Gastroenterology Research and Practice

Volume 2014 (2014), Article ID 108073, 5 pages

http://dx.doi.org/10.1155/2014/108073

Clinical Study

Pelvic Radiation Disease Management by Hyperbaric Oxygen Therapy: Prospective Study of 44 Patients

Mehdi Ouaïssi,1,2,3 Stephanie Tran,1,2,3 Diane Mege,1,2,3 Vivien Latrasse,1,2,3 Alain Barthelemy,⁴ Nicolas Pirro,¹ Philippe Grandval,⁵ James Lassey,² Igor Sielezneff,1,2 Bernard Sastre,1,2,3 and Mathieu Coulange1,4

¹Aix-Marseille University, UMR 911, Campus Santé Timone, 13005 Marseille, France

²Department of Digestive Surgery, AP-HM Timone Hospital, Pôle DACCORD, 13385 Marseille, France

³Atelier Provençal d'écriture Médicale, France

⁴Hyperbaric Medicine, Sainte Marguerite Hospital, Aix-Marseille University, UMR MD2, 13385 Marseille, France

⁵Department of Gastroenterology, AP-HM Timone Hospital, Pôle DACCORD, 13385 Marseille, France

Received 22 June 2013; Revised 8 October 2013; Accepted 4 November 2013; Published 27 January 2014

Academic Editor: Lorenzo Fuccio

Copyright © 2014 Mehdi Ouaïssi et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Pelvic radiation disease (PRD) occurs in 2–11% of patients undergoing pelvic radiation for urologic and gynecologic malignancies. Hyperbaric oxygen therapy (HBOT) has previously been described as a noninvasive therapeutic option for the treatment of PRD. the purpose of study was to analyze prospectively the results of HBOT in 44 consecutive patients with PRD who were resistant to conventional oral or topical treatments. Material and Methods. The median age of the cohort was 65.7 years (39–85). Twenty-seven percent of patients required blood transfusion (). The median of delay between radiotherapy and HBOT was 26 months (3–175). We evaluated the results of HBOT, using SOMA-LENT Scale. Results. SOMA-LENT score was decreased in 59% of patient. The median of SOMA-LENT score before HBOT was significantly higher, being equal to 14 (0–36), than after HBOT with the SOMA-LENT score of 12 (0–38) (). Tenesmus (), bleeding (), and ulceration () significantly decreased after HBOT. Regarding patients with colostomy, 33% () benefited from colostomies closure. HBOT was generally well tolerated. Only one patient stopped precociously due to transient myopia. Conclusion. This study is in favor of the interest of HBOT in pelvic radiation disease treatment (PRD).

1. Introduction

Pelvic radiation disease (PRD) induced by radiation occurs in 2–11% of patients undergoing pelvic radiation for urologic and gynecologic malignancies [1–4]. PRD occurs 3 months after radiotherapy and is characterized by the painless passage of blood per rectum (clots or streaking of the stool), mucous rectal discharge, frequent bowel movements, and rectal pain. Less commonly, bowel obstruction, fistulae, bowel perforation, and severe rectal bleeding requiring blood transfusions are observed. Treatments for PRD are not universally successful. Current modalities include pharmacological agents such as oral and rectal steroids, 5-amino salicylates, sucralfate, short chain fatty acid enemas, oral metronidazole, and oral vitamins E and C [5, 6]. Acute hemorrhage could imply local haemostatic treatments including topical formalin, yttrium-aluminum-garnet (YAG), laser and/or surgical intervention consisting of defunctioning colostomy in severe cases [5]. Hyperbaric oxygen therapy (HBOT) has previously been described as a noninvasive therapeutic option for the treatment of radiation PRD [7]. HBOT is thought to promote neovascularization by improving oxygenation thus increasing the p02 and promoting wound healing in the damaged rectal mucosa, thereby reducing bleeding [8]. Cochrane’s review concludes that HBOT in late tissue radiation injury is associated with improved outcome though the review was based on small trial series. In the present study, we are assessing the efficacy of HBOT in 44 consecutive patients with PRD who were resistant to conventional oral or topical treatments [6].

2. Materials and Methods

2.1. Type of Study

Between January 2001 and December 2009, forty-four patients with PRD, from the department of digestive surgery and hyperbaric Medicine unit prospectively included in this study and treated with HBOT. Before treatment, PRD was confirmed by sigmoidoscopy and biopsy in all patients.

