Evidence-Based Complementary and Alternative Medicine
Volume 2017 (2017), Article ID 7107136, 8 pages
https://doi.org/10.1155/2017/7107136

Research Article

Deqi Induction by HT7 Acupuncture Alters Theta and Alpha Band Coherence in Human Healthy Subjects

Go-Eun Lee,¹ Jong-Min Yun,² Seung-Bum Yang,3,4 Yeonseok Kang,⁵ Hyung-Won Kang,⁶ Kwang-Ho Choi,⁷ Junbeom Kim,⁷ O. Sang Kwon,⁷ Ji-Eun Park,⁷ and Jae-Hyo Kim³

¹Department of Oriental Rehabilitation Medicine, Korean National Rehabilitation Center, Seoul, Republic of Korea
²Department of Internal Medicine, College of Korean Medicine, Wonkwang University, Iksan, Republic of Korea
³Department of Meridian & Acupoint, College of Korean Medicine, Wonkwang University, Iksan, Republic of Korea
⁴Department of Medical Non-Commissioned Officer, Wonkwang Health Science University, Iksan, Republic of Korea
⁵Department of Medical History, College of Korean Medicine, Wonkwang University, Iksan, Republic of Korea
⁶Department of Korean Neuropsychiatry Medicine, Wonkwang University Sanbon Hospital, Gunpo, Republic of Korea
⁷Korea Institute of Oriental Medicine, Daejeon, Republic of Korea

Correspondence should be addressed to Jae-Hyo Kim; medicdog@wku.ac.kr

Received 18 January 2017; Accepted 29 March 2017; Published 6 April 2017

Academic Editor: Rongjie Zhao

Copyright © 2017 Go-Eun Lee et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The aim of this preliminary study is to investigate the changes in phase synchronization in the theta and alpha bands before and during the performance of classical acupuncture on the Sinmun (HT7). The electroencephalogram (EEG) signals from nine healthy young subjects were recorded before and during acupuncture in the “closed-eye” state. The EEG signals were acquired from 19 surface scalp electrodes (FP1, FP2, F7, F3, Fz F4, F8, T3, C3, Cz, C4, T4, T5, P3, Pz, P4, T6, O1, and O2). Needles were inserted into the HT7 bilaterally and were then manipulated to induce deqi and retained for 15 minutes. Phase synchronization was measured by phase coherence. In the theta band, coherence significantly increased between the temporal (T5, T6) and occipital areas (O1, O2) during the acupuncture stimulation. In the alpha band, coherence significantly increased between the left temporal area (T5) and other areas (frontal, parietal, and occipital). Phase coherence in the theta and alpha bands tended to increase during the retention of the acupuncture needles after deqi. Therefore, it can be concluded that acupuncture stimulation with deqi is clinically effective via the central nervous system (CNS).

1. Introduction

Acupuncture is a major part of the traditional Korean medicine treatment and has been used for the effective clinical treatment of many diseases. The traditional Korean medicine theories state that a needle stimulates meridian points, generating qi (vital energy) and allowing qi to reach a particular organ. Thus, deqi is closely related to the effectiveness of the acupuncture treatment. Furthermore, previous clinical studies have reported that a needle stimulus accompanied by deqi is more effective than a stimulus without deqi [1–3].

The nature of the deqi mechanism has not been clearly established yet, although some studies on neurological image changes claim to have identified the neurophysiological mechanism of deqi. A previous study using fMRI has reported that when qi is acquired, the limbic/subcortical structure is observed to be inactivated, while various motor cortices are activated [4–8]. Therefore, the possibility was raised that a needle stimulus can adjust the limbic-paralimbic-neocortical network and serve as a mediator for analgesia, anxiolytic, and relief from various diseases.

However, most previous studies have investigated the change of power in each frequency band using power spectral analysis, while almost no research has been conducted on functional connectivity changes. In previous studies using the power spectral analysis, the results were inconsistent. The frequency band the power of which was increasing varied over previous studies, such as the theta band [9], the alpha band [10, 11], the low-frequency band (except gamma) [12], and the all-frequency band [13].

