International Journal of Antennas and Propagation

Volume 2013 (2013), Article ID 603654, 6 pages

http://dx.doi.org/10.1155/2013/603654

Research Article

Microstrip Folded Dipole Antenna for 35 GHz MMW Communication

Guang Hua, Chen Yang, Ping Lu, Hou-Xing Zhou, and Wei Hong

State Key Laboratory of Millimeter Waves, School of Information Science and Engineering, Southeast University, Nanjing 210096, China

Received 8 October 2013; Accepted 27 November 2013

Academic Editor: Guo Qing Luo

Copyright © 2013 Guang Hua et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

A microstrip asymmetric folded dipole antenna on chip is proposed in this paper. The construction of balun feed line is adopted to provide wideband. A new design procedure based on the odd-even mode method to calculate the input impedance of an asymmetric strip folded dipole antenna is presented. The folded dipole antenna has the advantage of small size, low profile, low cost, and so forth. The measured results show that a miniaturized antenna has the bandwidth of more than 14.2% (VSWR 2); gain of the antenna is 5.7 dB at 35 GHz.

1. Introduction

Recently, substantial knowledge about the 35 GHz millimeter-wave (MMW) channel has been accumulated and different architectures have been analyzed to develop new MMW communication systems for commercial applications. MMW technique has been used as a favorite data transmission means for wireless or mobile communications. MMW integrated antenna, as the most effective reconnaissance tool, is popularly applied in many fields and becomes more and more indispensable. As is used in various fields for a highly attractive solution, several rigorous requirements for antennas such as small size, wide bandwidth, and stable radiation pattern are under consideration when the antenna is applied [1–3].

In this paper, a strip asymmetric folded dipole antenna and a new design procedure based on the odd-even mode method to calculate the input impedance of the antenna have been proposed to realize wide bandwidth and high gain. The method is explicit and simple. The construction of balun fed by microstrip is used to provide 180 phase difference and wideband. In order to integrate the antenna on chip, the structure traditional analysis method, and high frequency characteristic of antenna have to be taken into account.

2. Antenna Design

The configuration of the proposed antenna is shown in Figure 1. The antenna is constructed by using microstrip folded dipoles connected with a balun feed line on a bottom substrate having a thickness of 0.635 mm and a relatiminiaturization, GaAs substrate material, dielectric constant of 10.2. The asymmetric strip folded dipole is designed on the top of the substrate, which has a thickness of 0.1 mm and a relative dielectric constant of 2.2. The values of design parameters are listed in Table 1.

Table 1: Values of design parameters (all in millimetres).

3.44
0.12
0.1
0.11
0.6
0.318
0.462
0.13
0.1
0.237
0.13
0.87
0.1
0.635
2.2
10.2

(a)

(b)

Figure 1: The construction of the antenna: (a) side view; (b) top view.

The strip asymmetric folded dipole is shown in Figure 2. The geometries such as , , , , , and are adjusted to tune the input impedance and to widen the bandwidth. The antenna is accompanied without ground plane, so its radiation pattern is similar to the dipole of the same length , but it provides about four times lager input impedance than that of the conventional dipole when . The length of a single-wire dipole is usually for best directivity with no side lobes. Usually, is about half wavelength and . The separation distance between the two strip transmission lines of the folded dipole should not exceed .

Figure 2: The schematic diagram of strip asymmetric folded dipole.

According to the traditional analysis method [4], the excitation of a folded dipole is decomposed into two fundamental modes: the transmission line mode and unbalanced antenna radiation mode, as described in Figure 3, where is the antenna current of the dipole and is the transmission line current. The feed port input impedance of folded dipole is given by [5]:

where is the input impedance of strip dipole antenna with length of and width of . is the input impedance of the asymmetric strip. Consider

where is characteristic impedance of transmission line and is the elliptic function; ,

where is the distance between middles of two strip dipole line and is the impedance ratio. Since and are too complicated to be calculated, so an explicit and simple method is presented.

Figure 3: Current distribution on a folded dipole.

The design procedure involves two steps. The first is to calculate the input impedance of asymmetric strip line in transmission mode. The second step is to calculate the input impedance of asymmetric folded dipole in antenna mode. Then according to the traditional method equivalent input impedance is obtained [4].

2.1. Input Impedance of Transmission Line

The input impedance in asymmetric transmission can be viewed as two-series transmission line. An input impedance can be obtained by

where is the characteristic impedance of a strip transmission line. The characteristic impedance of and strip is calculated by Agilent ADS or Ansoft Designer, respectively.

2.2. Input Impedance of Folded Dipole Antenna

In case of symmetrical geometry of microstrip antennas or arrays with any voltage excitation, generalize odd-even mode expansion method can be used. An asymmetric folded dipole in antenna mode can be viewed as symmetric two-port microwave network, as shown in Figures 4 and 5. The characteristic impedance can be determined by odd-even method. The symmetric plane is magnet wall in even mode situation and electric wall in odd mode situation, respectively. The input impedance (resistance and reactance) of a very thin dipole of length and diameter can be computed using either Pocklington's integral equation or Hallen's integral equation [4]. The equivalent radius of strip dipole can determine that Hallen's theory of cylindrical antennas could be extended to antennas having noncircular cross section [4].

Figure 4: A strip asymmetric folded dipole in antenna mode.

Figure 5: Equivalent two-port network for strip asymmetric folded dipole.

