Gastroenterology Research and Practice
Volume 2019 (2019), Article ID 5290642, 5 pages
https://doi.org/10.1155/2019/5290642

Research Article

Endoscopic Ultrasound Findings in Patients Diagnosed with Exocrine Pancreatic Insufficiency by Low Fecal Elastase-1

Mazen Shobassy,¹ Nedaa Husainat,¹ Abdalaziz Tabash,¹ Kalpesh Patel,¹ Hashem B. El-Serag,1,2,3 and Mohamed O. Othman¹

¹Section of Gastroenterology and Hepatology, Department of Medicine, Baylor College of Medicine, Houston, TX, USA
²Center for Innovations in Quality, Effectiveness, and Safety, Michael E. DeBakey Veterans Affairs Medical Center, Houston, TX, USA
³Section of Gastroenterology and Hepatology, Michael E. DeBakey Veterans Affairs Medical Center, Houston, TX, USA

Correspondence should be addressed to Mohamed O. Othman; mohamed.othman@bcm.edu

Received 22 January 2019; Revised 9 May 2019; Accepted 2 July 2019; Published 14 August 2019

Academic Editor: Michel Kahaleh

Copyright © 2019 Mazen Shobassy et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Background and Aims. Fecal elastase-1 (FE-1) as a screening test for exocrine pancreatic insufficiency (EPI) is gaining popularity in clinical practice. The role of imaging in patients with FE-1-related suspicion of EPI remains unclear. The aim of this study was to characterize endoscopic ultrasound (EUS) findings for patients with low FE-1. Methods. A retrospective cross-sectional study was performed in 40 patients who had low FE-1 and underwent EUS to evaluate the pancreas. We obtained data on demographic and lifestyle factors, EUS findings, and histopathology results. We compared these variables between patients with  mcg/g vs. 100-200 mcg/g. Results. Most patients (82.5%) established one or more new diagnoses from EUS. Diagnoses included: definitive chronic pancreatitis (, 72.5%), fatty pancreas (, 22.5%), and pancreatic solid mass or cyst (, 22.5%). Half () of the solid or cystic lesions were neoplastic. All patients with a solid pancreatic mass also had concurrent chronic pancreatitis. There were no significant differences in EUS findings or demographic or lifestyle factors between groups with  mcg/g vs. 100-200 mcg/g. Conclusion. Chronic pancreatitis is the most common EUS finding in patients with low FE-1 levels. EUS appears helpful in determining the cause of EPI in most patients with low FE-1 and may detect unsuspected pancreatic neoplasia.

1. Introduction

Exocrine pancreatic insufficiency (EPI) is characterized by diarrhea, bloating, abdominal pain, and weight loss [1]. Complications of EPI include cardiovascular disease, compromised immunity, psychological disorders, bleeding disorders, night blindness, and muscle weakness [2–4]. However, EPI can be asymptomatic [5] and unrecognized in the early stages where diagnosis is challenging.

There are several diagnostic tests for EPI, but all have limitations [1, 6, 7]. Direct tests of pancreatic function, such as secretin-cholecystokinin or secretin-cerulein stimulation tests, have the highest accuracy for evaluating pancreatic secretions. However, their use is limited by high expense and lack of standardization of testing. Indirect tests such as 72-hour fecal fat quantification are considered a gold standard for diagnosing steatorrhea, but are cumbersome and have poor sensitivity for diagnosing mild to moderate EPI. Furthermore, many of these tests are inaccurate for patients who are taking pancreatic enzyme replacement therapy [1, 6, 7].

Fecal elastase-1 (FE-1) is a widely available noninvasive diagnostic tool for EPI. Elastase-1 is an enzyme produced by pancreatic acinar cells. Because of minimal degradation as it passes through the gut, fecal levels of elastatse-1 correlate well with pancreatic enzyme output [8, 9]. A recent meta-analysis by Vanga et al. found that FE-1 had a pooled sensitivity of 0.96 and specificity of 0.88 for identifying patients with EPI compared to quantitative fecal fat estimation [10]. With a relatively high sensitivity and wide availability, FE-1 is more frequently used to test for and diagnose possible EPI cases.