Oscillatory activity based on scalp electroencephalogram (EEG) reflects the intra- and interregional interactions of the brain [14, 15]. Among these interactions, oscillations of the theta frequency band are linked to the integration of sensory information and motion output [16]. In particular, oscillation of the theta frequency band involves participation in pain perception [17, 18] and other perceptual tasks [19]. Additionally, theta oscillations were found to be related to the induction of synaptic plasticity, spatial learning, and behavioral memory [20]. Furthermore, alpha oscillations were found to be related to selective attention, retention period of memory processing, and default mode [21–23].

Coherence is one of the indicators to measure the functional connectivity and is very sensitive to profiling of a mental state [24, 25]. Therefore, in various studies, coherence has been used to investigate the change of brain activity during performing cognitive tasks [26, 27] and meditation [28–30]. In addition, theta coherence represents a neural index of readiness to perceive and integrate sensory inputs [20, 31]. However, only one study observed the change of theta coherence during acupuncture stimulation [32].

In this context, the present study seeks to observe patterns in the changes of coherence of the theta and alpha frequency bands to disclose the effects of a needle stimulus on the functional connectivity of the cerebral cortex.

2. Methods

2.1. Participants

The study participants were 16 individuals aged 19–35 years who met the following inclusion criteria: they () do not major in the traditional Korean medicine; () do not consume cigarettes, tea, or coffee and display normal sleeping and dieting patterns on the experimental day; (3) are right-handed; and (4) have received an explanation of the purpose and process of this clinical study and have agreed to participate voluntarily.

The exclusion criteria were as follows: () acupuncture treatment in the 3 months prior to registration; () a serious physical disease or a mental disorder (based on a clinical laboratory examination, including electrocardiogram, chest X-ray, and vital signs, by the clinical study manager or doctors who assess the volunteers); (3) congenital diseases, psychiatric disorders, CNS diseases, peripheral nervous system diseases, endocrine system diseases, immunological diseases, and/or serious heart, liver, or renal problems; (4) neurological diseases, including head trauma and mental disorders, such as major depression, anxiety disorders, bipolar disorders, and schizophrenia; (5) a pacemaker, brain stimulus device, ventriculoperitoneal shunt, or other intracranial devices; (6) taking medications, except for vitamins (e.g., beta blockers, aspirin, nonsteroidal anti-inflammatory drugs, steroids, phenothiazines, selective serotonin reuptake inhibitors, statins, and angiotensin converting enzyme inhibitors) within 1 week after registering for the clinical study; (7) consumption of food containing caffeine (including coffee milk), black tea, green tea, cocoa, cola, chocolate, or caffeine-rich energy drinks within 2 hours before the clinical trial; (8) fear of acupuncture treatment or unsuitability for acupuncture treatment due to bleeding or blood coagulation diseases; (9) pregnancy or nursing a baby; (10) participation in other clinical studies in the past month or current participation in a different clinical study; and (11) unsuitability for a clinical trial as determined by the clinical study staff or the clinical study manager.

2.2. Acupuncture Treatment

Agreement from the subjects to participate in the clinical study and the approval of the Traditional Korean Medicine Hospital IRB of Wonkwang University in Iksan, Republic of Korea (WKUIOMH-IRB-2015-01), were obtained. Acupuncture was applied at Sinmun (HT7) bilaterally by the traditional Korean medicine doctors with over ten years of experience of providing acupuncture treatment. Comfortably seated in a chair, with their eyes closed, the participants received acupuncture stimulation. A stainless steel needle of the diameter of 0.25 mm and the length of 30 mm was inserted into the HT7 perpendicularly with the depth of 10 ± 2 mm. To obtain the deqi sensation without inflicting harmful pain, we readjusted the needle position whenever the participants complained of a sharp pain and then observed that the sharp pain disappeared in several seconds. After obtaining the deqi, the traditional Korean medical doctor stimulated the HT7 by turning the needle 180 degrees once per second for 10 seconds. This procedure was repeated three times every five minutes with a needle retention time of 15 minutes.