2.2. Types of Participants

We included all patients with PRD following radiation therapy for pelvic cancer. The patient characteristics are listed in Table 1. There were anal cancer (%), prostate cancer (%), uterine cancer (%), and other types of cancer (%) (Table 1). Diagnosis of PRD was established by endoscopy showing edematous and inflamed mucosa. PRD symptoms are tenesmus, rectal bleeding, stenosis, occlusion/constipation, fistulas, and incontinence. All patients were free of oncological disease.

Table 1: Demographical data of population.

(%)

Age (years)

    Median
65.7 (39–85)

Gender

    Female
18 (41)

    Male
26 (59)

Comorbidities

    Diabetes
2 (4.5)

    Hypertension
16 (36.4)

    Arteriopathy
9 (20.4)

    Tabaco
16 (36.4)

    Coronary disease
7 (15.9)

    Corticotherapy
5 (11.3)

    Immunosuppressive treatment
15 (34)

Type of cancer treated by radiation

    Prostate
18 (40.9)

    Anal
8 (18.2)

    Gynecologic cancer

        Uterus
8 (18.2)

        Endometrial
5 (11.3)

    Another
5 (11.3)

2.3. Types of Outcome Measures

The Undersea and Hyperbaric Medical Society defines HBOT as a treatment where a patient intermittently breathes 100% oxygen while the treatment chamber is pressurized to greater than sea level (1 absolute atm ATA). HBOT is thought to promote neovascularization by improving oxygenation thus increasing the pO2 to the damaged tissue, normalizing the tissue, and promoting wound healing to the damaged rectal mucosae, thereby reducing bleeding.

All patients received HBOT as a treatment of their PRD. The chamber was pressurized to 2.5 absolute atm and patients were treated for 60 minutes with 100% oxygen. Before HBOT, a history and physical investigation was performed by HBOT-trained specialists to validate the indication and eliminate the contraindications to HBO. Standard administration of HBOT was 20 sessions and was continued until a decrease in symptoms was observed. Treatment was given on a once-a-day basis, 5 to 7 days a week.

The pretreatment characteristics of the patients, the type of radiation received, SOMA-LENT score [9], the number of HBOT, the timing of the onset and reduction of symptoms, endoscopic injuries, the severity of the CRP, and the toxicity of treatment were collected prospectively.

The SOMA-LENT Scale (Table 2) [9] evaluates three different fields. First, subjective symptoms including tenesmus, mucus loss, defecation frequency, and pain and then objective symptoms including bleeding, ulceration, and stenosis are assessed. The third part details the medical management of all the symptoms (tenesmus and defecation frequency, pain, bleeding, ulceration, stenosis, and incontinence). The SOMA-LENT Scale defines 4 grades of increasing severity, of each criterion. The score can range from 0 to 56.

Table 2: SOMA-LENT Scale [9–22].

Grade 1
Grade 2
Grade 3
Grade 4
Score

Subjective

    Tenesmus
Occasional urgency
Frequent urgency
Constant urgency
Nonresponder

    Mucus lost
Occasional
Frequent
Constant
Nonresponder

    Incontinence
Occasional
Frequent
Constant
Nonresponder

    Defecation frequency
2–4 times/day
4–8 times/day
>8 times/day
Incontrol diarrhea

    Pain
Occasional and minimal
Frequent and tolerable
Constant and intense
Nonresponder and atrocious

Objective

    Bleeding
Hide
Occasional >2/week
Constant/daily
Brutal bleeding

    Ulceration
Superficial ≤1 cm²
Superficial >1 cm²
Deep ulcer
Perforation. Fistula

    Stenosis
>2/3 normal diameter without dilation
1/3 à 2/3 normal diameter with dilation
<1/3 normal diameter
Complete stenosis

Management

    Tenesmus and

    defecation frequency
Occasional ≤2 antidiarrhea medication/week
Usually >2 antidiarrhea medication/week
Several >2 antidiarrhea medication/day
Surgery/colostomy

    Pain
Occasional, nonopiate treatment
Usually nonopiate treatment
Usually with opiate treatment
Surgery

    Bleeding
Laxatives, for treatment
Occasional blood transfusion
Frequent blood transfusion
Surgery/colostomy

