Evidence-Based Complementary and Alternative MedicineVolume 2012 (2012), Article ID 153480, 5 pagesdoi:10.1155/2012/153480

Research Article

Sino-European Transcontinental Basic and Clinical High-Tech Acupuncture Studies—Part 4: “Fire of Life” Analysis of Heart Rate Variability during Acupuncture in Clinical Studies

Gerhard Litscher,¹ Lin-Peng Wang,² Lu Wang,¹ Cun-Zhi Liu,² and Xiao-Min Wang³

¹Stronach Research Unit for Complementary and Integrative Laser Medicine, Research Unit of Biomedical Engineering in Anesthesia and Intensive Care Medicin, TCM Research Center Graz, Medical University of Graz, Auenbruggerplatz 29, 8036 Graz, Austria²Acupuncture and Moxibustion Center, Beijing Hospital of Traditional Chinese Medicine, Capital Medical University, Beijing 100010, China³Department of Neurobiology, Capital Medical University, Beijing 100069, China

Received 17 February 2012; Accepted 9 March 2012

Academic Editor: Xinyan Gao

Copyright © 2012 Gerhard Litscher et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

This fourth part of a series of Sino-European high-tech acupuncture studies describes the first clinical transcontinental teleacupuncture measurements in two patients (cervical spine syndrome and tachycardia; both 27 years old) from the Beijing Hospital of Traditional Chinese Medicine affiliated to Capital Medical University, China. The electrocardiographic data were transferred to the Stronach Research Unit for Complementary and Integrative Laser Medicine and the TCM Research Center in Graz via conventional internet connections. Data analysis was performed in Graz using a new “Fire of Life” heart rate variability analysis. Analysis was performed without any technical problems in both subjects. Heart rate decreased significantly during acupuncture in the two patients from Beijing. At the same time, total HRV increased during acupuncture. The different influences of HRV (respiratory sinus arrhythmia, blood pressure waves, etc.) could be clearly documented using the new “Fire of Life” analysis.

1. Introduction

Recently, we performed several transcontinental acupuncture studies. Parts 1–3 of this series summarize some of our animal experimental and first clinical results, performed between institutions from Graz, Austria, Beijing, China, and Harbin, China [1–3]. Computer analysis of heart rate (HR) and heart rate variability (HRV) allows the identification of specific patterns in the fluctuations of the electrocardiogram (ECG) which reflects the effects of individual mechanisms involved in cardiovascular regulation. Based on the automatic assessment of these patterns, new scientific tools for evaluating the features of cardiovascular control have been developed [4, 5].

HRV has been investigated in normal subjects of various age groups and also in different cardiovascular diseases such as acute myocardial infarction, congestive heart failure, arterial hypertension, diabetes mellitus, and different autonomic dysfunctions [6, 7]. Beside HRV power spectral analysis, the so-called “Fire of Life” analysis (Huntleigh Healthcare, Cardiff, UK) is a new method of visualization of HRV, which has been described only in few scientific publications by our research group [8–12].

The aim of this study was to demonstrate the new “Fire of Life” HRV analysis in two patients from the Capital Medical University in Beijing. In both patients, the same type of monitoring equipment was used (Figure 1).

Figure 1: HRV equipment from Graz used for the clinical investigations at the Beijing Hospital of Traditional Chinese Medicine affiliated to Capital Medical University in China.

2. Materials and Methods

2.1. HRV Monitoring

An HRV medilog AR12 (Huntleigh Healthcare, Cardiff, UK, and Leupamed GmbH, Graz, Austria) system was used for cardiac monitoring in Beijing. The system is designed for a monitoring period of more than 24 hours. The sampling rate of the recorder is 4096 Hz. Therefore, R waves can be detected extremely accurately. All raw data are stored digitally on special memory cards. The data can be read by an appropriate card reader connected with a standard computer. The dimensions of the used HRV recorder are 70 × 100 × 22 millimeters, the weight is about 95 grams with batteries (compare Figure 1).