2.3. Electrophysiological Recording

The resting EEG in the closed-eye condition was measured for 10 minutes (5 minutes before acupuncture and 5 minutes during the retention of the acupuncture needle). The participants were instructed to remain still and stay relaxed, but to remain alert with their eyes closed while moving their eyes or bodies as little as possible during the recording periods. The EEG was measured with 19 electrodes according to the extended international 10–20 system with linked ears reference. A ground lead was placed between the Fz and Cz. All electrode impedances were below 5 kΩ. The EEGs were recorded using a Mitsar-EEG 201 machine (Mitsar, Russia) with a 16-bit ADC (analog to digital conversion) at the sampling rate of 128 Hz. A high-frequency filter was set to 70 Hz, a notch filter was set to 55–65 Hz, and a low-frequency filter was set to 0.3 Hz.

2.4. Method of the EEG Data Analysis

The EEG signals were imported into the NeuroGuide software (NeuroGuide 2.8.8, Applied Neuroscience, Inc., USA). This device has 510(k) clearance by the FDA. The removal of artifacts and the calculation of the statistical properties of the segments were performed using the NeuroGuide software. Artifacts were removed both by automatic algorithms in the NeuroGuide software and through visual inspection. Both split-half and test-retest reliability tests were conducted on the edited, artifact-free EEG segments. Only records with >95% split-half reliability, >90% test-retest reliability, and a total measurement of over 1 minute were used for further analyses.

Fast Fourier transform (FFT) autospectral and cross-spectral analyses were computed at 2 s epochs, thus yielding a 0.5 Hz frequency resolution over the frequency range of 0 to 30 Hz for each epoch. The 75% sliding window method [33] was used to compute the FFT, where successive 2 s epochs (i.e., 256 points) were overlapped by 500 ms steps (64 points) to minimize the effects of the FFT windowing procedure. Absolute power and relative power were computed from the 19 scalp locations in the theta (4.0–7.5 Hz) and alpha (8–12 Hz) frequency bands. The EEG coherence and phase were computed for all 171 intrahemispheric and interhemispheric pairwise combinations of electrodes [34]. Coherence was defined as follows:

where is the cross-power spectral density and and are the respective auto-power spectral densities. Coherence was computed for all pairwise combinations of the 19 channels for the theta and alpha bands. The computational procedure for obtaining coherence involved computing the power spectra for and and then computing the normalized cross-spectra. As complex analyses were involved, this resulted in the production of the cospectrum (“” for real) and quad-spectrum (“” for imaginary). Coherence was then computed as follows:

2.5. Measurement of Deqi Sensation

Using the Southampton acupuncture sensation questionnaire [35], deqi sensations felt by the participants during the acupuncture treatment were measured. Three (pricking, sharp, and electric shock) of the 17 sensations measured were irrelevant to deqi. The remaining 14 measured sensations relevant to deqi were classified to 2 dimensions. The first dimension, which concerns deqi related to aching sensations, includes 7 sensations (deep ache, dull ache, uncomfortable, heavy, pressure, bruised, and stinging) closely related to pain. The second dimension, which concerns deqi related to tingling sensations, includes 7 sensations (tingling, warm, spreading, fading, numb, twinge, and throbbing) that are less related to pain.

2.6. Statistical Method

Statistical analyses were performed using SPSS 22.0 (IBM Corp., Armonk, NY, USA). The paired t-test was applied to compare the coherence data before acupuncture and during the acupuncture needle retention time. The alpha value for significance was set to 0.05.

3. Results

3.1. Participant Characteristics and Deqi Sensations

A total of 16 healthy participants were sampled, two of whom were excluded for their own personal reasons, and 14 remaining subjects underwent EEG and participated in the acupuncture treatment. The participants were all right-handed and showed no neurological symptoms or evidence of nervous system diseases or psychiatric disorders. The clinical study was conducted in Iksan, South Korea, between November and December of 2015.

To ensure an accurate analysis of the EEG data, after the removal of artifacts, we excluded 2 participants with the edit time of under 60 seconds, 2 participants with the average split-half reliability under 95%, and 1 participant with the average test-retest reliability under 90% (see Figure 1). A total of 9 participants (5 males and 4 females) of the average age of 21.33 ± 2.18 years were included in the analysis of the EEG data. Evaluation of these 9 participants resulted in a total deqi score of 12 points with the average aching dimension deqi score of 6.56 points and the average tingling dimension deqi score of 5.44 points (see Table 1).

Table 1: Characteristics of participants and deqi sensation.