    Ulceration
Dietary management, laxatives
Occasional corticosteroids
Steroids rectal injection, HBOT
Surgery/colostomy

    Stenosis
Dietary management
Occasional dilation
Usually dilation
Surgery

    Incontinence
Occasional use of protective pads
Frequent use of protective pads
Constant use of protective pads
Surgery/colostomy

2.4. Statistical Analysis

Values are expressed as mean, median, and range. Statistical analysis was performed using GraphPad Software. Data are expressed as mean ± standard deviation or median with interquartile range. The differences between the two groups were analyzed using the Mann-Whitney test or Student’s -test. One-way analysis of variance or Kruskal-Wallis test was performed to compare more than two groups. Multivariate survival analysis using Cox’s regression model was conducted. To compare categorical variables, the chi-square or Fisher exact test was used. Kaplan-Meier method was used to estimate overall and relapse-free survival. For all tests, a value of less than 0.05 was considered significant.

3. Results

The median age of the cohort was 65.7 years (39–85). There were 18 females and 26 males. Median of delay between radiotherapy and the beginning of PRD symptoms was 16 months and the median of delay between radiotherapy and HBOT was 26 months (3–175). The median of followup was 8 months (3–17). PRD was associated chronic phase of radiation-induced damage in bladder for 17 patients (38%), in ileum for 2 patients (4%), and in sigmoid for 4 patients (9%).

Before HBOT, all patients had oral or topical treatments. Twenty-seven percent of patients required blood transfusion (). Electrocautery or argon plasma was performed on 13.6% () of patients. Corticosteroids enema was used on 29.6% () of patients; 6 of these patients also received formol enema. Twenty-seven percent () of patients required colostomy due to anal incontinence (), stenosis (), and fistula or sepsis (). No medical treatment was performed during HBOT.

The median number of sessions was 35, ranging from 6 to 90. Only one patient stopped precociously the HBOT (after 6 sessions) due to transient myopia.

At the end of followup twenty-six patients (59%) had a decreased SOMA-LENT score after HBOT, ten patients (22.8%) had a SOMA-LENT score unmodified, and eight patients (18.3%) showed an increase of the SOMA-LENT score. The median of SOMA-LENT score before HBOT was significantly greater, 14 (0–36), than after HBOT with the SOMA-LENT score of 12 (0–38) () (Figure 1).

Figure 1: Median score for SOMA-LENT before HBOT versus SOMA-LENT after HBOT per patient and per symptom. *. HBOT: hyperbaric oxygen therapy. Managing bleeding: patient required instrumental and/or blood transfusion Bleeding: patients with acute rectorrhagia.

HBOT decreased many symptoms: tenesmus, mucus loss, defecation frequency, bleeding, ulceration, and stenosis, with significant difference in tenesmus (), bleeding (), ulceration (), and management of ulceration () after HBOT (Figure 1). Concerning patients with colostomy, 33% () benefited from colostomies closure.

HBOT was generally well tolerated. Four patients had transient hearing problems. No cancer recurrence was found.

4. Discussion

PRD is seen after radiotherapy for any pelvic malignancy, including that of the bladder, the prostate, and the uterus. Although the complex pathological process of radiation-induced injury to the rectum begins immediately following exposure, it may require weeks to months to become clinically apparent [3, 4]. Late effects of radiation are seen from damaged to slowly replicating cells and by the induction of proinflammatory and procoagulation cytokine signaling pathways, leading to edema, fibrosis, and ultimately ischemia in the muscularis [10]. It is estimated that up to 30% of patients undergoing pelvic radiotherapy have acute rectal toxicities with 15% of patients experiencing chronic symptoms [11].

There are no standard therapies for radiation-induced proctopathy and a number of treatments have been described with varying efficacy, including pharmacotherapy, sclerotherapy, and HBOT [5].

By increasing systemic oxygen partial pressure, HBOT increases the delivery of oxygen to ischemic tissues [12], thereby promoting angiogenesis, nutrient influx, and fibroblast proliferation [12]. Several small retrospective series suggest that hyperbaric oxygen can successfully treat radiation-induced proctopathy with response rates between 40% and 60% [13]. A recent randomized, placebo controlled trial showed statistically significant improvement in wound healing with hyperbaric oxygen in patients with late radiation tissue necrosis compared to patients receiving normal air at 2 atmospheres [14]. In our study we demonstrate that HBOT had a significant impact on decreasing tenesmus and hemorrhage. Many patients had a failed medical treatment before HBOT as reported in a randomized control trial [14].

