Evidence-Based Complementary and Alternative Medicine

Volume 2013 (2013), Article ID 831539, 2 pages

http://dx.doi.org/10.1155/2013/831539

Erratum

Erratum to “Effects of Acupuncture on 1-Chloro-2,4-dinitrochlorobenzene-Induced Atopic Dermatitis”

Ji-Yeun Park,1,2 Hi-Joon Park,¹ You Yeon Choi,³ Mi Hye Kim,³ Seung-Nam Kim,1,2 and Woong Mo Yang³

¹Studies of Translational Acupuncture Research (STAR), Acupuncture and Meridian Science Research Center (AMSRC), Kyung Hee University, 26 Kyungheedae-ro, Dongdaemun-gu, Seoul 130-701, Republic of Korea

²Department of Korean Medical Science, Graduate School of Korean Medicine, Kyung Hee University, Seoul 130-701, Republic of Korea

³Department of Prescriptionology, College of Korean Medicine, Kyung Hee University, 26 Kyungheedae-ro, Dongdaemun-gu, Seoul 130-701, Republic of Korea

Received 28 August 2013; Accepted 16 September 2013

Copyright © 2013 Ji-Yeun Park et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

A mistake occurred in Figure 1(c), and the following is the corrected figure.

(a)

(b)

(c)

(d)

(e)

Figure 1