Index
Mean ± SD

Age (years)
21.33 ± 2.18

Gender (male/female)
5/4

Total score of deqi
12.00 ± 8.06

Aching deqi
6.56 ± 4.75

    Deep ache
0.56 ± 0.73

    Dull ache
1.22 ± 1.20

    Uncomfortable
1.33 ± 1.00

    Heavy
1.00 ± 1.00

    Pressure
0.67 ± 0.87

    Bruised
0.56 ± 0.73

    Stinging
1.22 ± 0.97

Tingling deqi
5.44 ± 3.84

    Tingling
0.67 ± 0.71

    Warm
0.33 ± 0.71

    Spreading
0.78 ± 0.83

    Fading
1.44 ± 1.24

    Numb
0.44 ± 0.53

    Twinge
0.78 ± 0.83

    Pricking
1.56 ± 0.53

    Sharp
0.89 ± 0.60

    Electric shock
0.33 ± 0.50

    Throbbing
1.00 ± 0.87

SD, standard deviation.

Figure 1: Flow diagram of study participants.

3.2. Coherence

The value of coherence on each electrode is presented in detail in Supplement  1 (see Supplementary Material available online at https://doi.org/10.1155/2017/7107136). Theta coherence increased significantly after deqi during the retention of the acupuncture needles at T4-T6, T5-P3, T5-O1, and T6-O2. Albeit insignificant, theta coherence tended to increase inside the frontal region and in the frontal and central regions (see Figure 2).

Figure 2: Coherence changes in the theta band before and during HT7 acupuncture. Data show the difference between mean coherence during retention of the acupuncture needle and mean coherence before acupuncture. The green areas represent a decrease of coherence during the acupuncture treatment. The red areas represent an increase of coherence during the acupuncture treatment. Significantly increasing areas are marked with the yellow color ().

Alpha coherence increased significantly at FP1-T5, FP2-T5, FP2-P3, F7-T5, F7-O2, F3-T5, Fz-T5, F4-T5, T3-O1, T3-O2, C3-O1, Cz-T5, T5-P4, T5-T6, T5-O2, P3-Pz, P3-P4, P3-T6, Pz-P4, P4-O1, T6-O1, and T6-O2 during the retention of the acupuncture needles after deqi (see Figure 3). Furthermore, albeit not significant, alpha coherence tended to increase between the frontal-parietal and frontal-occipital regions (see Figure 3).

Figure 3: Coherence changes in the alpha band before and during HT7 acupuncture. Data show the difference between mean coherence during retention of the acupuncture needle and mean coherence before acupuncture. The green areas represented a decrease of coherence during the acupuncture treatment. The red areas mark an increase of coherence during the acupuncture treatment. Significantly increasing areas are marked with the yellow color ().

The links between the nodes indicate a significant change () in synchronization between the two channels before acupuncture and during the retention of the acupuncture needles. The blue color lines indicate the strength of the coherence during acupuncture stimulation (see Figure 4).

Figure 4: Brain mapping showing significant statistical changes of theta and alpha coherence. Blue hair line means significance with and blue thick line means significance with .

4. Discussion

Acupuncture treatment has been widely used to treat various diseases. Notably, acupuncture treatment has been considered as a minimally invasive and safe treatment for high-risk patients, alleviating pain with a low risk of complications [36]. Additionally, acupuncture treatment has been reported to relieve mental fatigue [37, 38]. Among the meridians, the heart meridian is known to be deeply related to the brain and mental function. In addition, HT7, the acupoint of the heart meridian, is intensively used in clinical procedures to treat insomnia, epilepsy, mental fatigue, anxiety, and other psychiatric disorders and is known to be safe and effective.

Among the studies on the neurophysiological mechanisms of acupuncture treatment, the analgesic effect of acupuncture treatment has been the most actively investigated research topic. Acupuncture treatment has the effect of controlling pain by stimulating the CNS through an intrinsic mechanism that mediates endogenous opioids [39]. Additionally, according to several reports, acupuncture treatment stimulates the vagus nerve and the nucleus of the tractus solitarius, which subsequently modulate the opioid receptors and project rostrally to the hypothalamus, amygdala, dorsal raphe nucleus, nucleus ambiguus, parabrachial nucleus, and thalamus in the amygdala, thus modulating any imbalance in the autonomic nervous system and making acupuncture effective for treating disorders of the autonomic nervous system, such as insomnia [40]. Thus, acupuncture stimulation influences the CNS by offering pain control and sedative effects.