Our study population consisted of patients with severe radiation proctopathy after radiotherapy for pelvic cancer in whom multiple attempts at management including steroid injection, anti-inflammatory suppositories, and argon plasma laser coagulation failed. Due to our relatively small sample size, no inferences can be made on the outcomes in relation to prior treatments received. However, rectal bleeding was significantly reduced with an improvement in more than half of the patients. Rectal ulcers showed favorable responses to HBOT with partial or complete resolution in 20% of patients.

We used a standard scoring system to directly compare our outcomes to those from other series. Fewer than 20% of patients with this degree of injury heal spontaneously. Our series showed a favorable response (60% improved) with HBOT in patients with severe radiation proctitis refractory to treatment. Improvements were seen in mucus lost, defecation frequency, pain, stenosis, bleeding, and ulceration, and especially in tenesmus, bleeding, and ulceration which seemed to be most improved.

The optimal dose of oxygen is not known. In our study, we used an average of 35 treatments. Using an average of 24 treatments (two atmospheres for 105 min per session), Woo et al. reported improvement in 10 of 18 study patients with radiation proctitis [15]. Furthermore, Feldmeier et al. have reported their experience in using HBOT in eight patients with large or small bowel injuries who were given a median number of 20 treatments, whereby 75% of those who had at least 22 treatments had complete resolution of their symptoms [16]. Shorter durations (60 min) to enhance patient compliance and 26 treatment sessions have been used by Mayer and colleagues [17]. This prospective study, although nonrandomized with a small sample size, suggests a significant and prolonged response with HBOT in a challenging patient population. Overall the prognosis is favorable and further studies will require long-term followup to determine the durability of response to HBOT [18].

The most common complications experienced with HBOT delivery are mild and transient, including barotraumatic otitis, confinement anxiety, temporary myopia, and euphoria. More severe effects include rare seizures from central nervous system oxygen toxicity and pulmonary oxygen toxicity. In a series of 782 patients undergoing HBOT, 17% experienced ear pain with 3.4% having visually confirmed barotraumatic otitis [19]. In our series of 44 patients, HBOT was extremely well tolerated with only one patient who stopped HBOT for reversible myopia. Otherwise, our study as in the literature [16] is not in favor of increased risk of cancer recurrence.

This study confirms the interest of HBOT in chronic radiation proctitis resistant to conventional treatments [20, 21]. A multicenter study comparing HBOT with conventional treatments would clarify the role of this indication.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Authors’ Contribution

Mehdi Ouaïssi and Stephanie Tran equally contributed to this paper.

References

M. J. Zelefsky, K. E. Wallner, C. C. Ling et al., “Comparison of the 5-year outcome and morbidity of three-dimensional conformai radiotherapy versus transperineal permanent iodine-125 implantation for early-stage prostatic cancer,” Journal of Clinical Oncology, vol. 17, no. 2, pp. 517–522, 1999.

S. Girnius, N. Cersonsky, L. Gesell, S. Cico, and W. Barrett, “Treatment of refractory radiation-induced hemorrhagic proctitis with hyperbaric oxygen therapy,” American Journal of Clinical Oncology, vol. 29, no. 6, pp. 588–592, 2006.

H. J. N. Andreyev, “Gastrointestinal problems after pelvic radiotherapy: the past, the present and the future,” Clinical Oncology, vol. 19, no. 10, pp. 790–799, 2007.

H. J. N. Andreyev, A. Wotherspoon, J. W. Denham, and M. Hauer-Jensen, “Defining pelvic-radiation disease for the survivorship era,” The Lancet Oncology, vol. 11, no. 4, pp. 310–312, 2010.

W. M. Mendenhall, B. T. McKibben, B. S. Happe, R. C. Nichols, R. H. Henderson, and N. P. Mendenhall, “Management of radiation proctitis,” American Journal of Clinical Oncology. In press

M. H. Bennett, J. Feldmeier, N. Hampson, R. Smee, and C. Milross, “Hyperbaric oxygen therapy for late radiation tissue injury,” Cochrane Database of Systematic Reviews, vol. 5, no. 3, 2005.