Chronic pancreatitis is the most common cause of EPI, but other etiologies such as cystic fibrosis and pancreatic neoplasms can also be present [6, 11–13]. Emerging data has also associated pancreatic steatosis with EPI [14]. Once EPI is diagnosed, patients are frequently started on a therapeutic/diagnostic trial of pancreatic enzyme replacement. Though symptoms may improve after starting enzyme replacement, it remains unclear if pancreatic imaging is still useful on the initial evaluation of EPI.

Endoscopic ultrasound (EUS) is highly sensitive for the diagnosis of pancreatic neoplasms, chronic pancreatitis, and fatty pancreas [15–17]. However, the role of EUS in the management of patients with suspected EPI is unclear. There are no data on EUS findings in patients with EPI detected by low FE-1 levels. The aim of this study is to examine the EUS findings in patients with low FE-1, without prior diagnoses of chronic pancreatitis, cystic fibrosis, or pancreatic neoplasms.

2. Methods

This study was approved by the Institutional Review Board at Baylor College of Medicine. We conducted a cross-sectional study among patients seen at Baylor Clinic in Houston, Texas, from January 2015 to December 2016. Consecutive patients who were 18 years of age or older referred for suspected EPI, as defined by a  mcg/g, and underwent EUS were included in the study. We excluded pregnant patients and those with established cystic fibrosis because these patients already had a known cause of EPI. We collected data on patient demographics (gender, age), anthropometrics (weight, height), lifestyle factors (smoking history, alcohol use), and pancreatic testing/imaging (FE-1, CT, MRI, EUS findings).

2.1. Fecal Elastase-1

In all patients, FE-1 test was determined using a commercial kit (LabCorp, pancreatic elastase-1, United States) that employs enzyme-linked immunosorbent assay (ELISA) of monoclonal antibody-based detection system specific for pancreatic elastase-1. Based on lab references, normal FE-1 level was greater than 200 mcg/g. Moderate EPI was defined as 100-200 mcg/g, and severe EPI was defined as less than 100 mcg/g.

2.2. EUS Findings

EUS procedures were performed by one of three expert endosonographers (each previously performed more than 1000 EUS procedures). EUS was performed using an Olympus (Olympus Medical Systems, Tokyo, Japan) or Pentax (Pentax Medical Company, Montvale, NJ, USA) radial or curved-linear arrayed scope. All patients were placed in the left lateral position, and using radial arrayed EUS, the head of the pancreas was examined through the duodenum. The pancreatic body to tail was scanned through the stomach. Using curved-linear arrayed EUS, the head of the pancreas was scanned through the duodenum and stomach.

We reviewed the EUS findings for parenchymal changes (including hyperechoic foci, hyperechoic strands, lobularity, and cysts) and ductal changes (including hyperechoic ductal margins, dilated main pancreatic duct, duct irregularity, dilated side branches, or intraductal stones) as well as pancreatic calcifications, atrophy, or masses. Chronic pancreatitis was defined according to the Rosemont classification which included major A and B features [18].

Irrespective of chronic pancreatitis, patients with diffuse echogenicity throughout the pancreas were considered to have a fatty pancreas. If pancreatic masses or cysts were detected on EUS, fine needle aspiration and/or biopsy was performed. Cytology and histological reports were reviewed for final diagnosis.

2.3. Statistical Analysis

We stratified patients based on severe ( mcg/g) or moderate (100-200 mcg/g) EPI. EUS findings were aggregated as definite or indeterminate chronic pancreatitis as 2 mutually exclusive categories and fatty pancreas, cystic lesions, or pancreatic mass as not mutually exclusive. We compared the two FE-1 groups with respect to demographics, anthropometrics, lifestyle factors, and EUS pancreatic findings. Distributions of these variables between EPI patient groups were analyzed using -test and the chi-square test.