Coherence is a variable used to measure a phase difference, thereby assessing the functional connectivity between cortices [15, 41]. Therefore, coherence offers additional information as compared to studies of the EEG power. If the EEG activity at two electrodes is synchronized, coherence values approach 1, whereas, if there is no synchronization, coherence values approach zero. Thus, higher levels of coherence between two electrodes suggest a strong functional connectivity between different cerebral regions [42].

This study found that, in the theta frequency band, coherence increased significantly during needle retention following deqi on the intrahemispheric temporooccipital regions. Furthermore, in the alpha band, coherence increased significantly during needle retention following deqi on the left intrahemispheric frontotemporal and front-occipital regions. Additionally, alpha coherence significantly increased on the interhemispheric parietal, temporal, and occipital regions. Similarly, a previous study on acupuncture treatment involving changes in coherence reported that theta coherence between the frontal and occipital regions increased immediately after deqi, as compared to before the acupuncture treatment and that electroacupuncture treatment increased occipital connectivity [32]. This report is inconsistent with the findings of the present study with regard to the area where theta coherence increased immediately after deqi. However, both studies converge in finding that theta coherence increased significantly immediately after deqi and coherence increased in the occipital region during electrical stimulation.

Although not significant in our results, theta coherence increased between the frontal and central regions during acupuncture treatment. This is in line with previous reports showing that phase-locked averaged pain-related neuronal responses occur at frequencies below 10 Hz [43, 44]. Meanwhile, in the frontofrontal and frontocentral regions, alpha coherence tended to decrease. This result conflicts with the results of a previous study that reported that alpha coherence increased in the frontocentral regions during pain stimulation [25], thus suggesting that acupuncture stimulation cannot cause the same changes as the perception of pain stimulation. Furthermore, the results of the present study, which involves increasing theta coherence in the frontal and central regions, do not cohere with those of previous studies reporting that there would be a negative relationship between anxiety and increasing theta activity at the frontal-midline [45, 46]. Therefore, we can suspect that it can be related to sedative effects of acupuncture.

Alpha coherence showed many significant changes in various regions. Phase coupling in the alpha frequency band is known to play an important role in the top-down processing [47–49]. Therefore, a significant increase in alpha coherence suggests that the effect of acupuncture would be driven not only by bottom-up mechanisms due to external stimuli, but also by the top-down processing. Additionally, our findings that both theta and alpha coherence tend to increase are consistent with previous reports that, in various meditation states, both theta and alpha coherence increase compared to other resting times [46, 50–52]. Therefore, this suggests that acupuncture treatment would be effective in anxious states.

However, our study has several limitations. First, due to the small sample size, our findings are difficult to generalize. Furthermore, other studies have reported that needle stimulation accompanied by sharp pain might induce different neurophysiological changes from deqi without sharp pain [6–8]. Thirdly, the participants in the present study reported a wide range of deqi. Therefore, in future research, such heterogeneity associated with deqi sensation should be controlled for.

5. Conclusion

Acupuncture stimulation of the HT7 accompanying deqi induces a specific change in the coherence of the theta and alpha bands. The findings of this study provide evidence that the effectiveness triggered by deqi is affected by the CNS, particularly, the forebrain. However, this result needs to be replicated by further studies that would involve larger cohorts categorized according to their reported deqi sensation levels.

Conflicts of Interest

The authors declare that they have no conflicts of interest.

Acknowledgments

This study was supported by Korea Institute of Oriental Medicine (K16812).

References

J. Kong, D. T. Fufa, A. J. Gerber et al., “Psychophysical outcomes from a randomized pilot study of manual, electro, and sham acupuncture treatment on experimentally induced thermal pain,” Journal of Pain, vol. 6, no. 1, pp. 55–64, 2005.

R. B. Spaeth, S. Camhi, J. A. Hashmi et al., “A longitudinal study of the reliability of acupuncture deqi sensations in knee osteoarthritis,” Evidence-based Complementary and Alternative Medicine, vol. 2013, Article ID 204259, 2013.

