment of the sequences found was carried out using ClustalW to obtain a consensus sequence. When the comparison did not allow generating a consensus sequence, different sequence groups were made up based on their greater identity. Subsequently, the BLAST program (Basic Local Alignment Search Tool; https://blast.ncbi.nlm.nih.gov/Blast.cgi) was used to assess the identity of S. bovis sequences obtained to other species. Then, to refine the search and obtain greater accuracy in the results, the sequences were compared in two other schistosome-specific databases: SchistoDB (Schistosoma Genomic Resources; http://schistodb.net/schisto/), which contains the genome of S. mansoni, S. haematobium, and S. japonicum, and the Wellcome Trust Sanger Institute database (http://www.sanger.ac.uk/), which houses continuously updated genome sequencing results of 50 helminths, including several Schistosoma species (50 Helminth Genomes Project; http://www.sanger.ac.uk/science/collaboration/50hgp). Once all S. bovis sequences were compared and analysed, the most suitable one was selected for designing specific primers for the LAMP.

Useful sequences for designing the specific primers for developing a LAMP method for amplifying the genus Schistosoma were selected following similar steps as those described above for S. bovis.

2.2. Designing LAMP Primers

LAMP primer sets complementary to the selected specific nucleotide sequences were designed using both the online PrimerExplorer V5 software (Eiken Chemical Co., Ltd., Japan; https://primerexplorer.jp/e/) and the LAMP Designer software (OptiGene Ltd., UK; http://www.optigene.co.uk/lamp-designer/) since the two programs use different design parameters. HPLC grade primers were used (Thermo Fisher Scientific Inc., Madrid, Spain). Lyophilised primers were resuspended in ultrapure water to a final 100 pmol/μL concentration and stored at -20°C until use.

2.3. Obtaining and Preparing Schistosoma Species DNA

S. bovis adult worms were obtained from hamsters experimentally infected in the laboratory of Animal Parasitology, Institute of Natural Resources and Agrobiology of Salamanca (IRNASA-CSIC), Spain. S. bovis genomic DNA (gDNA) was extracted from worms kept frozen using the NucleoSpin Tissue Kit (Macherey-Nagel, GmbH&Co., Germany) following the manufacturers’ instructions.

S. mansoni DNA (Brazilian strain) was extracted from frozen adult male and female worms available in our laboratory. This strain has been maintained by serial passages in mice routinely infected in the Laboratory of Parasitic and Molecular Immunology, CIETUS, University of Salamanca. Genomic DNA from adult male and female S. haematobium (Egyptian Strain; NR-31682) and genomic DNA from adult male and female S. japonicum (Chinese Strain; NR-36066) were obtained from the Schistosomiasis Resource Centers for distribution by BEI Resources, NIAID, NIH (https://www.beiresources.org/Collection/51/Schistosome-Resource-Centers.aspx). S. intercalatum DNA was provided by Doctor José Manuel da Costa from the Center for Parasite Biology and Immunology, National Institute of Health Doutor Ricardo Jorge, Porto, Portugal. This DNA comes from a donation from Centers for Disease Control and Prevention, Atlanta, USA. All gDNAs were measured three times by spectrophotometry using a Nanodrop ND-100 spectrophotometer (Nanodrop Technologies) to obtain an average concentration and then diluted with ultrapure water to a final 5 ng/μL concentration. Subsequently, serial 10-fold dilutions from schistosomes’ DNA were prepared with ultrapure water ranging from to and stored at -20°C until use. DNAs thus prepared were used as positive controls in all LAMP and PCR reactions as well as for assessing sensitivity and specificity of both assays.

2.4. PCR with F3 and B3 External Primers

A touchdown PCR (TD-PCR) using designated F3 and B3 external primers was initially tested to verify that the correct target sequence selected in silico was amplified. The PCR assay was conducted in a 25 μL reaction mixture containing 2.5 μL of 10x buffer, 1.5 μL of 25 mM MgCl₂, 2.5 μL of 2.5 mM dNTPs, 0.5 μL of 100 pM F3 and B3, 2 U Taq-polymerase, and 2 μL (10 ng) of DNA template. Initial denaturation was conducted at 94°C for 1 min, followed by a touchdown program for 15 cycles with successive annealing temperature decrements of 1.0°C every 2 cycles. For these 2 cycles, the reaction was denatured at 94°C for 20 s followed by annealing at 65°C–60°C for 20 s and extension at 72°C for 30 s. The following 15 amplification cycles were similar, except that the annealing temperature was 59°C. The final extension was performed at 72°C for 10 min. The same reaction mixture was used in all PCR reactions (except for the primers), and the amplification conditions varied according to different annealing temperatures of the primers used.