2.2. HRV Data Analysis

HRV is measured as the percentage changes in sequential chamber complexes (RR intervals) in the ECG. HRV can be quantified over time using registration of percentage changes in RR intervals in the time domain as well as the changes in the frequency range by analysis of electrocardiographic power spectra. Parameters are recommended by the task force of the European Society of Cardiology and the North American Society of Pacing and Electrophysiology [13]. Calculation of ECG power spectra is thought to provide an understanding of the effects of sympathetic and parasympathetic systems on HRV [1–7, 13]. Early work pointed out a few bands in the spectrum of HRV that could be interpreted as markers of physiological relevance. Associated mechanisms are thermoregulation which can be found in the very low-frequency band, blood pressure, and respiratory effects [13].

The new “Fire of Life” software analyzes HRV and displays it in a new way to help judge the function of the autonomic nervous system. Viewing this innovative kind of analysis can help to visualize how well the human body reacts to acupuncture. For offline inspection all ECG raw data can be displayed on a screen.

2.3. Patients

The investigations were performed in two patients (both female and both 27 years old) at the Beijing Hospital of Traditional Chinese Medicine affiliated to Capital Medical University. One of them (patient A) had a cervical spine syndrome and the other one (patient B) tachycardia. Both subjects were not taking any medication. The registration of the noninvasive parameters was in accordance with the Declaration of Helsinki of the World Medical Association.

2.4. Procedure

The identical study design was used in both patients and included the following steps: three “Skintact Premier F-55” ECG electrodes (Leonhard Lang GmbH, Innsbruck, Austria) were fixed on the chest. The measurement procedure and the 5-minute segments (altogether 40 min) are shown in Figure 2.

Figure 2: Recording profile. Each analysis segment consisted of 5 minutes. Altogether, a recording session of 40 minutes was performed in each patient.

2.5. Acupuncture Points

The following acupuncture points were used in the two patients: patient A (diagnosis: cervical spine syndrome) received manual needle acupuncture at Fengchi (GB20), Neiguan (PC6), and Tianzhu (UB10) and patient B (diagnosis: tachycardia) at Neiguan (PC6). For manual acupuncture stimulation, sterile single-use needles (length: 30 mm; diameter: 0.3 mm, Huan Qiu, Suzhou, China) were inserted perpendicularly to the skin at the respective acupoint(s). The needles were stimulated clockwise and counterclockwise for 15 seconds each, with two rotations per second, resulting in 30 rotations per stimulation. The stimulation was performed immediately after inserting the needle, 10 minutes later, and before removing the needle (see Figure 2).

3. Results

Data acquisition and data transfer over a distance of more than 7,600 km between China and Europe were performed without any technical problems.

3.1. Standard Analysis

Figure 3 shows the HR trends (upper panel), the statistical distribution of the RR intervals (middle panel, left and middle), the Poincaré plot (middle panel, right), and the raw ECG (lower panel) which was transferred from Beijing to the TCM Research Center in Graz.

(a)

(b)

Figure 3: Data analysis of the ECG in the two patients (A and B). Note the decrease in HR in both patients during acupuncture.

The HR data from patient A over a period of 40 minutes are shown in Figure 3(a) (upper panel). At the beginning of the recording session, the mean HR was about 80/min. There are some minor artefacts during this period caused by movement. In the following acupuncture period, the patient was lying comfortably on a bed. The mean HR during this period was 70/min in patient A (Figure 3(a)) and about 100/min in patient B (Figure 3(b)). After finishing acupuncture, HR increased again slightly in both subjects (A: 75/min, B: 105/min).

3.2. HRV Scatterplots

The “Poincaré” plot is a technique taken from nonlinear dynamics [4, 8]. Figure 4 shows two Poincaré scattergrams in which each RR interval is plotted as a function of the previous RR interval. These graphical representations of cardiovascular dynamics result in elliptical types of shape (patient A). The ellipse is fitted onto the so-called “line of identity.” Standard deviation of the points perpendicular to the line of identity, denoted by SD₁, describes short-term RR variability due to the respiratory component of HRV. The standard deviation along the line of identity, denoted by SD₂, describes long-term variability [14]. In Figures 4(a) and 4(b) the two patients produced two ellipses of different shape and magnitude. Patient A (Figure 4(a)) showed a higher HRV associated with a big ellipse. Patient B (Figure 4(b)) produced an extremely reduced ellipse in which the RR points gravitate around the mean RR and the line of identity.