3. Results

3.1. Study Characteristics

A total of 40 patients with a mcg/g and EUS were included in the study (21 patients had a mcg/g, 19 patients had a FE-1 of 100-200 mcg/g). The study population characteristics are shown in Table 1. Overall, 16 male and 24 female patients were included. Documented history of smoking was reported in 24 of 40 patients, and 15 patients had a history of heavy alcohol use. The average age of patients was 54.0 years (standard deviation of 13.0 years) with a range of 25-80 years. The mean body mass index (BMI) was kg/m². Presenting symptoms such as diarrhea, reported weight loss, and history of diabetes were also included. There were no statistically significant differences in demographic, lifestyle factors, or presenting symptoms between the mcg/g and 100-200 mcg/g groups.

Table 1: Demographic, anthropometric, lifestyle factors, and presenting symptoms of study population.

Fecal elastase-1 levels

Overall
Severe EPI (<100 mcg/g)
Moderate EPI (100-200 mcg/g)
value

Male
40.0% (16/40)
52.4% (11/21)
26.3% (5/19)
0.09

Age (year)

0.78

BMI (kg/m²)

0.87

History of tobacco smoking
60.0% (24/40)
47.6% (10/21)
73.7% (14/19)
0.09

History of alcohol abuse
37.5% (15/40)
42.9% (9/21)
31.6% (6/19)
0.46

Reported diarrhea
85.0% (36/40)
85.7% (18/21)
84.2% (16/19)
0.89

Reported weight loss
47.5% (19/40)
52.4% (11/21)
42.1% (8/19)
0.52

Diabetes
27.5% (11/40)
38.1% (8/21)
15.8% (3/19)
0.11

3.2. EUS Findings

Most patient (33/40, 82.5%) were found to have one or more new diagnoses based on EUS findings. 14 of 40 patients (35.0%) had 2 or more diagnoses. These diagnoses were definitive chronic pancreatitis (72.5%), fatty pancreas (22.5%), and a cyst or mass (22.5%) (Table 2).

Table 2: Diagnostic findings of endoscopic ultrasound in patients with  mcg/g.

Fecal elastase-1 levels

Overall
Severe EPI (<100 mcg/g)
Moderate EPI (100-200 mcg/g)
value

Chronic pancreatitis

    Definite
72.5% (29/40)
81.0% (17/21)
63.2% (12/19)
0.21

    Indeterminate
17.5% (7/40)
9.5% (2/21)
26.3% (5/19)
0.16

Fatty pancreas
22.5% (9/40)
19.0% (4/21)
26.3% (5/19)
0.30

Pancreatic mass
15.0% (6/40)
19.0% (4/21)
10.5% (2/19)
0.45

Pancreatic cystic lesion
7.5% (3/40)
4.8% (1/21)
10.5% (2/19)
0.49

3.2.1. Chronic Pancreatitis

Definitive chronic pancreatitis was found in 29 of 40 patients (72.5%). Among patients with severe EPI ( mcg/g), 17/21 (81.0%) had definitive chronic pancreatitis, compared to 12/19 (63.2%) of patients with moderate EPI (-200 mcg/g) (). Only 2 patients had a normal appearing pancreas on EUS, and both had a mcg/g. Indeterminate chronic pancreatitis on EUS was found in 7 of 40 patients (17.5%); the distribution was 2/21 (9.5%) among patients with mcg/g and 5/19 (26.3%) among those with FE-1 between 100 and 200 mcg/g (). Specific endoscopic ultrasound findings were also compared between groups and has been listed in Table 3. Patients with mcg/g had a significantly higher prevalence of pancreatic duct dilation, pancreatic calcification, or atrophy of the pancreas.

Table 3: Comparison of endoscopic ultrasound findings in patients with  mcg/g.