H. Li, H. Liu, C. Liu et al., “Effect of “Deqi” during the study of needling “Wang's Jiaji” acupoints treating spasticity after stroke,” Evidence-based Complementary and Alternative Medicine, vol. 2014, Article ID 715351, 2014.

M.-T. Wu, J.-C. Hsieh, J. Xiong et al., “Central nervous pathway for acupuncture stimulation: localization of processing with functional MR imaging of the brain—preliminary experience,” Radiology, vol. 212, no. 1, pp. 133–141, 1999.

K. K. S. Hui, J. Liu, O. Marina et al., “The integrated response of the human cerebro-cerebellar and limbic systems to acupuncture stimulation at ST 36 as evidenced by fMRI,” NeuroImage, vol. 27, no. 3, pp. 479–496, 2005.

J. Fang, Z. Jin, Y. Wang et al., “The salient characteristics of the central effects of acupuncture needling: limbic-paralimbic-neocortical network modulation,” Human Brain Mapping, vol. 30, no. 4, pp. 1196–1206, 2009.

A. U. Asghar, G. Green, M. F. Lythgoe, G. Lewith, and H. MacPherson, “Acupuncture needling sensation: the neural correlates of deqi using fMRI,” Brain Research, vol. 1315, pp. 111–118, 2010.

K. K. S. Hui, O. Marina, J. Liu, B. R. Rosen, and K. K. Kwong, “Acupuncture, the limbic system, and the anticorrelated networks of the brain,” Autonomic Neuroscience, vol. 157, no. 1-2, pp. 81–90, 2010.

S.-F. Hsu, C.-Y. Chen, M.-D. Ke, C.-H. Huang, Y.-T. Sun, and J.-G. Lin, “Variations of brain activities of acupuncture to TE5 of left hand in normal subjects,” American Journal of Chinese Medicine, vol. 39, no. 4, pp. 673–686, 2011.

K. Streitberger, J. Steppan, C. Maier, H. Hill, J. Backs, and K. Plaschke, “Effects of verum acupuncture compared to placebo acupuncture on quantitative EEG and heart rate variability in healthy volunteers,” Journal of Alternative and Complementary Medicine, vol. 14, no. 5, pp. 505–513, 2008.

S. Y. Kim, S. W. Kim, C. S. Yin, H. J. Park, and H. Lee, “Different responses of acupuncture on EEG and HRV according to stress level: randomized, placebo-controlled cross-over trial,” Clinical EEG and Neuroscience, vol. 42, no. 1, p. 68, 2011.

M. S. Kim, Y. C. Cho, J. H. Moon, and S. C. Pak, “A characteristic estimation of bio-signals for electro-acupuncture stimulations in human subjects,” American Journal of Chinese Medicine, vol. 37, no. 3, pp. 505–517, 2009.

M. S. Kim, H. D. Kim, H. D. Seo, K. Sawada, and M. Ishida, “The effect of acupuncture at PC-6 on the electroencephalogram and electrocardiogram,” The American Journal of Chinese Medicine, vol. 36, no. 3, pp. 481–491, 2008.

A. Von Stein and J. Sarnthein, “Different frequencies for different scales of cortical integration: from local gamma to long range alpha/theta synchronization,” International Journal of Psychophysiology, vol. 38, no. 3, pp. 301–313, 2000.

P. Fries, “A mechanism for cognitive dynamics: neuronal communication through neuronal coherence,” Trends in Cognitive Sciences, vol. 9, no. 10, pp. 474–480, 2005.

B. H. Bland and S. D. Oddie, “Theta band oscillation and synchrony in the hippocampal formation and associated structures: the case for its role in sensorimotor integration,” Behavioural Brain Research, vol. 127, no. 1-2, pp. 119–136, 2001.

E. Schulz, L. Tiemann, T. Schuster, J. Gross, and M. Ploner, “Neurophysiological coding of traits and states in the perception of pain,” Cerebral Cortex, vol. 21, no. 10, pp. 2408–2414, 2011.

J. Wang, D. Li, X. Li et al., “Phase-amplitude coupling between theta and gamma oscillations during nociception in rat electroencephalography,” Neuroscience Letters, vol. 499, no. 2, pp. 84–87, 2011.