(a)

(b)

Figure 4: Quantitative beat-to-beat analysis of RR intervals (Poincaré plot). The results of patient A (a) are directly comparable (same scale) to those of patient B (b). Note the different shapes of the ellipses resulting in a different total heart rate variability.

3.3. HRV Frequency Domain (“Fire of Life” Analysis)

The results of the “Fire of Life” HRV analysis of both patients are shown in Figure 5.

(a)

(b)

Figure 5: “Fire of Life” power frequency analyses. Heart rate variability (HRV) data of 40 minutes from patient A (a) and patient B (b) are shown.

At the end of the acupuncture period (25–30 min), a small influence of respiratory sinus arrhythmia (frequency range 0.37–0.40 Hz) is recognizable in patient A (Figure 5(a)). This influence is much smaller in patient B (frequency range 0.28–0.30; Figure 5(b)). In addition the influence of blood pressure waves (frequency ~0.12 Hz) can be observed in patient A. The frequency range <0.05 Hz may also contain slowly changing effects from the renin angiotensin system and temperature regulation. However, the analysis and quantification of these latter parameters only make sense in long-term recordings. After acupuncture, during the last two resting periods (Figure 5(a)), the three main components of HRV analysis (respiratory sinus arrhythmia (very small), blood pressure influence, and thermoregulatory effects) are prominent in patient A. Similar effects, however extremely reduced, are shown in Figure 5(b) in patient B. Not only total variability (reduction of the “Fire of Life” in patient B) but also specific frequency component increases (e.g., influence from blood pressure waves and respiratory sinus arrhythmia) are noticeable. The neuromodulation of HRV is not as pronounced in patient B as in patient A. The “Fire of Life” burns much brighter in patient A than in patient B which can be seen in Figure 5 at the first glance.

4. Discussion

Transcontinental medical studies are rare [15–19]. Main fields of application are surgery [15], epidemiological assessments [16–18], and introducing new fields for academic health centers [19]. However, our research team was the first to perform “teleacupuncture” between Asia and Europe [10, 20, 21]. These first Sino-European transcontinental studies are at the moment mainly based on HR and HRV data acquisition and analysis using new modern methodological approaches like the “Fire of Life” analysis described in this fourth part of the series [1–3].

HRV is an index value of the neurocontrol of the heart. HRV can be quantified by simple calculation of the standard deviation of RR intervals of the cardiac cycles (total HRV) in the time domain [4, 13]. In addition, complex analyses of HRV in the frequency domain using different spectral analysis methods are possible [4, 13]. It is interpreted as a brainstem reflex with an afferent arc via the vagus and glossopharyngeal nerves and an efferent arc mainly via vagal fibres [22]. HRV has stochastic and rhythmic components. With spectral analysis variability can be classified into individual ranges which represent biological rhythms. The following influences can be distinguished for different ranges of HRV: (i) respiratory sinus arrhythmia (approximately 0.15–0.5 Hz); centrally nervous respiratory impulses and interaction with pulmonary afferents; (ii) the so-called “10-s-rhythm” (approximately 0.05–0.15 Hz); natural rhythm of cardiovascularly active neurons in the lower brainstem (circulatory center and its modulation by feedback with natural vasomotoric rhythms via baroreceptor feedback); (iii) longer wave HRV rhythms (approximately < 0.05 Hz); effects from the renin angiotensin system or temperature regulation as well as metabolic processes [4, 8, 13, 22, 23].