DNA samples (2 μL; 0.5 ng/μL) from the Schistosoma species included were used to evaluate specificity; negative (ultrapure water instead of DNA) and positive (DNA from each species) controls were included in each PCR assay.

2.5. LAMP Assay

The LAMP primer sets designed were evaluated by using a reaction mixture containing 40 pmol each of FIP and BIP primers, 5 pmol each of F3 and B3 primers, 1.4 mM each of dNTP (Intron), 1x Isothermal Amplification Buffer-20 mM Tris-HCl (pH 8.8), 50 mM KCl, 10 mM (NH₄)₂SO₄, 2 mM MgSO₄, 0.1% Tween20 (New England Biolabs, UK)-betaine (1 M) (Sigma, USA), supplementary MgSO₄ (4 mM) (New England Biolabs, UK), and 8 U of Bst polymerase 2.0 WarmStart (New England Biolabs, UK) with 2 μL (1 ng) of template DNA. LAMP reactions were performed in 0.2 mL tubes that were incubated in a dry bath heat block at 63°C-65°C for 60 min and then heated at 80°C for 5-10 min to stop the reaction.

Schistosome DNA samples mentioned above were used to evaluate the specificity of the LAMP assay; the lower detection limit of the LAMP assay was established by using 10-fold serial dilutions prepared as previously described. Positive controls (DNA from all species tested) and negative controls (ultrapure water instead of DNA) were included in all LAMP reactions.

2.6. Detection of Amplification Products

PCR amplification products were monitored using 1.5% agarose gel electrophoresis stained with ethidium bromide and visualised under UV light.

LAMP reaction results were visually inspected by colorimetric change by adding 2 μL (1 : 10, 10,000x) SYBR Green I fluorescent dye (Invitrogen, Carlsbad, California, USA) to the reaction tubes. Green fluorescence was observed in positive reactions whilst it remained original orange in negative reactions; additionally, the products (3-5 μL) were monitored by 1.5% agarose gel electrophoresis and visualised under UV light. All electrophoresed PCR and LAMP agarose gels were photographed using an ultraviolet gel documentation system (UVItec, UK).

3. Results

3.1. Selecting Targets for LAMP Amplification of Schistosoma bovis and Genus Schistosoma

Sequence similarity analysis of the selected sequences downloaded from the GenBank, SchistoDB, and Sanger databases allowed selecting several potentially useful sequences to design primers for the specific detection by LAMP of S. bovis and for the simultaneous detection of several schistosome species (genus Schistosoma) (Tables S1, S2). After comparison, a 678 bp sequence derived from mitochondrial NADH subunit 1 (NADH-1) (GenBank access number HM594942) and a 457 bp sequence from the internal transcribed spacer 1 (ITS-1) (GenBank access number GU257398) were selected for detecting S. bovis and Schistosoma spp., respectively (Figure 1).

(a)

(b)

Figure 1: Degree of sequence similarity detected amongst the selected sequences for designing the LAMP primers and schistosome sequences queried in each database. (a) S. bovis mitochondrial NADH subunit 1 sequence. (b) ITS-1 sequence from several Schistosoma species.

3.2. Designing and Synthesising Primers for LAMP Amplification

Specific LAMP primers were designed using two programs: LAMP Designer and PrimerExplorer V5. Different primer sets were generated depending on the particular characteristics and parameters evaluated by each software. A set of 6 primers (including 2 loop primers) were thus selected to amplify the S. bovis NADH-1 sequence as designed by the LAMP Designer software, whilst a set of 5 primers (including 1 loop primer) to amplify Schistosoma species ITS-1 sequence, as designed in the PrimerExplorer software (Table 1).

Table 1: Primer sets selected in this work for amplifying the S. bovis NADH subunit 1 and the ITS-1 region from the genus Schistosoma.