EUS findings
Fecal elastase-1 levels

Overall
Severe EPI (<100 mcg/g)
Moderate EPI (100-200 mcg/g)
value

Hyperechoic strand
87.5% (35/40)
81.0% (17/21)
94.7% (18/19)
0.22

Hyperechoic foci
82.5% (33/40)
81.0% (17/21)
84.2% (16/19)
0.79

Lobulation
70.0% (28/40)
76.2% (16/21)
63.2% (12/19)
0.37

Dilated duct
37.5% (15/40)
52.4% (11/21)
21.1% (4/19)
0.04

Visible side branch
52.5% (21/40)
61.9% (13/21)
42.1% (8/19)
0.22

Hyperechoic duct wall
60.0% (24/40)
66.7% (14/21)
52.6% (10/19)
0.37

Calcification
35.0% (14/40)
52.4% (11/21)
15.8% (3/19)
0.02

Atrophy
20.0% (8/40)
33.3% (7/21)
5.3% (1/19)
0.05

3.2.2. Fatty Pancreas

A total of 9/40 patients (22.5%) had a fatty pancreas on EUS. Seven of these patients additionally had features of definite () or indeterminate chronic pancreatitis (). When stratified by FE-1 levels, 4/21 (19.0%) with a  mcg/g and 5/19 (26.3%) with -200 mcg/g had a fatty pancreas on EUS ().

3.2.3. Pancreatic Cyst or Mass

Overall, 9/40 patients (22.5%) had a solid pancreatic mass () or cyst () seen on EUS. All patients with a solid mass also had concurrent chronic pancreatitis. The average size of all lesions was 16 mm, and 6 of 9 patients had a . Seven of 9 patients had cross-sectional imaging prior to EUS, but only 2/7 patients (29%) had the same EUS-detected lesion seen on prior imaging modalities. All cross-sectional imaging consisted of triple phase CT scan or MRI of the abdomen performed at our facility. FNA and/or FNB was performed on all lesions detected during EUS. Final cytopathology and surgical pathology of solid lesions revealed one pancreatic adenocarcinoma, one neuroendocrine tumor, one leiomyoma, and three chronic pancreatitis. The 3 cystic lesions were intraductal papillary mucinous neoplasm, walled-off pancreatic necrosis, and a simple cyst (Table 4).

Table 4: Patients with pancreatic mass or cystic lesion on endoscopic ultrasound. Findings on EUS, histology, and cross-sectional imaging.

Size (mm) on EUS
Histological diagnosis (based on EUS-guided FNA)
Cross-sectional imaging before EUS

Pancreatic mass

1
25
Adenocarcinoma
Not appreciated

2
30
Leiomyoma
Not appreciated

3
15
Chronic pancreatitis
Not appreciated

4
15
Chronic pancreatitis
Not appreciated

5
7
Neuroendocrine tumor
Not appreciated

6
9
Chronic pancreatitis
n/a

Pancreatic cyst

1
20
WOPN
Yes, reported

2
15
Simple cyst
Yes, reported

3
11
IPMN
n/a

WOPN = walled-off pancreatic necrosis; IPMN = intraductal papillary mucinous neoplasm.

4. Discussion

As more patients undergo screening for EPI, evaluations of patients with low levels of FE-1 will increase. Although chronic pancreatitis is the most common cause of EPI, other diseases such as pancreatic cancer are also potential etiologies. The role of imaging in this population is unclear, and this study is the first to characterize the EUS findings in these patients.

We found that among 40 patients who presented with low FE-1 and underwent EUS, 82.5% established at least one new diagnosis (definitive chronic pancreatitis, fatty pancreas, mass, or cyst) from EUS. 72.5% were diagnosed with definite chronic pancreatitis, and 17.5% had probable chronic pancreatitis. Irrespective of chronic pancreatitis, EUS also showed cyst/mass (22.5%) or a fatty pancreas (22.5%). We also compared EUS findings in patients with  mcg/g vs. 100-200 mcg/g, and while the proportion of patients with abnormal EUS findings was higher in severe than moderate FE-1 defined EPI, these differences were not statistically significant. Overall, only two patients (5.0%) had a normal appearing pancreas on EUS. These findings suggest that EUS has a high diagnostic yield in this patient population and therefore should be considered as follow-up tests among most patients with abnormally low FE-1.