J. B. Caplan, J. R. Madsen, A. Schulze-Bonhage, R. Aschenbrenner-Scheibe, E. L. Newman, and M. J. Kahana, “Human θ oscillations related to sensorimotor integration and spatial learning,” Journal of Neuroscience, vol. 23, no. 11, pp. 4726–4736, 2003.

G. Buzsáki, “Theta rhythm of navigation: link between path integration and landmark navigation, episodic and semantic memory,” Hippocampus, vol. 15, no. 7, pp. 827–840, 2005.

K. E. Mathewson, Pulsed Out of Awareness: EEG Alpha Oscillations Represent a Pulsed Inhibition of Ongoing Cortical Processing, University of Illinois at Urbana-Champaign, 2011.

W. Klimesch, P. Sauseng, and S. Hanslmayr, “EEG alpha oscillations: the inhibition-timing hypothesis,” Brain Research Reviews, vol. 53, no. 1, pp. 63–88, 2007.

O. Jensen and A. Mazaheri, “Shaping functional architecture by oscillatory alpha activity: gating by inhibition,” Frontiers in Human Neuroscience, vol. 4, article 186, 2010.

H. Petsche, D. Lacroix, K. Lindner, P. Rappelsberger, and E. Schmidt-Henrich, “Thinking with images or thinking with language: a pilot EEG probability mapping study,” International Journal of Psychophysiology, vol. 12, no. 1, pp. 31–39, 1992.

A. C. N. Chen and P. Rappelsberger, “Brain and human pain: topographic EEG amplitude and coherence mapping,” Brain Topography, vol. 7, no. 2, pp. 129–140, 1994.

T. L. Blankenship, M. O'Neill, K. Deater-Deckard, R. A. Diana, and M. A. Bell, “Frontotemporal function]al connectivity and executive functions contribute to episodic memory performance,” International Journal of Psychophysiology, vol. 107, pp. 72–82, 2016.

M. Jaime, C. M. McMahon, B. C. Davidson, L. C. Newell, P. C. Mundy, and H. A. Henderson, “Brief report: reduced temporal-central EEG alpha coherence during joint attention perception in adolescents with autism spectrum disorder,” Journal of Autism and Developmental Disorders, vol. 46, no. 4, pp. 1477–1489, 2016.

F. Travis, “Comparison of coherence, amplitude, and eLORETA patterns during Transcendental Meditation and TM-Sidhi practice,” International Journal of Psychophysiology, vol. 81, no. 3, pp. 198–202, 2011.

D. Lehmann, P. L. Faber, L. R. R. Gianotti, K. Kochi, and R. D. Pascual-Marqui, “Coherence and phase locking in the scalp EEG and between LORETA model sources, and microstates as putative mechanisms of brain temporo-spatial functional organization,” Journal of Physiology Paris, vol. 99, no. 1, pp. 29–36, 2006.

F. Travis, J. Tecce, A. Arenander, and R. K. Wallace, “Patterns of EEG coherence, power, and contingent negative variation characterize the integration of transcendental and waking states,” Biological Psychology, vol. 61, no. 3, pp. 293–319, 2002.

P. Lakatos, M. N. O'Connell, A. Barczak, A. Mills, D. C. Javitt, and C. E. Schroeder, “The leading sense: supramodal control of neurophysiological context by attention,” Neuron, vol. 64, no. 3, pp. 419–430, 2009.

X. Li, G. Xu, and X. Shang, “EEG theta-band phase synchronization during electrical acupuncture in humans,” in Proceedings of the 5th International Conference on Biomedical Engineering and Informatics (BMEI '12), pp. 511–514, October 2012.

D. A. Kaiser and M. B. Sterman, “Automatic artifact detection, overlapping windows, and state transitions,” Journal of Neurotherapy, vol. 4, no. 3, pp. 85–92, 2000.

R. Thatcher, R. McAlaster, M. Lester, R. Horst, and D. Cantor, “Hemispheric EEG asymmetries related to cognitive functioning in children,” in Cognitive Processing in the Right Hemisphere, pp. 125–146, 1983.

P. White, F. Bishop, H. Hardy et al., “Southampton needle sensation questionnaire: development and validation of a measure to gauge acupuncture needle sensation,” The Journal of Alternative and Complementary Medicine, vol. 14, no. 4, pp. 373–379, 2008.