(a) LAMP primers for the S. bovis sequence (LAMP Designer)

NADH subunit 1

Primer
5 pos
3 pos
Length (bp)
Tm (°C)
GC ratio (%)
Sequence

SbF3
219
236
18
56.8
38.9
TTCATTGTTAGGTTGCGT

SbB3
642
619
24
57
33.3
TCTATATTCTACTCTAATCCCTCT

SbFIP

48

TCAGTATCATCTCAAACATCACACTAGTAGTATGTTCTGTCTTAAGTT

SbBIP

45

TTTGTAGTACCTCTGGTTTACATCATTCACTCTCAGACTCTACAT

SbF2
327
349
23
56.8
30.4
AGTAGTATGTTCTGTCTTAAGTT

SbF1c
424
448
25
62.1
36
TCAGTATCATCTCAAACATCACACT

SbB2
593
612
20
57
40
TTCACTCTCAGACTCTACAT

SbB1c
520
544
25
61.8
36
TTTGTAGTACCTCTGGTTTACATCA

SbLF
364
388
25
61.9
36
ACTTAGACCATGAACATCAACCTAT

SbLB
560
584
25
61.9
40
TACTAAGTGAGAGTAATCGAACACC

(b) LAMP primers for the genus Schistosoma sequence (Primer Explorer V5)

ITS-1

Primer
5 pos
3 pos
Length (bp)
Tm (°C)
GC ratio (%)
Sequence

SF3
2
19
18
59.7
61
TTGACCGGGGTACCTAGC

SB3
200
218
19
59.5
53
CGTGAATGGCAAGCCAAAC

SFIP

39

ATCGCCCTTGGCAGATCAGGCTGTCGTATGCCCTGATGG

SBIP

40

ATATGCATGCAAATCCGCCCCGCGGATCGCTTCAACAGTGTA

SF2
20
38
19
59.2
58
CTGTCGTATGCCCTGATGG

SF1c
61
80
20
64.2
60
ATCGCCCTTGGCAGATCAGG

SB2
180
199
20
59.5
50
CGGATCGCTTCAACAGTGTA

SB1c
135
156
20
65.9
55
ATATGCATGCAAATCCGCCCCG

SLF
39
60
22
60.4
45
CAGATCAGGCAACCCGAAAG

For S. bovis (Sb) and genus Schistosoma (S): F3=forward outer primer; B3=backward outer primer; FIP=forward inner primer (comprising F1c and F2 sequences); BIP=backward inner primer (comprising B1c and B2 sequences); LF=loop forward primer; LB=loop backward primer.

3.3. TD-PCR with F3 and B3 External Primers

After testing several different reaction temperatures and cycles, amplification conditions for TD-PCR were finally established for S. bovis NADH-1 (range 58-53°C; ) and Schistosoma spp. ITS-1 fragment (range 61-57°C; ). An approximately 420 bp PCR product was obtained for S. bovis NADH-1 sequence (400 bp predicted in silico) (Figure 2). This sequence was only amplified when using S. bovis DNA, but no amplicons were obtained with DNA samples from other schistosome species tested.

Figure 2: TD-PCR F3-B3 for amplifying S. bovis NADH-1. A 58-53°C temperature range and were used. Sm: S. mansoni DNA; Sh: S. haematobium DNA; Sj: S. japonicum DNA; Si: S. intercalatum DNA; Sb: S. bovis DNA; N: negative control (ultrapure water, no DNA). M: molecular weight marker (100 bp PLUS BLUE DNA ladder).

On the other hand, a PCR product between 220 and 225 bp was obtained for Schistosoma spp. ITS-1 sequence (216 bp predicted in silico) (Figure 3). This PCR product was successfully amplified when DNA samples from the schistosome species included in the study were analysed. However, amplicons obtained for S. mansoni, S. haematobium, and S. bovis showed a greater signal intensity than those obtained for S. japonicum and S. intercalatum.

Figure 3: TD-PCR F3-B3 for amplifying genus Schistosoma ITS-1. A 61-57°C temperature range, and were used. Sm: S. mansoni DNA; Sh: S. haematobium DNA; Sj: S. japonicum DNA; Si: S. intercalatum DNA; Sb: S. bovis DNA; N: negative control (ultrapure water, no DNA). M: molecular weight marker (100 bp PLUS BLUE DNA ladder).