To derive an equation for the input impedance, let us refer to the model of Figure 6. When the electric and magnet wall were taken at the plane, odd admittance and even admittance at the terminals 1-1′ are obtained, respectively. Consider

where , is radiation admittance in correspondence of and strip dipole.

Figure 6: Equivalent network with electric and magnet wall.

The odd mode excitation is as follows:

The even mode excitation () is as follows:

The input admittance and input impedance are

A solution of input impedance is similar to the traditional analysis method, when the input impedance in transmission line mode and the input impedance in antenna mode are obtained. The curves comparison with odd-even mode method and method of literature [5] is shown in Figure 7.

Figure 7: Comparison with odd-even mode and literature [5] method.

Balun is an electrical device that converts an unbalanced signal (two signals working against each other where ground is irrelevant) to a balanced signal (a single signal working against ground or pseudo-ground), and vice versa. It has many forms and may include devices that also transform impedance. Transformer baluns can also be used to match impedance of differing transmission lines.

A simple structure using the shown microstrip feeding in Figure 8 is designed for the proposed balun to extend the bandwidth. The length difference between two arms of transmission line is , where is the wavelength of microstrip [6–9].

Figure 8: The schematic diagram of balun.

3. Simulated and Experimental Results

The front and back view of the proposed antenna are shown in Figures 9 and 10, which has the similar size with the Chinese coin of one yuan.

Figure 9: The front of the proposed antenna.

Figure 10: The back of the proposed antenna.

The analysis of the proposed antenna is completed by using the Ansys HFSS. The simulated and measured S-parameter of the antenna from 30 GHz to 40 GHz are shown in Figure 11. It can be seen that the antenna has a simulation bandwidth of 5 GHz and a measured bandwidth of 3.5 GHz.

Figure 11: The measured and simulated return loss of the proposed antenna.

The central frequency has moved to 36.5 GHz. The simulated return loss with different width of the ground is shown in Figure 12. As width grew, the central frequency has moved to low frequency.

Figure 12: The simulated return loss with different width of the ground.

The measured E-plane and H-plane patterns at 35 GHz are shown in Figures 13 and 14, respectively. From the figures of radiation pattern, it is observed that gain of the antenna is 5.7 dB, lesser than the simulated result. It is considered that the measured results do not perfectly match the simulated results which are caused by the limits of manufacturing technology and the influence of measurement environment; all these deficiencies need to be considered seriously and improved in further research.

Figure 13: E-plane radiation pattern at 35 GHz.

Figure 14: H-plane radiation pattern at 35 GHz.

4. Conclusion

A microstrip folded dipole antenna on chip is proposed with 5 GHz bandwidth and central frequency of 35 GHz. It has been demonstrated that the design takes the advantages of small size, wide impedance bandwidth, and stable radiation pattern. A new odd-even mode design procedure to calculate input impedance for asymmetric strip folded dipole is presented. It was verified that it is explicit and simple by another method [5] and another experiment.

Acknowledgments

This work was supported by the National Basic Research Program of China (no. 2009CB320203 and 2010CB327400) and in part by the National Science and Technology Major Project of China under Grant no. 2010ZX03007-001-01.

References

G. Hua, J. Zhang, J. Wu, and W. Hong, “Design and optimization of a millimetre wave compact folded magic-T,” International Journal of Antennas and Propagation, vol. 2012, Article ID 838962, 6 pages, 2012.

S. Montusclat, F. Gianesello, and D. Gloria, “Silicon full integrated LNA, filter and antenna system beyond 40 GHz for MMW wireless communication links in advanced CMOS technologies,” in Proceedings of the IEEE Radio Frequency Integrated Circuits Symposium, pp. 77–80, June 2006.

K. H. Park, “Generation of CW MMW using optical signal propagating nonlinear materials for wireless communications and ubiquitous communications systems,” Electronics Letters, vol. 41, no. 10, pp. 599–601, 2005.

C. A. Balanis, Antenna Theory: Analysis and Design, John Wiley & Sons, Hoboken, NJ, USA, 3rd edition, 2012.

S. Keyrouz, H. J. Visser, R. J. M. Vullers, and A. G. Tijhuis, “Novel analytical procedures for folded strip dipole antennas,” in Proceedings of the 6th IEEE European Conference on Antennas and Propagation (EUCAP '12), pp. 2479–2482, 2012.

P.-C. Yeh, W.-C. Liu, and H.-K. Chiou, “Compact 28-GHz subharmonically pumped resistive mixer MMIC using a lumped-element high-pass/band-pass balun,” IEEE Microwave and Wireless Components Letters, vol. 15, no. 2, pp. 62–64, 2005.

F. Hettstedt, W. Stellmach, T. von Hofe, R. Knãchel, and E. Quandt, “3D thin film Guanella-balun,” in Proceedings of the 7th German Microwave Conference (GeMiC '12), pp. 1–4, 2012.

Y. Dai, H. Yin, Y. Feng, P. Li, Q. Han, and M. Han, “A LTCC miniaturized broadband modified Marchand balun,” in Proceedings of the International Symposium on Communications and Information Technologies (ISCIT '12), pp. 110–113, 2012.

C. Inui, M. Yasuo, and M. Fujishima, “On-chip S-shaped rat-race balun for millimeter-wave band using wafer-level chip-size package process,” in Proceedings of the European Microwave Integrated Circuit Conference (EuMIC '08), pp. 32–35, October 2008.