J. Charneau, G. Bouachour, B. Person, P. Burtin, J. Ronceray, and J. Boyer, “Severe hemorrhagic radiation proctitis advancing to gradual cessation with hyperbaric oxygen,” Digestive Diseases and Sciences, vol. 36, no. 3, pp. 373–375, 1991.

J. J. Feldmeier and N. B. Hampson, “A systematic review of the literature reporting the application of hyperbaric oxygen prevention and treatment of delayed radiation injuries: an evidence based approach,” Undersea and Hyperbaric Medicine, vol. 29, no. 1, pp. 4–30, 2002.

P. Rubin, L. S. Constine, L. F. Fajardo, T. L. Phillips, and T. H. Wasserman, “Overview: late effects of normal tissues (LENT) scoring system,” International Journal of Radiation Oncology Biology Physics, vol. 31, no. 5, pp. 1041–1042, 1995.

H. B. Stone, C. N. Coleman, M. S. Anscher, and W. H. McBride, “Effects of radiation on normal tissue: consequences and mechanisms,” Lancet Oncology, vol. 4, no. 9, pp. 529–536, 2003.

D. V. Gopal, “Diseases of the rectum and anus: a clinical approach to common disorders,” Clinical Cornerstone, vol. 4, no. 4, pp. 34–46, 2002.

R. M. Leach, P. J. Rees, and P. Wilmshurst, “ABC of oxygen: hyperbaric oxygen therapy,” British Medical Journal, vol. 317, no. 7166, pp. 1140–1143, 1998.

M. J. Johnston, G. M. Robertson, and F. A. Frizelle, “Management of late complications of pelvic radiation in the rectum and anus: a review,” Diseases of the Colon and Rectum, vol. 46, no. 2, pp. 247–259, 2003.

D. Hayne and A. E. Smith, “Hyperbaric oxygen treatment of chronic refractory radiation proctitis: a randomized and controlled double-blind crossover trial with long-term follow-up,” International Journal of Radiation Oncology Biology Physics, vol. 72, no. 1, pp. 134–143, 2008.

T. C. S. Woo, D. Joseph, and H. Oxer, “Hyperbaric oxygen treatment for radiation proctitis,” International Journal of Radiation Oncology Biology Physics, vol. 38, no. 3, pp. 619–622, 1997.

J. J. Feldmeier, R. D. Heimbach, D. A. Davolt, M. J. Brakora, P. J. Sheffield, and A. T. Porter, “Does hyperbaric oxygen have a cancer-causing or -promoting effect? A review of the pertinent literature,” Undersea and Hyperbaric Medical Society, vol. 21, no. 4, pp. 467–475, 1994.

R. Mayer, H. Klemen, F. Quehenberger et al., “Hyperbaric oxygen—an effective tool to treat radiation morbidity in prostate cancer,” Radiotherapy and Oncology, vol. 61, no. 2, pp. 151–156, 2001.

R. D. Ennis, “Hyperbaric oxygen for the treatment of radiation cystitis and proctitis,” Current urology reports, vol. 3, no. 3, pp. 229–231, 2002.

C. Plafki, P. Peters, M. Almeling, W. Welslau, and R. Busch, “Complications and side effects of hyperbaric oxygen therapy,” Aviation Space and Environmental Medicine, vol. 71, no. 2, pp. 119–124, 2000.

N. Oscarsson, P. Arnell, P. Lodding, S. E. Ricksten, and H. Seeman-Lodding, “Hyperbaric oxygen treatment in radiation-induced cystitis and proctitis: a prospective cohort study on patient-perceived quality of recovery,” International Journal of Radiation Oncology Biology Physics, vol. 15, no. 87, pp. 670–675, 2013.

C. Oliai, B. Fisher, A. Jani et al., “Hyperbaric oxygen therapy for radiation-induced cystitis and proctitis,” International Journal of Radiation Oncology, Biology, Physics, vol. 1, no. 84, pp. 733–740, 2012.

F. Mornex, M. Bolla, J. J. Pavy, and J. J. Mazeron, “Late effects of ionizing radiations on normal tissues,” Cancer Radiothérapie, vol. 1, no. 6, p. 621, 1997.