The scope of HRV is not yet completely clear, but it is known that there are intraindividual and interindividual variances, and that HRV depends on age, circadian variations (sleep-wake-cycle), physical condition, and mental and physical exertion. HRV can also be affected by diverse conditions such as age-related diseases (diabetic neuropathy, renal failure, essential hypertension, cardiac disorders, coronary artery disease, and intracranial lesions) and different medications [8]. The narrowness of HRV after heart transplantation [23] is similar to that seen in deep comatose patients and in brain-dead subjects [22] in whom complex reflex mechanisms are no longer generated or regulated in the brain. In contrast, heart transplantation totally interrupts peripheral autonomic afferences and efferences.

HRV can be used as reliable indicator of the state of health [4, 8, 21]. It becomes less random with the aging process and the appearance of age-related diseases. However, it has been demonstrated that in special syndromes like fatigue and stress, one can counteract this process using different preventive methods like sport [4, 8] or acupuncture [21, 24]. The latter has been demonstrated in recent investigations concerning patients with burnout syndrome as performed in a common teleacupuncture study between Beijing and Graz [21].

5. Conclusions

The following conclusions can be drawn from the results of the two patients of this preliminary study.(i)Transcontinental data acquisition and analysis could be performed without any technical problems.(ii)Heart rate changes significantly during acupuncture of Fengchi, Neiguan, and Tianzhu in two patients from Beijing.(iii)Total HRV increases during acupuncture at the same acupoints as above.(iv)The different influences of HRV (respiratory sinus arrhythmia, blood pressure waves, etc.) can be clearly documented using the new “Fire of Life” analysis.

Acknowledgments

The scientific investigations were supported by the Stronach Medical Group, the German Academy of Acupuncture (DAA), and the Department of Science of the City of Graz. The measurements in China and the data analysis in Graz were performed within the research areas of “sustainable health research” and “neuroscience” at the Medical University of Graz.

References

X. Y. Gao, K. Liu, B. Zhu, and G. Litscher, “Sino-European transcontinental basic and clinical high-tech acupuncture studies, part 1: auricular acupuncture increases heart rate variability in anesthetized rats,” Evidence-Based Complementary and Alternative Medicine, vol. 2012, Article ID 817378, 7 pages, 2012.

G. Litscher, G. Y. Cheng, W. P. Cheng, et al., “Sino-European transcontinental basic and clinical high-tech acupuncture studies, part 2: acute stimulation effects on heart rate and its variability in patients with insomnia,” Evidence-Based Complementary and Alternative Medicine, vol. 2012, Article ID 916085, 5 pages, 2012.

X. Y. Gao, G. Litscher, K. Liu, and B. Zhu, “Sino-European transcontinental basic and clinical high-tech acupuncture studies, part 3: violet laser stimulation in anesthetized rats,” Evidence-based Complementary and Alternative Medicine, vol. 2012, Article ID 402590, 8 pages, 2012.

P. J. Maud and C. Foster, Eds., Physiological Assessment of Human Fitness, Human Kinetics Books, Champaign, Ill, USA, 2006.

L. T. Mainardi, “On the quantification of heart rate variability spectral parameters using time-frequency and time-varying methods,” Philosophical Transactions of the Royal Society A, vol. 367, no. 1887, pp. 255–275, 2009.

M. W. Chapleau and R. Sabharwal, “Methods of assessing vagus nerve activity and reflexes,” Heart Failure Reviews, vol. 16, no. 2, pp. 109–127, 2011.

T. G. Buchman, P. K. Stein, and B. Goldstein, “Heart rate variability in critical illness and critical care,” Current Opinion in Critical Care, vol. 8, no. 4, pp. 311–315, 2002.

G. Litscher and D. Litscher, “‘Fire of Life’ analysis of heart rate variability during alpine skiing in Austria,” North American Journal of Medical Sciences, vol. 2, no. 6, pp. 258–262, 2010.

G. Litscher, “Transcontinental and translational high-tech acupuncture research using computer-based heart rate and “Fire of Life” heart rate variability analysis,” Journal of Acupuncture and Meridian Studies, vol. 3, no. 3, pp. 156–164, 2010.

G. Litscher, “Modernization of traditional acupuncture using multimodal computer-based high-tech methods—recent results of blue laser and teleacupuncture from the Medical University of Graz,” Journal of Acupuncture and Meridian Studies, vol. 2, no. 3, pp. 202–209, 2009.