3.4. LAMP for Amplifying S. bovis NADH-1 and Genus Schistosoma ITS-1 Target Sequences

As shown in Figure 4, only LAMP products were obtained when S. bovis DNA was used as template to amplify NADH-1 sequence. No false positive amplification was observed when using DNA from other schistosomes (Figure 4(a)), thus indicating the high specificity of the designed LAMP primers. Regarding sensitivity, the results indicated that the detection limit of LAMP for S. bovis NADH-1 amplification was 0.01 ng (10 pg) (Figure 4(b)).

(a)

(b)

Figure 4: LAMP assay for amplifying S. bovis NADH-1. (a). Specificity assessment. Only NADH-1 was amplified using S. bovis DNA. Sm: S. mansoni DNA; Sh: S. haematobium DNA; Sj: S. japonicum DNA; Si: S. intercalatum DNA; Sb: S. bovis DNA; N: negative controls (ultrapure water, no DNA). (b). Sensitivity assessment. Sb: S. bovis genomic DNA (10 ng/μL); lanes 10⁻¹-10⁻⁹, 10-fold serially dilutions.

LAMP results when using the specific primers to amplify ITS-1 sequence for several schistosome species DNA are shown in Figure 5. Amplification products were observed when using DNA from S. mansoni, S. haematobium, S. intercalatum, and S. bovis, but not from S. japonicum. Colour change was clearly visualised in positive results, and also, a typical ladder-like band pattern was observed on agarose gel electrophoresis.

Figure 5: LAMP for amplifying the genus Schistosoma ITS-1 sequence. Lanes Sm, Sh, Sj, Si, and Sb mean S. mansoni, S. haematobium, S. japonicum, S. intercalatum, and S. bovis DNAs, respectively; Lanes N: negative controls (ultrapure water, no DNA).

When evaluating the sensitivity of the established LAMP assays for ITS-1 sequence, the detection limit in Schistosoma spp. genomic DNA amplification was different depending on the species used as template (Figure 6). Thus, a detection limit of 0.001 ng (1 pg) was obtained for S. mansoni and S. intercalatum (Figures 6(a) and 6(c)), 0.0001 ng (0.1 pg) for S. haematobium (Figure 6(b)), and 0.01 ng (10 pg) for S. bovis (Figure 6(d)).

(a)

(b)

(c)

(d)

Figure 6: Sensitivity assessment of LAMP for amplifying Schistosoma ITS-1 sequence using DNA from different schistosome species. (a) Detection limit for S. mansoni (1 pg). (b) Detection limit for S. haematobium (0.1 pg). (c) Detection limit for S. intercalatum (1 pg). (d) Detection limit for S. bovis (10 pg). Lanes Sm, Sh, Si, and Sb mean S. mansoni, S. haematobium, S. intercalatum, and S. bovis DNAs, respectively. Lanes 10⁻¹-10⁻⁹: 10-fold serial dilutions of DNA. Lanes N: negative controls (no DNA template).

4. Discussion

Schistosomiasis is a neglected tropical disease widespread in 74 tropical and subtropical countries. The most important schistosome species regarding human schistosomiasis are S. japonicum in the Republic of China, the Philippines, and Indonesia; S. haematobium in Africa and in some countries of the Arabian peninsula (it has also recently emerged on the French island of Corsica); and S. mansoni in Africa, the Arabian peninsula, and Latin America. Meanwhile, S. guineensis and S. intercalatum (both endemic in Central and West Africa) and S. mekongi (restricted to a short stretch of the Mekong River in southern Lao People’s Democratic Republic and eastern Cambodia) are of local regional importance [21]. The disease can also cause chronic, debilitating infection in animals, and it has been estimated that more than 165 million cattle are infected worldwide causing high levels of morbidity amongst susceptible animals (cattle, goats, sheep, horses, camelids, and pigs) and causing considerable production losses due to liver damage, reduced reproductive performance/yields, increased susceptibility to other infectious agents, and death [9]. There is no data on the current prevalence of S. bovis (animal schistosomiasis), but in the past, it had a wide distribution and prevalence in many Mediterranean, African, and Asian countries [22].