A large proportion (9/40, 22.5%) of all patients in this study also had a cyst or mass seen on EUS. Of the patients with a solid pancreatic mass, all had concurrent chronic pancreatitis. Three of these lesions were neoplasms that were sampled at the time of the initial EUS. The lesions were often small, and only 29% of these lesions were seen on other imaging modalities. These findings are consistent with other studies that suggest CT and MRI are less sensitive for in size [19] and further highlight the higher risk for pancreatic neoplasms in patients with chronic pancreatitis [20–23]. Early EUS evaluation in patients with low FE-1 levels may hasten the diagnosis of chronic pancreatitis, and possibly neoplasia. We would emphasize that some of the findings in this population (small mass or cyst) are not thought to be the cause for pancreatic insufficiency, but instead, have a high prevalence in such disease.

This study has the inherent limitations of a cross-sectional study design. It only examines the prevalence of disease at a specific point in time and does not give insight to incidence of disease. The prevalence of diseases of long duration and low fatality rate, such as chronic pancreatitis, may also be overestimated due to this study design. Given the cross-sectional study design and no control group, it is not possible to conclude that any of the study outcomes were the cause for the abnormal FE-1 in these patients. The study was limited by its relatively small sample size especially when evaluating the difference between groups. Large multicenter studies are needed to evaluate if these results can be further generalized to other populations.

Data Availability

The data used to support the findings of this study are restricted by the Baylor College of Medicine Institutional Review Board (IRB) in order to protect patients’ privacy. Data are available from Baylor College of Medicine IRB for researchers who meet the criteria for access to confidential data.

Disclosure

An earlier version of this abstract was published as a supplementary abstract in May 2016 in Gastrointestinal Endoscopy Journal.

Conflicts of Interest

Mohamed O. Othman is a consultant for Abbvie, Boston Scientific, Olympus Corporation of America, and Lumendi. Other authors declare that there is no conflict of interest regarding the publication of this paper.

References

B. Lindkvist, “Diagnosis and treatment of pancreatic exocrine insufficiency,” World Journal of Gastroenterology, vol. 19, no. 42, pp. 7258–7266, 2013.

S. Haas, S. Krins, A. Knauerhase, and M. Löhr, “Altered bone metabolism and bone density in patients with chronic pancreatitis and pancreatic exocrine insufficiency,” Journal of the Pancreas: JOP, vol. 16, no. 1, pp. 58–62, 2015.

S. Klapdor, E. Richter, and R. Klapdor, “Vitamin D status and per-oral vitamin D supplementation in patients suffering from chronic pancreatitis and pancreatic cancer disease,” Anticancer Research, vol. 32, no. 5, pp. 1991–1998, 2012.

M. F. Holick, “Vitamin D: importance in the prevention of cancers, type 1 diabetes, heart disease, and osteoporosis,” The American Journal of Clinical Nutrition, vol. 79, no. 3, pp. 362–371, 2004.

K. Nakajima, H. Oshida, T. Muneyuki, and M. Kakei, “Pancrelipase: an evidence-based review of its use for treating pancreatic exocrine insufficiency,” Core Evidence, vol. 7, pp. 77–91, 2012.

L. Laterza, F. Scaldaferri, G. Bruno et al., “Pancreatic function assessment,” European Review for Medical and Pharmacological Sciences, vol. 17, Supplement 2, pp. 65–71, 2013.

R. S. Chowdhury and C. E. Forsmark, “Pancreatic function testing,” Alimentary Pharmacology & Therapeutics, vol. 17, no. 6, pp. 733–750, 2003.

P. Levy, M. Barthet, B. R. Mollard, M. Amouretti, A. M. Marion-Audibert, and F. Dyard, “Estimation of the prevalence and incidence of chronic pancreatitis and its complications,” Gastroentérologie Clinique et Biologique, vol. 30, no. 6-7, pp. 838–844, 2006.