X. Y. Gao, L. Wang, I. Gaischek, Y. Michenthaler, B. Zhu, and G. Litscher, “Brain-modulated effects of auricular acupressure on the regulation of autonomic function in healthy volunteers,” Evidence-Based Complementary and Alternative Medicine, vol. 2012, Article ID 714391, 8 pages, 2012.

L. Wang, J. Valentini, K. Sugimoto, et al., “Biomedical teleacupuncture between China and Austria using heart rate variability, part 1: poststroke patients,” Evidence-Based Complementary and Alternative Medicine, vol. 2011, Article ID 782489, 5 pages, 2011.

Task force of the European Society of Cardiology and the North American Society of Pacing and Electrophysiology, “Heart rate variability: standards of measurement, physiological interpretation and clinical use,” European Heart Journal, vol. 17, pp. 354–381, 1996.

M. P. Tulppo, T. H. Mäkikallio, T. E. S. Takala, T. Seppänen, and H. V. Huikuri, “Quantitative beat-to-beat analysis of heart rate dynamics during exercise,” American Journal of Physiology, vol. 271, no. 1, pp. H244–H252, 1996.

T. Haidegger, J. Sándor, and Z. Benyó, “Surgery in space: the future of robotic telesurgery,” Surgical Endoscopy and Other Interventional Techniques, vol. 25, no. 3, pp. 681–690, 2011.

A. L. Gibson, R. C. Huard, N. C. Gey van Pittius et al., “Application of sensitive and specific molecular methods to uncover global dissemination of the major RDRio sublineage of the Latin American-Mediterranean Mycobacterium tuberculosis spoligotype family,” Journal of Clinical Microbiology, vol. 46, no. 4, pp. 1259–1267, 2008.

A. T. de Queiroz, A. C. Mota-Miranda, T. de Oliveira et al., “Re-mapping the molecular features of the human immunodeficiency virus type 1 and human T-cell lymphotropic virus type 1 Brazilian sequences using a bioinformatics unit established in Salvador, Bahia, Brazil, to give support to the viral epidemiology studies,” Memorias do Instituto Oswaldo Cruz, vol. 102, no. 2, pp. 133–139, 2007.

C. Casper, S. P. Singh, S. Rane et al., “The transcontinental transmission of tuberculosis: a molecular epidemiological assessment,” American Journal of Public Health, vol. 86, no. 4, pp. 551–553, 1996.

H. D. Sostman, L. L. Forese, M. L. Boom et al., “Building a transcontinental affiliation: a new model for academic health centers,” Academic Medicine, vol. 80, no. 11, pp. 1046–1053, 2005.

G. Litscher, “Teleacupuncture: a new approach for transcontinental long-distance cooperation between Graz, Austria and Beijing, China (7,650 km),” Medical Acupuncture, vol. 21, no. 3, pp. 223–224, 2009.

G. Litscher, “Translational research in acupuncture-teleacupuncture bridges science and practice,” Health, vol. 2, no. 1, pp. 16–19, 2010.

G. Schwarz, G. Pfurtscheller, G. Litscher, and W. F. List, “Quantification of autonomic activity in the brainstem in normal, comatose and brain dead subjects using heart rate variability,” Functional Neurology, vol. 2, no. 2, pp. 149–154, 1987.

G Litscher, G. Schwarz, K. H. Tscheliessnigg, G. Pfurtscheller, A. Lechner, and W. F. List , “Computer based analysis of cardiocirculatory and respiratory parameters after orthotopic heart transplantation—methodological aspects and preliminary results,” in Proceedings of the 7th World Congress on Medical Informatics (MEDINFO '92), K. C. Lun, Ed., pp. 826–830, Elsevier, Geneva, Switzerland, September 1992.

G. Litscher, “Bioengineering assessment of acupuncture, part 7: heart rate variability,” Critical Reviews in Biomedical Engineering, vol. 35, no. 3-4, pp. 183–195, 2007.