Hybridisations between schistosomes have already been identified between different human-specific schistosome species, different animal-specific schistosome species, and between human-specific and animal-specific schistosome species. The hybrid forms between human-specific and animal-specific schistosome species are particularly startling because they raise the possibility of the spread of hybrids, particularly zoonotic hybrids, that could prove problematic in terms of maintaining transmission if the can replace existing species and parasite strains, extend intermediate and definitive host ranges, or present and increase infectivity and virulence [23].

In addition, the hybrid status of the parasite may impair the parasitological, serological, and molecular diagnostic.

This work provides new LAMP assays for the specific detection of S. bovis and, additionally, for the simultaneous detection of a number of other human-infecting Schistosoma species.

The LAMP method designed for the simultaneous detection of different species of the Schistosoma genus achieved DNA amplification of four of the five species including S. mansoni, S. haematobium, S. intercalatum, and S. bovis; all of which are found in Africa. The S. japonicum DNA could not be amplified, possibly due to the few—although determinant—differences that its sequence presents with respect to DNA sequences from other African schistosomes, which share higher levels of identity [24, 25]. However, when performing the TD-PCR with the external primers F3 and B3 to check the in silico size of the selected ITS-1 sequence, it was possible to amplify the DNA of all species analysed, including S. japonicum. This could be explained by the additional primers required for the amplification in the LAMP technique, so internal primers might have not annealed in the S. japonicum DNA sequence. Moreover, it is important to highlight that due to the different origin of African and Asian schistosomes, it is very difficult to design primers for the amplification of common sequences amongst all species taking into account geographical variation [26, 27]. On the other hand, the ITS-1 sequence type selected for primer design was that obtained from S. haematobium and, for that reason, a higher degree of identity is expected for all African species, whilst Asian species share less identity.

Regarding the sensitivity of the developed LAMP methods, the detection limit of the LAMP for the S. bovis NADH-1 amplification was 10 pg of genomic DNA. On the other hand, the detection limit achieved with the LAMP for the amplification of the ITS-1 region of the Schistosoma genus was found to be 1 pg, 0.1 pg, 1 pg, and 10 pg for S. mansoni, S. haematobium, S. intercalatum, and S. bovis, respectively. These differences in the sensitivity obtained for the different species may be due to the small differences between the nucleotide sequences that may end up influencing primer annealing and, therefore, LAMP performance. It makes sense that S. haematobium is the species displaying the highest detection limit (0.1 pg), since its own sequence was used as a reference when designing the generic LAMP.

In terms of specificity, the LAMP designed for S. bovis NADH-1 amplification worked specifically for this species and no DNA from other schistosome species included in the study was amplified. On the other hand, the Schistosoma genus ITS-1 region LAMP amplified the DNA of all species tested except for S. japonicum. A LAMP method for the specific detection of S. bovis and another for the simultaneous detection of different schistosome species that can produce human schistosomiasis have thus been developed. It should be noted that comparisons of genetic distances from pairs of congeners for both mitochondrial DNA and ITS sequences have demonstrated that mitochondrial DNA sequences of platyhelminths (including schistosomes) accumulate nucleotide substitutions at a much higher rate than ITS [28]. Moreover, until now, most of the S. haematobium-S. bovis hybrids reported demonstrate the existence of a mitochondrial DNA (i.e., cox 1 and microsatellite DNA) introgressive hybridisation of S. haematobium by S. bovis [29]. Thus, our developed LAMP assay based on NADH-1 for S. bovis detection would be very useful for detecting S. haematobium-S. bovis hybrids, as most hybrids have a mitochondrial S. bovis signature and a S. haematobium ITS signature.

5. Conclusions

Two highly sensitive LAMP methods for detecting different Schistosoma species important for human and veterinary health were standardised. It is worth highlighting that LAMP assays are easier to turn into point-of-care tests since no specialised lab equipment is required. Considering that human cases due to S. intercalatum are currently increasing and hybridisation events between S. bovis and S. haematobium have been reported in Senegal and France [22], LAMP methods here developed could be very useful for the diagnosis and surveillance of schistosome infections.

Data Availability

The data used to support the findings of this study are included within the article.