E. Van de Vijver, K. Desager, A. E. Mulberg et al., “Treatment of infants and toddlers with cystic fibrosis-related pancreatic insufficiency and fat malabsorption with pancrelipase MT,” Journal of Pediatric Gastroenterology and Nutrition, vol. 53, no. 1, pp. 61–64, 2011.

R. R. Vanga, A. Tansel, S. Sidiq, H. B. el-Serag, and M. O. Othman, “Diagnostic performance of measurement of fecal elastase-1 in detection of exocrine pancreatic insufficiency: systematic review and meta-analysis,” Clinical Gastroenterology and Hepatology, vol. 16, no. 8, pp. 1220–1228.e4, 2018.

T. C. Martin, A. Scourfield, N. Rockwood et al., “Pancreatic insufficiency in patients with HIV infection: role of didanosine questioned,” HIV Medicine, vol. 14, no. 3, pp. 161–166, 2013.

J. S. Leeds, A. D. Hopper, D. P. Hurlstone et al., “Is exocrine pancreatic insufficiency in adult coeliac disease a cause of persisting symptoms?” Alimentary Pharmacology & Therapeutics, vol. 25, no. 3, pp. 265–271, 2007.

J. E. Dominguez-Munoz, “Pancreatic enzyme replacement therapy: exocrine pancreatic insufficiency after gastrointestinal surgery,” HPB: The Official Journal of the International Hepato Pancreato Biliary Association, vol. 11, Supplement 3, pp. 3–6, 2009.

M. Tahtacı, O. Algın, T. Karakan et al., “Can pancreatic steatosis affect exocrine functions of pancreas?” The Turkish Journal of Gastroenterology, vol. 29, no. 5, pp. 588–594, 2018.

S. S. Rana and P. Vilmann, “Endoscopic ultrasound features of chronic pancreatitis: a pictorial review,” Endoscopic Ultrasound, vol. 4, no. 1, pp. 10–14, 2015.

T. B. Gardner and M. J. Levy, “EUS diagnosis of chronic pancreatitis,” Gastrointestinal Endoscopy, vol. 71, no. 7, pp. 1280–1289, 2010.

G. Morris-Stiff, P. Webster, B. Frost, W. G. Lewis, M. C. Puntis, and S. A. Roberts, “Endoscopic ultrasound reliably identifies chronic pancreatitis when other imaging modalities have been non-diagnostic,” Journal of the Pancreas: JOP, vol. 10, no. 3, pp. 280–283, 2009.

M. F. Catalano, A. Sahai, M. Levy et al., “EUS-based criteria for the diagnosis of chronic pancreatitis: the Rosemont classification,” Gastrointestinal Endoscopy, vol. 69, no. 7, pp. 1251–1261, 2009.

Y. L. Bronstein, E. M. Loyer, H. Kaur et al., “Detection of small pancreatic tumors with multiphasic helical CT,” AJR. American Journal of Roentgenology, vol. 182, no. 3, pp. 619–623, 2004.

U. C. Bang, T. Benfield, L. Hyldstrup, F. Bendtsen, and J.–. E. Beck Jensen, “Mortality, cancer, and comorbidities associated with chronic pancreatitis: a Danish nationwide matched-cohort study,” Gastroenterology, vol. 146, no. 4, pp. 989–994.e1, 2014.

A. B. Lowenfels, P. Maisonneuve, G. Cavallini et al., “Pancreatitis and the risk of pancreatic cancer,” New England Journal of Medicine, vol. 328, no. 20, pp. 1433–1437, 1993.

E. J. Duell, E. Lucenteforte, S. H. Olson et al., “Pancreatitis and pancreatic cancer risk: a pooled analysis in the International Pancreatic Cancer Case-Control Consortium (PanC4),” Annals of Oncology, vol. 23, no. 11, pp. 2964–2970, 2012.

A. Ekbom, J. K. McLaughlin, B. M. Karlsson et al., “Pancreatitis and pancreatic cancer: a population-based study,” Journal of the National Cancer Institute, vol. 86, no. 8, pp. 625–627, 1994.