N. Kotani, H. Hashimoto, Y. Sato et al., “Preoperative intradermal acupuncture reduces postoperative pain, nausea and vomiting, analgesic requirement, and sympathoadrenal responses,” Anesthesiology, vol. 95, no. 2, pp. 349–356, 2001.

D. L. Dailey, B. A. Rakel, C. G. T. Vance et al., “Transcutaneous electrical nerve stimulation reduces pain, fatigue and hyperalgesia while restoring central inhibition in primary fibromyalgia,” Pain, vol. 154, no. 11, pp. 2554–2562, 2013.

F. Wang and H. Wang, “Study of driving fatigue alleviation by transcutaneous acupoints electrical stimulations,” The Scientific World Journal, vol. 2014, Article ID 450249, 2014.

H. Wang, Y. Xie, Q. Zhang et al., “Transcutaneous electric acupoint stimulation reduces intra-operative remifentanil consumption and alleviates postoperative side-effects in patients undergoing sinusotomy: a prospective, randomized, placebo-controlled trial,” British Journal of Anaesthesia, vol. 112, no. 6, pp. 1075–1082, 2014.

P.-L. Yi, C.-Y. Lu, S.-B. Jou, and F.-C. Chang, “Low-frequency electroacupuncture suppresses focal epilepsy and improves epilepsy-induced sleep disruptions,” Journal of Biomedical Science, vol. 22, no. 1, article 49, 2015.

F. Varela, J.-P. Lachaux, E. Rodriguez, and J. Martinerie, “The brainweb: Phase synchronization and large-scale integration,” Nature Reviews Neuroscience, vol. 2, no. 4, pp. 229–239, 2001.

R. W. Thatcher, D. M. North, and C. J. Biver, “Development of cortical connections as measured by EEG coherence and phase delays,” Human Brain Mapping, vol. 29, no. 12, pp. 1400–1415, 2008.

L. Garcia-Larrea, M. Frot, and M. Valeriani, “Brain generators of laser-evoked potentials: from dipoles to functional significance,” Neurophysiologie Clinique, vol. 33, no. 6, pp. 279–292, 2003.

J. Lorenz and L. Garcia-Larrea, “Contribution of attentional and cognitive factors to laser evoked brain potentials,” Neurophysiologie Clinique, vol. 33, no. 6, pp. 293–301, 2003.

K. Inanaga, “Frontal midline theta rhythm and mental activity,” Psychiatry and Clinical Neurosciences, vol. 52, no. 6, pp. 555–566, 1998.

L. I. Aftanas and S. A. Golocheikine, “Human anterior and frontal midline theta and lower alpha reflect emotionally positive state and internalized attention: high-resolution EEG investigation of meditation,” Neuroscience Letters, vol. 310, no. 1, pp. 57–60, 2001.

A. K. Engel and P. Fries, “Beta-band oscillations-signalling the status quo?” Current Opinion in Neurobiology, vol. 20, no. 2, pp. 156–165, 2010.

X. Liu, J. Wang, B. Wang et al., “Effect of transcutaneous acupoint electrical stimulation on propofol sedation: an electroencephalogram analysis of patients undergoing pituitary adenomas resection,” BMC Complementary and Alternative Medicine, vol. 16, no. 1, article 33, 2016.

A. Von Stein, C. Chiang, and P. König, “Top-down processing mediated by interareal synchronization,” Proceedings of the National Academy of Sciences of the United States of America, vol. 97, no. 26, pp. 14748–14753, 2000.

F. Travis, “Autonomic and EEG patterns distinguish transcending from other experiences during Transcendental Meditation practice,” International Journal of Psychophysiology, vol. 42, no. 1, pp. 1–9, 2001.

T. Murata, T. Takahashi, T. Hamada et al., “Individual trait anxiety levels characterizing the properties of Zen meditation,” Neuropsychobiology, vol. 50, no. 2, pp. 189–194, 2004.

T. Takahashi, T. Murata, T. Hamada et al., “Changes in EEG and autonomic nervous activity during meditation and their association with personality traits,” International Journal of Psychophysiology, vol. 55, no. 2, pp. 199–207, 2005.