Conflicts of Interest

The authors declare that there is no conflict of interest regarding the publication of this paper.

Authors’ Contributions

Pedro Fernández-Soto and Catalina Avendaño contributed equally to this work.

Acknowledgments

We would like to thank BEI Resources (http://www.beiresources.org), NIAID, NIH, for kindly providing schistosomes’ DNA samples. We would also like to thank Jason Garry for translating this manuscript. This work was funded by the Institute of Health Carlos III, ISCIII, Spain (http://www.isciii.es), grants: RICET RD16/0027/0018 (AMA), PI19/01727 (PFS), PI-0001-2019 Junta de Andalucía (AMA, PFS), European Union cofinancing by FEDER (Fondo Europeo de Desarrollo Regional) “Una manera de hacer Europa” and by the Plan TCUE 2018–2020 European Union cofinancing by FEDER and the Junta de Castilla y León. We also acknowledge support by Predoctoral Fellowship Program of University of Salamanca and cofinancing by Santander Bank, Predoctoral Fellowship Program of Junta de Castilla y León and Technical support staff for research support, National Youth Guarantee System, cofinancing with the European Social Fund, Youth Employment Initiative, BDNS: 376072. We would like to thank the Universidad del Rosario for assuming open access charges.

Supplementary Materials

Table 1: gene sequences located and analysed for S. bovis. Table 2: degree of ITS-1 and ITS-2 sequence identity regarding schistosome species in the different databases. (Supplementary Materials)

References

WHO, “Neglected tropical diseases,” Tech. Rep., WHO, 2018, August 2019, https://www.who.int/neglected_diseases/diseases/en/.

M. L. Nelwan, “Schistosomiasis : life cycle, diagnosis, and control,” Current Therapeutic Research, vol. 91, pp. 5–9, 2019.

WHO, “Schistosomiasis,” Tech. Rep., WHO, 2019, August 2019, https://www.who.int/schistosomiasis/en/.

GBD 2017 DALYs and HALE Collaborators, “Global, regional, and national disability-adjusted life-years (DALYs) for 359 diseases and injuries and healthy life expectancy (HALE) for 195 countries and territories, 1990-2017: a systematic analysis for the Global Burden of Disease Study 2017,” The Lancet, vol. 392, no. 10159, pp. 1859–1922, 2018.

J. García-Bernalt Diego, P. Fernández-Soto, B. Crego-Vicente et al., “Progress in loop-mediated isothermal amplification assay for detection of Schistosoma mansoni DNA: towards a ready-to-use test,” Scientific Reports, vol. 9, no. 1, p. 14744, 2019.

B. L. Webster, V. Southgate, and D. Littlewood, “A revision of the interrelationships of Schistosoma including the recently described Schistosoma guineensis,” International Journal for Parasitology, vol. 36, no. 8, pp. 947–955, 2006.

D. G. Colley, A. L. Bustinduy, W. E. Secor, and C. H. King, “Human schistosomiasis,” The Lancet, vol. 383, no. 9936, pp. 2253–2264, 2014.

T. Engdaw and A. Abuhay, “Overview on Schistosoma infection with reference to its economic importance,” European Journal of Applied Sciences, vol. 7, pp. 268–273, 2015.

H. You, P. Cai, B. Tebeje, Y. Li, and D. McManus, “Schistosome vaccines for domestic animals,” Tropical Medicine and Infectious Disease, vol. 3, no. 2, p. 68, 2018.

L. A. Tchuem Tchuenté, D. Rollinson, J. R. Stothard, and D. Molyneux, “Moving from control to elimination of schistosomiasis in sub-Saharan Africa: time to change and adapt strategies,” Infectious Diseases of Poverty, vol. 6, no. 1, p. 42, 2017.

A. Muro, L. Pérez del Villar, V. Velasco, and J. L. Pérez-Arellano, “Infecciones por trematodos,” Medicine - Programa de Formación Médica Continuada Acreditado, vol. 10, no. 55, pp. 3717–3728, 2010.

H. Moné, G. Mouahid, and S. Morand, “The distribution of Schistosoma bovis Sonsino, 1876 in relation to intermediate host mollusc-parasite relationships,” Advances in Parasitology, vol. 44, pp. 99–138, 1999.

K. G. A. D. Weerakoon, G. N. Gobert, P. Cai, and D. P. McManus, “Advances in the diagnosis of human schistosomiasis,” Clinical Microbiology Reviews, vol. 28, no. 4, pp. 939–967, 2015.

D. G. Colley, T. S. Andros, and C. H. Campbell Jr., “Schistosomiasis is more prevalent than previously thought: what does it mean for public health goals, policies, strategies, guidelines and intervention programs?” Infectious Diseases of Poverty, vol. 6, no. 1, p. 63, 2017.

L. A. Pontes, E. Dias-Neto, N. Katz, A. Rabello, and M. C. Oliveira, “Comparison of a polymerase chain reaction and the Kato-Katz technique for diagnosing infection with Schistosoma mansoni,” The American Journal of Tropical Medicine and Hygiene, vol. 68, no. 6, pp. 652–656, 2003.

C. A. Gordon, L. P. Acosta, D. J. Gray et al., “High prevalence of Schistosoma japonicum infection in Carabao from Samar Province, the Philippines: implications for transmission and control,” PLoS Neglected Tropical Diseases, vol. 6, no. 9, article e1778, 2012.

L. Meurs, E. Brienen, M. Mbow et al., “Is PCR the next reference standard for the diagnosis of Schistosoma in stool? A comparison with microscopy in Senegal and Kenya,” PLoS Neglected Tropical Diseases, vol. 9, no. 7, article e0003959, 2015.

T. Notomi, Y. Mori, N. Tomita, and H. Kanda, “Loop-mediated isothermal amplification (LAMP): principle, features, and future prospects,” Journal of Microbiology, vol. 53, no. 1, pp. 1–5, 2015.

J. Li, J. Macdonald, and F. Von Stetten, “Review: a comprehensive summary of a decade development of the recombinase polymerase amplification,” Analyst, vol. 144, no. 1, pp. 31–67, 2019.

Z. K. Njiru, “Loop-mediated isothermal amplification technology: towards point of care diagnostics,” PLoS Neglected Tropical Diseases, vol. 6, no. 6, article e1572, 2012.

D. P. McManus, R. Bergquist, P. Cai, S. Ranasinghe, B. M. Tebeje, and H. You, “Schistosomiasis—from immunopathology to vaccines,” Seminars in Immunopathology, vol. 42, no. 3, pp. 355–371, 2020.

E. de la Torre-Escudero, R. Pérez-Sánchez, R. Manzano-Román, and A. Oleaga, “Schistosoma bovis-host interplay: proteomics for knowing and acting,” Molecular and Biochemical Parasitology, vol. 215, pp. 30–39, 2017.

E. Leger and J. P. Webster, “Hybridizations within the genus Schistosoma: implications for evolution, epidemiology and control,” Parasitology, vol. 144, no. 1, pp. 65–80, 2017.

N. D. Young, A. R. Jex, B. Li et al., “Whole-genome sequence of Schistosoma haematobium,” Nature Genetics, vol. 44, no. 2, pp. 221–225, 2012.

M. Mitreva, “The genome of a blood fluke associated with human cancer,” Nature Genetics, vol. 44, no. 2, pp. 116–118, 2012.

B. L. Webster and V. R. Southgate, “Mating interactions of Schistosoma haematobium and S. intercalatum with their hybrid offspring,” Parasitology, vol. 126, no. 4, pp. 327–338, 2003.

S. P. Lawton, H. Hirai, J. E. Ironside, D. A. Johnston, and D. Rollinson, “Genomes and geography: genomic insights into the evolution and phylogeography of the genus Schistosoma,” Parasites & Vectors, vol. 4, no. 1, p. 131, 2011.

R. Vilas, C. D. Criscione, and M. S. Blouin, “A comparison between mitochondrial DNA and the ribosomal internal transcribed regions in prospecting for cryptic species of platyhelminth parasites,” Parasitology, vol. 131, no. 6, pp. 839–846, 2005.

E. K. Angora, J. F. Allienne, O. Rey et al., “High prevalence of Schistosoma haematobium × Schistosoma bovis hybrids in schoolchildren in Côte d’Ivoire,” Parasitology, vol. 147, no. 3, pp. 287–294, 2020.